内容

概要

前提条件

要件

使用するコンポーネント

表記法

背景理論

Link Aggregation Control Protocol（LACP）と Port Aggregation Protocol（PAgP）

PAgP モードと LACP モード

PAgP の制限

Dynamic Trunking Protocol（DTP; ダイナミック トランキング プロトコル）

設定

ネットワーク図

設定

確認

LACP 設定での show の出力例

PAgP 設定での show の出力例

トラブルシュート

関連情報

概要

このドキュメントでは、Catalyst Layer 2（L2）固定構成スイッチ（2950/2955/2970/2940/2900XL/3500XL スイッチ）と、Catalyst OS（CatOS）が動作する Catalyst 4500/4000 スイッチの間のトランク リンクである EtherChannel リンクのセットアップに関する設定例とコマンド構文について説明します。 このシナリオで、Catalyst L2 固定構成スイッチと、CatOS が動作する Catalyst 4500/4000、5500/5000、または 6500/6000 シリーズ スイッチを設定しても、同じ結果を得ることができます。最近のネットワークでのファスト イーサネットの普及に伴い、設定例ではファスト イーサネットを使用します。この例では、各スイッチの 2 つのファスト イーサネット ポートを 1 つの Fast EtherChannel（FEC）にバンドルし、FEC の上で IEEE 802.1Q（dot1q）トランキングを設定します。

前提条件

要件

このドキュメントで使用する「EtherChannel」という用語は、FEC、Gigabit EtherChannel（GEC）、ポート チャネル、チャネル、およびポート グループを指しています。スイッチでの EtherChannel の設定方法の詳細については、次のドキュメントを参照してください。

- Catalyst 4000 スイッチでの Fast EtherChannel と Gigabit EtherChannel の設定

- Catalyst 2950 スイッチでの EtherChannel の設定

- Catalyst 2950/2955 スイッチでの EtherChannel の設定

- Catalyst 2970 スイッチでの EtherChannel の設定

- Catalyst 2940 スイッチでの EtherChannel の設定

- Catalyst 2900XL/3500XL スイッチと CatOS スイッチ間の EtherChannel の設定

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

- Cisco IOS®ソフトウェアリリース12.1(6)EA2cが稼働するCatalyst 2950

- Cisco IOS ソフトウェア リリース 12.1(12c)EA1 が稼働する Catalyst 2955

- Cisco IOS ソフトウェア リリース 12.1(22)EA1 が稼働する Catalyst 2940

- Cisco IOS ソフトウェア リリース 12.1(19)EA1c が稼働する Catalyst 2970

- Cisco IOS ソフトウェア リリース 12.0(5)WC9 が稼働する Catalyst 2900XL/3500XL

- CatOS バージョン 8.4.1 が稼働する Catalyst 4000

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

表記法

ドキュメント表記の詳細は、「シスコ テクニカル ティップスの表記法」を参照してください。

背景理論

Catalyst L2 固定構成スイッチと CatOS（Catalyst 4003/4006/2948G/2980G）が稼働する任意の Catalyst 4500/4000 ファミリ製品を使用する場合、スイッチでは dot1q トランキング カプセル化だけがサポートされることに注意してください。他の Catalyst プラットフォームでは、dot1q とスイッチ間リンク プロトコル（ISL）の両方がサポートされます。 dot1q は IEEE 標準ですが、ISL は Cisco 独自の形式です。ISL トランキング カプセル化をサポートできるのは、Cisco ハードウェアだけです。Catalyst 5500/5000 または 6500/6000 など別の Cisco スイッチング プラットフォームを使用する場合、どのトランキング方法がサポートされるか判別するには、次のコマンドを使用します。

