목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

배경 정보

구성

네트워크 다이어그램

Microsoft L2TP 클라이언트 구성

PIX 방화벽의 인증서 가져오기

PIX 방화벽 컨피그레이션

다음을 확인합니다.

문제 해결

문제 해결 명령

디버그 출력 샘플

CA에 등록하는 데 적합한 디버그

CA에 등록하는 데 잘못된 디버그

관련 정보

소개

L2TP(Layer 2 Tunneling Protocol) over IPsec은 Cisco Secure PIX Firewall Software Release 6.x 이상에서 지원됩니다.Windows 2000을 실행하는 사용자는 PIX 방화벽에 대한 L2TP 터널을 설정하기 위해 네이티브 IPsec 클라이언트 및 L2TP 클라이언트를 사용할 수 있습니다.트래픽은 IPsec SA(Security Associations)에 의해 암호화된 L2TP 터널을 통과합니다.

참고: PIX에 텔넷하기 위해 Windows 2000 L2TP IPsec 클라이언트를 사용할 수 없습니다.

참고: PIX의 L2TP에서는 스플릿 터널링을 사용할 수 없습니다.

사용자 인증을 위해 Microsoft Windows 2003 IAS(Internet Authentication Service) RADIUS 서버와 사전 공유 키를 사용하여 원격 Microsoft Windows 2000/2003 및 XP 클라이언트에서 PIX/ASA Security Appliance 회사 사무실로 L2TP over IPsec을 구성하려면 Windows 200 간 L2TP Over IP0을 참조하십시오. 사전 공유 키 구성 예를 사용하는 PIX/XP PC 및 PIX/ASA 7.2.

암호화된 방법을 사용하여 원격 Microsoft Windows 2000 및 XP 클라이언트에서 기업 사이트로 L2TP over IP Security(IPsec)를 구성하려면 사전 공유 키를 사용하여 Windows 2000 또는 XP 클라이언트에서 Cisco VPN 300 Series Concentrator로 L2TP over IPSec 구성 을 참조하십시오.

사전 요구 사항

요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서의 정보는 다음 소프트웨어 및 하드웨어 버전에 적용됩니다.

- PIX Software 릴리스 6.3(3)

- Windows 2000(SP2 포함 또는 제외)(SP1에 대한 자세한 내용은 Microsoft 팁 Q276360 참조)

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다.이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다.현재 네트워크가 작동 중인 경우, 모든 명령어의 잠재적인 영향을 미리 숙지하시기 바랍니다.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참고하십시오.

배경 정보

Cisco Secure PIX 버전 6.x 이상의 인증서 지원에는 Baltimore, Microsoft, VeriSign 및 Entrust 서버가 포함됩니다.현재 PIX는 IPsec 보호 없이 L2TP 요청을 수락하지 않습니다.

이 예에서는 이 문서에서 앞서 언급한 시나리오에 대해 PIX 방화벽을 구성하는 방법을 보여 줍니다.IKE(Internet Key Exchange) 인증은 rsa sig 명령(인증서)을 사용합니다. 이 예에서는 RADIUS 서버에 의해 인증이 수행됩니다.

PIX에 암호화된 클라이언트 연결을 위한 덜 관련된 옵션은 IPSec/PPTP/L2TP를 지원하는 Cisco 하드웨어 및 VPN 클라이언트에 나열됩니다.

구성

이 섹션에서는 이 문서에 설명된 기능을 구성하는 정보를 제공합니다.

참고: 명령 조회 도구(등록된 고객만 해당)를 사용하여 이 문서에 사용된 명령에 대한 자세한 내용을 확인하십시오.

네트워크 다이어그램

이 문서에서는 다음 네트워크 설정을 사용합니다.

Microsoft L2TP 클라이언트 구성

Microsoft L2TP 클라이언트 구성 방법에 대한 자세한 내용은 Microsoft의 인터넷 프로토콜 보안 단계별 안내서를 참조하십시오 .

