内容

概要

前提条件

要件

使用するコンポーネント

関連製品

表記法

背景説明

設定

ネットワーク図

設定

確認

Saturnにダイヤルインした後のVenus のshow コマンド

Venusがダイヤルインした後のSaturn のshow コマンド

トラブルシュート

トラブルシューティングのリソース

トラブルシューティングのためのコマンド

対象トラフィックが到着したときの Venus の debug コマンド

関連情報

概要

このドキュメントでは、ルーテッド ネットワークおよびブリッジ型ネットワークの接続に PPP のハーフ ブリッジングを使用する設定例を説明します。

前提条件

要件

このドキュメントに特有の要件はありません。

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

- Cisco IOS® ソフトウェア リリース 12.2(7b)

- Cisco 2500 シリーズ ルータ：2 台それぞれに少なくとも 1 つの ISDN BRI インターフェイスがあります。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

関連製品

この設定は、次のバージョンのハードウェアとソフトウェアにも使用できます。

- シリアル インターフェイス（シリアルの基本速度インターフェイス（BRI）、一次群速度インターフェイス（PRI）など）。

- Cisco IOS ソフトウェア リリース 11.2

- 前述したように、Cisco IOS ソフトウェアを実行しており、少なくとも 1 つの ISDN-BRI ポートを持つ任意のルータ。ただし、シリアル インターフェイスを備えたルータでハーフ ブリッジ機能を使用できます。

表記法

ドキュメントの表記法の詳細は、「シスコ テクニカル ティップスの表記法」を参照してください。

背景説明

PPP ハーフブリッジは、ブリッジ パケットをルーテッド パケットに変換し、それを他のルータ プロセスに転送します。同様に、PPP ハーフブリッジはルーテッド パケットをイーサネット ブリッジ パケットに変換し、それを同一のイーサネット サブネットワーク上のブリッジに送ります。

注：この設定では、両側のフルブリッジはカバーされません。そのような設定については、ドキュメント「ISDN を経由したブリッジング」を参照してください。

ISDN 接続でのブリッジングでは、大抵の場合、接続が（永久ではないものの）非常に長い間有効になることに注意してください。ISDN の通信事業者が接続時間に基づいて課金する場合、非常に高額な請求が発生する可能性があります。そのため、このシナリオは使用制限のない ISDN 回線を使用するユーザに推奨されます。

注：インターフェイスは、ハーフブリッジとブリッジの両方として機能することはできません。Cisco IOS ソフトウェアでは、1 つのイーサネット サブネットワークに対して複数の PPP ハーフブリッジはサポートされません。

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注：この文書で使用されているコマンドの詳細を調べるには、「Command Lookup ツール」を使用してください（登録ユーザのみ）。

ネットワーク図

このドキュメントでは、次のネットワーク セットアップを使用します。

設定

このドキュメントでは、次の構成を使用します。

- Venus

このルータは IP ルーティングを無効にしたフルブリッジとして設定されます。このデバイスは、ブリッジ トラフィックが到着するとダイヤルします。

- Saturn

このルータはハーフ ブリッジとして設定されています。dialer string、dialer group、および dialer list コマンドは、こちら側では設定されないことに注意してください。このルータはダイヤルしませんが、着信コールを受け入れます。そのため、このルータはリモート ルータにダイヤルすることはありません。ここでは、IP ルーティングをオンにしました。このルータでは、フル ブリッジ ソフトウェアは設定されません。PPP ハーフ ブリッジが BRI インターフェイスで実行されているので、show bridge や show spanning-tree などのコマンドでは、このルータで何も出力されません。

Venus

Venus#show running-config

!

version 12.2

!

hostname Venus

!

username Saturn password 0 same

!--- Required for PPP CHAP authentication during dialup

ip subnet-zero

no ip routing

!--- Turn off routing

no ip domain-lookup

!

isdn switch-type basic-5ess

!--- The ISDN switchtype for this circuit. Obtain this information from the !--- Telco. This ISDN switch type is USA specific and could be changed !--- depending on the country and TELCO requirements

