목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

구성

네트워크 다이어그램

구성

다음을 확인합니다.

문제 해결

문제 해결 명령

디버그 출력 샘플

터널 모드 구성 오류

관련 정보

소개

이 문서에서는 Cisco VPN 5000 Series Concentrator와 Cisco IOS® 소프트웨어를 실행하는 Cisco 라우터 간에 IPSec을 통한 GRE(Generic Routing Encapsulation)를 구성하는 방법에 대해 설명합니다. GRE-over-IPSec 기능은 VPN 5000 Concentrator 6.0(19) 소프트웨어 릴리스에 도입되었습니다.

이 예에서는 고정 라우팅을 사용하여 터널을 통해 패킷을 라우팅합니다.

사전 요구 사항

요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서의 정보는 다음 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- Cisco IOS Software 릴리스 12.2(3)

- Cisco VPN 5000 Concentrator 소프트웨어 버전 6.0(19)

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 현재 네트워크가 작동 중인 경우, 모든 명령어의 잠재적인 영향을 미리 숙지하시기 바랍니다.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참조하십시오.

구성

이 섹션에는 이 문서에서 설명하는 기능을 구성하기 위한 정보가 표시됩니다.

참고: 이 문서에 사용된 명령에 대한 추가 정보를 찾으려면 명령 조회 도구(등록된 고객만 해당)를 사용합니다.

네트워크 다이어그램

이 문서에서는 이 다이어그램에 표시된 네트워크 설정을 사용합니다.

GRE over IPSec은 Cisco IOS 소프트웨어를 실행하는 1720-1 라우터와 VPN 5002 Concentrator 간에 구성됩니다. 라우터와 VPN Concentrator 뒤에는 OSPF(Open Shortest Path First)를 통해 광고되는 여러 네트워크가 있습니다. OSPF는 라우터와 VPN Concentrator 간의 GRE 터널 내에서 실행됩니다.

- 이러한 네트워크는 1720-1 라우터에 뒤집니다.

- 10.1.1.0/24

- 10.1.2.0/24

- 10.1.3.0/24

- 이러한 네트워크는 VPN 5002 Concentrator 뒤에 있습니다.

- 20.1.1.0/24

- 20.1.2.0/24

- 20.1.3.0/24

구성

이 문서에서는 이러한 구성을 사용합니다.

- 1720-1 라우터

- VPN 5002 Concentrator

참고: Cisco IOS Software Release 12.2(13)T 이상(번호가 높은 T-Train 코드, 12.3 이상 코드)의 경우 구성된 IPSec 암호화 맵을 물리적 인터페이스에만 적용해야 합니다. 더 이상 GRE 터널 인터페이스에 암호화 맵을 적용할 필요가 없습니다. Cisco IOS Software Releases 12.2.(13)T 이상을 사용할 때 물리적 인터페이스와 터널 인터페이스에 암호화 맵이 있어야 합니다. 그러나 Cisco Systems에서는 물리적 인터페이스에만 암호화 맵을 적용할 것을 권장합니다.

1720-1 라우터

Current configuration : 1305 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 1720-1

!

no logging buffered

no logging monitor

enable secret 5 $1$vIzI$RqD0LqlqbSFCCjVELFLfH/

!

memory-size iomem 15

ip subnet-zero

no ip domain-lookup

!

ip audit notify log

ip audit po max-events 100

ip ssh time-out 120

ip ssh authentication-retries 3

!

crypto isakmp policy 1

hash md5

authentication pre-share

crypto isakmp key cisco123 address 172.16.172.21

!

!

crypto ipsec transform-set myset esp-des esp-md5-hmac

mode transport

!

crypto map vpn 10 ipsec-isakmp

set peer 172.16.172.21

set transform-set myset

match address 102

!

cns event-service server

!

!

