内容

概要

前提条件

要件

使用するコンポーネント

表記法

設定

ネットワーク図

設定

調整とオプションのコマンド

確認

show コマンド

Show コマンドの出力

トラブルシュート

トラブルシューティングのためのコマンド

debug コマンドの出力

関連情報

概要

このドキュメントでは、複数の BRI インターフェイスを持つ別のルータへダイヤルし、マルチリンク PPP（MPPP）の接続を確立する、複数の BRI インターフェイスを持つルータの設定例を説明します。ダイヤルするルータは、そのリモート BRI でこれ以上のチャネルは使用できないことを識別し、続いて追加チャネルを確立するために次のリモート BRI の電話番号にダイヤルする必要があります。

両方のルータはダイヤラ プロファイルを使用して、物理 BRI インターフェイスを結合します。また、『ロータリー グループを使用して複数の BRI の MPPP を設定する方法』で説明するように、このセットアップをダイヤラ ロータリー グループで設定することもできます。

ダイヤラ プロファイルの詳細は、『ダイヤラ プロファイルの設定とトラブルシューティング』を参照してください。

前提条件

要件

このドキュメントに特有の要件はありません。

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

- 4 ポート BRI モジュール搭載の Cisco 3640（Cisco IOSソフトウェア リリース 12.1(4) が稼働中であること）

- 4 つの BRI インターフェイス搭載の Cisco 4000（Cisco IOS ソフトウェア リリース 12.1(4) が稼働中であること）

- 両側の 2 つの BRI 回線。これらの BRI はハント グループには設定されません。

このマニュアルの情報は、特定のラボ環境に置かれたデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。実稼動中のネットワークで作業をしている場合、実際にコマンドを使用する前に、その潜在的な影響について理解しておく必要があります。

表記法

ドキュメント表記の詳細は、『シスコ テクニカル ティップスの表記法』を参照してください。

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注：このドキュメントで使用されているコマンドの詳細を調べるには、Command Lookup Toolを使用してください(登録ユーザ専用)。

ネットワーク図

このドキュメントでは、次のネットワーク セットアップを使用します。

設定

このドキュメントでは、次の構成を使用します。

- melanie（Cisco 3640）

- torito（Cisco 4000）

melanie（Cisco 3640）

Current configuration:

version 12.1

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname melanie

!

enable password ww

!

username torito password 0 ww

!--- Username for remote router (torito) and shared secret (used for !--- Challenge Handshake Authentication Protocol (CHAP) authentication). !--- Shared secret must be the same on both sides.

isdn switch-type basic-net3

!

interface Loopback0

ip address 10.10.10.1 255.255.255.0

!

interface BRI0/0

no ip address

shutdown

!

interface BRI2/0

no ip address

shutdown

!

interface BRI2/1

!--- First BRI interface.

description ISDN number 6104

!--- Phone number of this BRI.

no ip address

encapsulation ppp

dialer pool-member 1

!--- Member of dialer pool 1.

isdn switch-type basic-net3

no cdp enable

ppp authentication chap

!--- Use CHAP authentication.

ppp multilink

!--- Enable multilink on the physical interface.

!

interface BRI2/2

!--- Second BRI interface.

description ISDN number 6103

!--- Phone number of this BRI.

no ip address

encapsulation ppp

dialer pool-member 1

!--- Member of dialer pool 1.

isdn switch-type basic-net3

no cdp enable

ppp authentication chap

!--- Use CHAP authentication.

ppp multilink

!--- Enable multilink on the physical interface.

!

interface BRI2/3

no ip address

shutdown

!

interface Dialer2

!--- Dialer interface used for dialout.

ip unnumbered Loopback0

!--- Use the loopback0 address. !--- Static route on remote router points to this Loopback0 address.

encapsulation ppp

dialer pool 1

!--- Defines dialer pool 1. !--- BRI 2/1 and BRI 2/2 are members of this pool.

dialer string 6113

!--- Dial 6113 first

.

dialer string 6114

!--- If 6113 fails, dial 6114 . !--- Both numbers are required. Otherwise, the third call encounters a busy signal.

dialer load-threshold 1 either

!--- Load level (in either direction) for traffic at which additional !--- connections will be added to the MPPP bundle. !--- Load level values range from 1 (unloaded) to 255 (fully loaded).

dialer-group 1

!--- Apply interesting traffic definition from dialer-list 1.

no cdp enable

ppp authentication chap

!--- Use CHAP authentication.

ppp multilink

!--- Allow MPPP for the four BRI channels.

!

ip route 10.10.12.1 255.255.255.255 Dialer2

!--- Static route to remote router. !--- All traffic destined for the remote router must use int Dialer2

!

dialer-list 1 protocol ip permit

!--- All IP traffic is designated as interesting. !--- This is applied to interface dialer2 with the help of dialer-group 1.

line con 0

transport input none

line 97 114

modem InOut

transport input all

line aux 0

line vty 0 4

login

!

end

Cisco 3640（melanie）の設定では、次の点に注意してください。

- 設定には、ダイヤラ プロファイルを使用する。BRI インターフェイスは、ダイヤラ プールのメンバーです。特定の宛先に関するすべての設定は、インターフェイス ダイヤラ 2 で設定されます。