!

interface Ethernet0

ip address 10.1.1.2 255.0.0.0

!--- This is for management purpose only

no ip route-cache

no ip mroute-cache

bridge-group 1

!--- Assign this interface to Bridge Group 1 !--- Frames are bridged only among interfaces in the same group !--- Note: the dialer1 interface is also in this bridge-group 1

interface BRI0

no ip address

no ip route-cache

no ip mroute-cache

dialer pool-member 1

!--- Dialer profiles configured with same dialer pool # !--- (in this case, dialer1) will bind to this interface

isdn switch-type basic-5ess

!--- Check with your Telco for the correct values

!

interface Dialer1

!--- Configure the Dialer profile

description ISDN to Saturn

ip address 10.1.1.2 255.0.0.0

encapsulation ppp

dialer pool 1

!--- Use physical interfaces configured with same pool # !--- (in this case, bri0) during dialup

dialer remote-name Saturn

!--- Specifies remote CHAP name

dialer string 5552000

!--- Specifies the number to dial when interesting traffic arrives

dialer-group 1

!--- Defines the interesting traffic as configured in the dialer-list

ppp authentication chap

!--- Use CHAP as the authentication method

bridge-group 1

!--- Assign this interface to Bridge Group 1. !--- Frames are bridged only among interfaces in the same group. !--- Note: the Ethernet interface 0 is also in this bridge-group 1

ip default-gateway 10.1.1.3

!--- All default traffic from Venus should go through Saturn

dialer-list 1 protocol bridge permit

!--- Defines the interesting traffic. In this case, all bridged traffic

bridge 1 protocol ieee

!--- Define the type of Spanning-Tree Protocol used for the interface in !--- bridge-group 1. Here we use the IEEE spanning tree protocol. The IEEE 802.1D !--- Spanning-Tree Protocol is the preferred way of running the bridge.

!

Saturn

Saturn#show running-config

!

version 12.2

!

hostname Saturn

!

username Venus password 0 same

!--- Required for PPP CHAP authentication during dialup

ip subnet-zero

no ip domain-lookup

!

isdn switch-type basic-5ess

!--- The ISDN switchtype for this circuit. Obtain this information from the !--- Telco. This ISDN switch type is USA specific and could be changed !--- depending on the country and Telco requirements

!

interface Ethernet0

ip address 192.168.1.1 255.255.0.0

!

interface BRI0

no ip address

no ip mroute-cache

dialer pool-member 1

!--- Dialer profiles configured with same dialer pool # !--- (in this case, dialer1) will bind to this interface

isdn switch-type basic-5ess

!

interface Dialer1

!--- Configure the Dialer profile

description ISDN to Venus

ip address 10.1.1.3 255.0.0.0

!--- IP address is required to route the bridged traffic from Venus !--- This ip address MUST be in the same subnet as the remote bridge network

encapsulation ppp

dialer pool 1

!--- Use physical interfaces configured with same pool # !--- (in this case, bri0) during dialup

dialer remote-name Venus

pulse-time 0

ppp bridge ip

!--- Configures half bridge

ppp authentication chap

!--- Use CHAP as the authentication method

!

確認

ここでは、設定が正しく機能していることを確認するために使用する情報を示します。

一部の show コマンドはアウトプット インタープリタ ツールによってサポートされています（登録ユーザ専用）。このツールを使用することによって、show コマンド出力の分析結果を表示できます。

- show isdn status:ISDNインターフェイスのL1、L2、およびL3ステータスを表示します。

- show dialer：ダイヤラの状態と各 ISDN チャネルの状態を表示します。

- show bridge：特権 EXEC モードでブリッジ フォワーディング データベースのエントリのクラスを表示します。

- show interface：シリアル インターフェイスや BRI インターフェイスなどのさまざまなインターフェイスの状態を表示します。

- show arp：ARP マッピングを検査します。ARP はレイヤ 2 アドレス（MAC アドレス）をレイヤ 3 アドレス（IP アドレス）にマップするのに使われるプロトコルです。

