内容

概要

前提条件

要件

使用するコンポーネント

Jabberデスクフォン制御のためのCTIメッセージング

関連情報

概要

このドキュメントでは、Jabberデスクトップクライアントの正常なコンピュータテレフォニーインテグレーション(CTI)マネージャ認証の詳細なコールフローについて説明します

前提条件

要件

次の項目に関する知識があることが推奨されます。

- Lightweight Directory Access Protocol(LDAP)

- コンピュータ/テレフォニー インテグレーション（CTI）

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアのバージョンに基づいています。

- Cisco Jabber for Windows 11.5

- Cisco Unified Communications Manager(CUCM)10.5(2)以降

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。本稼働中のネットワークでは、各コマンドによって起こる可能性がある影響を十分確認してください。

Jabberデスクフォン制御のためのCTIメッセージング

CTI Managerのサービスログがデバッグレベルに設定されていることを確認し、問題を再現してから、コマンドラインまたはReal Time Monitoring Tool(RTMT)を使用してログを収集します。 CTI認証を確認するには、次の手順を実行します

ステップ1:Jabberクライアントからのプロバイダーオープン要求がCTI Managerサービスによって受信されます。

00895255.002 |08:59:16.944 |AppInfo |[CTI-APP] [CTIHandler::processIncomingMessage] CTI ProviderOpenRequest ( seq#=2 provider=UCProvider login=wwhite heartbeat=60 timer=10 priority=0 lightWeightProviderOpen=0 AuthType=0 RequestOldFetch=0 EncryptedSSODataSize=0)

00895256.000 |08:59:16.944 |SdlSig |CtiProviderOpenReq |init_complete_await_provopen |CTIHandler(1,200,22,7) |CTIHandler(1,200,22,7) |1,200,13,8.3^*^* |[R:N-H:0,N:0,L:0,V:0,Z:0,D:0] Async Response=2 ProviderName=UCProvider ClientVersion=UCProvider LoginId=wwhite ApplName=Shibui ServerHeartbeat=60 CMAssignedAppId=1234 PluginName=Cisco JTAPI LightWeightProviderOpen=0 Auth Style=0 RequestOldFetch=0

00895256.001 |08:59:16.944 |AppInfo |SSOTOKEN =

00895256.002 |08:59:16.944 |AppInfo |CQBEBuilder::BuildQbeMessage(): objectID=2

00895256.003 |08:59:16.944 |AppInfo |CTIHandler::OutputQbeMessage: TcpHand=[1:200:13:8] QbePref={0x0xf74b346c,0x70} pQbeMsg=0x0xf74b3474 qbeMsgSize=0x70 tmpLen=0x78 msgSize_=0x78

ステップ2：プロバイダーオープン応答がJabberクライアントに送信されます。

00895256.004 |08:59:16.944 |AppInfo |[CTI-APP] [CTIHandler::OutputCtiMessage ] CTI ProviderOpenResponse (seq#=2) provider id=16777223 FIPSMode = 0

ステップ3：エンドユーザ認証のプロセスが開始されます。

00895260.000 |08:59:17.057 |SdlSig |CtiProceedWithAppLogin |init_complete_await_auth |CTIHandler(1,200,22,7) |CtiManager(1,200,21,1) |1,200,13,8.3^*^* |[R:L-H:0,N:0,L:0,V:0,Z:0,D:0]

00895261.000 |08:59:17.058 |SdlSig |CtiLoginCheckReq |ready |Directory(1,200,23,1) |CTIHandler(1,200,22,7) |1,200,13,8.3^*^* |[T:N-H:0,N:0,L:0,V:0,Z:0,D:0] Login=wwhite Seq#=2 Auth Style=0 3rd Party Certificate=0 mOcsp_url= mIssuerName= EncryptedSingleSignOnData Size=0

00895261.001 |08:59:17.058 |AppInfo |CtiLoginCheckReq::authenticateByUserName

ステップ4：キーの復号化が行われ、認証を試行する前に成功する必要があります。

00895261.002 |08:59:17.058 |AppInfo |CCMAsymmetricEncryption::DecryptText Enter

00895261.003 |08:59:17.067 |AppInfo |CCMAsymmetricEncryption::DecryptText Exit

00895261.004 |08:59:17.067 |AppInfo |Decrypted Key Status success - [52]