- ダイヤラ インターフェイスには、2 つのダイヤラ ストリングがある。リモート ルータ（torito）には 2 つの BRI インターフェイスがあることに注意してください。 これらの BRI は、通信事業者によってハント グループに設定されていないため、ルータ melanie は、各 BRI に別々にダイヤルする必要があります。複数のダイヤラ ストリングがある場合は、常に最初の電話番号がダイヤルされます。その発信に失敗した場合にのみ、ダイヤラ インターフェイスは 2 番目のダイヤラ ストリングを試行します。ダイヤラ ストリングは、必要な数だけ順番に定義できます。

- MPPP のダイヤラ負荷しきい値が、最小の 1 に設定されている。この値は、トラフィック パターンと要件に基づいて変更できます。ただし、高い負荷しきい値を定義すると、追加のリンクは負荷がその定義を超えたときにだけ追加されます。マルチリンク バンドルへのチャネルの追加を制御する方法については、「調整とオプションのコマンド」のセクションを参照してください。

- リモート ルータのスタティック ホスト ルートは、インターフェイス ダイヤラ 2 を指し示している。 トラフィックは、次にプールの物理メンバー（BRI 2/1 および BRI 2/2）を転送します。 マルチリンク接続を使用する必要がある接続先のスタティック ルートを作成（またはルーティング プロトコルを使用）します。

torito（Cisco 4000）

Current configuration:

!

version 12.1

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname torito

!

username melanie password 0 ww

!--- Username for remote router (melanie) and shared secret !--- (used for CHAP authentication). !--- Shared secret must be the same on both sides.

!

isdn switch-type basic-net3

interface Loopback0

ip address 10.10.12.1 255.255.255.0

!

interface BRI0

no ip address

shutdown

!

interface BRI1

!--- Phone number is 6113.

no ip address

encapsulation ppp

dialer pool-member 1

!--- Member of dialer pool 1.

isdn switch-type basic-net3

ppp authentication chap

!--- Use CHAP authentication.

ppp multilink

!--- Enable multilink on the physical interface. !--- Unless you use CLID/DNIS based binding, this command is required. !--- See Configuring and Troubleshooting Dialer Profiles for more information.

!

interface BRI2

!--- Phone number is 6114.

no ip address

encapsulation ppp

dialer pool-member 1

!--- Member of dialer pool 1.

isdn switch-type basic-net3

ppp authentication chap

!--- Use CHAP authentication.

ppp multilink

!--- Enable multilink on the physical interface. !--- Unless you use CLID/DNIS based binding, this command is required. !--- See Configuring and Troubleshooting Dialer Profiles for more information.

!

interface BRI3

no ip address

shutdown

!

interface Dialer1

ip unnumbered Loopback0

!--- Use the Loopback0 address. !--- The static route on remote router points to this Loopback0 address.

encapsulation ppp

dialer pool 1

!--- Defines Dialer pool 1. !--- BRI 1 and BRI 2 are members of this pool.

dialer remote-name melanie

!--- Specifies the name of the remote router. !--- This name matches the name used by the remote router to authenticate itself.

dialer-group 1

!--- Apply interesting traffic definition from dialer-list 1.

ppp authentication chap

!--- Use CHAP authentication.

ppp multilink

!--- Allow MPPP for the 4 BRI channels.

!

ip route 10.10.10.1 255.255.255.255 Dialer1

!--- Static route to remote router. !--- All traffic destined for the remote router must use int Dialer1.

dialer-list 1 protocol ip permit

!--- All IP traffic is designated as interesting. !--- This is applied to interface dialer2 using dialer-group 1.

line con 0

exec-timeout 0 0

transport input none

line aux 0

exec-timeout 0 0

transport input all

line vty 0 4

password ww

login

!

end

調整とオプションのコマンド

このセクションに示したコマンドを使用すると、MPPP 接続の動作を調整できます。これらのパラメータを注意深く調整することで、データリンクの無駄や不必要な使用を避けることができます。これらのコマンドは、ダイヤルを開始する側で実装する必要があります。

- dialer load-threshold load [outbound |インバウンド | either] ???プライマリチャネルが確立された直後に追加チャネルが起動するようにMPPPを設定できます。このような場合は、dialer load-threshold loadコマンドの負荷しきい値を1に設定します。そのため、追加チャネルが起動し、アップ状態が続きます（つまり、フラップしません）。 負荷しきい値を高い値に設定すると、リンクの負荷状態に基づいて複数のチャネルがフラップする場合があります。必要に応じて、トラフィックに基づいて追加チャネルを追加する場合は、負荷しきい値を1 ～ 255の適切な値に設定します。たとえば、追加チャネルが合計容量の50%で増加する場合は、しきい値を128(0.50*25)に5)に0)に0。

- ppp timeout multilink link remove seconds ???このコマンドは、負荷が変動したときにマルチリンク接続がフラッピングするのを防ぐために使用します。たとえば、負荷しきい値が 15（つまり、15/255 = 6 %）に設定されていて、トラフィックがこのしきい値を超えると、追加回線が起動されます。トラフィックがしきい値未満に低下すると、追加回線はドロップされます。データ レートの変動が大きい状況では、負荷しきい値が指定した値未満に低下しても、複数のチャネルは指定した期間アップ状態を保つようにしておくと有益です。このマルチリンク タイムアウトは、全リンクのタイムアウトを制御する dialer idle-timeout に指定された値未満になるように割り当てます。