- show port capabilities mod/port

特定のポートや、特定のポートの機能の詳細（dot1q、ISL、およびポート チャネルなど,）については、次を参照してください。

- show port capabilities

Link Aggregation Control Protocol（LACP）と Port Aggregation Protocol（PAgP）

EtherChannel は、Port Aggregation Protocol（PAgP; ポート集約プロトコル）または Link Aggregation Control Protocol（LACP）を使用して自動的に設定されます。 EtherChannels を手作業で設定することもできます。PAgP はシスコ独自のプロトコルであり、シスコ製のスイッチと、PAgP をサポートするライセンスを許可されたベンダー製のスイッチだけで使用できます。LACP は IEEE 802.3ad で定義されています。シスコ製のスイッチで LACP を使用すると、802.3ad プロトコルに準拠したスイッチ間のイーサネット チャネルを管理できます。1 つチャネルでは最大 16 個のポートを設定できます。そのうち 8 個のポートはアクティブ モードになり、残り 8 個のポートはスタンバイ モードになります。アクティブ ポートのいずれかに障害が発生した場合は、スタンバイ ポートがアクティブになります。スタンバイ モードは LACP のみで機能し、PAgP では機能しません。

これらのプロトコルのいずれかを使用すると、PAgP または LACP のいずれかをサポートできるパートナーの識別情報と各インターフェイスの機能がスイッチによって学習されます。次に、スイッチは同様の設定を持つインターフェイスを1つの論理リンク（チャネルまたは集約ポート）に動的にグループ化します。スイッチは、ハードウェア、管理、およびポートパラメータの制約に基づいて、これらのインターフェイスグループをベースにしています。たとえば、PAgP では、速度、デュプレックス モード、ネイティブ VLAN、VLAN 範囲、およびトランキングの状態とタイプなどが同一のインターフェイスがグループ化されます。PAgP では、EtherChannel へのリンクがグループ化されると、このグループが単一のスイッチ ポートとしてスパニング ツリーに追加されます。

最大 300 のアクセス ポイント グループ

LACP サポート

LACP をサポートする最小バージョン

PAgP サポート

PAgP をサポートする最小バージョン

Catalyst 2940

Yes

Cisco IOS ソフトウェア リリース 12.1(19)EA1

Yes

Cisco IOS ソフトウェア リリース 12.1(13)AY

Catalyst 2950

Yes

Cisco IOS ソフトウェア リリース 12.1(14)EA1

Yes

Cisco IOS ソフトウェア リリース 12.0(5.2)WC(1)

Catalyst 2955

Yes

Cisco IOS ソフトウェア リリース 12.1(14)EA1

Yes

Cisco IOS ソフトウェア リリース 12.1(12c)EA1

Catalyst 2970

Yes

Cisco IOS ソフトウェア リリース 12.2(18)SE

Yes

Cisco IOS ソフトウェア リリース 12.1(11)AX

Catalyst 2900XL

No

—

No

—

Catalyst 3500XL

No

—

No

—

PAgP モードと LACP モード

このセクションでは、channel-group インターフェイス設定コマンドでユーザ設定が可能な EtherChannel のモードを示しています。スイッチのインターフェイスでは、auto モードか desirable モード設定のパートナー インターフェイスとだけ PAgP パケットが交換されます。スイッチのインターフェイスは、アクティブ モードまたはパッシブ モード設定のパートナー インターフェイスとだけ LACP パケットを交換します。オン モード設定のインターフェイスは PAgP パケットも LACP パケットも交換しません。

- active：インターフェイスをアクティブなネゴシエーション状態にします。この状態のインターフェイスは、LACPパケットの送信を通じて他のインターフェイスとのネゴシエーションを開始します。

- auto：インターフェイスをパッシブネゴシエーション状態にします。この状態のインターフェイスは、受信したPAgPパケットに応答しますが、PAgPパケットネゴシエーションは開始しません。この設定では PAgP パケットの転送量が最も少なくなります。

- desirable：インターフェイスをアクティブなネゴシエーション状態にします。この状態のインターフェイスは、PAgPパケットの送信を通じて他のインターフェイスとのネゴシエーションを開始します。

- オン：この状態のインターフェイスは PAgP パケットも LACP パケットも交換しない EtherChannel になります。オン モードでは、オン モードの 2 つのインターフェイス グループが相互に接続されている場合にだけ、使用可能な EtherChannel が存在します。

- パッシブ：インターフェイスをパッシブのネゴシエーション状態にします。この状態のインターフェイスは受信した LACP パケットに応答しますが、LACP パケットのネゴシエーションは開始しません。この設定によると LACP パケットの転送量が最も少なくなります。

