목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

구성

네트워크 다이어그램

구성

다음을 확인합니다.

문제 해결

문제 해결 명령

관련 정보

소개

이 샘플 컨피그레이션에서는 Cisco VPN 5000 Concentrator와 Cisco IOS® 라우터 간에 IPSec을 통한 GRE(Generic Routing Encapsulation)를 구성하는 방법에 대해 설명합니다. GRE-over-IPSec 기능은 VPN 5000 Concentrator 6.0(19) 소프트웨어 릴리스에 도입되었습니다.

RIP(Routing Information Protocol)는 VPN 터널을 통해 트래픽을 라우팅하기 위해 이 샘플에서 동적 라우팅 프로토콜로 사용됩니다.

사전 요구 사항

요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서의 정보는 다음 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- Cisco IOS Software 릴리스 12.1(5)T7

- VPN 5000 Concentrator Software 릴리스 6.0(19)

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 현재 네트워크가 작동 중인 경우, 모든 명령어의 잠재적인 영향을 미리 숙지하시기 바랍니다.

표기 규칙

문서 표기 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참조하십시오.

구성

이 섹션에는 이 문서에서 설명하는 기능을 구성하기 위한 정보가 표시됩니다.

참고: 이 문서에 사용된 명령에 대한 추가 정보를 찾으려면 명령 조회 도구(등록된 고객만 해당)를 사용합니다.

네트워크 다이어그램

이 문서에서는 이 다이어그램에 표시된 네트워크 설정을 사용합니다.

GRE over IPSec은 Cisco IOS 라우터(7140)와 Cisco VPN 5008 Concentrator 간에 구성됩니다. 이러한 디바이스 뒤에는 7140과 VPN 5008 사이의 GRE 터널 내에서 실행되는 RIP를 통해 여러 네트워크가 광고됩니다.

Cisco 7140을 지원하는 네트워크는 다음과 같습니다.

- 10.31.0.0/17

VPN 5008 뒤의 네트워크는 다음과 같습니다.

- 172.18.124.0.0/24

- 20.20.20.0/24

- 10.0.0.0/24

구성

이 문서에서는 여기에 표시된 구성을 사용합니다.

- Cisco IOS 라우터

- VPN 5000 Concentrator

- CVC

Cisco IOS 라우터

Building configuration...

Current configuration : 1607 bytes

!

version 12.1

no service single-slot-reload-enable

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 03-vpn-7140

!

boot system flash disk1:c7100-ik8s-mz.122-3

logging rate-limit console 10 except errors

enable password <removed>

!

ip subnet-zero

ip cef

!

!

no ip finger

!

!

!--- Define phase 1 policy.

crypto isakmp policy 10

authentication pre-share

!--- Define the PreShared Key for the Remote peer !--- (5000 ) in this example.

crypto isakmp key cisco123 address 10.32.1.161

!

!--- Define Phase 2 policy. !--- Make sure that Transport Mode is enabled.

crypto ipsec transform-set www esp-des esp-sha-hmac

mode transport

!

!--- Define the crypto map that is later !--- applied on the outbound interface.

crypto map temp 10 ipsec-isakmp

set peer 10.32.1.161

set transform-set www

match address 100

!

call rsvp-sync

!

!

!

!

!

!

!

controller ISA 5/1

!

!--- Define the GRE tunnel on the router. !--- Tunnel source is the outbound interface !--- and tunnel destination is VPN 5000.

interface Tunnel0

ip address 10.1.1.2 255.255.255.0

tunnel source FastEthernet0/0

tunnel destination 10.32.1.161

crypto map temp

!

!--- Outbound Interface that is connected to the Internet.

interface FastEthernet0/0

ip address 10.32.1.162 255.255.128.0

duplex auto

speed auto

crypto map temp

!

!