- ppp timeout multilink link add seconds ???このコマンドを使用すると、指定した間隔で高いトラフィックが受信されるまで、MPバンドルに複数のリンクが追加されるのを防ぐことができます。これにより、トラフィックのバーストにより不必要に追加回線がアップ状態になることを防止できます。

- dialer max-link number ???：ダイヤラプロファイルに対して、リモート接続先へのリンクの最大数を一度にアップ状態に設定できるようにするには、インターフェイスコンフィギュレーションモードでdialer max-linkコマンドを使用します。この例では、ダイヤルアウトに設定された melanie に 2 つの BRI（つまり 4 つの B チャネル）があります。そのため、デフォルトでは、MPPP 接続で 4 つのチャネルがすべて起動されます。ただし、3 つの B チャネルだけを起動する場合は、dialer max-link コマンドを使用してリンク数を制限できます。

確認

ここでは、設定が正しく機能していることを確認するために使用する情報を示します。

show コマンド

接続を確認するには、次のコマンドを使用します。

一部の show コマンドはアウトプット インタープリタ ツールによってサポートされています（登録ユーザ専用）。このツールを使用することによって、show コマンド出力の分析結果を表示できます。

- show isdn status???：ルータがISDNスイッチと正常に通信しているかどうかを示します。この出力では、レイヤ 1 ステータスが ACTIVE、レイヤ 2 ステータスが state = MULTIPLE_FRAME_ESTABLISHED になっていることを確認する必要があります。このコマンドは、通信中のコールの数も表示します。詳細は、『show isdn status コマンドを使用した BRI のトラブルシューティング』を参照してください。

- show ppp multilink???：アクティブなマルチリンクバンドルに関する情報を表示します。このコマンドを使用して、マルチリンク接続を検証します。

- show dialer [interface type number] ???DDR用に設定されたインターフェイスの一般的な診断情報を表示します。ダイヤラが正常に始動すると、「Dialer state is data link layer up」というメッセージが表示されます。「physical layer up」が表示された場合は、回線プロトコルは立ち上がっていますが、Network Control Protocol（NCP）は立ち上がっていないことを表します。ダイヤリングを開始したパケットのソース アドレスと宛先アドレスが、「Dial reason line」の行に表示されます。この show コマンドでは、タイマーの設定と接続がタイムアウトするまでの時間も表示されます。

- show caller user username detail ???は、割り当てられたIPアドレス、PPPおよびPPPバンドルパラメータなどの特定のユーザのパラメータを表示します。このコマンドが、ご使用の Cisco IOS ソフトウェア バージョンでサポートされていない場合には、show user コマンドを使用してください。

Show コマンドの出力

show ppp multilink コマンドでは、リンクの接続後に、各ルータのマルチリンク バンドルのメンバーを表示します。ルータ melanie ではバンドル名が torito になり、ルータ torito ではバンドル名が melanie になることを確認します。バンドルに属する BRI インターフェイスと B チャネルも表示されます。

melanie#show ppp multilink

Dialer2, bundle name is torito

0 lost fragments, 0 reordered, 0 unassigned

0 discarded, 0 lost received, 1/255 load

0x8 received sequence, 0x8 sent sequence

Member links: 4 (max not set, min not set)

BRI2/1:1

BRI2/1:2

BRI2/2:1

BRI2/2:2

torito#show ppp multilink

Dialer1, bundle name is melanie

0 lost fragments, 0 reordered, 0 unassigned

0 discarded, 0 lost received, 1/255 load

0x8 received sequence, 0x8 sent sequence

Member links: 4 (max not set, min not set)

BRI1:1

BRI1:2

BRI2:1

BRI2:2

トラブルシュート

ここでは、設定のトラブルシューティングに使用できる情報を示します。

トラブルシューティングのためのコマンド

注：debug コマンドを使用する前に、「debug コマンドに関する重要な情報」を参照してください。

- debug dialer???：ダイヤラインターフェイスで受信されたパケットに関するDDRデバッグ情報を表示します。この情報により、ダイヤラ インターフェイスを使用できる対象トラフィックが存在することを確認できます。

- debug isdn q931：ISDN ネットワーク接続（レイヤ 3）のコール設定と切断を表示します。

- debug ppp negotiation ???:Link Control Protocol(LCP)、認証、およびNetwork Control Protocol(NCP)をネゴシエートしている間のPPPトラフィックおよび交換に関する情報を表示します。PPP ネゴシエーションが正常に行われると、最初に LCP 状態が開放され、次に認証、最後に NCP をネゴシエートします。Maximum Receive Reconstructed Unit（MRRU）などのマルチリンク パラメータは、LCP ネゴシエーションの間に確立されます。

- debug ppp authentication ???:PPP認証プロトコルメッセージを表示します。CHAPパケット交換やパスワード認証プロトコル(PAP)交換も含まれます。

- debug ppp error???:PPP接続のネゴシエーションと動作に関連するプロトコルエラーとエラー統計情報を表示します。

debug コマンドの出力

BRI 単位でマルチリンクをトラブルシューティングする方法の詳細は、『ISDN BRI リンクで 2 番目の B チャンネル コールが失敗する問題のトラブルシューティング』を参照してください。1 つの BRI（2 つの B チャネル）でマルチリンクを機能させると、バンドルに BRI を追加できるようになります。

「トラブルシューティング コマンド」のセクションで説明したデバッグを有効にしてから、リモート ルータのアドレスに ping を実行します。ping はダイヤルを開始して、リモート ルータに接続する必要があります。追加の各リンクがオンになると、そのリンクは MPPP バンドルに追加されます。

melanie#show debug

Dial on demand:

Dial on demand events debugging is on

PPP:

PPP authentication debugging is on

PPP protocol negotiation debugging is on

ISDN:

ISDN Q931 packets debugging is on

ISDN Q931 packets debug DSLs. (On/Off/No DSL:1/0/-)

melanie#ping 10.10.12.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.10.12.1, timeout is 2 seconds:

*Mar 1 05:30:45.502: BR2/1 DDR: rotor dialout [priority]

!--- Use BRI 2/1 to dial out.

