内容

概要

前提条件

要件

使用するコンポーネント

表記法

背景説明

設定

設定

確認

トラブルシュート

関連情報

概要

このドキュメントでは、Nexus 5000シリーズスイッチでジャンボ最大伝送ユニット(MTU)パケットを設定する際に発生する問題について説明します。

前提条件

確認

要件

このドキュメントに特有の要件はありません。

使用するコンポーネント

このドキュメントの情報は、次のシリーズのNexusスイッチに基づくものです。

- Nexus 5020

- NX-OS バージョン 4.1(3)N2(1a)

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。本稼働中のネットワークでは、各コマンドによって起こる可能性がある影響を十分確認してください。

表記法

ドキュメント表記の詳細については、『シスコ テクニカル ティップスの表記法』を参照してください。

背景説明

このドキュメントでは、Nexus 5000シリーズスイッチでジャンボパケットを使用する必要がある場合に発生する問題について説明します。ここで説明するシナリオは、Nexus 5000またはNexus 7000スイッチの間でジャンボパケットを転送しようとするときに発生する可能性があります。

設定

パケット損失は、2台のNexus 5000スイッチ間、またはNexus 5000スイッチとNexus 7000スイッチ間で発生する可能性があります。

パケット サイズ 9216 バイトでホストに ping すると、50 % のパケット損失が発生することがあります。

Nexus-5000#ping 172.16.0.1 packet-size 9216 count 20

PING 172.16.0.1 (172.16.0.1): 9216 data bytes

9224 bytes from 172.16.0.1: icmp_seq=0 ttl=254 time=6.094 ms

Request 1 timed out

9224 bytes from 172.16.0.1: icmp_seq=2 ttl=254 time=5.507 ms

Request 3 timed out

9224 bytes from 172.16.0.1: icmp_seq=4 ttl=254 time=5.529 ms

Request 5 timed out

9224 bytes from 172.16.0.1: icmp_seq=6 ttl=254 time=10.09 ms

Request 7 timed out

9224 bytes from 172.16.0.1: icmp_seq=8 ttl=254 time=5.597 ms

Request 9 timed out

9224 bytes from 172.16.0.1: icmp_seq=10 ttl=254 time=5.497 ms

Request 11 timed out

9224 bytes from 172.16.0.1: icmp_seq=12 ttl=254 time=5.491 ms

Request 13 timed out

9224 bytes from 172.16.0.1: icmp_seq=14 ttl=254 time=5.555 ms

Request 15 timed out

9224 bytes from 172.16.0.1: icmp_seq=16 ttl=254 time=6.021 ms

Request 17 timed out

9224 bytes from 172.16.0.1: icmp_seq=18 ttl=254 time=5.51 ms

--- 172.16.0.1 ping statistics ---

20 packets transmitted, 10 packets received, 50.00% packet loss

round-trip min/avg/max = 5.491/6.089/10.09 ms

設定

ジャンボパケットがNexus 5020とNexus 7010を通過する必要がある場合は、Nexus 5020でポリシーマップを設定し、  system jumbomtu size 統合します。

Nexus 5020 でポリシーマップを設定するには、次の手順を実行します。

Nexus-5020

!--- You can enable the Jumbo MTU for the whole switch by setting the MTU to its maximum size (9216 bytes)

!--- in the policy map for the default Ethernet system class (class-default).

switch(config)#policy-map type network-qos jumbo

switch(config-pmap-nq)#class type network-qos class-default

switch(config-pmap-c-nq)#mtu 9216

switch(config-pmap-c-nq)#exit

switch(config-pmap-nq)#exit

switch(config)#system qos

switch(config-sys-qos)#service-policy type network-qos jumbo

詳細については、『Cisco Nexus 5000シリーズNX-OSレイヤ2スイッチングコンフィギュレーションガイド、リリース4.2(1)N1(1)』を参照してください。

Nexus-7010 スイッチでジャンボ フレームを設定するには、次の手順を実行します。

Nexus-7010

!--- Set the MTU to its maximum size (9216 bytes) in order to enable the Jumbo MTU for the whole switch.

switch(config)#system jumbomtu 9216

!--- Set the MTU specification for an interface.

switch(config)#interface ethernet x/x

!--- By default, Cisco NX-OS configures Layer 3 parameters. In order to configure Layer 2 parameters, use this command.

switch(config-if)#switchport

switch(config-if)#mtu 9216

switch(config-if)#exit

確認

確認するには、1500バイトを超えるパケットサイズでpingを実行できます。Ping -l 9000 x.x.x.x。

show interface ethernet port/slot  コマンドを発行して、ジャンボフレームが設定されているかどうかを確認します。

Nexus 5000で、  show queuing interface ethernet 1/1  コマンドにより、WLC CLI で明確に示されます。

Nexus5000#show queuing interface ethernet 1/1

Ethernet1/1 queuing information:

TX Queuing

qos-group  sched-type  oper-bandwidth

0       WRR             50

1       WRR             50

RX Queuing

qos-group 0

q-size: 243200, HW MTU: 9280 (9216 configured)

Nexus 7000で、  show interface ethernet 1/9  コマンドにより、WLC CLI で明確に示されます。

Nexus-7010#show interface ethernet 1/9

Ethernet1/9 is up

Hardware: 10000 Ethernet, address: 0000.0000.0000 (bia 0000.0000.0000)

MTU 9216 bytes, BW 10000000 Kbit, DLY 10 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA

Port mode is access

full-duplex, 10 Gb/s, media type is 10g

Beacon is turned off

Auto-Negotiation is turned off

Input flow-control is off, output flow-control is off

Rate mode is dedicated

Switchport monitor is off

Last link flapped 00:57:24

Last clearing of "show interface" counters 00:56:14

30 seconds input rate 0 bits/sec, 0 packets/sec

30 seconds output rate 360 bits/sec, 0 packets/sec

Load-Interval #2: 5 minute (300 seconds)

input rate 0 bps, 0 pps; output rate 448 bps, 0 pps

RX

5894254 unicast packets  0 multicast packets  0 broadcast packets

5894254 input packets  29108950332 bytes

0 jumbo packets  0 storm suppression packets

0 runts  0 giants  0 CRC  0 no buffer

0 input error  0 short frame  0 overrun   0 underrun  0 ignored

0 watchdog  0 bad etype drop  0 bad proto drop  0 if down drop

0 input with dribble  0 input discard

0 Rx pause

TX

5894228 unicast packets  2225 multicast packets  0 broadcast packets

5896453 output packets  29109001641 bytes

0 jumbo packets

0 output error  0 collision  0 deferred  0 late collision

0 lost carrier  0 no carrier  0 babble

0 Tx pause

0 interface resets

注：Nexus 7000シリーズのジャンボカウンタはサポートされておらず、TxおよびRxフレームにはヌル値が表示されますが、MTUサイズをメモすると、設定されたジャンボフレームが表示されます。

トラブルシュート

現在、この設定のトラブルシューティングに使用できる情報はありません。

関連情報

- Cisco Nexus 5000 Series Switches

- Cisco Nexus 7000 シリーズ スイッチのサポート ページ

- シスコテクニカルサポートおよびダウンロード