次の表で示すように、LACP リンク集約を実行する有効な組み合わせは 3 つだけです。

最大 300 のアクセス ポイント グループ

最大 300 のアクセス ポイント グループ

注

active

active

推奨

active

受動的な

ネゴシエーションが成功すると、リンク集約が成立します。

日付：

日付：

LACP を使用せずにリンク集約が成立します。これは動作しますが、この組合せは推奨されません。

注：デフォルトでは、LACPチャネルの設定では、LACPチャネルモードはパッシブです。

PAgP の制限

PAgP は、FEC リンクの自動作成を支援します。チャネルの構成をネゴシエートするために、FEC 対応のポート間で PAgP パケットが伝送されます。PAgP には意図的に制限が設けられています。制約事項は以下のとおりです。

- PAgP では、ダイナミック VLAN 用に設定されたポートにバンドルが構成されることはありません。PAgP では、チャネルのすべてのポートが同じ VLAN に属すか、ポートにトランク ポートが設定されている必要があります。バンドルがすでに存在し、ポートの VLAN が変更された場合、バンドル内のすべてのポートがその VLAN に対応するよう変更されます。

- PAgP は、異なる速度またはポート デュプレックスで動作しているポートをグループ化しません。バンドルが存在する状態で速度とデュプレックスを変更すると、PAgP によりバンドル内のすべてのポートのポート速度とデュプレックスが変更されます。

- PAgP モードは、off、auto、desirable、および on です。auto-desirable、desirable-desirable、および on-on の組み合わせでのみ、チャネルの形成が可能です。ルータなど、チャネルの一方のデバイスで PAgP がサポートされていない場合、もう一方のデバイスでは PAgP が on に設定されている必要があります。Catalyst 2950 スイッチでは、Cisco IOS ソフトウェア リリース 12.1(6)EA2 以降で、チャネル ネゴシエーション用に PAgP がサポートされています。Cisco IOS ソフトウェア リリース 12.0 では、スタティック設定だけがサポートされています。PAgP プロトコル チャネル ネゴシエーションは、CatOS が稼働するすべての Catalyst スイッチでサポートされています。

Dynamic Trunking Protocol（DTP; ダイナミック トランキング プロトコル）

トランキング プロトコルにはさまざまなタイプがあります。ポートをトランクにできる場合、自動的にトランクする機能があることになります。場合によっては、そのポートで使用するトランキングのタイプをネゴシエートできることもあります。他のデバイスとトランキング方式をネゴシエートするこの機能は Dynamic Trunking Protocol（DTP）という名前です。

Catalyst 2950 スイッチでは、Cisco IOS ソフトウェア リリース 12.1(6)EA2 以降で、ダイナミック トランキングのための DTP がサポートされています。Cisco IOS ソフトウェア リリース 12.0 では、スタティック設定だけがサポートされています。CatOS が稼働するすべての Catalyst スイッチで、DTP がサポートされています。

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注：この文書で使用されているコマンドの詳細を調べるには、「Command Lookup ツール」を使用してください（登録ユーザのみ）。

ネットワーク図

このドキュメントでは、次のネットワーク セットアップを使用します。

設定

このドキュメントでは、次の構成を使用します。

- CatOS が稼働する Catalyst 4000 上の LACP

- Cisco IOS ソフトウェアが稼働する Catalyst L2 固定構成スイッチ上の LACP

- Cisco IOS ソフトウェアが稼働する Catalyst L2 固定構成スイッチ上の PAgP

- CatOS が稼働する Catalyst 4000 上の PAgP

CatOS が稼働する Catalyst 4000 上での LACP の設定

Catalyst 4000

Cat4003 (enable) show channelprotocol

Channel

Module Protocol

------- --------

2       PAGP

Cat4003 (enable)

!--- By default, all ports on a Catalyst 4500/4000 use channel protocol PAgP. !--- So, to run LACP, you must change the channel protocol to LACP. On switches !--- that run CatOS, you can only change the channel mode per module. In this !--- example, the command set channelprotocol lacp module_number !--- changes the channel mode for slot 2. Use the show channelprotocol command to !--- verify the changes.

Cat4003 (enable) set channelprotocol lacp 2

Mod 2 is set to LACP protocol.

Cat4003 (enable)

Cat4003 (enable) set port lacp-channel 2/1-2

Port(s) 2/1-2 are assigned to admin key 80.

