목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

구성

네트워크 다이어그램

구성

다음을 확인합니다.

문제 해결

관련 정보

소개

BGP(Border Gateway Protocol)는 인터넷 연결 이중화를 달성하는 데 사용할 주요 프로토콜 중 하나입니다. 네트워크를 서로 다른 두 ISP(인터넷 서비스 공급자)에 연결하면 이를 멀티호밍이라고 합니다. 멀티홈(Multhoming)은 이중화 및 네트워크 최적화를 제공합니다. 리소스에 대한 최상의 경로를 제공하는 ISP를 선택합니다. 둘 이상의 서비스 공급자와 함께 BGP를 실행하면 자동 시스템(AS)이 전송 AS가 될 위험이 발생합니다. 이로 인해 인터넷 트래픽이 AS를 통과하고 잠재적으로 라우터의 CPU에 있는 모든 대역폭과 리소스를 사용하게 됩니다. 이 문서에서는 이 문제를 해결하고 적절한 구성 예를 제공합니다.

사전 요구 사항

요구 사항

계속하기 전에 이 문서를 참조하십시오.

두 개의 서로 다른 통신 사업자를 사용하는 BGP 샘플 컨피그레이션(멀티홈)

사용되는 구성 요소

이 문서의 정보는 다음 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- Cisco 2800 Series Router with Cisco IOS® Software 릴리스 12.4(13r)T

- Cisco 3800 Series Router with Cisco IOS Software 릴리스 12.4(13r)T

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참고하십시오.

구성

이 섹션에는 이 문서에서 설명하는 기능을 구성하기 위한 정보가 표시됩니다.

참고: 명령 조회 도구(등록된 고객만 해당)를 사용하여 이 문서에 사용된 명령에 대한 자세한 내용을 확인하십시오.

네트워크 다이어그램

이 문서에서는 다음 네트워크 설정을 사용합니다.

이 네트워크에서 라우터 A는 1010:1010::/64 및 2020:2020::/64가 AS 101에 의해 외부에 광고되고 네트워크 1212:1212:/64가 서로 다른 두 개의 SP-A 및 SP-B에 연결됩니다. 202 및 AS 303입니다

참고: BGP 멀티호밍에 대한 개요를 제공하고 피어링 및 높은 CPU와 같은 일반적인 BGP 문제를 해결하는 방법에 대한 조언을 제공하는 비디오(Cisco Support Community 에서 사용 가능)에 대한 링크입니다.

BGP 멀티홈: 디자인 및 문제 해결 - 라이브 웹캐스트에서 비디오

구성

이 문서에서는 다음 구성을 사용합니다.

- 라우터-A

- 통신 사업자 A

- 서비스 공급자 B

라우터-A

Router-A#

ipv6 unicast-routing

!---Enables the forwarding of IPv6 packets.

ipv6 cef

interface Serial3/0

description CONNECTED TO SP-A

ip address 192.168.10.1 255.255.255.0

ipv6 address 1202:ABCD::/64 eui-64

ipv6 enable

no fair-queue

clock rate 64000

!

interface Serial3/1

description CONNECTED TO SP-B

no ip address

ipv6 address 2303:ABCD::/64 eui-64

clock rate 64000

!

router bgp 101

bgp router-id 1.1.1.1

no bgp default ipv4-unicast

bgp log-neighbor-changes

neighbor 1202:ABCD::21B:54FF:FEA9:24B0 remote-as 202

!--- Configures SP-A as neighbor.

neighbor 1202:ABCD::21B:54FF:FEA9:24B0 ebgp-multihop 2

neighbor 2303:ABCD::21B:54FF:FE54:FB10 remote-as 303

!--- Configures SP-B as neighbor.

!

address-family ipv6

neighbor 1202:ABCD::21B:54FF:FEA9:24B0 activate

neighbor 2303:ABCD::21B:54FF:FE54:FB10 activate

network 1010:1010::/64

network 2020:2020::/64

exit-address-family

!

서비스 공급자A

SP-A#

ipv6 unicast-routing

ipv6 cef

interface Serial1/0

no ip address

ipv6 address 1202:ABCD::/64 eui-64

ipv6 enable

no fair-queue

!

router bgp 202

bgp router-id 2.2.2.2

no bgp default ipv4-unicast

bgp log-neighbor-changes

neighbor 1202:ABCD::21C:58FF:FEED:3E90 remote-as 101

!--- Configuers Router A as neighbor.

!

address-family ipv6

neighbor 1202:ABCD::21C:58FF:FEED:3E90 activate

network 1212:1212::/64

exit-address-family

!