!--- Inside interface.

interface FastEthernet0/1

ip address 10.31.100.1 255.255.128.0

no keepalive

duplex auto

speed auto

!

interface Serial1/0

no ip address

shutdown

framing c-bit

cablelength 10

dsu bandwidth 44210

!

interface Serial1/1

no ip address

shutdown

framing c-bit

cablelength 10

dsu bandwidth 44210

!

!--- Define RIP Routing Protocol on the router. !--- This example shows Version 2 for classless routing.

router rip

version 2

network 10.0.0.0

no auto-summary

!

ip classless

ip route 0.0.0.0 0.0.0.0 10.32.1.1

no ip http server

!

!--- Encryption access-list that is used !--- to encrypt the GRE packets.

access-list 100 permit gre host 10.32.1.162 host 10.32.1.161

!

!

line con 0

exec-timeout 0 0

transport input none

line aux 0

line vty 5 15

!

end

VPN 5000 Concentrator

show configuration

Edited Configuration not Present, using Running

[ IP Ethernet 0:0 ]

SubnetMask = 255.255.255.0

IPAddress = 1.1.1.1

[ IP Ethernet 1:0 ]Mode = Routed

SubnetMask = 255.255.128.0

IPAddress = 10.32.1.161

[ General ]

VPNGateway = 10.32.1.1

EnablePassword = <removed>

Password = <removed>

EthernetAddress = 00:00:a5:e9:c8:00

DeviceType = VPN 5002/8 Concentrator

ConfiguredOn = Timeserver not configured

ConfiguredFrom = Command Line, from Console

[ IKE Policy ]

Protection = SHA_DES_G1

[ IP Static ]

0.0.0.0 0.0.0.0 10.32.1.1 1 redist=none

[ Context List ]

flash://rip.cfg

[ Logging ]

Enabled = On

Level = 7

Configuration size is 822 out of 65500 bytes.

VPN5002_8_A5E9C800: Main#

CVC

show configuration

Edited Configuration not Present, using Running

[ General ]

Context = "rip"

[ IP Ethernet 1:0.1 ]

VLANID = 124

Encapsulation = dot1q

Mode = Routed

SubnetMask = 255.255.255.0

IPAddress = 172.18.124.219

[ IP Static ]

[ Tunnel Partner VPN 1 ]

InactivityTimeout = 120

Transform = esp(sha,des)

KeyManage = ReliablePeer = "10.31.0.0/17"

LocalAccess = "10.5.1.0/24"

SharedKey = "cisco123"

Mode = Main

TunnelType = GREinIPSec

BindTo = "Ethernet 1:0"

Partner = 10.32.1.162

[ IP VPN 1 ]

RIPIn = On

RIPOut = On

RIPVersion = V2

DirectedBroadcast = Off

Numbered = On

Mode = Routed

SubnetMask = 255.255.255.0

IPAddress = 10.1.1.1

[ IP Ethernet 1:0.2 ]

Mode = Routed

SubnetMask = 255.255.255.0

IPAddress = 20.20.20.20

Configuration size is 1127 out of 65500 bytes.

VPN5002_8_A5E9C800: rip#

다음을 확인합니다.

이 섹션에서는 컨피그레이션이 제대로 작동하는지 확인하는 데 사용할 수 있는 정보를 제공합니다.

일부 show 명령은 출력 인터프리터 툴 에서 지원되는데(등록된 고객만), 이 툴을 사용하면 show 명령 출력의 분석 결과를 볼 수 있습니다.

- show ip route - 라우팅 테이블의 현재 상태를 표시합니다.

- show crypto engine connection active(암호화 엔진 연결 활성 표시) - IPSec 보안 연결당 패킷 암호화/암호 해독 카운터를 표시합니다.

- show crypto ipsec sa - 현재 모든 IPSec 보안 연결을 표시합니다.

- show system log buffer —기본 syslog 정보를 표시합니다.

- vpn trace dump - VPN 프로세스에 대한 자세한 정보를 표시합니다.

