内容

はじめに

前提条件

要件

使用するコンポーネント

設定

ネットワーク図

背景説明

vPC動作のプライマリタスク

アップグレード方法

関連情報

はじめに

このドキュメントでは、Cisco NX-OSを使用したvPCでのCisco Nexus 9000スイッチのアップグレード手順について説明します。

前提条件

要件

次の項目に関する知識があることが推奨されます。

- Nexus NX-OS ソフトウェア

- 仮想ポートチャネル(vPC)。

- Cisco Nexusスイッチのデバイスファイルシステム、ディレクトリ、およびファイルを使用します。

- ソフトウェアのダウンロードにログインします。

- この手順では中断が発生するため、メンテナンス時間帯をスケジュールすることをお勧めします。

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

- Cisco Nexus 9000とCisco NX-OS

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、クリアな（デフォルト）設定で作業を開始しています。本稼働中のネットワークでは、各コマンドによって起こる可能性がある影響を十分確認してください。

注:Cisco Nexus 7000スイッチのアップグレード手順は、このドキュメントに基づいて記載されていますが、コマンドや出力は実際の環境によって異なります。詳細については、ご使用のCisco Nexusスイッチ固有のシスコ公式ガイドを参照してください。

設定

ネットワーク図

ネットワーク図

背景説明

- 2つのN9K-C-YC-FX9318024があるデータセンターのネットワーク管理者を想定します。

- N9K-1とN9K-2にはNX-OS 9.3(11)が搭載されています。

- サーバAとBが実稼働トラフィックを送信している。

- 目標は、両方のNexusスイッチをNX-OS 10.2(5)にアップグレードすることです。

注:プライマリスイッチでアップグレードを開始しても、セカンダリスイッチで機能が区別されることはありません。ただし、プライマリスイッチを使用して開始すると、両方のデバイスが最初に設定したプライマリロールとセカンダリロールに戻ることが保証されます。 vPCの運用上の主要な機能としてNexusの一部の機能を知ることは重要ですが、

vPC動作のプライマリタスク

- FHRPを使用してもARP要求に応答します。

- ブリッジプロトコルデータユニット(BPDU)を処理します。

- PIMマルチキャストトラフィックの転送

- IGMPのコントロールプレーンパケット。

- ピアリンクのダウン時にvPCメンバーポートのシャットダウンなし

アップグレード方法

ステップ 1：オープンなCisco Nexus 9000および3000 ISSUのサポート一覧

1. Current releaseを選択します。

2. ターゲットリリースを選択します。

Cisco Nexus 9000および3000 ISSUのサポート一覧

注:Cisco TACでは、推奨パスとともに中断（リロード）アップグレードオプションを常に使用することを推奨しています。

注：推奨パスでは、複数のジャンプを表示できます。両方のCisco NexusスイッチにターゲットのNX-OSバージョンが設定されるまで、ホップごとに手順2 ～ 11を繰り返す必要があります。

ステップ 2：お使いのCisco Nexusスイッチラインカードに応じて、推奨パスに記載されているすべてのCisco NX-OSファイルをダウンロードします。

1. ソフトウェアダウンロードにログインします。

2. セクションDownload and Upgradeに移動し、Access Downloadsを開きます。

3. Browse all > Cisco IOS and NX-OS Software > NX-OS - NX-OS Software > Switches > Data Center Switches > Select your Nexus series > Select your linecard > NX-OS System Software > Select NX-OS version to downloadの順にクリックします。

4. ファイル名の上にカーソルを移動してファイルの詳細を表示し、MD5チェックサム値をコピーして、NX-OSファイルをダウンロードします。

ソフトウェアのダウンロード

5. SCP、SFTP、TFTP、またはUSB経由で、vPCの両方のCisco NexusスイッチのブートフラッシュにNX-OSファイルを転送します。 最初の3つのオプションのいずれかを選択した場合は、予想されるVRFを指定してサーバへのpingがあることを確認します。この例では、SFTPサーバのIPアドレス192.168.9.9に、Virtual Routing Forwarding(VRF)Managementを介して到達できます。
N9K-1(config)# ping 192.168.9.9 vrf management

N9K-1(config)# copy sftp: bootflash:

Enter source filename: nxos64-cs.10.2.5.M.bin

Enter vrf (If no input, current vrf 'default' is considered): management

Enter hostname for the sftp server: 192.168.9.9

Enter username: admin

The authenticity of host ‘192.168.9.9 (192.168.9.9)' can't be established.