!

interface Tunnel0

ip address 50.1.1.1 255.255.255.252

tunnel source FastEthernet0

tunnel destination 172.16.172.21

crypto map vpn

!

interface FastEthernet0

ip address 172.16.172.39 255.255.255.240

speed auto

crypto map vpn

!

interface Serial0

ip address 10.1.1.2 255.255.255.0

encapsulation ppp

!

ip classless

ip route 0.0.0.0 0.0.0.0 172.16.172.33

ip route 10.1.0.0 255.255.0.0 10.1.1.1

ip route 20.1.0.0 255.255.0.0 Tunnel0

no ip http server

!

access-list 102 permit gre host 172.16.172.39 host 172.16.172.21

!

line con 0

line aux 0

line vty 0 4

password cisco

login

!

no scheduler allocate

end

VPN 5002 Concentrator

[ General ]

VPNGateway               = 172.16.172.17

EthernetAddress          = 00:05:32:3e:90:40

DeviceType               = VPN 5002/8 Concentrator

ConfiguredOn             = Timeserver not configured

ConfiguredFrom           = Command Line, from Console

[ IKE Policy ]

Protection               = SHA_DES_G1

Protection               = MD5_DES_G2

Protection               = MD5_DES_G1

[ Tunnel Partner VPN 1 ]

KeyLifeSecs              = 3500

KeepaliveInterval        = 120

TunnelType               = GREinIPSec

InactivityTimeout        = 120

Transform                = ESP(MD5,DES)

BindTo                   = "Ethernet 1:0"

SharedKey                = "cisco123"

Certificates             = Off

Mode                     = Main

KeyManage                = Reliable

Partner                  = 172.16.172.39

[ IP VPN 1 ]

HelloInterval            = 10

SubnetMask               = 255.255.255.252

IPAddress                = 50.1.1.2

DirectedBroadcast        = Off

Numbered                 = On

Mode                     = Routed

[ IP Ethernet 1:0 ]

Mode                     = Routed

SubnetMask               = 255.255.255.240

IPBroadcast              = 172.16.172.32

IPAddress                = 172.16.172.21

[ IP Ethernet 0:0 ]

Mode                     = Routed

IPBroadcast              = 20.1.1.255

SubnetMask               = 255.255.255.0

IPAddress                = 20.1.1.1

[ Logging ]

Level                    = Debug

LogToAuxPort             = On

Enabled                  = On

[ Ethernet Interface Ethernet 0:0 ]

DUPLEX                   = half

SPEED                    = 10meg

[ IP Static ]

0.0.0.0 0.0.0.0 20.1.1.5 1

10.1.1.0 255.255.255.0 VPN 1 1

10.1.2.0 255.255.255.0 VPN 1 1

10.1.3.0 255.255.255.0 VPN 1 1

Configuration size is 1696 out of 65500 bytes.

다음을 확인합니다.

이 섹션에서는 컨피그레이션이 제대로 작동하는지 확인하는 데 사용할 수 있는 정보를 제공합니다.

일부 show 명령은 출력 인터프리터 툴 에서 지원되는데(등록된 고객만), 이 툴을 사용하면 show 명령 출력의 분석 결과를 볼 수 있습니다.

- 이러한 명령은 Cisco IOS 라우터에서 실행할 수 있습니다.

- show crypto isakmp sa - 모든 현재 ISAKMP(Internet Security Association and Key Management Protocol) SA(Security Associations)를 표시합니다.

- show crypto ipsec sa - 현재 모든 IPSec SA를 표시합니다.

- show crypto engine connection active(암호화 엔진 연결 활성 표시) - 각 IPSec SA에 대한 패킷 암호화/암호 해독 카운터를 표시합니다.

- VPN 5002 Concentrator에서 이러한 명령을 실행할 수 있습니다.

- show system log buffer—기본 syslog 정보를 표시합니다.

- vpn trace dump - VPN 프로세스에 대한 자세한 정보를 표시합니다.

문제 해결

이 섹션에서는 컨피그레이션 문제를 해결하는 데 사용할 수 있는 정보를 제공합니다.

문제 해결 명령

참고: debug 명령을 실행하기 전에 디버그 명령에 대한 중요 정보를 참조하십시오.

Cisco IOS 라우터에서 이러한 명령을 실행할 수 있습니다.

- debug crypto isakmp - IKE(Internet Key Exchange) 단계 I(Main Mode) 협상에 대한 자세한 정보를 표시합니다.

- debug crypto ipsec - IKE phase II(Quick Mode) 협상에 대한 자세한 정보를 표시합니다.

- debug crypto engine—패킷 암호화/암호 해독 및 DH(Diffie-Hellman) 프로세스를 디버깅합니다.