00895261.005 |08:59:17.067 |AppInfo |Nonce =cc64fd13-d4e1-43bc-808f-f051f7c945d0

00895261.006 |08:59:17.067 |AppInfo |Nonce validation success

00895261.007 |08:59:17.067 |AppInfo |CCMSymmetricEncryption::DecryptText:enter

00895261.008 |08:59:17.067 |AppInfo |CCMEncryption::DecryptText (Exit) (Success))

00895261.009 |08:59:17.067 |AppInfo |Decrypted Password Status success - [8]

ステップ5：ユーザ名が取得され、パスワードとともに認証に使用されます。

00895261.010 |08:59:17.067 |AppInfo |AuthenticationImpl::login:enter

00895261.011 |08:59:17.067 |AppInfo |AuthenticationImpl::retrieveCredential:enter

00895261.012 |08:59:17.067 |AppInfo |userid is wwhite

00895261.013 |08:59:17.067 |AppInfo |AuthenticationImpl::login - no encryptedpassword Credential, look for password

00895261.014 |08:59:17.067 |AppInfo |AuthenticationImpl::login (Auth with password. Calling authenticateUserWithPassword)

00895261.015 |08:59:17.067 |AppInfo |authenticationDB::authenticateUserWithPassword():enter

00895261.016 |08:59:17.067 |AppInfo |Credential Length is: 8

ステップ6:CTI Managerはユーザのクレデンシャルポリシーを確認します。

00895261.021 |08:59:17.113 |AppInfo |userType is: 1

00895261.022 |08:59:17.113 |AppInfo |timeOfLockout is: 0

00895261.023 |08:59:17.113 |AppInfo |timeHackedLockout is: 0

00895261.024 |08:59:17.113 |AppInfo |hackCount is: 0

00895261.025 |08:59:17.113 |AppInfo |daysToExpiry is: 0

00895261.026 |08:59:17.113 |AppInfo |doesNotExpire is: 0

00895261.027 |08:59:17.113 |AppInfo |useExpiryWarning is: 0

00895261.028 |08:59:17.113 |AppInfo |isInactive is: 0

00895261.029 |08:59:17.113 |AppInfo |userMustChange is: 0

00895261.030 |08:59:17.113 |AppInfo |endUserStatus is: 1

00895261.031 |08:59:17.113 |AppInfo |imsInfo is: 1

00895261.032 |08:59:17.113 |AppInfo |lastSuccessfulLoginTime is: 1455049675

00895261.033 |08:59:17.148 |AppInfo |XXXXXX Check 1

ステップ7：エンドユーザのCTI認証が続行されます。

00895261.034 |08:59:17.149 |AppInfo |authenticationDB::login (Authenticating using LDAP)

00895261.035 |08:59:17.149 |AppInfo |authenticationLDAP.cpp::authenticateUserWithPassword():enter

00895261.036 |08:59:17.149 |AppInfo |LDAP userid is 'wwhite'

00895261.037 |08:59:17.149 |AppInfo |authenticationUtils::escapeLDAPSpecialCharsForFilter():enter

00895261.038 |08:59:17.149 |AppInfo |

After Escaping for LDAP special Characters for Filter = wwhite

ステップ8:CTI Manager Serviceは、認証を試行する前にLDAPへの接続を試行します。

00895261.040 |08:59:17.149 |AppInfo |LDAP not initialized...connecting...

00895261.041 |08:59:17.149 |AppInfo |authenticationLDAP::connect():enter

00895261.042 |08:59:17.149 |AppInfo |authenticationLDAP::Authenticate():enter

00895261.043 |08:59:17.149 |AppInfo |Authenticating with SSL not enabled (ldap://10.10.10.10:3268)

ステップ9:LDAP認証の設定で設定されたサービスアカウントで接続が成功します。

00895261.044 |08:59:17.149 |AppInfo |LDAP initialize non-SSL Return Code (0)

ステップ10：管理認証が成功します。

00895261.051 |08:59:17.158 |AppInfo |LDAP authentication bind SUCCESS for Administrator@joshlab.net

00895261.052 |08:59:17.158 |AppInfo |Connection # (0): sucessful

00895261.053 |08:59:17.158 |AppInfo |Details ::

00895261.054 |08:59:17.158 |AppInfo |10.10.10.10 3268

00895261.055 |08:59:17.158 |AppInfo |------------------------------------------------------------------------

00895261.056 |08:59:17.158 |AppInfo |Available Servers (1)

00895261.057 |08:59:17.158 |AppInfo |authenticationLDAP::Authenticate():exit(0)

00895261.058 |08:59:17.158 |AppInfo |Authentication of LDAP administrator successful.