03-vpn-7140#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.32.1.1 to network 0.0.0.0

20.0.0.0/24 is subnetted, 1 subnets

R 20.20.20.0 [120/1] via 10.1.1.1, 00:00:10, Tunnel0

172.18.0.0/16 is variably subnetted, 2 subnets, 2 masks

R 172.18.124.0/24 [120/1] via 10.1.1.1, 00:00:10, Tunnel0

10.0.0.0/8 is variably subnetted, 4 subnets, 2 masks

R 10.0.0.0/24 [120/2] via 10.1.1.1, 00:00:10, Tunnel0

C 10.1.1.0/24 is directly connected, Tunnel0

C 10.31.0.0/17 is directly connected, FastEthernet0/1

C 10.32.0.0/17 is directly connected, FastEthernet0/0

S* 0.0.0.0/0 [1/0] via 10.32.1.1

03-vpn-7140#

03-vpn-7140#show crypto enggine connection active

ID Interface IP-Address State Algorithm Encrypt Decrypt

3 FastEthernet0/0 10.32.1.162 set HMAC_SHA+DES_56_CB 0 0

4 FastEthernet0/0 10.32.1.162 set HMAC_SHA+DES_56_CB 0 0

5 FastEthernet0/0 10.32.1.162 set HMAC_SHA+DES_56_CB 0 0

2098 FastEthernet0/0 10.32.1.162 set HMAC_SHA+DES_56_CB 0 1892

2099 FastEthernet0/0 10.32.1.162 set HMAC_SHA+DES_56_CB 11552 0

03-vpn-7140#show crypto ipsec sa

interface: FastEthernet0/0

Crypto map tag: temp, local addr. 10.32.1.162

local ident (addr/mask/prot/port): (10.32.1.162/255.255.255.255/0/0)

remote ident (addr/mask/prot/port): (10.32.1.161/255.255.255.255/0/0)

current_peer: 10.32.1.161

PERMIT, flags={transport_parent,}

#pkts encaps: 0, #pkts encrypt: 0, #pkts digest 0

#pkts decaps: 0, #pkts decrypt: 0, #pkts verify 0

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0, #pkts decompress failed: 0

#send errors 0, #recv errors 0

local crypto endpt.: 10.32.1.162, remote crypto endpt.: 10.32.1.161

path mtu 1500, media mtu 1500

current outbound spi: 0

inbound esp sas:

inbound ah sas:

inbound pcp sas:

outbound esp sas:

outbound ah sas:

outbound pcp sas:

local ident (addr/mask/prot/port): (10.32.1.162/255.255.255.255/47/0)

remote ident (addr/mask/prot/port): (10.32.1.161/255.255.255.255/47/0)

current_peer: 10.32.1.161

PERMIT, flags={origin_is_acl,transport_parent,}

#pkts encaps: 12912, #pkts encrypt: 12912, #pkts digest 12912

#pkts decaps: 2382, #pkts decrypt: 2382, #pkts verify 2382

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0, #pkts decompress failed: 0

#send errors 0, #recv errors 0

local crypto endpt.: 10.32.1.162, remote crypto endpt.: 10.32.1.161

path mtu 1500, media mtu 1500

current outbound spi: 101

inbound esp sas:

spi: 0x4624F3AD(1176826797)

transform: esp-des esp-sha-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 2098, flow_id: 69, crypto map: temp

sa timing: remaining key lifetime (k/sec): (1048130/3179)

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0x101(257)

transform: esp-des esp-sha-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 2099, flow_id: 70, crypto map: temp

sa timing: remaining key lifetime (k/sec): (1046566/3179)

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

interface: Tunnel0

Crypto map tag: temp, local addr. 10.32.1.162

local ident (addr/mask/prot/port): (10.32.1.162/255.255.255.255/0/0)

remote ident (addr/mask/prot/port): (10.32.1.161/255.255.255.255/0/0)

current_peer: 10.32.1.161

PERMIT, flags={transport_parent,}

#pkts encaps: 0, #pkts encrypt: 0, #pkts digest 0

#pkts decaps: 0, #pkts decrypt: 0, #pkts verify 0

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0, #pkts decompress failed: 0