RSA key fingerprint is SHA256:ABCDEFGHIJK.

Are you sure you want to continue connecting (yes/no/[fingerprint])? yes

Warning: Permanently added ‘192.168.9.9' (RSA) to the list of known hosts.

Inbound-ReKey for 192.168.9.9

User Access Verification

Password: cisco

6. ファイル転送が完了したら、dirコマンドを使用して、NX-OSファイルがブートフラッシュにあることを確認します。

7. show file bootflashコマンドを使用して、NX-OSファイルからMD5チェックサムを取得します。

8. この値を、ソフトウェアのダウンロードからコピーした値と比較します。 両方の値が一致している必要があります。一致していない場合、NX-OSファイルが破損しているか、有効ではありません。

N9K-1(config)# dir | include nxos

1978203648    Mar 31 01:36:06 2023  nxos.9.3.11.bin

1943380992    Mar 17 09:54:16 2023  nxos64-cs.10.2.5.M.bin

Usage for bootflash://

20548902912 bytes used

96040308736 bytes free

116589211648 bytes total

N9K-1(config)# show file bootflash:nxos64-cs.10.2.5.M.bin md5sum

2f60a186cb9c2d55c90086302e51f655

ステップ 3：各Cisco NexusスイッチのvPCでの動作ロールを特定します。

1. show vpc roleコマンドを使用します。

N9K-1(config)# show vpc role

vPC Role status

-----------------------------------------

vPC role                        : primary

Dual Active Detection Status    : 0

vPC system-mac                  : 00:23:04:ee:be:01

vPC system-priority             : 32667

vPC local system-mac            : 44:b6:be:11:17:67

vPC local role-priority         : 32667

vPC local config role-priority  : 32667

vPC peer system-mac             : f8:a7:3a:4e:40:07

vPC peer role-priority          : 32667

vPC peer config role-priority   : 32667

N9K-2(config)# show vpc role

vPC Role status

-----------------------------------------

vPC role                        : secondary

Dual Active Detection Status    : 0

vPC system-mac                  : 00:23:04:ee:be:01

vPC system-priority             : 32667

vPC local system-mac            : f8:a7:3a:4e:40:07

vPC local role-priority         : 32667

vPC local config role-priority  : 32667

vPC peer system-mac             : 44:b6:be:11:17:67

vPC peer role-priority          : 32667

vPC peer config role-priority   : 32667

ステップ 4：vPCの両方のCisco NexusスイッチでCisco NX-OSの非互換性を確認します。

1. show incompatibility-all nxos bootflashコマンドを使用します。

N9K-1(config)# show incompatibility-all nxos bootflash:nxos64-cs.10.2.5.M.bin

Checking incompatible configuration(s) for vdc 'N9K-1':

-------------------------------------------------------

No incompatible configurations

Checking dynamic incompatibilities:

-----------------------------------

No incompatible configurations

ステップ 5：vPCで両方のCisco Nexusスイッチに対するCisco NX-OSの影響を確認します。

1. show install all impact nxos bootflashコマンドを使用します。これにより、暫定診断が実行され、Cisco NX-OSのバージョンに互換性があり、インストールが可能であることが検証されます。

N9K-1(config)# show install all impact nxos bootflash:nxos64-cs.10.2.5.M.bin

Installer will perform impact only check. Please wait.

Verifying image bootflash:/nxos64-cs.10.2.5.M.bin for boot variable "nxos".

[####################] 100% -- SUCCESS

Verifying image type.

[####################] 100% -- SUCCESS

Preparing "nxos" version info using image bootflash:/nxos64-cs.10.2.5.M.bin.

[####################] 100% -- SUCCESS

Preparing "bios" version info using image bootflash:/nxos64-cs.10.2.5.M.bin.

[####################] 100% -- SUCCESS

Performing module support checks.

[####################] 100% -- SUCCESS

Notifying services about system upgrade.