Cat4003 (enable)

!--- There is a parameter exchange in the LACP packet. The parameter is !--- the admin key. A channel can only form between ports that have !--- the same admin key. In this example, both ports have assignment to the same group. !--- (The random assignment is admin key 80.) !--- Keep in mind that the admin key is only locally significant. In other words, !--- the admin key must be the same only for ports within the switch and is not a factor !--- between different switches.

Cat4003 (enable) set port lacp-channel 2/1-2 mode active

Port(s) 2/1-2 channel mode set to active.

Cat4003 (enable)

To form the channel change the LACP channel mode

to active state on one or both of the sides.

Cat4003 (enable) set trunk 2/1 desirable dot1q

Port(s) 2/1-2 trunk mode set to desirable.

Port(s) 2/1-2 trunk type set to dot1q.

Cat4003 (enable)

!--- Configure the ports to the desirable trunk mode that makes the ports actively !--- attempt to convert the link to a trunk link. The ports become trunk ports if !--- the neighbor ports are in on, desirable, or auto mode.

Cat4003 (enable) show config

This command shows non-default configurations only.

Use 'show config all' to show both default and non-default configurations.

.................

.............................

..

begin

!--- Output suppressed.

#channelprotocol

set channelprotocol lacp 2

!

#port channel

set port lacp-channel 2/1-2 80

!

!--- Output suppressed.

#module 2 : 48-port 10/100/1000 Ethernet

set trunk 2/1 desirable dot1q 1-1005,1025-4094

set trunk 2/2 desirable dot1q 1-1005,1025-4094

!

!--- Output suppressed.

Cisco IOS ソフトウェアが稼働する Catalyst L2 固定構成スイッチ上での LACP の設定

L2 固定構成スイッチ プラットフォームの設定コマンドは、どのプラットフォームでも同じです。ドキュメントを適切な長さに収めるために、このドキュメントでは 1 つのプラットフォーム（Catalyst 2955）に対する設定のみを示しています。 ただし、すべての L2 固定構成スイッチ プラットフォームで、すべてのコマンドのテストが実施済みです。

Catalyst L2 固定構成スイッチ

CAT2955# configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

CAT2955(config)# interface fastethernet 0/9

CAT2955(config-if)# channel-group 1 mode active

Creating a port-channel interface Port-channel 1

Assign the interface to a channel group, and specify the LACP mode.

CAT2955(config-if)#

6d08h: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet0/9,changed state to down

6d08h: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet0/9,changed state to up

6d08h: %LINK-3-UPDOWN: Interface Port-channel1, changed state to up

6d08h: %LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1,changed state to up

CAT2955(config-if)# interface fastethernet 0/10

CAT2955(config-if)# channel-group 1 mode active

CAT2955(config-if)#

6d08h: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet0/10,changed state to down

6d08h: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet0/10,changed state to up

CAT2955(config-if)# interface port-channel 1

CAT2955(config-if)# switchport mode trunk

Configuring the port channel interface to be a trunk pulls fa 0/9-10 in.

CAT2955(config-if)# ^Z

CAT2955# show run

6d08h: %SYS-5-CONFIG_I: Configured from console by consolerun

Building configuration...

!--- Output suppressed.

!

interface Port-channel1

switchport mode trunk

no ip address

flowcontrol send off

fcs-threshold 0

!

!--- Output suppressed.

interface FastEthernet0/9

switchport mode trunk

no ip address

channel-group 1 mode active

!

interface FastEthernet0/10

switchport mode trunk

no ip address

channel-group 1 mode active

!

!--- Output suppressed.

end

CAT2955#

Cisco IOS ソフトウェアが稼働する Catalyst L2 固定構成スイッチ上での PAgP の設定

Catalyst L2 固定構成スイッチ

5-2950# configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

5-2950(config)# interface fastethernet0/1

5-2950(config-if)# channel-group 1 mode desirable

Creating a port-channel interface Port-channel1

!--- The software dynamically creates the port channel interface.