- show spanning-tree：ルータに既知のスパニングツリー トポロジを表示します。

Saturnにダイヤルインした後のVenus のshow コマンド

Venus#show isdn status

Global ISDN Switchtype = basic-5ess

ISDN BRI0 interface

dsl 0, interface ISDN Switchtype = basic-5ess

Layer 1 Status:

ACTIVE

Layer 2 Status:

TEI = 107, Ces = 1, SAPI = 0, State = MULTIPLE_FRAME_ESTABLISHED

Layer 3 Status:

1 Active Layer 3 Call(s)

CCB:callid=800E, sapi=0, ces=1, B-chan=2, calltype=DATA

Active dsl 0 CCBs = 1

The Free Channel Mask:

0x80000001

Number of L2 Discards = 0, L2 Session ID = 17

Total Allocated ISDN CCBs = 1

Venus#show dialer

BRI0 - dialer type = ISDN

Dial String Successes Failures Last DNIS Last status

0 incoming call(s) have been screened.

0 incoming call(s) rejected for callback.

BRI0:1 - dialer type = ISDN

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is idle

BRI0:2 - dialer type = ISDN

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is data link layer up

Dial reason: bridge (0x0800)

Interface bound to profile Di1

Time until disconnect 90 secs

Current call connected 00:00:31

Di1 - dialer type = DIALER PROFILE

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is data link layer up

Number of active calls = 1

Dial String Successes Failures Last DNIS  Last status

5552000   5   1   00:00:34  Successful Default

Venus#show interface bri0:2

BRI0:2 is up, line protocol is up

Hardware is BRI

MTU 1500 bytes, BW 64 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

Time to interface disconnect: idle 00:01:18

Interface is bound to Di1 (Encapsulation PPP)

LCP Open

Closed: IPCP

Open: BRIDGECP, CDPCP

!--- Bridge Control Protocol is open

Last input 00:00:42, output 00:00:00, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

161 packets input, 9796 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

328 packets output, 16659 bytes, 0 underruns

0 output errors, 0 collisions, 7 interface resets

0 output buffer failures, 0 output buffers swapped out

16 carrier transitions

Venus#show bridge

Total of 300 station blocks, 298 free

Codes: P - permanent, S - self

Bridge Group 1:

Address Action Interface Age RX count TX count

00d0.58ad.ae13 forward Ethernet0 0 74 58

0060.5cf4.a955 forward Dialer1 0 58 72

Venus#show arp

Protocol Address Age (min) Hardware Addr Type Interface

Internet 10.1.1.2 - 0060.5cf4.a9a8 ARPA Ethernet0

Internet 10.1.1.3 0 0060.5cf4.a955 ARPA Dialer1

Venus#show spanning-tree

Bridge group 1 is executing the ieee compatible Spanning Tree protocol

Bridge Identifier has priority 32768, address 0060.5cf4.a9a8

Configured hello time 2, max age 20, forward delay 15

Current root has priority 32768, address 0009.7c2e.ba00

Root port is 2 (Ethernet0), cost of root path is 100

Topology change flag not set, detected flag not set

Number of topology changes 1 last change occurred 22:09:28 ago

from Ethernet0

Times: hold 1, topology change 35, notification 2

hello 2, max age 20, forward delay 15

Timers: hello 0, topology change 0, notification 0, aging 300

Port 2 (Ethernet0) of Bridge group 1 is forwarding

Port path cost 100, Port priority 128, Port Identifier 128.2.

Designated root has priority 32768, address 0009.7c2e.ba00

Designated bridge has priority 32768, address 0009.7c2e.ba00

Designated port id is 128.13, designated path cost 0

Timers: message age 2, forward delay 0, hold 0

Number of transitions to forwarding state: 1

BPDU: sent 1, received 39911

Port 8 (Dialer1) of Bridge group 1 is forwarding

Port path cost 17857, Port priority 128, Port Identifier 128.8.