Microsoft에서 참조한 단계별 가이드에서 설명한 것처럼, 클라이언트는 여러 개의 테스트를 거친 CA(Certificate Authority) 서버를 지원합니다.Microsoft CA 설정 방법에 대한 자세한 내용은 Microsoft의 인증 기관 설정 단계별 안내서를 참조하십시오 .

PIX 방화벽의 인증서 가져오기

VeriSign, Entrust, Baltimore 및 Microsoft의 인증서와의 상호 운용성을 위해 PIX를 구성하는 방법에 대한 자세한 내용은 CA 컨피그레이션 예를 참조하십시오.

PIX 방화벽 컨피그레이션

이 문서에서는 이 구성을 사용합니다.

PIX 방화벽

PIX Version 6.3(3)

nameif ethernet0 outside security0

nameif ethernet1 inside security100

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname PIX-506-2

domain-name sjvpn.com

fixup protocol ftp 21

fixup protocol http 80

fixup protocol h323 1720

fixup protocol rsh 514

fixup protocol smtp 25

fixup protocol sqlnet 1521

fixup protocol sip 5060

fixup protocol skinny 2000

names

!--- Access Control List (ACL) configured to bypass !--- Network Address Translation (NAT) for the L2TP IP pool.

access-list nonat permit ip 20.1.1.0 255.255.255.0 50.1.1.0 255.255.255.0

!--- ACL configured to permit L2TP traffic (UDP port 1701).

access-list l2tp permit udp host 171.68.9.57 any eq 1701

no pager

logging on

logging console debugging

logging buffered debugging

interface ethernet0 10baset

interface ethernet1 10baset

mtu outside 1500

mtu inside 1500

ip address outside 171.68.9.57 255.255.255.0

ip address inside 20.1.1.1 255.255.255.0

ip audit info action alarm

ip audit attack action alarm

!--- Pool for L2TP address assignment.

ip local pool l2tp 50.1.1.1-50.1.1.5

pdm history enable

arp timeout 14400

!--- NAT configuration that matches previously defined !--- ACL for the L2TP IP pool.

nat (inside) 0 access-list nonat

route outside 0.0.0.0 0.0.0.0 171.68.9.1 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h323

0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

!--- AAA (RADIUS) server configuration.

aaa-server RADIUS (inside) host 20.1.1.2 cisco timeout 5

no snmp-server location

no snmp-server contact

snmp-server community public

no snmp-server enable traps

floodguard enable

!--- sysopt command entry to permit L2TP !--- traffic, while bypassing all ACLs.

sysopt connection permit-l2tp

no sysopt route dnat

!--- The IPsec configuration.

crypto ipsec transform-set l2tp esp-des esp-md5-hmac

!--- Only transport mode is supported.

crypto ipsec transform-set l2tp mode transport

crypto ipsec security-association lifetime seconds 3600

crypto dynamic-map dyna 20 match address l2tp

crypto dynamic-map dyna 20 set transform-set l2tp

crypto map mymap 10 ipsec-isakmp dynamic dyna

crypto map mymap client authentication RADIUS

crypto map mymap interface outside

!--- The IKE configuration.

isakmp enable outside

isakmp policy 20 authentication rsa-sig

isakmp policy 20 encryption des

isakmp policy 20 hash md5

isakmp policy 20 group 1

isakmp policy 20 lifetime 86400

ca identity sjvpn 171.68.9.149:/certsrv/mscep/mscep.dll

ca configure sjvpn ra 1 20 crloptional

telnet 171.68.9.0 255.255.255.0 inside

telnet 20.1.1.2 255.255.255.255 inside

telnet timeout 60

ssh timeout 5

!--- The L2TP configuration parameters.

vpdn group l2tpipsec accept dialin l2tp

vpdn group l2tpipsec ppp authentication chap

vpdn group l2tpipsec ppp authentication mschap

vpdn group l2tpipsec client configuration address local l2tp

vpdn group l2tpipsec client configuration dns 20.1.1.250 20.1.1.251

vpdn group l2tpipsec client configuration wins 20.1.1.250

vpdn group l2tpipsec client authentication aaa RADIUS

vpdn group l2tpipsec client accounting RADIUS

vpdn group l2tpipsec l2tp tunnel hello 60

vpdn enable outside

terminal width 80

Cryptochecksum:06a53009d1e9f04740256d9f0fb82837

: end

[OK]

다음을 확인합니다.