5-2950(config-if)#

*Mar 16 13:50:56.185: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet0/1, changed

state to down

*Mar 16 13:50:57.013: %EC-5-BUNDLE: Interface Fa0/1 joined port-channel Po1

*Mar 16 13:50:58.053: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet0/1, changed

state to up

*Mar 16 13:50:59.021: %LINK-3-UPDOWN: Interface Port-channel1, changed state to up

*Mar 16 13:51:00.021: %LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1, changed

state to up

5-2950(config-if)#

5-2950(config)# interface fastethernet0/2

5-2950(config-if)# channel-group 1 mode desirable

5-2950(config-if)#

5-2950(config-if)# interface port-channel 1

!--- Configuration of the port channel interface to be a trunk !--- pulls in Fast Ethernet 0/1 and 0/2.

5-2950(config-if)# switchport mode trunk

*Mar 14 15:31:13.428: %DTP-5-TRUNKPORTON: Port Fa0/1 has become dot1q trunk

*Mar 14 15:31:14.880: %EC-5-BUNDLE: Interface Fa0/1 joined port-channel Po1

*Mar 14 15:31:14.908: %EC-5-UNBUNDLE: Interface Fa0/2 left the port-channel Po1

*Mar 14 15:31:14.944: %EC-5-BUNDLE: Interface Fa0/2 joined port-channel Po1

*Mar 14 15:31:15.908: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet0/1, changed

state to up

5-2950# show run

Building configuration...

Current configuration : 1608 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log datetime msec localtime

no service password-encryption

!

hostname 5-2950

!

!

clock timezone PST -8

ip subnet-zero

no ip finger

no ip domain-lookup

cluster enable SWITCH 0

!

!

!

interface Port-channel 1

!--- This is the port channel interface where you configure trunking that !--- the members of the channel group inherit.

switchport mode trunk

!

interface FastEthernet0/1

switchport mode trunk

channel-group 1 mode desirable

!--- Here, the channel group corresponds with interface port-channel 1.

!

interface FastEthernet0/2

switchport mode trunk

channel-group 1 mode desirable

!--- Here, the channel group corresponds with interface port-channel 1.

!

interface FastEthernet0/3

!

interface FastEthernet0/4

!

interface FastEthernet0/5

!

interface FastEthernet0/6

!

interface FastEthernet0/7

!

CatOS が稼働する Catalyst 4000 上での PAgP の設定

Catalyst 4000 スイッチ

Console> (enable) set port channel 2/19-20 mode desirable

Port(s) 2/19-20 channel mode set to desirable.

Console> (enable) 2003 Jan 08 11:40:14 %PAGP-5-PORTFROMSTP:Port 2/19 left bridge port 2/19

2003 Jan 08 11:40:14 %PAGP-5-PORTFROMSTP:Port 2/20 left bridge port 2/20

2003 Jan 08 11:40:18 %PAGP-5-PORTTOSTP:Port 2/19 joined bridge port 2/19

2003 Jan 08 11:40:18 %PAGP-5-PORTTOSTP:Port 2/20 joined bridge port 2/20

Console> (enable) set trunk 2/19 desirable

!--- The set of the trunk on the first port of the channel !--- dynamically trunks all channel ports.

Port(s) 2/19-20 trunk mode set to desirable.

!

Console> (enable)

!--- The dot1q trunk adopts the port VLAN assignment (VLAN 1 by default) !--- as the native VLAN. If this switch were a Catalyst 5500/5000 or 6500/6000 switch !--- (which also supports ISL trunking), you would specify dot1q encapsulation here. !--- The Catalyst 2950 only supports dot1q.

確認

ここでは、設定が正しく機能していることを確認するために使用する情報を示します。

一部の show コマンドはアウトプット インタープリタ ツールによってサポートされています（登録ユーザ専用）。このツールを使用することによって、show コマンド出力の分析結果を表示できます。 L2 固定構成スイッチ プラットフォーム上での show コマンドは同じでも、出力形式が異なる場合があります。

LACP 設定での show の出力例

Catalyst 2955 スイッチ

CAT2955# show etherchannel summary

Flags:  D - down        P - in port-channel

I - stand-alone s - suspended

H - Hot-standby (LACP only)

R - Layer3      S - Layer2

u - unsuitable for bundling

U - in use      f - failed to allocate aggregator

d - default port

Number of channel-groups in use: 1

Number of aggregators: 1

Group Port-channel Protocol Ports

------+-------------+-----------+-----------------------------------------------

1 Po1(SU) LACP Fa0/9(P) Fa0/10(Pd)

CAT2955#

CAT2955# show interfaces fastethernet 0/9 switchport

Name: Fa0/9

Switchport: Enabled

Administrative Mode: trunk

Operational Mode: trunk (member of bundle Po1)