ステップ11:CTI ManagerサービスはLDAP情報を取得し、エンドユーザアカウントで認証します。

00895261.072 |08:59:17.164 |AppInfo |Retrieve the specified user entry: (&(&(objectclass=user)(!(objectclass=Computer))(!(UserAccountControl:1.2.840.113556.1.4.803:=2)))(sAMAccountName=wwhite))

00895261.073 |08:59:17.164 |AppInfo |LDAP Search for User base: 'OU=Breaking Bad,DC=joshlab,DC=net'

00895261.074 |08:59:17.165 |AppInfo |LDAP Search complete. Code: 0

00895261.075 |08:59:17.165 |AppInfo |Get DN of entry.

00895261.076 |08:59:17.165 |AppInfo |Got DN: CN=Walter White,OU=Breaking Bad,DC=joshlab,DC=net

00895261.077 |08:59:17.165 |AppInfo |Attempt to authenticate DN: CN=Walter White,OU=Breaking Bad,DC=joshlab,DC=net

00895261.078 |08:59:17.165 |AppInfo |authenticationLDAP::Authenticate():enter

00895261.079 |08:59:17.165 |AppInfo |Authenticating with SSL not enabled (ldap://10.10.10.10:3268)

ステップ12：エンドユーザのLDAP認証が成功します。

00895261.087 |08:59:17.171 |AppInfo |LDAP authentication bind SUCCESS for CN=Walter White,OU=Breaking Bad,DC=joshlab,DC=net

00895261.088 |08:59:17.171 |AppInfo |Connection # (0): sucessful

00895261.089 |08:59:17.171 |AppInfo |Details ::

00895261.090 |08:59:17.171 |AppInfo |10.10.10.10 3268

00895261.091 |08:59:17.171 |AppInfo |------------------------------------------------------------------------

00895261.092 |08:59:17.171 |AppInfo |Available Servers (1)

00895261.093 |08:59:17.171 |AppInfo |authenticationLDAP::Authenticate():exit(0)

00895261.094 |08:59:17.171 |AppInfo |authenticationLDAP::authenticateUserWithPassword():Exit(0)

00895261.095 |08:59:17.171 |AppInfo |Successfully authenticated user: wwhite

ステップ13:CTI Managerはデータベースをチェックし、エンドユーザが電話機へのアクセスを許可する正しい権限を持っていることを確認します。

00895262.000 |08:59:17.171 |SdlSig |CtiLoginCheckRes |authenticating |CTIHandler(1,200,22,7) |Directory(1,200,23,1) |1,200,13,8.3^*^* |[R:N-H:0,N:0,L:0,V:0,Z:0,D:0] Seq#=2 result=Success LoginUserID= Expire days=4294967295

00895263.000 |08:59:17.172 |SdlSig |CtiUserSettingsReq |ready |CTIDbAccess(1,200,26,1) |CTIHandler(1,200,22,7) |1,200,13,8.3^*^* |[T:H-H:0,N:0,L:0,V:0,Z:0,D:0] mUserId=wwhite

00895263.001 |08:59:17.172 |AppInfo |DbAccess::ReadCtiUserSettingsReq

ステップ14:CTIユーザ権限を確認します。

00895264.000 |08:59:17.172 |SdlSig |CtiUserSettingsRes |verifying |CTIHandler(1,200,22,7) |CTIDbAccess(1,200,26,1) |1,200,13,8.3^*^* |[R:N-H:0,N:0,L:0,V:0,Z:0,D:0] SuperProvider = Disabled CallParkRetrievalAllowed = Disabled ModifyCallingNumber = Disabled CTI Enabled = Enabled CallMonitor=Disabled CallRecord=Disabled Userid = wwhite result=0

00895264.001 |08:59:17.172 |AppInfo |[CTI-INFO] [CTIHandler::verifying_CtiUserSettingsRes] mCtiUserSettings.mbSecurityEnabled=0

00895264.002 |08:59:17.172 |AppInfo |[CTI-INFO] [CTIHandler::verifying_CtiUserSettingsRes] mListenPort=2748

00895264.003 |08:59:17.172 |AppInfo |[CTI-INFO] [CTIHandler::verifying_CtiUserSettingsRes] sent providerSubscriptionRegNotify for user wwhite

ステップ15:CTIは、Jabberが制御する電話機に対してDeviceOpenRequestを送信します。

00895326.002 |08:59:17.335 |AppInfo |[CTI-APP] [CTIHandler::processIncomingMessage] CTI DeviceOpenRequest ( seq#=4 device name=SEP001794625DE5 softkeys AppID=1234)