이 섹션을 사용하여 컨피그레이션이 제대로 작동하는지 확인합니다.

Output Interpreter 도구(등록된 고객만 해당)(OIT)는 특정 show 명령을 지원합니다.OIT를 사용하여 show 명령 출력의 분석을 봅니다.

- show crypto ca cert - 인증서, CA 인증서 및 모든 RA(Registration Authority) 인증서에 대한 정보를 표시합니다.

Certificate

Status: Available

Certificate Serial Number: 03716308000000000022

Key Usage: General Purpose

Subject Name

Name: PIX-506-2.sjvpn.com

Validity Date:

start date: 16:29:10 Apr 27 2001

end date: 16:39:10 Apr 27 2002

RA Signature Certificate

Status: Available

Certificate Serial Number: 0347dc82000000000002

Key Usage: Signature

CN = scott

OU = tac

O = cisco

L = san jose

ST = ca

C = US

EA =<16> zaahmed@cisco.com

Validity Date:

start date: 18:47:45 Jul 27 2000

end date: 18:57:45 Jul 27 2001

CA Certificate

Status: Available

Certificate Serial Number: 1102485095cbf8b3415b2e96e86800d1

Key Usage: Signature

CN = zakca

OU = vpn

O = cisco

L = sj

ST = california

C = US

EA =<16> zaahmed@cisco.com

Validity Date:

start date: 03:15:09 Jul 27 2000

end date: 03:23:48 Jul 27 2002

RA KeyEncipher Certificate

Status: Available

Certificate Serial Number: 0347df0d000000000003

Key Usage: Encryption

CN = scott

OU = tac

O = cisco

L = san jose

ST = ca

C = US

EA =<16> zaahmed@cisco.com

Validity Date:

start date: 18:47:46 Jul 27 2000

end date: 18:57:46 Jul 27 2001

- show crypto isakmp sa - 피어의 현재 모든 IKE SA를 표시합니다.

dst src state pending created

171.68.9.57 171.68.9.149 QM_IDLE 0 1

- show crypto ipsec sa - 현재 SA에서 사용하는 설정을 표시합니다.

interface: outside

Crypto map tag: mymap, local addr. 171.68.9.57

local ident (addr/mask/prot/port): (171.68.9.57/255.255.255.255/17/1701)

remote ident (addr/mask/prot/port): (171.68.9.149/255.255.255.255/17/1701)

current_peer: 171.68.9.149

dynamic allocated peer ip: 0.0.0.0

PERMIT, flags={reassembly_needed,transport_parent,}

#pkts encaps: 20, #pkts encrypt: 20, #pkts digest 20

#pkts decaps: 45, #pkts decrypt: 45, #pkts verify 45

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0, #pkts decompress failed: 0

#send errors 0, #recv errors 0

local crypto endpt.: 171.68.9.57, remote crypto endpt.: 171.68.9.149

path mtu 1500, ipsec overhead 36, media mtu 1500

current outbound spi: a8c54ec8

inbound esp sas:

spi: 0xfbc9db43(4224310083)

transform: esp-des esp-md5-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 1, crypto map: mymap

sa timing: remaining key lifetime (k/sec): (99994/807)

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0xa8c54ec8(2831503048)

transform: esp-des esp-md5-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 2, crypto map: mymap

sa timing: remaining key lifetime (k/sec): (99999/807)

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

- show vpdn tunnel - VPDN(virtual private dialup network)의 활성 L2TP 또는 L2F(Level 2 Forwarding) 터널에 대한 정보를 표시합니다.