*Mar 1 05:30:45.502: BR2/1 DDR: Dialing cause ip (s=10.10.10.1, d=10.10.12.1)

!--- DDR dialing cause is a ping to the remote router.

*Mar 1 05:30:45.502: BR2/1 DDR: Attempting to dial 6113

!--- Dial the first number (6113) configured with dialer string command. !--- This number corresponds to the first BRI on torito.

*Mar 1 05:30:45.506: ISDN BR2/1: TX -> SETUP pd = 8 callref = 0x77

*Mar 1 05:30:45.506: Bearer Capability i = 0x8890

*Mar 1 05:30:45.506: Channel ID i = 0x83

*Mar 1 05:30:45.506: Called Party Number i = 0x80, '6113', Plan:Unknown,

Type:Unknown

*Mar 1 05:30:45.574: ISDN BR2/1: RX <- CALL_PROC pd = 8 callref = 0xF7

*Mar 1 05:30:45.574: Channel ID i = 0x89

*Mar 1 05:30:46.026: ISDN BR2/1: RX <- CONNECT pd = 8 callref = 0xF7

*Mar 1 05:30:46.030: ISDN BR2/1: TX -> CONNECT_ACK pd = 8 callref = 0x77

!--- Call connects.

*Mar 1 05:30:46.030: %LINK-3-UPDOWN: Interface BRI2/1:1, changed state to up

*Mar 1 05:30:46.034: BR2/1:1: interface must be fifo queue, force fifo

*Mar 1 05:30:46.034: %DIALER-6-BIND: Interface BR2/1:1 bound to profile Di2

!--- Call is bound to interface Dialer 2.

*Mar 1 05:30:46.034: BR2/1:1 PPP: Treating connection as a callout

*Mar 1 05:30:46.034: BR2/1:1 PPP: Phase is ESTABLISHING, Active Open

!--- LCP negotiation begins.

*Mar 1 05:30:46.034: BR2/1:1 LCP: O CONFREQ [Closed] id 116 len 29

*Mar 1 05:30:46.034: BR2/1:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:30:46.034: BR2/1:1 LCP: MagicNumber 0x513DE606 (0x0506513DE606)

*Mar 1 05:30:46.034: BR2/1:1 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:30:46.034: BR2/1:1 LCP: EndpointDisc 1 Local (0x130A016D656C616E6965)

*Mar 1 05:30:46.074: BR2/1:1 LCP: I CONFREQ [REQsent] id 11 len 28

*Mar 1 05:30:46.074: BR2/1:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:30:46.074: BR2/1:1 LCP: MagicNumber 0x00B3729B (0x050600B3729B)

*Mar 1 05:30:46.074: BR2/1:1 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:30:46.074: BR2/1:1 LCP: EndpointDisc 1 Local (0x130901746F7269746F)

*Mar 1 05:30:46.074: BR2/1:1 LCP: O CONFACK [REQsent] id 11 len 28

*Mar 1 05:30:46.074: BR2/1:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:30:46.074: BR2/1:1 LCP: MagicNumber 0x00B3729B (0x050600B3729B)

*Mar 1 05:30:46.074: BR2/1:1 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:30:46.074: BR2/1:1 LCP: EndpointDisc 1 Local (0x130901746F7269746F)

*Mar 1 05:30:46.086: BR2/1:1 LCP: I CONFACK [ACKsent] id 116 len 29

*Mar 1 05:30:46.086: BR2/1:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:30:46.086: BR2/1:1 LCP: MagicNumber 0x513DE606 (0x0506513DE606)

*Mar 1 05:30:46.086: BR2/1:1 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:30:46.086: BR2/1:1 LCP: EndpointDisc 1 Local (0x130A016D656C616E6965)

*Mar 1 05:30:46.086: BR2/1:1 LCP: State is Open

!--- LCP negotiation is complete.

*Mar 1 05:30:46.090: BR2/1:1 PPP: Phase is AUTHENTICATING, by both

!--- PPP authentication by both sides begins.