[####################] 100% -- SUCCESS

Compatibility check is done:

Module  bootable          Impact  Install-type  Reason

------  --------  --------------  ------------  ------

1       yes      disruptive         reset  default upgrade is not hitless

Images will be upgraded according to following table:

Module       Image                  Running-Version(pri:alt)           New-Version  Upg-Required

------  ----------  ----------------------------------------  --------------------

1        nxos                                   9.3(11)                                10.2(5)           yes

1        bios     v05.47(04/28/2022):v05.43(11/22/2020)    v05.47(04/28/2022)            no

Additional info for this installation:

--------------------------------------

Service "vpc" in vdc 1: Vpc is enabled, Please make sure both Vpc peer switches have same boot mode using 'show boot mode' and proceed

ステップ 6（オプション）：vPCの両方のCisco Nexusスイッチから実行コンフィギュレーションのバックアップをエクスポートします。

N9K-1(config)# copy running-config sftp:running-config-backup

Enter vrf (If no input, current vrf 'default' is considered): default

Enter hostname for the sftp server: 192.168.9.9

Enter username: admin

The authenticity of host '192.168.9.9 (192.168.9.9)' can't be established.

RSA key fingerprint is SHA256:ABDCEFGHI.

Are you sure you want to continue connecting (yes/no/[fingerprint])? yes

Warning: Permanently added '192.168.9.9' (RSA) to the list of known hosts.

Inbound-ReKey for 192.168.9.9:22

User Access Verification

Password:

Connected to 192.168.9.9.

手順 7：vPCプライマリロールを持つNexusスイッチにNX-OSをインストールします。

1. コマンドinstall all nxos bootflashを使用します。

N9K-1(config)# install all nxos bootflash:nxos64-cs.10.2.5.M.bin

Installer will perform compatibility check first. Please wait.

Installer is forced disruptive

Verifying image bootflash:/nxos64-cs.10.2.5.M.bin for boot variable "nxos".

[####################] 100% -- SUCCESS

Verifying image type.

[####################] 100% -- SUCCESS

Preparing "nxos" version info using image bootflash:/nxos64-cs.10.2.5.M.bin.

[####################] 100% -- SUCCESS

Preparing "bios" version info using image bootflash:/nxos64-cs.10.2.5.M.bin.

[####################] 100% -- SUCCESS

Performing module support checks.

[####################] 100% -- SUCCESS

Notifying services about system upgrade.

[####################] 100% -- SUCCESS

Compatibility check is done:

Module  bootable          Impact  Install-type  Reason

------  --------  --------------  ------------  ------

1       yes      disruptive         reset  default upgrade is not hitless

Images will be upgraded according to following table:

Module       Image                  Running-Version(pri:alt)           New-Version  Upg-Required

------  ----------  -------------------------------------------------------------

1        nxos                                   9.3(11)                                10.2(5)           yes

1        bios     v05.47(04/28/2022):v05.43(11/22/2020)    v05.47(04/28/2022)            no

Additional info for this installation:

--------------------------------------

Service "vpc" in vdc 1: Vpc is enabled, Please make sure both Vpc peer switches have same boot mode using 'show boot mode' and proceed

Switch will be reloaded for disruptive upgrade.

Do you want to continue with the installation (y/n)?  [n] y

注意：エラーなしで成功を読み取る必要があります。この後、Cisco Nexusスイッチがリブートし、インストールプロセスに数分かかる場合があります。これは、Cisco Nexusスイッチごとに異なります。

ステップ 8：Cisco Nexusスイッチでステータスがアクティブになるまで待ちます。

1. show moduleコマンドを使用します。

N9K-1(config)# show module

Mod Ports             Module-Type                      Model           Status

--- ----- ------------------------------------- ------------------------------

1    54   24x10/25G/32G + 6x40/100G Ethernet/FC N9K-C93180YC-FX-24    active *

Mod  Sw                       Hw    Slot

---  ----------------------- ------ ----

1    9.3(11)                  1.0    NA

Mod  MAC-Address(es)                         Serial-Num

---  --------------------------------------  ----------

1    44-b6-aa-aa-aa-aa to 44-b6-be-bb-bb-bb  ABCDEFGHIJK

Mod  Online Diag Status

---  ------------------

1    Pass

* this terminal session

注:vPCのキープアライブやピアリンクがアップ状態にならない可能性があることに注意してください。これは、vPCのCisco NexusスイッチにサポートされていないCisco NX-OSのバージョンが異なるためです。

ステップ 9：Cisco NX-OSをvPCピアのCisco Nexusスイッチにインストールします。

N9K-2(config)# install all nxos bootflash:nxos64-cs.10.2.5.M.bin

Installer will perform compatibility check first. Please wait.