서비스 공급자B

SP-B#

ipv6 unicast-routing

ipv6 cef

interface Serial1/0

no ip address

ipv6 address 2303:ABCD::/64 eui-64

no fair-queue

!

router bgp 303

no synchronization

bgp router-id 3.3.3.3

bgp log-neighbor-changes

neighbor 2303:ABCD::21C:58FF:FEED:3E90 remote-as 101

!--- Configures as Router A as neighbor.

neighbor 2303:ABCD::21C:58FF:FEED:3E90 ebgp-multihop 5

no auto-summary

!

address-family ipv6

neighbor 2303:ABCD::21C:58FF:FEED:3E90 activate

network 1212:1212::/64

exit-address-family

!

다음을 확인합니다.

이 섹션을 사용하여 컨피그레이션이 제대로 작동하는지 확인합니다.

Output Interpreter 도구(등록된 고객만 해당)(OIT)는 특정 show 명령을 지원합니다. OIT를 사용하여 show 명령 출력의 분석을 봅니다.

- 2개의 ISP로 라우터 A 피어링

Router-A#

show bgp ipv6 unicast summary

BGP router identifier 1.1.1.1, local AS number 101

BGP table version is 6, main routing table version 6

3 network entries using 447 bytes of memory

4 path entries using 304 bytes of memory

4/2 BGP path/bestpath attribute entries using 496 bytes of memory

2 BGP AS-PATH entries using 48 bytes of memory

0 BGP route-map cache entries using 0 bytes of memory

0 BGP filter-list cache entries using 0 bytes of memory

BGP using 1295 total bytes of memory

BGP activity 3/0 prefixes, 14/10 paths, scan interval 60 secs

Neighbor        V    AS MsgRcvd MsgSent   TblVer  InQ OutQ Up/Down  State/PfxRcd

1202:ABCD::21B:54FF:FEA9:24B0   4   202   108     119   6    0    0 00:31:41   1

2303:ABCD::21B:54FF:FE54:FB10   4   303   108     121   6    0    0 00:25:1    1

!--- Indicates that Router A is peering with both the ISP SP-A and SP-B

- SP-A 및 SP-B에서 라우터를 학습한 경우

Router-A#show bgp ipv6 unicast

BGP table version is 6, local router ID is 1.1.1.1

Status codes: s suppressed, d damped, h history, * valid, > best, i - internal,

r RIB-failure, S Stale

Origin codes: i - IGP, e - EGP, ? - incomplete

Network          Next Hop            Metric LocPrf Weight Path

*> 1010:1010::/64   ::                       0                          32768 i

*  1212:1212::/64   2303:ABCD::21B:54FF:FE54:FB10 0  0 303 i

*>                              1202:ABCD::21B:54FF:FEA9:24B0 0  0 202 i

*> 2020:2020::/64   ::                       0                         32768 i

- SP-A:

SP-A#sh bgp ipv6 unicast

BGP table version is 4, local router ID is 2.2.2.2

Status codes: s suppressed, d damped, h history, * valid, > best, i - internal,

r RIB-failure, S Stale

Origin codes: i - IGP, e - EGP, ? - incomplete

Network          Next Hop            Metric LocPrf Weight Path

*> 1010:1010::/64   1202:ABCD::21C:58FF:FEED:3E90 0 0 101 i

*> 1212:1212::/64   ::                       0            32768              i

*> 2020:2020::/64   1202:ABCD::21C:58FF:FEED:3E90 0 0 101 i

- SP-B의 경우:

SP-B#sh bgp ipv6 unicast

BGP table version is 4, local router ID is 3.3.3.3

Status codes: s suppressed, d damped, h history, * valid, > best, i - internal,

r RIB-failure, S Stale

Origin codes: i - IGP, e - EGP, ? - incomplete

Network          Next Hop            Metric LocPrf Weight Path

*> 1010:1010::/64   2303:ABCD::21C:58FF:FEED:3E90 0             0 101 i

*  1212:1212::/64   2303:ABCD::21C:58FF:FEED:3E90  0                 101 202 i

*>                  ::                       0         32768 i

*> 2020:2020::/64   2303:ABCD::21C:58FF:FEED:3E90 0             0 101 i

문제 해결

피어링 상태를 결정하는 데 도움이 되도록 업데이트에 디버깅 정보를 표시하려면 debug bgp ipv6 update 명령을 사용합니다.

관련 정보

- BGP(Border Gateway Protocol)

- BGP 사례 연구

- BGP 명령 참조

- BGP 컨피그레이션 가이드

- 기술 지원 및 문서 − Cisco Systems