디버그 출력 샘플

라우터 및 VPN Concentrator에 대한 샘플 디버그 출력이 여기에 표시됩니다.

- Cisco IOS 라우터

- VPN 5002 Concentrator

Cisco IOS 라우터의 디버깅

라우터의 debug crypto isakmp 및 debug crypto ipsec 명령의 출력은 여기에 나와 있습니다.

5d20h: ISAKMP (0:0): received packet from 172.16.172.21 (N) NEW SA

5d20h: ISAKMP: local port 500, remote port 500

5d20h: ISAKMP (0:81): processing SA payload. message ID = 0

5d20h: ISAKMP (0:81): found peer pre-shared key matching 172.16.172.21

5d20h: ISAKMP (0:81): Checking ISAKMP transform 1 against priority 1 policy

5d20h: ISAKMP:      encryption DES-CBC

5d20h: ISAKMP:      hash SHA

5d20h: ISAKMP:      auth pre-share

5d20h: ISAKMP:      default group 1

5d20h: ISAKMP (0:81): atts are not acceptable. Next payload is 3

5d20h: ISAKMP (0:81): Checking ISAKMP transform 2 against priority 1 policy

5d20h: ISAKMP:      encryption DES-CBC

5d20h: ISAKMP:      hash MD5

5d20h: ISAKMP:      auth pre-share

5d20h: ISAKMP:      default group 2

5d20h: ISAKMP (0:81): atts are not acceptable. Next payload is 3

5d20h: ISAKMP (0:81): Checking ISAKMP transform 3 against priority 1 policy

5d20h: ISAKMP:      encryption DES-CBC

5d20h: ISAKMP:      hash MD5

5d20h: ISAKMP:      auth pre-share

5d20h: ISAKMP:      default group 1

5d20h: ISAKMP (0:81): atts are acceptable. Next payload is 0

5d20h: ISAKMP (0:81): processing vendor id payload

5d20h: ISAKMP (0:81): SA is doing pre-shared key authentication

using id type ID_IPV4_ADDR

5d20h: ISAKMP (0:81): sending packet to 172.16.172.21 (R) MM_SA_SETUP

5d20h: ISAKMP (0:81): received packet from 172.16.172.21 (R) MM_SA_SETUP

5d20h: ISAKMP (0:81): processing KE payload. message ID = 0

5d20h: ISAKMP (0:81): processing NONCE payload. message ID = 0

5d20h: ISAKMP (0:81): found peer pre-shared key matching 172.16.172.21

5d20h: ISAKMP (0:81): SKEYID state generated

5d20h: ISAKMP (0:81): sending packet to 172.16.172.21 (R) MM_KEY_EXCH

5d20h: ISAKMP (0:81): received packet from 172.16.172.21 (R) MM_KEY_EXCH

5d20h: ISAKMP (0:81): processing ID payload. message ID = 0

5d20h: ISAKMP (0:81): processing HASH payload. message ID = 0

5d20h: ISAKMP (0:81): SA has been authenticated with 172.16.172.21

5d20h: ISAKMP (81): ID payload

next-payload : 8

type         : 1

protocol     : 17

port         : 500

length       : 8

5d20h: ISAKMP (81): Total payload length: 12

5d20h: ISAKMP (0:81): sending packet to 172.16.172.21 (R) QM_IDLE

5d20h: ISAKMP (0:81): received packet from 172.16.172.21 (R) QM_IDLE

5d20h: ISAKMP (0:81): processing HASH payload. message ID = 241

5d20h: ISAKMP (0:81): processing SA payload. message ID = 241

5d20h: ISAKMP (0:81): Checking IPSec proposal 1

5d20h: ISAKMP: transform 1, ESP_DES

5d20h: ISAKMP:   attributes in transform:

5d20h: ISAKMP:      SA life type in seconds

5d20h: ISAKMP:      SA life duration (VPI) of  0x0 0x0 0xD 0xAC

5d20h: ISAKMP:      SA life type in kilobytes

5d20h: ISAKMP:      SA life duration (VPI) of  0x0 0x10 0x0 0x0

5d20h: ISAKMP:      encaps is 2

5d20h: ISAKMP:      authenticator is HMAC-MD5

5d20h: ISAKMP (0:81): atts are acceptable.