*Mar 1 05:30:46.090: BR2/1:1 CHAP: O CHALLENGE id 39 len 28 from "melanie"

*Mar 1 05:30:46.110: BR2/1:1 CHAP: I CHALLENGE id 7 len 27 from "torito"

*Mar 1 05:30:46.110: BR2/1:1 CHAP: O RESPONSE id 7 len 28 from "melanie"

*Mar 1 05:30:46.126: BR2/1:1 CHAP: I SUCCESS id 7 len 4

*Mar 1 05:30:46.134: BR2/1:1 CHAP: I RESPONSE id 39 len 27 from "torito"

*Mar 1 05:30:46.138: BR2/1:1 CHAP: O SUCCESS id 39 len 4

!--- CHAP authentication is successful

*Mar 1 05:30:46.138: BR2/1:1 PPP: Phase is VIRTUALIZED

*Mar 1 05:30:46.138: Di2 PPP: Phase is UP

*Mar 1 05:30:46.138: Di2 IPCP: O CONFREQ [Closed] id 14 len 10

*Mar 1 05:30:46.138: Di2 IPCP: Address 10.10.10.1 (0x03060A0A0A01)

*Mar 1 05:30:46.142: BR2/1:1 MLP: torito, multilink up, first link

*Mar 1 05:30:46.162: Di2 IPCP: I CONFREQ [REQsent] id 7 len 10

*Mar 1 05:30:46.162: Di2 IPCP: Address 10.10.12.1 (0x03060A0A0C01)

*Mar 1 05:30:46.162: Di2 IPCP: O CONFACK [REQsent] id 7 len 10

*Mar 1 05:30:46.162: Di2 IPCP: Address 10.10.12.1 (0x03060A0A0C01)

*Mar 1 05:30:46.166: Di2 CDPCP: I CONFREQ [Not negotiated] id 7 len 4

*Mar 1 05:30:46.166: Di2 LCP: O PROTREJ [Open] id 14 len 10 protocol CDPCP

(0x820701070004)

*Mar 1 05:30:46.182: Di2 IPCP: I CONFACK [ACKsent] id 14 len 10

*Mar 1 05:30:46.182: Di2 IPCP: Address 10.10.10.1 (0x03060A0A0A01)

*Mar 1 05:30:46.182: Di2 IPCP: State is Open

*Mar 1 05:30:46.182: Di2 DDR: dialer protocol up

*Mar 1 05:30:46.182: Di2 IPCP: Install route to 10.10.12.1

*Mar 1 05:30:46.186: BR2/1 DDR: rotor dialout [priority]

*Mar 1 05:30:46.186: BR2/1 DDR: Attempting to dial 6113

!--- Dial the first number (6113) configured with dialer string command. !--- This number corresponds to the first BRI on torito. !--- Remember there is one B-channel available on the remote BRI.

*Mar 1 05:30:46.186: ISDN BR2/1: TX -> SETUP pd = 8 callref = 0x78

*Mar 1 05:30:46.186: Bearer Capability i = 0x8890

*Mar 1 05:30:46.190: Channel ID i = 0x83

*Mar 1 05:30:46.190: Called Party Number i = 0x80, '6113', Plan:Unknown,

Type:Unknown

*Mar 1 05:30:46.274: ISDN BR2/1: RX <- CALL_PROC pd = 8 callref = 0xF8

*Mar 1 05:30:46.274: Channel ID i = 0x8A

*Mar 1 05:30:46.726: ISDN BR2/1: RX <- CONNECT pd = 8 callref = 0xF8

*Mar 1 05:30:46.730: ISDN BR2/1: TX -> CONNECT_ACK pd = 8 callref = 0x78

*Mar 1 05:30:46.730: %LINK-3-UPDOWN: Interface BRI2/1:2, changed state to up

!--- Second B-channel is connected.

*Mar 1 05:30:46.730: BR2/1:2: interface must be fifo queue, force fifo

*Mar 1 05:30:46.734: %DIALER-6-BIND: Interface BR2/1:2 bound to profile Di2

*Mar 1 05:30:46.734: %ISDN-6-CONNECT: Interface BRI2/1:1 is now connected to

6113 torito

*Mar 1 05:30:46.734: BR2/1:2 PPP: Treating connection as a callout

*Mar 1 05:30:46.734: BR2/1:2 PPP: Phase is ESTABLISHING, Active Open

*Mar 1 05:30:46.734: BR2/1:2 LCP: O CONFREQ [Closed] id 31 len 29

*Mar 1 05:30:46.734: BR2/1:2 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:30:46.734: BR2/1:2 LCP: MagicNumber 0x513DE8C4 (0x0506513DE8C4)

*Mar 1 05:30:46.734: BR2/1:2 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:30:46.734: BR2/1:2 LCP: EndpointDisc 1 Local (0x130A016D656C616E6965)

*Mar 1 05:30:46.774: BR2/1:2 LCP: I CONFREQ [REQsent] id 12 len 28

*Mar 1 05:30:46.774: BR2/1:2 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:30:46.774: BR2/1:2 LCP: MagicNumber 0x00B37556 (0x050600B37556)

*Mar 1 05:30:46.774: BR2/1:2 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:30:46.774: BR2/1:2 LCP: EndpointDisc 1 Local (0x130901746F7269746F)

*Mar 1 05:30:46.774: BR2/1:2 LCP: O CONFACK [REQsent] id 12 len 28

*Mar 1 05:30:46.774: BR2/1:2 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:30:46.774: BR2/1:2 LCP: MagicNumber 0x00B37556 (0x050600B37556)

*Mar 1 05:30:46.774: BR2/1:2 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:30:46.774: BR2/1:2 LCP: EndpointDisc 1 Local (0x130901746F7269746F)

*Mar 1 05:30:46.786: BR2/1:2 LCP: I CONFACK [ACKsent] id 31 len 29

*Mar 1 05:30:46.786: BR2/1:2 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:30:46.786: BR2/1:2 LCP: MagicNumber 0x513DE8C4 (0x0506513DE8C4)