L2TP Tunnel Information (Total tunnels=1 sessions=1)

Tunnel id 4 is up, remote id is 19, 1 active sessions

Tunnel state is established, time since change 96 secs

Remote Internet Address 171.68.9.149, port 1701

Local Internet Address 171.68.9.57, port 1701

15 packets sent, 38 received, 420 bytes sent, 3758 received

Control Ns 3, Nr 5

Local RWS 16, Remote RWS 8

Retransmission time 1, max 1 seconds

Unsent queuesize 0, max 0

Resend queuesize 0, max 1

Total resends 0, ZLB ACKs 3

Retransmit time distribution: 0 0 0 0 0 0 0 0 0

% No active PPTP tunnels

PIX-506-2# sh uauth

Current Most Seen

Authenticated Users 1 2

Authen In Progress 0 2

vpdn user 'vpnclient' at 50.1.1.1, authenticated

- show vpdn session - VPDN의 활성 L2TP 또는 L2F 세션에 대한 정보를 표시합니다.

L2TP Session Information (Total tunnels=1 sessions=1)

Call id 4 is up on tunnel id 4

Remote tunnel name is zaahmed-pc

Internet Address is 171.68.9.149

Session username is vpnclient, state is established

Time since change 201 secs, interface outside

Remote call id is 1

PPP interface id is 1

15 packets sent, 56 received, 420 bytes sent, 5702 received

Sequencing is off

- show vpdn pppinterface - show vpdn session 명령에서 인터페이스 식별 값에 대해 PPTP 터널에 대해 생성된 PPP 가상 인터페이스의 상태 및 통계를 표시합니다.

PPP virtual interface id = 1

PPP authentication protocol is CHAP

Client ip address is 50.1.1.1

Transmitted Pkts: 15, Received Pkts: 56, Error Pkts: 0

MPPE key strength is None

MPPE_Encrypt_Pkts: 0, MPPE_Encrypt_Bytes: 0

MPPE_Decrypt_Pkts: 0, MPPE_Decrypt_Bytes: 0

Rcvd_Out_Of_Seq_MPPE_Pkts: 0

- show uauth - 현재 사용자 인증 및 권한 부여 정보를 표시합니다.

Current Most Seen

Authenticated Users 1 2

Authen In Progress 0 2

vpdn user 'vpnclient' at 50.1.1.1, authenticated

문제 해결

이 섹션에서는 컨피그레이션 문제를 해결하는 데 사용할 수 있는 정보를 제공합니다.

문제 해결 명령

Output Interpreter 도구(등록된 고객만 해당)(OIT)는 특정 show 명령을 지원합니다.OIT를 사용하여 show 명령 출력의 분석을 봅니다.

참고: debug 명령을 사용하기 전에 디버그 명령에 대한 중요 정보를 참조하십시오.

- debug crypto ipsec - IPsec 이벤트를 표시합니다.

- debug crypto isakmp - IKE 이벤트에 대한 메시지를 표시합니다.

- debug crypto engine - 암호화 및 해독을 수행하는 암호화 엔진에 대한 디버그 메시지를 표시합니다.

- debug ppp io - PPTP PPP 가상 인터페이스에 대한 패킷 정보를 표시합니다.

- debug crypto ca - CA와 교환된 디버그 메시지를 표시합니다.

- debug ppp error—PPP 연결 협상 및 작업과 관련된 프로토콜 오류 및 오류 통계를 표시합니다.

- debug vpdn error - PPP 터널이 설정되지 않도록 하는 오류 또는 설정된 터널을 닫도록 하는 오류를 표시합니다.

- debug vpdn packet - VPDN에 대한 일반 터널 설정 또는 종료의 일부인 L2TP 오류 및 이벤트를 표시합니다.

- debug vpdn event - 일반 PPP 터널 설정 또는 종료의 일부인 이벤트에 대한 메시지를 표시합니다.

- debug ppp uauth — PPTP PPP 가상 인터페이스 AAA 사용자 인증 디버깅 메시지를 표시합니다.