5d20h: IPSEC(validate_proposal_request): proposal part #1,

(key eng. msg.) dest= 172.16.172.39, src= 172.16.172.21,

dest_proxy= 172.16.172.39/255.255.255.255/47/0 (type=1),

src_proxy= 172.16.172.21/255.255.255.255/47/0 (type=1),

protocol= ESP, transform= esp-des esp-md5-hmac ,

lifedur= 0s and 0kb,

spi= 0x0(0), conn_id= 0, keysize= 0, flags= 0x0

5d20h: ISAKMP (0:81): processing NONCE payload. message ID = 241

5d20h: ISAKMP (0:81): processing ID payload. message ID = 241

5d20h: ISAKMP (81): ID_IPV4_ADDR src 172.16.172.21 prot 47 port 0

5d20h: ISAKMP (0:81): processing ID payload. message ID = 241

5d20h: ISAKMP (81): ID_IPV4_ADDR dst 172.16.172.39 prot 47 port 0

5d20h: ISAKMP (0:81): asking for 1 spis from ipsec

5d20h: IPSEC(key_engine): got a queue event...

5d20h: IPSEC(spi_response): getting spi 895566248 for SA

from 172.16.172.21   to 172.16.172.39   for prot 3

5d20h: ISAKMP: received ke message (2/1)

5d20h: ISAKMP (0:81): sending packet to 172.16.172.21 (R) QM_IDLE

5d20h: ISAKMP (0:81): received packet from 172.16.172.21 (R) QM_IDLE

5d20h: ISAKMP (0:81): Creating IPSec SAs

5d20h:         inbound SA from 172.16.172.21 to 172.16.172.39

(proxy 172.16.172.21 to 172.16.172.39)

5d20h:         has spi 0x356141A8 and conn_id 362 and flags 0

5d20h:         lifetime of 3500 seconds

5d20h:         lifetime of 1048576 kilobytes

5d20h:         outbound SA from 172.16.172.39   to 172.16.172.21

(proxy 172.16.172.39   to 172.16.172.21  )

5d20h:         has spi 337 and conn_id 363 and flags 0

5d20h:         lifetime of 3500 seconds

5d20h:         lifetime of 1048576 kilobytes

5d20h: ISAKMP (0:81): deleting node 241 error FALSE reason

"quick mode done (await()"

5d20h: IPSEC(key_engine): got a queue event...

5d20h: IPSEC(initialize_sas): ,

(key eng. msg.) dest= 172.16.172.39, src= 172.16.172.21,

dest_proxy= 172.16.172.39/0.0.0.0/47/0 (type=1),

src_proxy= 172.16.172.21/0.0.0.0/47/0 (type=1),

protocol= ESP, transform= esp-des esp-md5-hmac ,

lifedur= 3500s and 1048576kb,

spi= 0x356141A8(895566248), conn_id= 362, keysize= 0, flags= 0x0

5d20h: IPSEC(initialize_sas): ,

(key eng. msg.) src= 172.16.172.39, dest= 172.16.172.21,

src_proxy= 172.16.172.39/0.0.0.0/47/0 (type=1),

dest_proxy= 172.16.172.21/0.0.0.0/47/0 (type=1),

protocol= ESP, transform= esp-des esp-md5-hmac ,

lifedur= 3500s and 1048576kb,

spi= 0x151(337), conn_id= 363, keysize= 0, flags= 0x0

5d20h: IPSEC(create_sa): sa created,

(sa) sa_dest= 172.16.172.39, sa_prot= 50,

sa_spi= 0x356141A8(895566248),

sa_trans= esp-des esp-md5-hmac , sa_conn_id= 362

5d20h: IPSEC(create_sa): sa created,

(sa) sa_dest= 172.16.172.21, sa_prot= 50,

sa_spi= 0x151(337),

sa_trans= esp-des esp-md5-hmac , sa_conn_id= 363

5d20h: IPSEC(add_sa): peer asks for new SAs -- expire current in 120 sec.,

(sa) sa_dest= 172.16.172.21, sa_prot= 50,

sa_spi= 0x150(336),

sa_trans= esp-des esp-md5-hmac , sa_conn_id= 361,

(identity) local= 172.16.172.39, remote= 172.16.172.21,

local_proxy= 172.16.172.39/255.255.255.255/47/0 (type=1),

remote_proxy= 172.16.172.21/255.255.255.255/47/0 (type=1)