*Mar 1 05:30:46.786: BR2/1:2 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:30:46.786: BR2/1:2 LCP: EndpointDisc 1 Local (0x130A016D656C616E6965)

*Mar 1 05:30:46.786: BR2/1:2 LCP: State is Open

*Mar 1 05:30:46.786: BR2/1:2 PPP: Phase is AUTHENTICATING, by both

*Mar 1 05:30:46.786: BR2/1:2 CHAP: O CHALLENGE id 14 len 28 from "melanie"

*Mar 1 05:30:46.806: BR2/1:2 CHAP: I CHALLENGE id 7 len 27 from "torito"

*Mar 1 05:30:46.806: BR2/1:2 CHAP: O RESPONSE id 7 len 28 from "melanie"

*Mar 1 05:30:46.822: BR2/1:2 CHAP: I SUCCESS id 7 len 4

*Mar 1 05:30:46.834: BR2/1:2 CHAP: I RESPONSE id 14 len 27 from "torito"

*Mar 1 05:30:46.834: BR2/1:2 CHAP: O SUCCESS id 14 len 4

!--- PPP authentication is complete.

*Mar 1 05:30:46.834: BR2/1:2 PPP: Phase is VIRTUALIZED

*Mar 1 05:30:46.834: BR2/1:2 MLP: torito, multilink up

*Mar 1 05:30:47.138: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI2/1:1,

changed state to up

*Mar 1 05:30:47.834: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI2/1:2,

changed state to up

*Mar 1 05:30:52.734: %ISDN-6-CONNECT: Interface BRI2/1:2 is now connected to

6113 torito

!--- Both B-channels are up.

melanie#

*Mar 1 05:31:16.186: BR2/2 DDR: rotor dialout [priority]

!--- Dialout using BRI 2/2.

*Mar 1 05:31:16.186: BR2/2 DDR: Attempting to dial 6113

!--- Dial the first number (6113) configured with dialer string command. !--- This number corresponds to the first BRI on torito. !--- Remember there are no B-channels available on the remote BRI.

*Mar 1 05:31:16.186: ISDN BR2/2: TX -> SETUP pd = 8 callref = 0x79

*Mar 1 05:31:16.186: Bearer Capability i = 0x8890

*Mar 1 05:31:16.186: Channel ID i = 0x83

*Mar 1 05:31:16.190: Called Party Number i = 0x80, '6113', Plan:Unknown,

Type:Unknown

*Mar 1 05:31:16.274: ISDN BR2/2: RX <- CALL_PROC pd = 8 callref = 0xF9

*Mar 1 05:31:16.274: Channel ID i = 0x89

*Mar 1 05:31:16.298: ISDN BR2/2: RX <- PROGRESS pd = 8 callref = 0xF9

*Mar 1 05:31:16.302: Progress Ind i = 0x8188 - In-band info or appropriate

now available

*Mar 1 05:31:16.318: ISDN BR2/2: RX <- DISCONNECT pd = 8 callref = 0xF9

*Mar 1 05:31:16.318: Cause i = 0x8191 - User busy

!--- We receive a user busy signal, because there are no available !--- B-channels on that BRI, and melanie must dial the next BRI on torito.

*Mar 1 05:31:16.322: BRI2/2: wait for isdn carrier timeout, call id=0x8079

*Mar 1 05:31:16.322: BR2/2 DDR: Attempting to dial 6114

!--- Dial the second number (6114) configured with dialer string command. !--- This number corresponds to the second BRI on torito. !--- Remember both B-channels are available on that remote BRI.

*Mar 1 05:31:16.326: ISDN BR2/2: TX -> RELEASE pd = 8 callref = 0x79

*Mar 1 05:31:16.326: Cause i = 0x8091 - User busy

!--- Release message from the previous failed call.

*Mar 1 05:31:16.346: ISDN BR2/2: TX -> SETUP pd = 8 callref = 0x7A

!--- Setup message for next call.

*Mar 1 05:31:16.346: Bearer Capability i = 0x8890

*Mar 1 05:31:16.346: Channel ID i = 0x83

*Mar 1 05:31:16.346: Called Party Number i = 0x80, '6114', Plan:Unknown,

Type:Unknown

*Mar 1 05:31:16.362: ISDN BR2/2: RX <- RELEASE_COMP pd = 8 callref = 0xF9

!--- Release acknowledgement for previous failed call.

*Mar 1 05:31:16.422: ISDN BR2/2: RX <- CALL_PROC pd = 8 callref = 0xFA

!--- ISDN call progress message.

*Mar 1 05:31:16.426: Channel ID i = 0x89

*Mar 1 05:31:16.878: ISDN BR2/2: RX <- CONNECT pd = 8 callref = 0xFA

*Mar 1 05:31:16.882: ISDN BR2/2: TX -> CONNECT_ACK pd = 8 callref = 0x7A

*Mar 1 05:31:16.882: %LINK-3-UPDOWN: Interface BRI2/2:1, changed state to up

!--- Call is connected on BRI 2/2 B-channel 1.

*Mar 1 05:31:16.882: BR2/2:1: interface must be fifo queue, force fifo

*Mar 1 05:31:16.882: %DIALER-6-BIND: Interface BR2/2:1 bound to profile Di2

!--- Call is bound to interface Dialer 2.