Designated root has priority 32768, address 0009.7c2e.ba00

Designated bridge has priority 32768, address 0060.5cf4.a9a8

Designated port id is 128.8, designated path cost 100

Timers: message age 0, forward delay 0, hold 0

Number of transitions to forwarding state: 1

BPDU: sent 39879, received 0

Venusがダイヤルインした後のSaturn のshow コマンド

Saturn#show dialer

BRI0 - dialer type = ISDN

Dial String Successes Failures Last DNIS Last status

0 incoming call(s) have been screened.

0 incoming call(s) rejected for callback.

BRI0:1 - dialer type = ISDN

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is idle

BRI0:2 - dialer type = ISDN

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is data link layer up

Interface bound to profile Di1

Time until disconnect 45 secs

Connected to

(Venus)

Di1 - dialer type = DIALER PROFILE

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is data link layer up   Number of active calls = 1

Dial String Successes Failures Last DNIS Last status

Saturn#show isdn status

Global ISDN Switchtype = basic-5ess

ISDN BRI0 interface

dsl 0, interface ISDN Switchtype = basic-5ess

Layer 1 Status:

ACTIVE

Layer 2 Status:

TEI = 105, Ces = 1, SAPI = 0, State = MULTIPLE_FRAME_ESTABLISHED

I_Queue_Len 0, UI_Queue_Len 0

Layer 3 Status:

1 Active Layer 3 Call(s)

CCB:callid=2B, sapi=0, ces=1, B-chan=2, calltype=DATA

Active dsl 0 CCBs = 1

The Free Channel Mask: 0x80000001

Number of L2 Discards = 0, L2 Session ID = 37

Total Allocated ISDN CCBs = 1

Saturn#show arp

Protocol Address Age (min) Hardware Addr Type Interface

Internet 10.1.1.2 27 0060.5cf4.a9a8 ARPA Dialer1

Internet 10.1.1.1 63 00d0.58ad.ae13 ARPA Dialer1

Internet 192.168.1.1 - 0060.5cf4.a955 ARPA Ethernet0

Internet 192.168.1.2 53 0000.0c76.2882 ARPA Ethernet0

Saturn#show spanning-tree

No spanning tree instances exist.

!--- This router does not run full bridge, !--- so spanning tree does not run on this router

Saturn#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is not set

C 10.0.0.0/8 is directly connected, Dialer1

C 192.168.0.0/16 is directly connected, Ethernet0

トラブルシュート

ここでは、設定のトラブルシューティングに使用できる情報を示します。

トラブルシューティングのリソース

着信および発信 ISDN コールのトラブルシューティング手順の説明については、文書「ダイヤルアップ テクノロジー：トラブルシューティング手法」を参照してください。ISDN のレイヤ 1、レイヤ 2、およびレイヤ 3 の問題のトラブルシューティングに関する詳細は、「show isdn status コマンドを使用した BRI のトラブルシューティング」および「debug isdn q931 コマンドを使用した ISDN BRI レイヤ 3 のトラブルシューティング」で説明されています。

トラブルシューティングのためのコマンド

一部の show コマンドはアウトプット インタープリタ ツールによってサポートされています（登録ユーザ専用）。このツールを使用することによって、show コマンド出力の分析結果を表示できます。

注：debugコマンドを発行する前に、『debugコマンドの重要な情報』を参照してください。

- debug dialer：対象トラフィックがいつ検出されたか、また、ダイヤルがいつ開始されたかを示します。

- debug isdn event:ISDNインターフェイスのユーザ側で発生しているISDNアクティビティを示します。debug isdn q931に似ています。

- debug isdn q931：ローカルルータ（ユーザ側）とネットワーク間のISDNネットワーク接続（レイヤ3）のコールセットアップとティアダウンに関する情報を提供します。