1720-1#

1720-1#show crypto isakmp sa

dst             src             state           conn-id    slot

172.16.172.39   172.16.172.21   QM_IDLE              81       0

1720-1#show crypto ipsec sa

interface: FastEthernet0

Crypto map tag: vpn, local addr. 172.16.172.39

local  ident (addr/mask/prot/port): (172.16.172.39/255.255.255.255/0/0)

remote ident (addr/mask/prot/port): (172.16.172.21/255.255.255.255/0/0)

current_peer: 172.16.172.21

PERMIT, flags={transport_parent,}

#pkts encaps: 0, #pkts encrypt: 0, #pkts digest 0

#pkts decaps: 0, #pkts decrypt: 0, #pkts verify 0

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0,

#pkts decompress failed: 0, #send errors 0, #recv errors 0

local crypto endpt.: 172.16.172.39, remote crypto endpt.: 172.16.172.21

path mtu 1514, media mtu 1514

current outbound spi: 0

inbound esp sas:

inbound ah sas:

inbound pcp sas:

outbound esp sas:

outbound ah sas:

outbound pcp sas:

local  ident (addr/mask/prot/port): (172.16.172.39/255.255.255.255/47/0)

remote ident (addr/mask/prot/port): (172.16.172.21/255.255.255.255/47/0)

current_peer: 172.16.172.21

PERMIT, flags={origin_is_acl,transport_parent,parent_is_transport,}

#pkts encaps: 34901, #pkts encrypt: 34901, #pkts digest 34901

#pkts decaps: 34900, #pkts decrypt: 34900, #pkts verify 34900

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0,

#pkts decompress failed: 0, #send errors 0, #recv errors 0

local crypto endpt.: 172.16.172.39, remote crypto endpt.: 172.16.172.21

path mtu 1500, media mtu 1500

current outbound spi: 151

inbound esp sas:

spi: 0x356141A8(895566248)

transform: esp-des esp-md5-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 362, flow_id: 163, crypto map: vpn

sa timing: remaining key lifetime (k/sec): (1046258/3306)

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0x151(337)

transform: esp-des esp-md5-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 363, flow_id: 164, crypto map: vpn

sa timing: remaining key lifetime (k/sec): (1046258/3306)

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

interface: Tunnel0

Crypto map tag: vpn, local addr. 172.16.172.39

local  ident (addr/mask/prot/port): (172.16.172.39/255.255.255.255/0/0)

remote ident (addr/mask/prot/port): (172.16.172.21/255.255.255.255/0/0)

current_peer: 172.16.172.21

PERMIT, flags={transport_parent,}

#pkts encaps: 0, #pkts encrypt: 0, #pkts digest 0

#pkts decaps: 0, #pkts decrypt: 0, #pkts verify 0

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0,

#pkts decompress failed: 0, #send errors 0, #recv errors 0

local crypto endpt.: 172.16.172.39, remote crypto endpt.: 172.16.172.21

path mtu 1514, media mtu 1514

current outbound spi: 0

inbound esp sas:

inbound ah sas:

inbound pcp sas:

outbound esp sas:

outbound ah sas:

outbound pcp sas:

local  ident (addr/mask/prot/port): (172.16.172.39/255.255.255.255/47/0)

remote ident (addr/mask/prot/port): (172.16.172.21/255.255.255.255/47/0)

current_peer: 172.16.172.21

PERMIT, flags={origin_is_acl,transport_parent,parent_is_transport,}

#pkts encaps: 35657, #pkts encrypt: 35657, #pkts digest 35657

#pkts decaps: 35656, #pkts decrypt: 35656, #pkts verify 35656

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0,

#pkts decompress failed: 0, #send errors 0, #recv errors 0

local crypto endpt.: 172.16.172.39, remote crypto endpt.: 172.16.172.21

path mtu 1500, media mtu 1500

current outbound spi: 151

inbound esp sas:

spi: 0x356141A8(895566248)

transform: esp-des esp-md5-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 362, flow_id: 163, crypto map: vpn

sa timing: remaining key lifetime (k/sec): (1046154/3302)