Installer is forced disruptive

Verifying image bootflash:/nxos64-cs.10.2.5.M.bin for boot variable "nxos".

[####################] 100% -- SUCCESS

Verifying image type.

[####################] 100% -- SUCCESS

Preparing "nxos" version info using image bootflash:/nxos64-cs.10.2.5.M.bin.

[####################] 100% -- SUCCESS

Preparing "bios" version info using image bootflash:/nxos64-cs.10.2.5.M.bin.

[####################] 100% -- SUCCESS

Performing module support checks.

[####################] 100% -- SUCCESS

Notifying services about system upgrade.

[####################] 100% -- SUCCESS

Compatibility check is done:

Module  bootable          Impact  Install-type  Reason

------  --------  --------------  ------------  ------

1       yes      disruptive         reset  default upgrade is not hitless

Images will be upgraded according to following table:

Module       Image                  Running-Version(pri:alt)           New-Version  Upg-Required

------  ----------  -------------------------------------------------------------

1        nxos                                   9.3(11)                              10.2(5)           yes

1        bios     v05.47(04/28/2022):v05.42(06/14/2020)    v05.47(04/28/2022)            no

Additional info for this installation:

--------------------------------------

Service "vpc" in vdc 1: Vpc is enabled, Please make sure both Vpc peer switches have same boot mode using 'show boot mode' and proceed

Switch will be reloaded for disruptive upgrade.

Do you want to continue with the installation (y/n)?  [n] y

ステップ 10：Cisco Nexusスイッチでステータスがアクティブになるまで待ちます。

1. show moduleコマンドを使用します。

N9K-2(config)# show module

Mod Ports             Module-Type                      Model           Status

--- ----- ------------------------------------- --------------------- ---------

1    54   24x10/25G/32G + 6x40/100G Ethernet/FC N9K-C93180YC-FX-24    active *

Mod  Sw                       Hw    Slot

---  ----------------------- ------ ----

1    9.3(11)                  1.0    NA

Mod  MAC-Address(es)                         Serial-Num

---  --------------------------------------  ----------

1    f8-a7-3a-nn-nn-nn to f8-a7-3a-n1-n1-n1  98765432109

Mod  Online Diag Status

---  ------------------

1    Pass

* this terminal session

ステップ 11キープアライブ、ピアリンク、およびvPCポートチャネルがアップ状態であることを確認します。

1. show vpcコマンドを使用します。

N9K-1(config)# show vpc

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 1

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : primary

Number of vPCs configured         : 2

Peer Gateway                      : Enabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Disabled

Delay-restore status              : Timer is off.(timeout = 30s)

Delay-restore SVI status          : Timer is off.(timeout = 10s)

Operational Layer3 Peer-router    : Enabled

Virtual-peerlink mode             : Disabled

vPC Peer-link status

-----------------------------------------------------------------

id    Port   Status Active vlans

--    ----   ------ -------------------------------------------------

1     Po1    up     1

vPC status

-----------------------------------------------------------------

Id    Port          Status Consistency Reason                Active vlans

--    ------------  ------ ----------- ------  ---------------

50    Po50          up     success     success               1

60    Po60          up     success     success               1

N9K-2(config)# show vpc

Legend:

(*) - local vPC is down, forwarding via vPC peer-link

vPC domain id                     : 1

Peer status                       : peer adjacency formed ok

vPC keep-alive status             : peer is alive

Configuration consistency status  : success

Per-vlan consistency status       : success

Type-2 consistency status         : success

vPC role                          : secondary

Number of vPCs configured         : 2

Peer Gateway                      : Enabled

Dual-active excluded VLANs        : -

Graceful Consistency Check        : Enabled

Auto-recovery status              : Disabled

Delay-restore status              : Timer is off.(timeout = 30s)

Delay-restore SVI status          : Timer is off.(timeout = 10s)

Operational Layer3 Peer-router    : Enabled

Virtual-peerlink mode             : Disabled

vPC Peer-link status

---------------------------------------------------------------------

id    Port   Status Active vlans

--    ----   ------ -------------------------------------------------

1     Po1    up     1

vPC status

----------------------------------------------------------------------------

Id    Port          Status Consistency Reason                Active vlans

--    ------------  ------ ----------- ------                ---------------

50    Po50          up     success     success               1

60    Po60          up     success     success               1

関連情報

- シスコのテクニカルサポートとダウンロード