목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

절차

관련 정보

소개

공급업체마다 특정 요구 사항을 충족하기 위해 표준 특성 값 쌍(AV 쌍)을 확장했습니다.Cisco에서 도입한 AV 쌍은 Cisco AV 쌍이라고 하는 벤더 특정 특성이라고 합니다.

이 문서에서는 여러 Cisco AV 쌍 또는 다중값 특성을 사용자 프로필에 추가하는 방법에 대해 설명합니다.

사전 요구 사항

요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서의 정보는 다음 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- Solaris 8

- Access Registrar 3.0R8

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다.이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다.현재 네트워크가 작동 중인 경우, 모든 명령어의 잠재적인 영향을 미리 숙지하시기 바랍니다.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참조하십시오.

절차

Cisco AV 쌍 또는 다중값 특성은 한 번에 하나씩 추가할 수 없습니다.한 번에 하나씩 추가한 경우 마지막 AV 쌍 또는 속성만 남습니다. 나머지 AV 쌍을 덮어쓰므로 이 특성이 유지됩니다.

올바른 구문은 다음과 같습니다.

set Cisco-Avpair "vpdn:l2tp-tunnel-password=XYZ" "vpdn:tunnel-type=l2tp"

"vpdn:tunnel-id=tunnel23" "vpdn:ip-addresses=10.10.10.1"

참고: 값에 공백이 없으면 큰따옴표가 반드시 필요하지 않습니다.이 경우 큰따옴표가 필요하지 않습니다.전체 명령을 한 줄에 입력해야 합니다.공간 이유로 이 문서의 두 번째 줄로 래핑되었습니다.

다음은 aregcmd에서 단계를 수행하는 방법의 예입니다.

--> cd /Radius/Profiles/default-PPP-users/Attributes/

[ //localhost/Radius/Profiles/default-PPP-users/Attributes ]

Ascend-Idle-Limit = 1800

Framed-Compression = "VJ TCP/IP header compression"

Framed-MTU = 1500

Framed-Protocol = PPP

Framed-Routing = None

Service-Type = Framed

!--- This command is brought down to a second line !--- for spatial reasons. Keep this command on one line when you !--- enter it.

--> set Cisco-Avpair "vpdn:l2tp-tunnel-password=XYZ" "vpdn:tunnel-type=l2tp"

"vpdn:tunnel-id=tunnel23" "vpdn:ip-addresses=10.10.10.1"

!--- This command is brought down to a second line !--- for spatial reasons. Keep this command on one line when you !--- enter it.

Set Cisco-Avpair vpdn:l2tp-tunnel-password=XYZ vpdn:tunnel-type=l2tp

vpdn:tunnel-id=tunnel23 vpdn:ip-addresses=10.10.10.1

--> ls

[ //localhost/Radius/Profiles/default-PPP-users/Attributes ]

Ascend-Idle-Limit = 1800

Cisco-Avpair = vpdn:l2tp-tunnel-password=XYZ

Cisco-Avpair = vpdn:tunnel-type=l2tp

Cisco-Avpair = vpdn:tunnel-id=tunnel23

Cisco-Avpair = vpdn:ip-addresses=10.10.10.1

!--- All av-pairs are successfully added.

Framed-Compression = "VJ TCP/IP header compression"

Framed-MTU = 1500

Framed-Protocol = PPP

Framed-Routing = None

Service-Type = Framed

관련 정보

- Cisco Access Registrar 지원 페이지

- TACACS+ 특성-값 쌍

- RADIUS 특성-값 쌍

- 기술 지원 및 문서 − Cisco Systems