*Mar 1 05:31:16.886: BR2/2:1 PPP: Treating connection as a callout

*Mar 1 05:31:16.886: BR2/2:1 PPP: Phase is ESTABLISHING, Active Open

*Mar 1 05:31:16.886: BR2/2:1 LCP: O CONFREQ [Closed] id 31 len 29

*Mar 1 05:31:16.886: BR2/2:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:31:16.886: BR2/2:1 LCP: MagicNumber 0x513E5E8D (0x0506513E5E8D)

*Mar 1 05:31:16.886: BR2/2:1 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:31:16.886: BR2/2:1 LCP: EndpointDisc 1 Local (0x130A016D656C616E6965)

*Mar 1 05:31:16.926: BR2/2:1 LCP: I CONFREQ [REQsent] id 11 len 28

*Mar 1 05:31:16.926: BR2/2:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:31:16.926: BR2/2:1 LCP: MagicNumber 0x00B3EB20 (0x050600B3EB20)

*Mar 1 05:31:16.926: BR2/2:1 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:31:16.926: BR2/2:1 LCP: EndpointDisc 1 Local (0x130901746F7269746F)

*Mar 1 05:31:16.926: BR2/2:1 LCP: O CONFACK [REQsent] id 11 len 28

*Mar 1 05:31:16.926: BR2/2:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:31:16.926: BR2/2:1 LCP: MagicNumber 0x00B3EB20 (0x050600B3EB20)

*Mar 1 05:31:16.926: BR2/2:1 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:31:16.926: BR2/2:1 LCP: EndpointDisc 1 Local (0x130901746F7269746F)

*Mar 1 05:31:16.938: BR2/2:1 LCP: I CONFACK [ACKsent] id 31 len 29

*Mar 1 05:31:16.938: BR2/2:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:31:16.938: BR2/2:1 LCP: MagicNumber 0x513E5E8D (0x0506513E5E8D)

*Mar 1 05:31:16.938: BR2/2:1 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:31:16.938: BR2/2:1 LCP: EndpointDisc 1 Local (0x130A016D656C616E6965)

*Mar 1 05:31:16.938: BR2/2:1 LCP: State is Open

*Mar 1 05:31:16.938: BR2/2:1 PPP: Phase is AUTHENTICATING, by both

*Mar 1 05:31:16.938: BR2/2:1 CHAP: O CHALLENGE id 14 len 28 from "melanie"

*Mar 1 05:31:16.958: BR2/2:1 CHAP: I CHALLENGE id 6 len 27 from "torito"

*Mar 1 05:31:16.958: BR2/2:1 CHAP: O RESPONSE id 6 len 28 from "melanie"

*Mar 1 05:31:16.974: BR2/2:1 CHAP: I SUCCESS id 6 len 4

*Mar 1 05:31:16.986: BR2/2:1 CHAP: I RESPONSE id 14 len 27 from "torito"

*Mar 1 05:31:16.986: BR2/2:1 CHAP: O SUCCESS id 14 len 4

!--- CHAP authentication is successful.

*Mar 1 05:31:16.986: BR2/2:1 PPP: Phase is VIRTUALIZED

*Mar 1 05:31:16.990: BR2/2:1 MLP: torito, multilink up

*Mar 1 05:31:17.986: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI2/2:1,

changed state to up

*Mar 1 05:31:22.886: %ISDN-6-CONNECT: Interface BRI2/2:1 is now connected to

6114 torito

!--- Call connection is complete.

melanie#

*Mar 1 05:31:46.186: BR2/2 DDR: rotor dialout [priority]

*Mar 1 05:31:46.186: BR2/2 DDR: Attempting to dial 6113

!--- Dial the first number (6113) configured with dialer string command. !--- This number corresponds to the first BRI on torito. !--- Remember there are no B-channels available on the remote BRI.

*Mar 1 05:31:46.186: ISDN BR2/2: TX -> SETUP pd = 8 callref = 0x7B

*Mar 1 05:31:46.186: Bearer Capability i = 0x8890

*Mar 1 05:31:46.186: Channel ID i = 0x83

*Mar 1 05:31:46.190: Called Party Number i = 0x80, '6113', Plan:Unknown,

Type:Unknown

*Mar 1 05:31:46.274: Channel ID i = 0x8A

*Mar 1 05:31:46.302: ISDN BR2/2: RX <- PROGRESS pd = 8 callref = 0xFB

*Mar 1 05:31:46.302: Progress Ind i = 0x8188 - In-band info or appropriate

now available

*Mar 1 05:31:46.318: ISDN BR2/2: RX <- DISCONNECT pd = 8 callref = 0xFB

*Mar 1 05:31:46.322: Cause i = 0x8191 - User busy

!--- We receive a user busy signal, since there are no available B-channels. !--- on that BRI melanie must dial the next BRI on torito.

*Mar 1 05:31:46.322: BRI2/2: wait for isdn carrier timeout, call id=0x807B

*Mar 1 05:31:46.326: BR2/2 DDR: Attempting to dial 6114

!--- Dial the second number (6114) configured with dialer string command. !--- This number corresponds to the second BRI on torito. !--- Remember there is one B-channels available on that remote BRI.

*Mar 1 05:31:46.326: ISDN BR2/2: TX -> RELEASE pd = 8 callref = 0x7B

*Mar 1 05:31:46.326: Cause i = 0x8091 - User busy

!--- Release message from the previous failed call.

*Mar 1 05:31:46.346: ISDN BR2/2: TX -> SETUP pd = 8 callref = 0x7C

!--- Setup message for next call.