#send errors 0, #recv errors 0

local crypto endpt.: 10.32.1.162, remote crypto endpt.: 10.32.1.161

path mtu 1500, media mtu 1500

current outbound spi: 0

inbound esp sas:

inbound ah sas:

inbound pcp sas:

outbound esp sas:

outbound ah sas:

outbound pcp sas:

local ident (addr/mask/prot/port): (10.32.1.162/255.255.255.255/47/0)

remote ident (addr/mask/prot/port): (10.32.1.161/255.255.255.255/47/0)

current_peer: 10.32.1.161

PERMIT, flags={origin_is_acl,transport_parent,}

#pkts encaps: 13017, #pkts encrypt: 13017, #pkts digest 13017

#pkts decaps: 2410, #pkts decrypt: 2410, #pkts verify 2410

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0, #pkts decompress failed: 0

#send errors 0, #recv errors 0

local crypto endpt.: 10.32.1.162, remote crypto endpt.: 10.32.1.161

path mtu 1500, media mtu 1500

current outbound spi: 101

inbound esp sas:

spi: 0x4624F3AD(1176826797)

transform: esp-des esp-sha-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 2098, flow_id: 69, crypto map: temp

sa timing: remaining key lifetime (k/sec): (1048124/3176)

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0x101(257)

transform: esp-des esp-sha-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 2099, flow_id: 70, crypto map: temp

sa timing: remaining key lifetime (k/sec): (1046566/3176)

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

문제 해결

이 섹션에서는 컨피그레이션 문제를 해결하는 데 사용할 수 있는 정보를 제공합니다.

문제 해결 명령

일부 show 명령은 출력 인터프리터 툴 에서 지원되는데(등록된 고객만), 이 툴을 사용하면 show 명령 출력의 분석 결과를 볼 수 있습니다.

참고: debug 명령을 실행하기 전에 디버그 명령에 대한 중요 정보를 참조하십시오.

- debug crypto isakmp(Cisco IOS Router) - IKE(Internet Key Exchange) 단계 I(Main Mode) 협상에 대한 자세한 정보를 표시합니다.

- debug crypto ipsec(Cisco IOS Router) - IKE phase II(Quick Mode) 협상에 대한 자세한 정보를 표시합니다.

- debug crypto engine(Cisco IOS Router) - 패킷 암호화/암호 해독 및 DH(Diffie-Hellman) 프로세스를 디버깅합니다.

- debug ip rip(Cisco IOS Router) - RIP 라우팅 프로토콜을 디버깅합니다.

VPN 5000 Concentrator에서 show ip routing 명령을 실행합니다.

VPN5002_8_A5E9C800: rip#show ip routing

IP Routing Table for rip

Directly Connected Routes:

Destination Mask Ref Uses Type Interface

10.1.1.0 FFFFFF00 5 STIF VPN0:1

10.1.1.0 FFFFFFFF 0 STIF Local

10.1.1.1 @FFFFFFFF 5 LocalLocal

10.1.1.255 FFFFFFFF 0 STIF Local

20.20.20.0 FFFFFF00 1352 STIF Ether1:0.2

20.20.20.0 FFFFFFFF 0 STIF Local

20.20.20.20 @FFFFFFFF 14 LocalLocal

20.20.20.255 FFFFFFFF 1318 STIF Local

127.0.0.1 FFFFFFFF 0 STIF Local

172.18.124.0 FFFFFF00 13789 STIF Ether1:0.1

172.18.124.0 FFFFFFFF 0 STIF Local

172.18.124.219 @FFFFFFFF 6 LocalLocal

172.18.124.255 FFFFFFFF 13547 STIF Local

224.0.0.5 FFFFFFFF 0 STIF Local

224.0.0.6 FFFFFFFF 0 STIF Local

224.0.0.9 FFFFFFFF 15 STIF Local

255.255.255.255 @FFFFFFFF 221 LocalLocal

Static Routes:

Destination Mask Gateway Metric Ref Uses Type Interface

10.31.0.0 FFFF0000 Interface 1 0 Stat VPN0:1

10.32.1.162 @FFFFFFFF 10.32.1.161 2 0 *Stat VPN0:1

Dynamic Routes:

Src/

Destination Mask Gateway Metric Ref Uses Type TTL Interface

DEFAULT 10.1.1.2 1 293 RIP2 165 VPN0:1

10.0.0.0 FFFFFF00 172.18.124.216 1 0 RIP1 160 Ether1:0.1

10.31.0.0 FFFF8000 10.1.1.2 1 0 RIP2 165 VPN0:1

10.32.0.0 FFFF8000 10.1.1.2 1 0 RIP2 165 VPN0:1

Configured IP Routes:

Destination Mask Gateway Metric IFnum Flags

10.31.0.0 FFFF0000 Interface 1 VPN 0:1 Redist = none

Total Routes in use: 23 Mask -> @Host route Type -> Redist *rip #ospf

VPN5002_8_A5E9C800: rip#show vpn stat ver

Current In High Running Script Script Script

Active Negot Water Total Starts OK Error

--------------------------------------------------------------

Users 0 0 0 0 0 0 0

Partners 1 0 1 1 1 0 0

Total 1 0 1 1 1 0 0

Stats VPN0:1

Wrapped 2697

Unwrapped 14439

BadEncap 0

BadAuth 0

BadEncrypt 0

rx IP 14439

rx IPX 0

rx Other 0

tx IP 2697

tx IPX 0

tx Other 0

IKE rekey 0

Input VPN pkts dropped due to no SA: 1

Input VPN pkts dropped due to no free queue entries: 0

IOP slot 1:

Current In High Running Script Script Script

Active Negot Water Total Starts OK Error

--------------------------------------------------------------

Users 0 0 0 0 0 0 0

Partners 0 0 0 0 0 0 0

Total 0 0 0 0 0 0 0

Stats

Wrapped

Unwrapped

BadEncap

BadAuth

BadEncrypt

rx IP

rx IPX

rx Other

tx IP

tx IPX

tx Other

IKE rekey

Input VPN pkts dropped due to no SA: 0

Input VPN pkts dropped due to no free queue entries: 0

IOP slot 2:

Current In High Running Script Script Script

Active Negot Water Total Starts OK Error

--------------------------------------------------------------

Users 0 0 0 0 0 0 0

Partners 0 0 0 0 0 0 0

Total 0 0 0 0 0 0 0

Stats

Wrapped

Unwrapped

BadEncap

BadAuth

BadEncrypt

rx IP

rx IPX

rx Other

tx IP

tx IPX

tx Other

IKE rekey

Input VPN pkts dropped due to no SA: 0

Input VPN pkts dropped due to no free queue entries: 0

IOP slot 3:

Current In High Running Script Script Script

Active Negot Water Total Starts OK Error

--------------------------------------------------------------

Users 0 0 0 0 0 0 0

Partners 0 0 0 0 0 0 0

Total 0 0 0 0 0 0 0

Stats

Wrapped

Unwrapped

BadEncap

BadAuth

BadEncrypt

rx IP

rx IPX

rx Other

tx IP

tx IPX

tx Other

IKE rekey

Input VPN pkts dropped due to no SA: 0

Input VPN pkts dropped due to no free queue entries: 0

관련 정보

- Cisco VPN 5000 Series Concentrator 지원 페이지

- Cisco VPN 5000 클라이언트 지원 페이지

- IPSec(IP Security Protocol) 지원 페이지

- Technical Support - Cisco Systems