디버그 출력 샘플

이것은 PIX 방화벽의 올바른 디버그 샘플입니다.

crypto_isakmp_process_block: src 171.68.9.149, dest 171.68.9.57

ISAKMP: Created a peer node for 171.68.9.149

OAK_MM exchange

ISAKMP (0): processing SA payload. message ID = 0

ISAKMP (0): Checking ISAKMP transform 1 against priority 20 policy

ISAKMP: encryption DES-CBC

ISAKMP: hash MD5

ISAKMP: default group 1

ISAKMP: auth RSA sig

ISAKMP: life type in seconds

ISAKMP: life duration (VPI) of 0x0 0x0 0xe 0x10

ISAKMP (0): atts are acceptable. Next payload is 0

ISAKMP (0): processing vendor id payload

ISAKMP (0): speaking to a MSWIN2K client

ISAKMP (0): SA is doing RSA signature authentication using id type ID_FQDN

return status is IKMP_NO_ERROR

crypto_isakmp_process_block: src 171.68.9.149, dest 171.68.9.57

OAK_MM exchange

ISAKMP (0): processing KE payload. message ID = 0

ISAKMP (0): processing NONCE payload. message ID = 0

return status is IKMP_NO_ERROR

crypto_isakmp_process_block: src 171.68.9.149, dest 171.68.9.57

OAK_MM exchange

ISAKMP (0): processing ID payload. message ID = 0

ISAKMP (0): processing CERT payload. message ID = 0

ISAKMP (0): processing a CT_X509_SIGNATURE cert

CRYPTO_PKI: status = 0: crl check ignored

PKI: key process suspended and continued

CRYPTO_PKI: WARNING: Certificate, private key or CRL was not found

while selecting CRL

CRYPTO_PKI: cert revocation status unknown.

ISAKMP (0): cert approved with warning

ISAKMP (0): processing SIG payload. message ID = 0

ISAKMP (0): processing CERT_REQ payload. message ID = 0

ISAKMP (0): peer wants a CT_X509_SIGNATURE cert

ISAKMP (0): SA has been authenticated

ISAKMP (0): ID payload

next-payload : 6

type : 2

protocol : 17

port : 500

length : 23

ISAKMP (0): Total payload length: 27

return status is IKMP_NO_ERROR

crypto_isakmp_process_block: src 171.68.9.149, dest 171.68.9.57

OAK_QM exchange

oakley_process_quick_mode:

OAK_QM_IDLE

ISAKMP (0): processing SA payload. message ID = 3800855889

ISAKMP : Checking IPSec proposal 1

ISAKMP: transform 1, ESP_DES

ISAKMP: attributes in transform:

ISAKMP: SA life type in seconds

ISAKMP: SA life duration (VPI) of 0x0 0x0 0x3 0x84

ISAKMP: SA life type in kilobytes

ISAKMP: SA life duration (VPI) of 0x0 0x1 0x86 0xa0

ISAKMP: encaps is 2

ISAKMP: authenticator is HMAC-MD5

ISAKMP (0): atts are acceptable.IPSEC(validate_proposal_request): proposal part #1,

(key eng. msg.) dest= 171.68.9.57, src= 171.68.9.149,

dest_proxy= 171.68.9.57/255.255.255.255/17/1701 (type=1),

src_proxy= 171.68.9.149/255.255.255.255/17/1701 (type=1),

protocol= ESP, transform= esp-des esp-md5-hmac ,

lifedur= 0s and 0kb,

spi= 0x0(0), conn_id= 0, keysize= 0, flags= 0x0

ISAKMP (0): processing NONCE payload. message ID = 3800855889

ISAKMP (0): processing ID payload. message ID = 3800855889

ISAKMP (0): ID_IPV4_ADDR src 171.68.9.149 prot 17 port 1701

ISAKMP (0): processing ID payload. message ID = 3800855889

ISAKMP (0): ID_IPV4_ADDR dst 171.68.9.57 prot 17 port 1701IPSEC(key_engine):

got a queue event...