*Mar 1 05:31:46.346: Bearer Capability i = 0x8890

*Mar 1 05:31:46.346: Channel ID i = 0x83

*Mar 1 05:31:46.346: Called Party Number i = 0x80, '6114', Plan:Unknown,

Type:Unknown

*Mar 1 05:31:46.362: ISDN BR2/2: RX <- RELEASE_COMP pd = 8 callref = 0xFB

!--- Release acknowledgement for previous failed call.

*Mar 1 05:31:46.422: ISDN BR2/2: RX <- CALL_PROC pd = 8 callref = 0xFC

*Mar 1 05:31:46.426: Channel ID i = 0x8A

*Mar 1 05:31:46.878: ISDN BR2/2: RX <- CONNECT pd = 8 callref = 0xFC

*Mar 1 05:31:46.882: ISDN BR2/2: TX -> CONNECT_ACK pd = 8 callref = 0x7C

*Mar 1 05:31:46.882: %LINK-3-UPDOWN: Interface BRI2/2:2, changed state to up

!--- Call is connected on BRI 2/2 B-channel 2.

*Mar 1 05:31:46.882: BR2/2:2: interface must be fifo queue, force fifo

*Mar 1 05:31:46.882: %DIALER-6-BIND: Interface BR2/2:2 bound to profile Di2

!--- Call is bound to interface Dialer 2.

*Mar 1 05:31:46.886: BR2/2:2 PPP: Treating connection as a callout

*Mar 1 05:31:46.886: BR2/2:2 PPP: Phase is ESTABLISHING, Active Open

*Mar 1 05:31:46.886: BR2/2:2 LCP: O CONFREQ [Closed] id 24 len 29

*Mar 1 05:31:46.886: BR2/2:2 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:31:46.886: BR2/2:2 LCP: MagicNumber 0x513ED3BF (0x0506513ED3BF)

*Mar 1 05:31:46.886: BR2/2:2 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:31:46.886: BR2/2:2 LCP: EndpointDisc 1 Local (0x130A016D656C616E6965)

*Mar 1 05:31:46.922: BR2/2:2 LCP: I CONFREQ [REQsent] id 10 len 28

*Mar 1 05:31:46.922: BR2/2:2 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:31:46.926: BR2/2:2 LCP: MagicNumber 0x00B46053 (0x050600B46053)

*Mar 1 05:31:46.926: BR2/2:2 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:31:46.926: BR2/2:2 LCP: EndpointDisc 1 Local (0x130901746F7269746F)

*Mar 1 05:31:46.926: BR2/2:2 LCP: O CONFACK [REQsent] id 10 len 28

*Mar 1 05:31:46.926: BR2/2:2 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:31:46.926: BR2/2:2 LCP: MagicNumber 0x00B46053 (0x050600B46053)

*Mar 1 05:31:46.926: BR2/2:2 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:31:46.926: BR2/2:2 LCP: EndpointDisc 1 Local (0x130901746F7269746F)

*Mar 1 05:31:46.938: BR2/2:2 LCP: I CONFACK [ACKsent] id 24 len 29

*Mar 1 05:31:46.938: BR2/2:2 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:31:46.938: BR2/2:2 LCP: MagicNumber 0x513ED3BF (0x0506513ED3BF)

*Mar 1 05:31:46.938: BR2/2:2 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:31:46.938: BR2/2:2 LCP: EndpointDisc 1 Local (0x130A016D656C616E6965)

*Mar 1 05:31:46.938: BR2/2:2 LCP: State is Open

*Mar 1 05:31:46.938: BR2/2:2 PPP: Phase is AUTHENTICATING, by both

*Mar 1 05:31:46.938: BR2/2:2 CHAP: O CHALLENGE id 11 len 28 from "melanie"

*Mar 1 05:31:46.958: BR2/2:2 CHAP: I CHALLENGE id 6 len 27 from "torito"

*Mar 1 05:31:46.958: BR2/2:2 CHAP: O RESPONSE id 6 len 28 from "melanie"

*Mar 1 05:31:46.974: BR2/2:2 CHAP: I SUCCESS id 6 len 4

*Mar 1 05:31:46.982: BR2/2:2 CHAP: I RESPONSE id 11 len 27 from "torito"

*Mar 1 05:31:46.986: BR2/2:2 CHAP: O SUCCESS id 11 len 4

!--- CHAP authentication is successful.

*Mar 1 05:31:46.986: BR2/2:2 PPP: Phase is VIRTUALIZED

*Mar 1 05:31:46.986: BR2/2:2 MLP: torito, multilink up

*Mar 1 05:31:47.986: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI2/2:2,

changed state to up

*Mar 1 05:31:52.886: %ISDN-6-CONNECT: Interface BRI2/2:2 is now connected to

6114 torito

!--- Call connection is complete.

melanie#ping 10.10.12.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.10.12.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 24/24/24 ms

!--- Successful ping.

melanie#

関連情報

- 『DDR 用のマルチリンク PPP：基本設定と検証』を参照してください。

- ロータリー グループを使用して複数の BRI の MPPP を設定する方法

- ダイヤラ プロファイルの設定とトラブルシューティング

- ISDN BRI リンクで 2 つ目の B チャネル コールが失敗する問題のトラブルシューティング

- 製品サポート ページへのアクセス

- アクセス テクノロジーのサポート

- テクニカルサポート - Cisco Systems