Administrative Trunking Encapsulation: dot1q

Operational Trunking Encapsulation: dot1q

Negotiation of Trunking: On

Access Mode VLAN: 1 (default)

Trunking Native Mode VLAN: 1 (default)

Administrative private-vlan host-association: none

Administrative private-vlan mapping: none

Operational private-vlan: none

Trunking VLANs Enabled: ALL

Pruning VLANs Enabled: 2-1001

Protected: false

Voice VLAN: none (Inactive)

Appliance trust: none

Catalyst 4000 スイッチ

Cat4003 (enable) show lacp

Channel Id   Ports

-----------  -----------------------------------------------

417          2/1-2

Cat4003 (enable) show lacp-channel 417

Channel Ports                                          Status     Channel

id                                                                Mode

------- ---------------------------------------------- ---------- --------------

417 2/1-2                                          connected  active

Cat4003 (enable)

Cat4003 (enable) show trunk

* - indicates vtp domain mismatch

# - indicates dot1q-all-tagged enabled on the port

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

2/1      desirable    dot1q          trunking      1

2/2      desirable    dot1q          trunking      1

Port Vlans allowed on trunk

-------- ---------------------------------------------------------------------

2/1 1-1005,1025-4094

2/2 1-1005,1025-4094

Port Vlans allowed and active in management domain

-------- ---------------------------------------------------------------------

2/1 1,10

2/2 1,10

Port Vlans in spanning tree forwarding state and not pruned

-------- ---------------------------------------------------------------------

2/1 1,10

2/2 1,10

Cat4003 (enable)

PAgP 設定での show の出力例

Catalyst 2950 スイッチ

5-2950# show etherchannel summary

Flags:  D - down        P - in port-channel

I - stand-alone s - suspended

R - Layer3      S - Layer2

U - port-channel in use

Group Port-channel  Ports

-----+------------+-----------------------------------------------------------

1     Po6(SU)     Fa0/1(P)   Fa0/2(P)

5-2950# show interface fastethernet0/1 switchport

Name: Fa0/1

Switchport: Enabled

Administrative Mode: trunk

Operational Mode: trunk (member of bundle Po6)

Administrative Trunking Encapsulation: dot1q

Operational Trunking Encapsulation: dot1q

Negotiation of Trunking: On

Access Mode VLAN: 1 (default)

Trunking Native Mode VLAN: 1 (default)

!--- This line shows that the trunk link is up.

Trunking VLANs Enabled: ALL

!--- This line shows that all VLANs trunk.

Pruning VLANs Enabled: 2-1001

Protected: false

Voice VLAN: none (Inactive)

Appliance trust: none

Catalyst 4000 スイッチ

Console> show port channel

Port  Status     Channel Admin       Ch Mode Group Id

----- ---------- -------------------- -----   -----

2/19 connected  desirable silent      174     815

2/20 connected  desirable silent      174     815

----- ---------- -------------------- ----- -----

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

2/19 5-2950                          Fa0/1                     cisco WS-C2950-24

2/20 5-2950                          Fa0/2                     cisco WS-C2950-24

----- ------------------------------- ------------------------- ----------------

Console> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

2/19     desirable    dot1q          trunking      1

2/20     desirable    dot1q          trunking      1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

2/19     1-1005

2/20     1-1005

Port      Vlans allowed and active in management domain

--------  ---------------------------------------------------------------------

2/19     1,100,300,350,450

2/20     1,100,300,350,450

Port      Vlans in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

2/19     1,100,300,350,450

2/20     1,100,300,350,450

Console> (enable)

トラブルシュート

現在、この設定に関する特定のトラブルシューティング情報はありません。

関連情報

- EtherChannel 設定時の注意事項 スイッチポートの設定

- Catalyst 2950 デスクトップ スイッチ ソフトウェア コンフィギュレーション ガイド、12.1(6)EA2c

- ソフトウェア コンフィギュレーション ガイド（5.5）

- LAN 製品に関するサポート ページ

- LAN スイッチングに関するサポート ページ

- テクニカルサポート - Cisco Systems