IPSEC(spi_response): getting spi 0xfbc9db43(4224310083) for SA

from 171.68.9.149 to 171.68.9.57 for prot 3

return status is IKMP_NO_ERROR

crypto_isakmp_process_block: src 171.68.9.149, dest 171.68.9.57

OAK_QM exchange

oakley_process_quick_mode:

OAK_QM_AUTH_AWAIT

ISAKMP (0): Creating IPSec SAs

inbound SA from 171.68.9.149 to 171.68.9.57 (proxy 171.68.9.149 to 171.68.9.57)

has spi 4224310083 and conn_id 1 and flags 0

lifetime of 900 seconds

lifetime of 100000 kilobytes

outbound SA from 171.68.9.57 to 171.68.9.149 (proxy 171.68.9.57 to 171.68.9.149)

has spi 2831503048 and conn_id 2 and flags 0

lifetime of 900 seconds

lifetime of 100000 kilobytesIPSEC(key_engine): got a queue event...

IPSEC(initialize_sas): ,

(key eng. msg.) dest= 171.68.9.57, src= 171.68.9.149,

dest_proxy= 171.68.9.57/0.0.0.0/17/1701 (type=1),

src_proxy= 171.68.9.149/0.0.0.0/17/1701 (type=1),

protocol= ESP, transform= esp-des esp-md5-hmac ,

lifedur= 900s and 100000kb,

spi= 0xfbc9db43(4224310083), conn_id= 1, keysize= 0, flags= 0x0

IPSEC(initialize_sas): ,

(key eng. msg.) src= 171.68.9.57, dest= 171.68.9.149,

src_proxy= 171.68.9.57/0.0.0.0/17/1701 (type=1),

dest_proxy= 171.68.9.149/0.0.0.0/17/1701 (type=1),

protocol= ESP, transform= esp-des esp-md5-hmac ,

lifedur= 900s and 100000kb,

spi= 0xa8c54ec8(2831503048), conn_id= 2, keysize= 0, flags= 0x0

return status is IKMP_NO_ERROR

show log

603102: PPP virtual interface 1 - user: vpnclient aaa authentication started

603103: PPP virtual interface 1 - user: vpnclient aaa authentication succeed

109011: Authen Session Start: user 'vpnclient', sid 0

603106: L2TP Tunnel created, tunnel_id is 1, remote_peer_ip is 171.68.9.149

ppp_virtual_interface_id is 1, client_dynamic_ip is 50.1.1.1

username is vpnclient

CA에 등록하는 데 적합한 디버그

CI thread sleeps!

Crypto CA thread wakes up!%

% Start certificate enrollment ..

% The subject name in the certificate will be: PIX-506-2.sjvpn.com

CI thread wakes up!% Certificate request sent to Certificate Authority

% The certificate request fingerprint will be displayed.

PIX-506-2(config)#

PIX-506-2(config)#     Fingerprint:  d8475977 7198ef1f 17086f56 9e3f7a89

CRYPTO_PKI: transaction PKCSReq completed

CRYPTO_PKI: status:

Crypto CA thread sleeps!

PKI: key process suspended and continued

CRYPTO_PKI: http connection opened

CRYPTO_PKI:  received msg of 711 bytes

CRYPTO_PKI: WARNING: Certificate, private key or CRL was not found

while selecting CRL

CRYPTO_PKI: signed attr: pki-message-type:

13 01 33

CRYPTO_PKI: signed attr: pki-status:

13 01 33

CRYPTO_PKI: signed attr: pki-recipient-nonce:

04 10 70 0d 4e e8 03 09 71 4e c8 24 7a 2b 03 70 55 97

CRYPTO_PKI: signed attr: pki-transaction-id:

13 20 65 66 31 32 32 31 30 33 31 37 30 61 30 38 65 32 33 38

38 35 61 36 30 65 32 35 31 31 34 66 62 37

CRYPTO_PKI: status = 102: certificate request pending

CRYPTO_PKI: http connection opened

CRYPTO_PKI:  received msg of 711 bytes

CRYPTO_PKI: WARNING: Certificate, private key or CRL was not found

while selecting CRL

CRYPTO_PKI: signed attr: pki-message-type:

13 01 33

CRYPTO_PKI: signed attr: pki-status:

13 01 33

CRYPTO_PKI: signed attr: pki-recipient-nonce:

04 10 c8 9f 97 4d 88 24 92 a5 3b ba 9e bc d6 7c 75 57

CRYPTO_PKI: signed attr: pki-transaction-id:

13 20 65 66 31 32 32 31 30 33 31 37 30 61 30 38 65 32 33 38

38 35 61 36 30 65 32 35 31 31 34 66 62 37

CRYPTO_PKI: status = 102: certificate request pending

!--- After approval from CA.

