목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

구성

네트워크 다이어그램

구성

다음을 확인합니다.

문제 해결

관련 정보

소개

터널로 Cisco CET(Encryption Technology) 암호화를 구성하려면 터널의 인터페이스에서 암호화를 구성해야 합니다. 또한 터널의 최종 목적지로 향하는 물리적 인터페이스에서 암호화를 구성해야 합니다.

참고: CET 암호화는 단종되었습니다. IPSec은 마이그레이션에 권장되는 암호화 체계입니다.

사전 요구 사항

요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서는 특정 소프트웨어 및 하드웨어 버전으로 한정되지 않습니다.

표기 규칙

문서 표기 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참조하십시오.

구성

이 섹션에는 이 문서에서 설명하는 기능을 구성하기 위한 정보가 표시됩니다.

참고: 이 문서에 사용된 명령에 대한 추가 정보를 찾으려면 명령 조회 도구(등록된 고객만 해당)를 사용합니다.

네트워크 다이어그램

이 문서에서는 다음 네트워크 설정을 사용합니다.

네트워크 다이어그램 참고 사항

- 8.8.8.8 r3-4k 및 7.7.7.4 뒤에 있는 R6-2500은 엔드스테이션입니다. 서로 ping하면 트래픽이 터널을 통과합니다.

- GRE(Generic Routing Encapsulation) 터널은 루프백 인터페이스를 터널 소스 및 대상으로 구성합니다.

- 터널을 통과하는 트래픽도 암호화됩니다. 이 기능을 구현하려면 터널 트래픽을 암호화하려면 암호화 맵을 터널 인터페이스와 물리적 아웃바운드 인터페이스 모두에 연결해야 합니다.

구성

이 문서에서는 다음 구성을 사용합니다.

- r3-4k

- R1-AGS

- R6-2500

r3-4k

hostname r3-4k

!

crypto public-key r6-2500 02014544

F3681B5D 32372A19 0C0CCC4B E707F829 D882CF30 A9B4DBE3 E1911E9C F6A9E162

732558DF A20FEFAD 2ACC400E 8DDB10B1 3566FA3A E55A9BBE 00916AAD 20A0C75C

quit

!

crypto map my_crypto_map 10

set algorithm 40-bit-des

set peer r6-2500

match address 128

!

interface Loopback0

ip address 1.1.6.1 255.255.255.0

!

interface Tunnel0

ip address 5.5.5.1 255.255.255.0

tunnel source Loopback0

tunnel destination 2.2.6.3

crypto map my_crypto_map

!

interface Ethernet0

ip address 1.1.1.1 255.255.255.0

description inside interface

media-type 10BaseT

crypto map my_crypto_map

!

!

interface Serial0

encapsulation frame-relay

no ip route-cache

!

interface Serial0.1 point-to-point

description outside interface

ip address 8.8.8.1 255.255.255.0

frame-relay interface-dlci 100

!

!ip classless

ip route 0.0.0.0 0.0.0.0 1.1.1.2

ip route 7.0.0.0 255.0.0.0 5.5.5.2

access-list 128 permit gre host 1.1.6.1 host 2.2.6.3

!

R1-AGS

!

hostname R1-AGS

!

interface Ethernet0

ip address 1.1.1.2 255.255.255.0

!

interface Serial1

ip address 2.2.5.2 255.255.255.0

!

ip classless

ip route 1.0.0.0 255.0.0.0 1.1.1.1

ip route 2.0.0.0 255.0.0.0 2.2.5.3

R6-2500

hostname R6-2500

!

crypto public-key r3-4k 04D6265A

512A7D84 43C348B7 959D2FE2 3122B285 FDA2A362 7272A835 84D03134 DB160DE1

27CA2D24 D6C23EFE 3BE25A95 D62EA30B 0F2C3BA8 9AB6DB82 D8127238 266AC987

quit

!

crypto map my_crypto_map 10

set algorithm 40-bit-des

set peer r3-4k

match address 128

!

interface Loopback0

ip address 2.2.6.3 255.255.255.0

!

interface Tunnel0

ip address 5.5.5.2 255.255.255.0

tunnel source Loopback0

tunnel destination 1.1.6.1

crypto map my_crypto_map

!

interface Ethernet 0

description inside interface

ip address 7.7.7.3 255.255.255.0

!

interface Serial0

description outside interface

ip address 2.2.5.3 255.255.255.0

crypto map my_crypto_map

!

ip classless

ip route 0.0.0.0 0.0.0.0 2.2.5.2

ip route 7.0.0.0 255.0.0.0 7.7.7.0

ip route 8.0.0.0 255.0.0.0 5.5.5.1

!

access-list 128 permit gre host 2.2.6.3 host 1.1.6.1

다음을 확인합니다.

현재 이 구성에 대해 사용 가능한 확인 절차가 없습니다.

문제 해결

현재 이 컨피그레이션에 사용할 수 있는 특정 문제 해결 정보가 없습니다.

관련 정보

- IPSec 지원 페이지

- Technical Support - Cisco Systems