목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

중요 참고 사항

구성

네트워크 다이어그램

구성

다음을 확인합니다.

Catalyst 5500 스위치

Catalyst 5000 스위치

문제 해결

관련 정보

소개

이 문서에서는 Catalyst 5500과 Catalyst 5000 스위치 간의 ISL(Inter-Switch Link)에 대한 샘플 컨피그레이션을 제공하며, 둘 다 Catalyst OS(CatOS)를 실행합니다. CatOS를 실행하는 모든 Catalyst 5000 또는 6000 제품군 멤버를 이 시나리오에서 사용하여 동일한 결과를 얻을 수 있습니다.

간단히 말해, 트렁킹은 두 디바이스 간의 포인트-투-포인트 링크를 통해 여러 VLAN에서 트래픽을 전달하는 방법입니다.이더넷 트렁킹을 구현할 수 있는 방법에는 두 가지가 있습니다.

- ISL(Cisco 전용 Inter-Switch Link 프로토콜)

- 802.1Q(IEEE 표준)

이 문서에서는 스위치의 컨피그레이션 파일과 관련 샘플 show 명령의 출력만 표시합니다.Catalyst 스위치 간 ISL 트렁크를 구성하는 방법에 대한 자세한 내용은 Configuring ISL Trunking on Catalyst 5500/5000 and 6500/6000 Family Switch를 참조하십시오.

사전 요구 사항

요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서의 정보는 다음 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- Catalyst OS 6.1(1) 소프트웨어를 실행하는 Catalyst 5500 스위치

- Catalyst OS 6.1(1) 소프트웨어를 실행하는 Catalyst 5000 스위치

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다.현재 네트워크가 작동 중인 경우, 모든 명령어의 잠재적인 영향을 미리 숙지하시기 바랍니다.모든 디바이스의 컨피그레이션은 clear config all 및 write erase 명령을 통해 지워져 기본 컨피그레이션이 적용되었는지 확인합니다.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참조하십시오.

중요 참고 사항

CatOS를 실행하는 Catalyst 4000 제품군(Catalyst 2948G 및 Catalyst 2980G 포함)은 ISL 트렁킹이 아닌 802.1Q 트렁킹만 지원합니다.

Catalyst 6000 제품군의 모든 이더넷 포트는 802.1Q 및 ISL 캡슐화를 지원합니다.

모듈에 따라 Catalyst 5000 트렁크 지원 포트는 ISL 캡슐화 또는 ISL 및 802.1Q만 지원할 수 있습니다.이를 확인하는 가장 좋은 방법은 show port capabilities 명령을 실행하는 것입니다.트렁킹 용량은 명시적으로 명시되어 있습니다.예를 들면 다음과 같습니다.

cat5000> show port capabilities 3

Model                    WS-X5225R

Port                     3/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  3/1-2,3/1-4

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off,on)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(none),tx-(none)

CoS rewrite              yes

ToS rewrite              IP-Precedence

Rewrite                  no

UDLD                     yes

AuxiliaryVlan            1..1000,1025..4094,untagged,dot1p,none

SPAN                     source,destination

트렁킹 모드가 트렁크 링크 전체에서 일치하는지 확인합니다.링크의 한 쪽이 ISL 트렁크로 구성된 경우 링크의 다른 쪽도 ISL로 구성해야 합니다.마찬가지로, 링크의 한 쪽이 802.1Q로 구성된 경우 링크의 다른 쪽도 802.1Q로 구성해야 합니다.

구성

이 섹션에는 이 문서에서 설명하는 기능을 구성하기 위한 정보가 표시됩니다.

참고: 이 문서에 사용된 명령에 대한 추가 정보를 찾으려면 명령 조회 도구(등록된 고객만 해당)를 사용합니다.

네트워크 다이어그램

이 문서에서는 다음 네트워크 설정을 사용합니다.

구성

이 문서에서는 다음 구성을 사용합니다.

- Catalyst 5500

- Catalyst 5000

Catalyst 5500

#version 6.1(1)

!

set option fddi-user-pri enabled

set password $2$q.J7$O5n.pwx7aEC6NHWJfXadx1

set enablepass $2$o.h/$bAxfjJ4XUA/RMUHqBr1YQ0

!

#errordetection

set errordetection portcounter enable

!

#system

set system name  cat5500

!

#frame distribution method

set port channel all distribution mac both

!