Crypto CA thread wakes up!

CRYPTO_PKI: resend GetCertInitial, 1

Crypto CA thread sleeps!

CRYPTO_PKI: resend GetCertInitial for session: 0

CRYPTO_PKI: http connection opened

The certificate has been granted by CA!

CRYPTO_PKI:  received msg of 1990 bytes

CRYPTO_PKI: WARNING: Certificate, private key or CRL was not found

while selecting CRL

PKI: key process suspended and continued

CRYPTO_PKI: signed attr: pki-message-type:

13 01 33

CRYPTO_PKI: signed attr: pki-status:

13 01 30

CRYPTO_PKI: signed attr: pki-recipient-nonce:

04 10 c8 9f 97 4d 88 24 92 a5 3b ba 9e bc d6 7c 75 57

CRYPTO_PKI: signed attr: pki-transaction-id:

13 20 65 66 31 32 32 31 30 33 31 37 30 61 30 38 65 32 33 38

38 35 61 36 30 65 32 35 31 31 34 66 62 37

CRYPTO_PKI: status = 100: certificate is granted

CRYPTO_PKI: WARNING: Certificate, private key or CRL was not found

while selecting CRL

CRYPTO_PKI: All enrollment requests completed.

CRYPTO_PKI: All enrollment requests completed.

CRYPTO_PKI: WARNING: Certificate, private key or CRL was not found

while selecting CRL

CA에 등록하는 데 잘못된 디버그

이 예에서는 ca identity 명령에서 잘못된 URL 구문이 사용되었습니다.

CI thread sleeps!

Crypto CA thread wakes up!

CRYPTO_PKI: http connection opened

msgsym(GETCARACERT, CRYPTO)!

%Error in connection to Certificate Authority: status = FAIL

CRYPTO_PKI: status = 266: failed to verify

CRYPTO_PKI: transaction GetCACert completed

Crypto CA thread sleeps!

등록 모드가 RA 대신 CA로 지정된 경우 다음 디버그를 가져옵니다.

CI thread sleeps!

Crypto CA thread wakes up!

CRYPTO_PKI: http connection opened

Certificate has the following attributes:

Fingerprint: 49dc7b2a cd5fc573 6c774840 e58cf178

CRYPTO_PKI: transaction GetCACert completed

CRYPTO_PKI: Error:  Invalid format for BER encoding while

CRYPTO_PKI: can not set ca cert object.

CRYPTO_PKI: status = 65535: failed to process RA certiifcate

Crypto CA thread sleeps!

이 예에서는 mode transport 명령이 없습니다.

ISAKMP:      SA life type in seconds

ISAKMP:      SA life duration (VPI) of  0x0 0x0 0x70 0x80

ISAKMP:      SA life type in kilobytes

ISAKMP:      SA life duration (VPI) of  0x0 0x46 0x50 0x0

ISAKMP:      encaps is 2

ISAKMP:      authenticator is HMAC-MD5IPSEC(validate_proposal):

invalid transform proposal flags -- 0x0

이 출력에서 crypto map mymap 10 ipsec-isakmp dynamic dyna 명령이 누락되었으며 이 메시지가 디버그에 나타날 수 있습니다.

no IPSEC cryptomap exists for local address a.b.c.d

관련 정보

- RADIUS 기술 지원 페이지

- PIX 명령 참조

- PIX 지원 페이지

- IPsec 협상/IKE 프로토콜 지원 페이지

- RFC(Request for Comments)