- debug isdn q921:ISDNインターフェイスのDチャネル(LAPD)のルータで行われているデータリンク層（レイヤ2）のアクセス手順を表示します。

- debug ppp negotiation：PPP オプションと Network Control Protocol （NCP）パラメータのネゴシエーションを実行します。

- debug ppp authentication：Challenge Authentication Protocol（CHAP）パケットと Password Authentication Protocol（PAP）パケットの交換を許可します。

対象トラフィックが到着したときの Venus の debug コマンド

Venus#

*Mar  1 22:00:14.838: BR0 DDR: rotor dialout [priority]

*Mar  1 22:00:14.838: BR0 DDR: Dialing cause bridge (0x0800)

*Mar  1 22:00:14.842: BR0 DDR: Attempting to dial 5552000

*Mar  1 22:00:14.846: ISDN BR0: Outgoing call id = 0x8006, dsl 0

*Mar  1 22:00:14.846: ISDN BR0: Event: Call to 5552000 at 64 Kb/s

*Mar  1 22:00:14.850: ISDN BR0: process_bri_call(): call id 0x8006,

called_number 5552000, speed 64, call type DATA

*Mar  1 22:00:14.854: CCBRI_Go Fr Host InPkgInfo (Len=22) :

*Mar  1 22:00:14.858: 1 0 1 80 6 0 4 2 88 90 18 1 83 2C 7 35 35 35 32 30 30 30

*Mar  1 22:00:14.866:

*Mar  1 22:00:14.870: CC_CHAN_GetIdleChanbri: dsl 0

*Mar  1 22:00:14.870:     Found idle channel B1

*Mar  1 22:00:14.886: ISDN BR0: TX -> INFOc sapi=0 tei=106 ns=0 nr=0

i=0x08010605040288901801832C0735353532303030

*Mar  1 22:00:14.906:     SETUP pd = 8  callref = 0x06

*Mar  1 22:00:14.914:         Bearer Capability i = 0x8890

*Mar  1 22:00:14.918:         Channel ID i = 0x83

*Mar  1 22:00:14.92Venus#6:         Keypad Facility i = '5552000'

*Mar  1 22:00:15.190: ISDN BR0: RX <- INFOc sapi=0 tei=106 ns=0 nr=1

i=0x0801860218018A

*Mar  1 22:00:15.198:     CALL_PROC pd = 8  callref = 0x86

*Mar  1 22:00:15.206:         Channel ID i = 0x8A

*Mar  1 22:00:15.222: ISDN BR0: TX -> RRr sapi=0 tei=106 nr=1

*Mar  1 22:00:15.230: CCBRI_Go Fr L3 pkt (Len=7) :

*Mar  1 22:00:15.230: 2 1 6 98 18 1 8A

*Mar  1 22:00:15.234:

*Mar  1 22:00:15.238: ISDN BR0: LIF_EVENT: ces/callid 1/0x8006

HOST_PROCEEDING

*Mar  1 22:00:15.238: ISDN BR0: HOST_PROCEEDING

*Mar  1 22:00:15.242: ISDN BR0: HOST_MORE_INFO

*Mar  1 22:00:15.658: ISDN BR0: RX <- INFOc sapi=0 tei=106 ns=1

nr=1 i=0x08018607

*Mar  1 22:00:15.666:     CONNECT pd = 8  callref = 0x86

*Mar  1 22:00:15.678: ISDN BR0: TX -> RRr sapi=0 tei=106 nr=2

*Mar  1 22:00:15.686: CCBRI_Go Fr L3 pkt (Len=4) :

*Mar  1 22:00:15.690: 7 1 6 91

*Mar  1 22:00:15.690:

*Mar  1 22:00:15.694: ISDN BR0: LIF_EVENT: ces/callid 1/0x8006 HOST_CONNECT

22:00:15: %LINK-3-UPDOWN: Interface BRI0:2, changed state to up

*Mar  1 22:00:15.702: BR0:2 PPP: Phase is DOWN, Setup [0 sess, 0 load]