#vtp

!--- In this example, the VLAN Trunking Protocol (VTP) mode is set to be transparent. !--- Depending on your network, set the VTP mode accordingly.

set vtp mode transparent

!--- For details on VTP, refer to Configuring VTP.

set vlan 1 name default type ethernet mtu 1500 said 100001 state active

set vlan 1002 name fddi-default type fddi mtu 1500 said 101002 state active

set vlan 1004 name fddinet-default type fddinet mtu 1500 said 101004 state active stp ieee

set vlan 1005 name trnet-default type trbrf mtu 1500 said 101005 state active stp ibm

set vlan 2

set vlan 1003 name token-ring-default type trcrf mtu 1500 said 101003 state acti

ve mode srb aremaxhop 7 stemaxhop 7 backupcrf off

!

#ip

!--- IP address used for management.

set interface sc0 1 10.10.10.2/255.255.255.0 10.10.10.255

!

#set boot command

set boot config-register 0x2102

set boot system flash slot0:cat5000-sup3.6-1-1.bin

!

# default port status is enable

!

!

#module 1 empty

!

#module 2 : 2-port 1000BaseSX Supervisor

!

#module 3 empty

!

#module 4 : 24-port 10/100BaseTX Ethernet

!--- Ports 4/13-24 are assigned to VLAN 2.

set vlan 2 4/13-24

!--- The ISL trunking mode is set to on. !--- Depending on your network and requirements, set the trunking mode accordingly.

set trunk 4/1 on isl 1-1005

!--- For details on different trunking modes, refer to !--- Configuring VLAN Trunks on Fast Ethernet and Gigabit Ethernet Ports !--- Portfast has been enabled on the ports connected to the workstations.

set spantree portfast 4/2-24 enable

!--- For details on why to enable portfast, refer to !--- Using Portfast and Other Commands to Fix Workstation Startup Connectivity Delays

!

#module 5 empty

!

#module 6 empty

!

#module 7 empty

!

#module 8 empty

!

#module 9 empty

!

#module 10 empty

!

#module 11 empty

!

#module 12 empty

!

#module 13 empty

end

Catalyst 5000

#Version 6.1(1)

!

set option fddi-user-pri enabled

set password $2$J75L$Ug4163kfeHTDcLJZ/L9es1

set enablepass $2$h/BN$i3S54iNvIXknFelh6gOve0

!

#errordetection

set errordetection portcounter enable

!

#system

set system name  cat5000

!

#frame distribution method

set port channel all distribution Mac both

!

#vtp

!--- In this example, the VTP mode is set to be transparent. !--- Depending on your network and requirements, set the VTP mode accordingly.

set vtp mode transparent

!--- For details on VTP, refer to Configuring VTP.

set vlan 1 name default type ethernet mtu 1500 said 100001 state active

set vlan 1002 name fddi-default type fddi mtu 1500 said 101002 state active

set vlan 1004 name fddinet-default type fddinet mtu 1500 said 101004 state active stp IEEE

set vlan 1005 name trnet-default type trbrf mtu 1500 said 101005 state active stp IBM

set vlan 2

set vlan 1003 name token-ring-default type trcrf mtu 1500 said 101003 state acti

ve mode srb aremaxhop 7 stemaxhop 7 backupcrf off

!

#ip

!--- IP address used for management.

set interface sc0 1 10.10.10.3/255.255.255.0 10.10.10.255

!

#set boot command

set boot config-register 0x2102

set boot system flash slot0:cat5000-sup3.6-1-1.bin

!

# default port status is enable

!

!

#module 1 : 0-port Supervisor III

!

#module 2 : 12-port 10/100BaseTX Ethernet

!

#module 3 : 24-port 10/100BaseTX Ethernet

!--- Ports 3/13-24 have been assigned to VLAN 2.

set vlan 2 3/13-24

!--- The ISL trunking mode is set to on. !--- Depending on your network and requirements, set the trunking mode accordingly.

set trunk 3/1 on isl 1-1005

!--- For details on different trunking modes, refer to !--- Configuring VLAN Trunks on Fast Ethernet and Gigabit Ethernet Ports !--- Portfast has been enabled on the ports connected to the workstations.

set spantree portfast 3/2-24 enable

!--- For details on why to enable portfast, refer to !--- Using Portfast and Other Commands to Fix Workstation Startup Connectivity Delays

!

!

#module 4 : 24-port 10/100BaseTX Ethernet

!

#module 5 : 12-port 10BaseFL Ethernet

end

다음을 확인합니다.

이 섹션에서는 컨피그레이션이 제대로 작동하는지 확인하는 데 사용할 수 있는 정보를 제공합니다.

특정 show 명령(특히 show tech-support)은 Output Interpreter Tool(등록된 고객만 해당)에서 지원되므로 show 명령 출력 분석을 볼 수 있습니다.