00895327.000 |08:59:17.335 |SdlSig |CtiDeviceOpenDeviceReq |ready |CTIHandler(1,200,22,7) |CTIHandler(1,200,22,7) |1,200,13,8.5^14.48.68.203^SEP001794625DE5 |[R:N-H:0,N:0,L:0,V:0,Z:0,D:0] AsyncResponse=4 DH=0|0 Name=SEP001794625DE5 Type=0 RisClass=0 TerminateMedia=5 RequestType=0 RtpDestination1|1 ApplnIpAddrMode=3 Filter Bitmap=000100000000000000000100000001001 AppLoginUserId=wwhite AppIPAddr= ipAddrType=0 ipv4=10.10.10.100 ApplicationIDListCount = 1 ApplicationIds are 1234, mSoftKeyApplicationID = 1234 ProviderIDListCount = 1 ProviderIds are 16777223, IsCTIConnectionTLS = F

ステップ16:CTI Managerは接続を許可し、DeviceOpenRequest Responseを送信します。

00895329.000 |08:59:17.339 |SdlSig |CtiDeviceOpenDeviceRes |ready |CTIHandler(1,200,22,7) |CTIDeviceLineMgr(1,200,25,1) |1,200,13,8.5^10.10.10.100^SEP001794625DE5 |[R:N-H:0,N:3,L:0,V:0,Z:0,D:0] mAsyncResponse = 4 DH=1|38 Name=SEP001794625DE5 Type=7 StationPid=(0,0,0,0) mOpenResult=0x0 mEncodingType=3 mRequestType=0 mDSSDeviceState = 0

00895329.001 |08:59:17.339 |AppInfo |CQBEBuilder::BuildQbeMessage(): objectID=27

00895329.002 |08:59:17.340 |AppInfo |CTIHandler::OutputQbeMessage: TcpHand=[1:200:13:8] QbePref={0x0xf74b346c,0x98} pQbeMsg=0x0xf74b3474 qbeMsgSize=0x98 tmpLen=0xa0 msgSize_=0xa0

00895329.003 |08:59:17.340 |AppInfo |[CTI-APP] [CTIHandler::OutputCtiMessage ] CTI DeviceOpenResponse ( seq#=4 result=0 DH=1|38 deviceName=SEP001794625DE5 deviceType=7 deviceId=38 registrationAllowed=0 deviceLocale=1 protocol=1 deviceRestricted=0 altScript= Rollover=0 BIB=0 DNDOption=0 IpAddrMode=0 supportsFeat=0 Visiting=0)

00895330.000 |08:59:17.340 |AppInfo |-->RisCTIManagerAccess::DeviceOpenActivityy(...)

00895331.000 |08:59:17.340 |AppInfo |DeviceOpenActivity(): activity: 1, connID: 7, deviceName: SEP001794625DE5, appID: wwhite-10.10.10.100-58667, rtpaddr: , assocIpAddr: , mediaControl: 0, deviceType: 7, reason: 0

00895332.000 |08:59:17.340 |AppInfo |<--RisCTIManagerAccess::DeviceOpenActivityy(...)

ステップ17：最後にDeviceInServiceメッセージが表示され、デスクフォン制御要求が正常に完了しました。

00895336.003 |08:59:17.343 |AppInfo |[CTI-APP] [CTIHandler::OutputCtiMessage ] CTI DeviceInServiceEvent ( DH=1|38 ) Encoding Type=3 Device locale=1 Alt Script= DNDStatus=0 DNDOption=0)

00895337.000 |08:59:17.344 |SdlSig |SdlDataInd |ready |CtiManager(1,200,21,1) |SdlTCPConnection(1,200,13,8) |1,200,13,8.6^*^* |*TraceFlagOverrode

00895337.001 |08:59:17.344 |AppInfo |CtiManager::ready_SdlDataInd(): ConnHandle=[1:200:13:8] TCP message length=0x108

00895338.000 |08:59:17.344 |SdlSig |CtiQbeGenericMessage |ready |CTIHandler(1,200,22,7) |CtiManager(1,200,21,1) |1,200,13,8.6^*^* |*TraceFlagOverrode

00895338.001 |08:59:17.344 |AppInfo |CQBEParser::ParseQbeMessage: PDU#=37

この時点で、JabberクライアントはCTI経由でデスクフォンを正常に制御できます。一般的な問題は、CTIログのLDAP認証およびエンドユーザ権限プロセスで確認できます。

関連情報

- Jabber設定ガイド

- テクニカル サポートとドキュメント – Cisco Systems