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0x151(337)

transform: esp-des esp-md5-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 363, flow_id: 164, crypto map: vpn

sa timing: remaining key lifetime (k/sec): (1046154/3302)

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

1720-1#show crypto engine connections active

ID Interface             IP-Address    State  Algorithm    Encrypt Decrypt

81 FastEthernet0  172.16.172.39   set  HMAC_MD5+DES_56_CB      0       0

362 FastEthernet0  172.16.172.39   set  HMAC_MD5+DES_56_CB      0   23194

363 FastEthernet0  172.16.172.39   set  HMAC_MD5+DES_56_CB  23195       0

VPN 5002 Concentrator의 디버깅

VPN Concentrator의 Syslog 출력이 여기에 표시됩니다.

VPN5002_8_323E9040: Main# VPN 0:1 opened for 172.16.172.39 from 172.16.172.39.

User assigned IP address 50.1.1.2

VPN5002_8_323E9040: Main#show vpn partner verbose

Port        Partner         Partner  Default  Bindto          Connect

Number      Address         Port     Partner  Address         Time

--------------------------------------------------------------------------

VPN 0:1     172.16.172.39   500      No       172.16.172.21   00:00:13:26

Auth/Encrypt: MD5e/DES  User Auth: Shared Key

Access: Static Peer: 172.16.172.39    Local: 172.16.172.21

Start:14518 seconds Managed:15299 seconds State:imnt_maintenance

IOP slot 1:

No active connections found.

VPN5002_8_323E9040: Main#show vpn statistics verbose

Current  In       High     Running  Script   Script   Script

Active   Negot    Water    Total    Starts   OK       Error

--------------------------------------------------------------

Users     0        0        0        0        0        0        0

Partners  1        0        1        81       81       1        158

Total     1        0        1        81       81       1        158

Stats             VPN0:1

Wrapped            79733

Unwrapped          79734

BadEncap               0

BadAuth                0

BadEncrypt             0

rx IP              79749

rx IPX                 0

rx Other               0

tx IP              79761

tx IPX                 0

tx Other               0

IKE rekey              0

Input VPN pkts dropped due to no SA: 0

Input VPN pkts dropped due to no free queue entries: 0

IOP slot 1:

Current  In       High     Running  Script   Script   Script

Active   Negot    Water    Total    Starts   OK       Error

--------------------------------------------------------------

Users     0        0        0        0        0        0        0

Partners  0        0        0        0        0        0        0

Total     0        0        0        0        0        0        0

Stats

Wrapped

Unwrapped

BadEncap

BadAuth

BadEncrypt

rx IP

rx IPX

rx Other

tx IP

tx IPX

tx Other

IKE rekey

Input VPN pkts dropped due to no SA: 0

Input VPN pkts dropped due to no free queue entries: 0

터널 모드 구성 오류

GRE over IPSec을 사용할 경우 VPN 5000 Concentrator는 기본적으로 전송 모드를 제안합니다. 터널 모드에 대해 Cisco IOS 라우터가 잘못 구성된 경우 이 오류가 발생합니다.

Cisco IOS 라우터의 디버그 출력이 여기에 표시됩니다.

2d21h: ISAKMP (0:23): Checking IPSec proposal 1

2d21h: ISAKMP: transform 1, ESP_DES

2d21h: ISAKMP: attributes in transform:

2d21h: ISAKMP: SA life type in seconds

2d21h: ISAKMP: SA life duration (VPI) of 0x0 0x1 0x51 0x80

2d21h: ISAKMP: SA life type in kilobytes

2d21h: ISAKMP: SA life duration (VPI) of 0x0 0x10 0x0 0x0

2d21h: ISAKMP: encaps is 2

2d21h: ISAKMP: authenticator is HMAC-MD5

2d21h: IPSEC(validate_proposal): invalid transform proposal flags -- 0x0

VPN 5002 Concentrator의 로그에는 이 출력과 비슷한 항목이 표시됩니다.

lan-lan-VPN0:1:[172.16.172.39]: received notify from partner --

notify: NO PROPOSAL CHOSEN

관련 정보

- Cisco VPN 5000 Series Concentrator 판매 중단 발표

- Cisco VPN 5000 Concentrator 지원 페이지

- Cisco VPN 5000 클라이언트 지원 페이지

- IPSec 지원 페이지

- Technical Support - Cisco Systems