Catalyst 5500 스위치

show port capabilities module/port—이 명령을 실행하여 포트가 트렁킹 기능을 지원하는지 확인합니다.

cat5500> (enable)  show port capabilities 4/1

Model                    WS-X5234

Port                     4/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  4/1-2,4/1-4

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off,on)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(none),TX(1q4t)

COs rewrite              yes

ToS rewrite              IP-Precedence

Rewrite                  no

UDLD                     yes

AuxiliaryVlan            1..1000,1025..4094,untagged,dot1p,none

SPAN                     source,destination

show port module/port—이 명령을 실행하여 특정 포트의 상태와 트렁킹 여부를 확인합니다.

cat5500> (enable) show port 4/1

Port  Name               Status     Vlan       Level  Duplex Speed Type

----- ------------------ ---------- ---------- ------ ------ ----- ------------

4/1                     connected  trunk      normal a-full a-100 10/100BaseTX

Port  AuxiliaryVlan AuxVlan-Status

----- ------------- --------------

4/1  none          none

Port  Security Violation Shutdown-Time Age-Time Max-Addr Trap     IfIndex

----- -------- --------- ------------- -------- -------- -------- -------

4/1  disabled  shutdown             0        0        1 disabled      11

Port  Num-Addr Secure-Src-Addr   Age-Left Last-Src-Addr     Shutdown/Time-Left

----- -------- ----------------- -------- ----------------- ------------------

4/1         0                 -        -                 -        -         -

!--- Output suppressed.

show trunk - 트렁킹 상태 및 컨피그레이션을 확인하려면 이 명령을 실행합니다.

cat5500> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

4/1      on           isl            trunking      1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

4/1      1-1005

Port      Vlans allowed and active in management domain

--------  ---------------------------------------------------------------------

4/1      1-2

Port      Vlans in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

4/1      1-2

show vtp domain - VTP 정보를 확인하려면 이 명령을 실행합니다.

cat5500> (enable) show vtp domain

Domain Name                      Domain Index VTP Version Local Mode  Password

-------------------------------- ------------ ----------- ----------- ----------

1            2           Transparent -

Vlan-count Max-vlan-storage Config Revision Notifications

---------- ---------------- --------------- -------------

6          1023             0               disabled

Last Updater    V2 Mode  Pruning  PruneEligible on Vlans

--------------- -------- -------- -------------------------

10.10.10.2      disabled disabled 2-1000

Catalyst 5000 스위치

show port capabilities module/port—이 명령을 실행하여 포트가 트렁킹 기능을 지원하는지 확인합니다.

cat5000> (enable) show port capabilities 3/1

Model                    WS-X5225R

Port                     3/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  3/1-2,3/1-4

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off,on)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(none),TX(none)

COs rewrite              yes

ToS rewrite              IP-Precedence

Rewrite                  no

UDLD                     yes

AuxiliaryVlan            1..1000,1025..4094,untagged,dot1p,none

SPAN                     source,destination

show port module/port—이 명령을 실행하여 특정 포트의 상태와 트렁킹 여부를 확인합니다.

cat5000> (enable) show port 3/1

Port  Name               Status     Vlan       Level  Duplex Speed Type

----- ------------------ ---------- ---------- ------ ------ ----- ------------

3/1                     connected  trunk      normal a-full a-100 10/100BaseTX

Port  AuxiliaryVlan AuxVlan-Status

----- ------------- --------------

3/1  none          none

Port  Security Violation Shutdown-Time Age-Time Max-Addr Trap     IfIndex

----- -------- --------- ------------- -------- -------- -------- -------

3/1  disabled  shutdown             0        0        1 disabled      57

!--- Output suppressed.

show trunk - 트렁킹 상태 및 컨피그레이션을 확인하려면 이 명령을 실행합니다.

cat5000> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

3/1      on           isl            trunking      1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

3/1      1-1005

Port      Vlans allowed and active in management domain

--------  ---------------------------------------------------------------------

3/1      1-2

Port      Vlans in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

3/1      1-2

show vtp domain - VTP 정보를 확인하려면 이 명령을 실행합니다.

cat5000> (enable) show vtp domain

Domain Name                      Domain Index VTP Version Local Mode  Password

-------------------------------- ------------ ----------- ----------- ----------

1            2           Transparent -

Vlan-count Max-vlan-storage Config Revision Notifications

---------- ---------------- --------------- -------------

6          1023             0               disabled

Last Updater    V2 Mode  Pruning  PruneEligible on Vlans

--------------- -------- -------- -------------------------

10.10.10.3      disabled disabled 2-1000

문제 해결

현재 이 컨피그레이션에 사용할 수 있는 특정 문제 해결 정보가 없습니다.

관련 정보

- LAN 제품 지원 페이지

- LAN 스위칭 지원 페이지

- 기술 지원 및 문서 − Cisco Systems