목차

소개

문제

솔루션

소개

이 문서에서는 ISE 분산 구축에서 컨텍스트 가시성의 재설정 및 동기화를 수행하는 방법에 대해 설명합니다.

문제

'Unable to load Context Visibility page' 오류 메시지와 함께 Context Visibility GUI가 로드되지 않거나 대시보드 카운터가 비어 있는 경우 이 절차를 수행하는 것이 좋습니다. "엔드포인트를 생성할 수 없습니다. 엔드포인트 XX:XX:XX:XX:XX가 이미 있습니다. 이는 Context Visibility 데이터베이스가 해당 엔드포인트의 Oracle 데이터베이스와 동기화되지 않을 때 발생합니다.

이 문서에서는 이러한 문제를 해결하기 위해 ISE 분산 구축에서 상황 가시성 재설정 및 동기화를 수행하는 방법에 대해 설명합니다.

솔루션

콘솔 또는 SSH를 통해 기본 관리 노드(간결성을 위해 생략된 일부 출력)에 연결한 다음 application configure ise 명령, 옵션 [20] Reset Context Visibility` 및 agreement를 수행하여 y를 진행합니다. 마지막 질문에 답하지 않음:

primary-node/admin# application configure ise

Selection configuration option

~

[20]Reset Context Visibility

[21]Synchronize Context Visibility With Database

~

20

This will remove all data from Context Visibility. Do you want to proceed [y/n]: y

Checking ISE persona

- Done

Reset of indexing engine on this node needs to be run only after running it on Secondary Admin Node(secondary-node)

Is reset indexing engine started on Secondary Admin Node(secondary-node) [ Y/N ] :

마지막 질문에 대한 응답이 없으면 SSH 또는 콘솔을 보조 관리 노드에 열고 명령 애플리케이션 configure ise를 수행한 다음 옵션 [20] Reset Context Visibility and agreement를 수행하여 y를 계속 진행하면, 마지막 질문에 응답하지 않습니다.

secondary-node/admin# application configure ise

Selection configuration option

~

[20]Reset Context Visibility

[21]Synchronize Context Visibility With Database

~

20

This will remove all data from Context Visibility. Do you want to proceed [y/n]: y

Checking ISE persona

- Done

Stopping monit services

- Done

Stopping ISE indexing engine

- Done

Unzip and making changes to vcs jar

- Done

Modifying ISE indexing engine configuration

- Done

Starting ISE indexing engine

- Done

Performing reset of ISE indexing engine

- Done

Stopping ISE indexing engine

- Done

Removing backup of vcs jar

- Done

Reverting changes to ISE indexing engine configuration

- Done

Please proceed with running reset indexing engine on Primary Admin Node(primary-node) now. Once reset finishes on Primary Admin Node, please come back and press Y here

Is reset indexing engine done on Primary Admin Node(primary-node) [ Y/N ] :

마지막 질문에 대한 응답이 없을 경우 Y를 사용하는 기본 관리 노드의 SSH 또는 콘솔에서 계속 진행합니다.

Is reset indexing engine started on Secondary Admin Node(secondary-node) [ Y/N ] :Y

Verifying ISE indexing engine services on Secondary Admin Node

- Done

Stopping monit services

- Done

Stopping ISE indexing engine

- Done

Unzip and making changes to vcs jar

- Done

Modifying ISE indexing engine configuration

- Done

Starting ISE indexing engine

- Done

Performing reset of ISE indexing engine

- Done

Stopping ISE indexing engine

- Done

Removing backup of vcs jar

- Done

Reverting changes to ISE indexing engine configuration

- Done

Starting ISE indexing engine

- Done

Starting monit services

- Done

Reset of indexing engine on this node is complete. Please proceed with remaining steps on Secondary Admin Node(secondary-node)

Reset of Context Visibility is successful on this node

[0] 구성 메뉴를 종료하고 Y를 사용하여 보조 관리 노드의 SSH 또는 콘솔에서 계속합니다.

Is reset indexing engine done on Primary Admin Node(primary-node) [ Y/N ] :Y

Verifying ISE indexing engine services on Primary Admin Node

- Done

Starting ISE indexing engine

- Done

Starting monit services

- Done

Reset of Context Visibility is successful on this node

[0] 구성 메뉴를 종료합니다.

두 노드에서 모두 컨텍스트 가시성을 재설정한 후 기본 관리 노드에서 동기화를 진행합니다.

primary-node/admin# application configure ise

Selection configuration option

~

[20]Reset Context Visibility

[21]Synchronize Context Visibility With Database

~

21

This will synchronize Context Visibility with database. Do you want to proceed [y/n]: y

Copying files

- Done

Changing permissions

- Done

Exporting endpoints from database

- Done

Importing endpoints into context visibility

- Done

Synchronization of Context Visibility with Oracle is successful

[0] 구성 메뉴를 종료합니다.

인덱싱 엔진이 두 관리 노드에서 모두 실행 중인지 확인합니다.

primary-node/admin# show application status ise

ISE PROCESS NAME STATE PROCESS ID

--------------------------------------------------------------------

Database Listener running 3010

Database Server running 80 PROCESSES

Application Server running 8877

Profiler Database running 5420

ISE Indexing Engine running 13865

AD Connector running 11922

M&T Session Database running 5322

M&T Log Collector running 9019

M&T Log Processor running 8927

Certificate Authority Service disabled

EST Service disabled

SXP Engine Service disabled

Docker Daemon running 11469

TC-NAC Service disabled

Wifi Setup Helper Container disabled

pxGrid Infrastructure Service disabled

pxGrid Publisher Subscriber Service disabled

pxGrid Connection Manager disabled

pxGrid Controller disabled

PassiveID WMI Service disabled

PassiveID Syslog Service disabled

PassiveID API Service disabled

PassiveID Agent Service disabled

PassiveID Endpoint Service disabled

PassiveID SPAN Service disabled

DHCP Server (dhcpd) disabled

DNS Server (named) disabled