*Mar  1 22:00:15.706: BR0:2 PPP: No remote authentication for call-out

*Mar  1 22:00:15.710: BR0:2 PPP: Phase is ESTABLISHING [0 sess, 0 load]

*Mar  1 22:00:15.710: BR0:2 PPP: Treating connection as a callout

*Mar  1 22:00:15.714: BR0:2 PPP: No remote authentication for call-out

*Mar  1 22:00:15.718: BR0:2 LCP: O CONFREQ [Closed] id 1 len 10

*Mar  1 22:00:15.722: BR0:2 LCP:    MagicNumber 0x6515B12A (0x05066515B12A)

*Mar  1 22:00:15.722: BR0:2: interface must be fifo queue, force fifo

22:00:15: %DIALER-6-BIND: Interface BR0:2 bound to profile Di1

*Mar  1 22:00:15.742: ISDN: get_isdn_service_state(): idb 0x1A2DBC bchan 3

is_isdn 1 Not a Pri

*Mar  1 22:00:15.746: BR0:2 PPP: Treating connection as a callout

*Mar  1 22:00:15.746: ISDN BR0: Event: Connected to 5552000 on B2 at 64 Kb/s

*Mar  1 22:00:15.762: ISDN BR0: TX -> INFOc sapi=0 tei=106 ns=1 nr=2 i=0x0801060F

*Mar  1 22:00:15.766:     CONNECT_ACK pd = 8  callref = 0x06

*Mar  1 22:00:15.774: BR0:2 LCP: I CONFREQ [REQsent] id 1 len 15

*Mar  1 22:00:15.778: BR0:2 LCP:    AuthProto CHAP (0x0305C22305)

*Mar  1 22:00:15.782: BR0:2 LCP:    MagicNumber 0x788C6F8F (0x0506788C6F8F)

*Mar  1 22:00:15.786: BR0:2 LCP: O CONFACK [REQsent] id 1 len 15

*Mar  1 22:00:15.790: BR0:2 LCP:    AuthProto CHAP (0x0305C22305)

*Mar  1 22:00:15.790: BR0:2 LCP:    MagicNumber 0x788C6F8F (0x0506788C6F8F)

*Mar  1 22:00:15.798: BR0:2 LCP: I CONFACK [ACKsent] id 1 len 10

*Mar  1 22:00:15.798: BR0:2 LCP:    MagicNumber 0x6515B12A (0x05066515B12A)

*Mar  1 22:00:15.802: BR0:2 LCP: State is Open

*Mar  1 22:00:15.806: BR0:2 PPP: Phase is AUTHENTICATING, by the peer

[0 sess, 1 load]

*Mar  1 22:00:15.870: ISDN BR0: RX <- RRr sapi=0 tei=106 nr=2

*Mar  1 22:00:15.882: BR0:2 CHAP: I CHALLENGE id 31 len 27 from "Saturn"

*Mar  1 22:00:15.890: BR0:2 CHAP: O RESPONSE id 31 len 26 from "Venus"

*Mar  1 22:00:15.914: BR0:2 CHAP: I SUCCESS id 31 len 4

*Mar  1 22:00:15.918: BR0:2 PPP: Phase is UP [0 sess, 1 load]

*Mar  1 22:00:15.922: BR0:2 BNCP: O CONFREQ [Closed] id 1 len 4

*Mar  1 22:00:15.926: BR0:2 IPCP: O CONFREQ [Closed] id 1 len 10

*Mar  1 22:00:15.930: BR0:2 IPCP:    Address 10.1.1.2 (0x03060A010102)

*Mar  1 22:00:15.934: BR0:2 CDPCP: O CONFREQ [Closed] id 1 len 4

*Mar  1 22:00:15.942: BR0:2 BNCP: I CONFREQ [REQsent] id 1 len 4

*Mar  1 22:00:15.946: BR0:2 BNCP: O CONFACK [REQsent] id 1 len 4

*Mar  1 22:00:15.950: BR0:2 CDPCP: I CONFREQ [REQsent] id 1 len 4

*Mar  1 22:00:15.954: BR0:2 CDPCP: O CONFACK [REQsent] id 1 len 4

*Mar  1 22:00:15.958: BR0:2 BNCP: I CONFACK [ACKsent] id 1 len 4

*Mar  1 22:00:15.958: BR0:2 BNCP: State is Open

*Mar  1 22:00:15.966: BR0:2 LCP: I PROTREJ [Open] id 2 len 16 protocol IPCP

(0x80210101000A03060A010102)

*Mar  1 22:00:15.970: BR0:2 IPCP: State is Closed

*Mar  1 22:00:15.974: BR0:2 CDPCP: I CONFACK [ACKsent] id 1 len 4

*Mar  1 22:00:15.978: BR0:2 CDPCP: State is Open

*Mar  1 22:00:15.978: BR0:2 DDR: dialer protocol up

22:00:16: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0:2,

changed state to up

22:00:21: %ISDN-6-CONNECT: Interface BRI0:2 is now connected to 5552000

Venus#

Saturn#

4d16h: ISDN BR0: RX <- UI c/r=1 sapi=0 tei=127

i=0x080141050402889018018A7008C135353532303030

4d16h:     SETUP pd = 8  callref = 0x41

4d16h:         Bearer Capability i = 0x8890

4d16h:         Channel ID i = 0x8A

4d16h:         Called Party Number i = 0xC1, '5552000', Plan:ISDN,

Type:Subscriber(local)

4d16h: CCBRI_Go Fr L3 pkt (Len=21) :

4d16h: 5 1 C1 90 4 2 88 90 18 1 8A 70 8 C1 35 35 35 32 30 30 30

4d16h:

4d16h: ISDN BR0: Incoming call id = 0x002B, dsl 0

4d16h: ISDN BR0: LIF_EVENT: ces/callid 1/0x2B HOST_INCOMING_CALL

4d16h: ISDN BR0: HOST_INCOMING_CALL: (non-POTS) DATA

4d16h: ISDN BR0: HOST_INCOMING_CALL: (1) call_type = DATA

4d16h: ISDN BR0: HOST_INCOMING_CALL: voice_answer_data = FALSE call type is DATA

4d16h: ISDN BR0: Event: Received a DATA call from

on B2 at 64 Kb/s

4d16h: ISDN BR0: Event: Accepting the call id 0x2B

4d16h: BR0:2 PPP: Phase is DOWN, Setup [0 sess, 1 load]

4d16h: BR0:2 PPP: Phase is ESTABLISHING [0 sess, 1 load]

4d16h: BR0:2: inteSarface must be fifo queue, force fifo

4d16h: %DIALER-6-BIND: Interface BR0:2 bound to profile Di1

4d16h: ISDN BR0: RM returned call_type 0 resource type 0 response 1

4d16h: CCBRI_Go Fr Host InPkgInfo (Len=9) :

4d16h: 7 0 1 0 2B 3 18 1 8A

4d16h:

4d16h: ISDN BR0: isdn_send_connect(): msg 4, call id 0x2B, ces 1 bchan 1, c

all type DATA

4d16h: %LINK-3-UPDOWN: Interface BRI0:2, changed state to up

4d16h: ISDN: get_isdn_service_state(): idb 0x1A2EAC bchan 3 is_isdn 1 Not a Pri

4d16h: BR0:2 PPP: Treating connection as a callin

4d16h: BR0:2 LCP: State is Listen

4d16h: CCBRI_Go Fr Host InPkgInfo (Len=6) :

4d16h: 4 0 1 0 2B 0

4d16h:

4d16h: ISDN BR0: TX -> INFOc sapi=0 tei=105 ns=7 nr=5 i=0x0801C10218018A

4d16h:     CALL_PROC pd = 8  callref = 0xC1

4d16h:         Channel ID i = 0x8A

4d16h: ISDN BR0: RX <- RRr sapi=0 tei=105 nr=8

4d16h: ISDN BR0: TX -> INFOc sapi=0 tei=105 ns=8 nr=5 i=0x0801C107

4d16h:     CONNECT pd = 8  callref = 0xC1

4d16h: ISDN BR0: RX <- INFOc sapi=0 tei=105 ns=5 nr=9 i=0x0801410F

4d16h:     CONNECT_ACK pd = 8  callref = 0x41

4d16h: ISDN BR0: TX -> RRr sapi=0 tei=105 nr=6

4d16h: CCBRI_Go Fr L3 pkt (Len=4) :

4d16h: F 1 C1 92

4d16h:

4d16h: ISDN BR0: LIF_EVENT: ces/callid 1/0x2B HOST_CONNECT

4d16h: ISDN BR0: Event: Connected to <unknown> on B2 at 64 Kb/s

4d16h: BR0:2 LCP: I CONFREQ [Listen] id 1 len 10

4d16h: BR0:2 LCP:    MagicNumber 0x6515B12A (0x05066515B12A)

4d16h: BR0:2 LCP: O CONFREQ [Listen] id 1 len 15

4d16h: BR0:2 LCP:    AuthProto CHAP (0x0305C22305)

4d16h: BR0:2 LCP:    MagicNumber 0x788C6F8F (0x0506788C6F8F)

4d16h: BR0:2 LCP: O CONFACK [Listen] id 1 len 10

4d16h: BR0:2 LCP:    MagicNumber 0x6515B12A (0x05066515B12A)

4d16h: BR0:2 LCP: I CONFACK [ACKsent] id 1 len 15

4d16h: BR0:2 LCP:    AuthProto CHAP (0x0305C22305)

4d16h: BR0:2 LCP:    MagicNumber 0x788C6F8F (0x0506788C6F8F)

4d16h: BR0:2 LCP: State is Open

4d16h: BR0:2 PPP: Phase is AUTHENTICATING, by this end [0 sess, 0 load]

4d16h: BR0:2 CHAP: O CHALLENGE id 31 len 27 from "Saturn"

4d16h: BR0:2 CHAP: I RESPONSE id 31 len 26 from "Venus"

4d16h: BR0:2 CHAP: O SUCCESS id 31 len 4

4d16h: BR0:2 PPP: Phase is UP [0 sess, 0 load]

4d16h: BR0:2 BNCP: O CONFREQ [Closed] id 1 len 4

4d16h: BR0:2 CDPCP: O CONFREQ [Closed] id 1 len 4

4d16h: BR0:2 BNCP: I CONFREQ [REQsent] id 1 len 4

4d16h: BR0:2 BNCP: O CONFACK [REQsent] id 1 len 4: BR0:2 IPCP: I CONFREQ

[Not negotiated] id 1 len 10

4d16h: BR0:2 IPCP:    Address 10.1.1.2 (0x03060A010102)

4d16h: BR0:2 LCP: O PROTREJ [Open] id 2 len 16 protocol IPCP

(0x80210101000A03060A010102)

4d16h: BR0:2 CDPCP: I

4d16h CONFREQ [REQsent] id 1 len 4

4d16h: BR0:2 CDPCP: O CONFACK [REQsent] id 1 len 4

4d16h: BR0:2 BNCP: I CONFACK [ACKsent] id 1 len 4

4d16h: BR0:2 BNCP: State is Open

4d16h: BR0:2 CDPCP: I CONFACK [ACKsent] id 1 len 4

4d16h: BR0:2 CDPCP: State is Open

4d16h: BR0:2 DDR: dialer protocol up

4d16h: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0:2, changed state to up

4d16h: %ISDN-6-CONNECT: Interface BRI0:2 is now connected to

<unknown phone number> Venus

!--- Unknown phone number because of no dialer string on Saturn

Saturn#

関連情報

- ダイヤルバックアップ コマンドの詳細

- Cisco テクノロジに関するサポート ページ - ダイヤル

- テクニカルサポート - Cisco Systems