内容

概要

前提条件

要件

使用するコンポーネント

表記法

背景説明

設定

ネットワーク図

設定

確認

関連情報

概要

このドキュメントでは、Catalyst 3750 シリーズ スイッチでの Cisco EnergyWise 機能の設定と確認の例を示します。具体的には、Catalyst 3750 スイッチに Cisco EnergyWise 機能を設定する方法を説明します。

前提条件

要件

この設定を行う前に、以下の要件を満たしていることを確認してください。

- Cisco Catalyst 3750 シリーズ スイッチの設定に関する基本的な知識がある。

- Cisco EnergyWise の機能に関して基本を理解している。

使用するコンポーネント

このドキュメントの情報は、Cisco Catalyst 3750 シリーズ スイッチに基づくものです。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

表記法

ドキュメント表記の詳細については、『シスコ テクニカル ティップスの表記法』を参照してください。

背景説明

Cisco EnergyWise は、IT インフラストラクチャ全体で電力を監視および制御できるようにする電力管理機能です。Cisco EnergyWise は、ネットワーク自体がすべてのデバイス タイプに電力管理を可能にするフレームワークを提供します。

Cisco EnergyWise ドメインとは、電力を監視および管理するためにデバイスを管理グループに分けたものです。EnergyWise SDK クライアントをサポートする Cisco EnergyWise エンドポイントが、Cisco EnergyWise プロトコルを使用して管理アプリケーションまたは他のドメイン メンバーから開始された EnergyWise クエリに応答します。

設定

この項では、このドキュメントで説明している Cisco EnergyWise の機能を設定するのに必要な情報を提供します。

注：このセクションで使用されるコマンドの詳細を調べるには、Command Lookup Tool(登録ユーザ専用)を使用してください。

ネットワーク図

このドキュメントでは、次のネットワーク セットアップを使用します。

設定

このドキュメントでは、次の構成を使用します。

Catalyst 3750 スイッチ

configure terminal

!--- Enable Cisco EnergyWise on supported platforms.

Switch(config)#energywise domain Cisco security shared-secret 0 cisco protocol

udp port 43440 ip 10.78.4.48

!--- Set the EnergyWise importance for the platform.

Switch(config)#energywise importance 80

!--- Set the EnergyWise keywords for the platform.

Switch(config)#energywise keywords lab1,lab2

Switch(config)#service password-encryption

!--- Enable communication between management applications which support EnergyWise protocol and domain.

Switch(config)#energywise management security shared-secret 7 070C285F4D06 port 60500

!--- Set the EnergyWise name for the platform.

Switch(config)#energywise name floor.lab

!--- Configure a static neighbor.

Switch(config)#energywise neighbor 2.2.4.31 43440

!--- Set the EnergyWise role for the platform.

Switch(config)#energywise role access4lab1

Switch(config)#energywise allow query save

!--- Configure Cisco EnergyWise on a port.

Switch(config)#time-range onlabfloor

Switch(config-time-range)#absolute start 00:00 01 January 2012 end 23:59 01 Jan 2012

Switch(config-time-range)#periodic weekdays 7:00 to 19:00

Switch(config-time-range)#periodic weekend 10:00 to 17:00

Switch(config)#time-range offlabfloor

Switch(config-time-range)#absolute start 00:00 01 January 2012 end 23:59 01 Jan 2012

Switch(config-time-range)#periodic weekdays 00:00 to 08:00

Switch(config-time-range)#periodic weekdays 20:00 to 23:59

Switch(config-time-range)#periodic weekend 00:00 to 10:00

Switch(config-time-range)#periodic weekend 17:00 to 23:59

Switch(config)#interface fastEthernet 1/0/3

!--- Configure a recurring event on the interface.

Switch(config-if)#energywise level 10 recurrence importance 80 time-range onlabfloor

Switch(config-if)#energywise level 0 recurrence importance 80 time-range offlabfloor

Switch(config-if)#energywise name IP_phone

Switch(config-if)#energywise role manager

Switch(config-if)#end

!--- Save the configurations in the device.

switch(config)#copy running-config startup-config

Switch(config)#exit

確認

ここでは、設定が正常に機能しているかどうかを確認します。

アウトプット インタープリタ ツール（登録ユーザ専用）（OIT）は、特定の show コマンドをサポートします。OIT を使用して、show コマンドの出力の分析を表示します。

EnergyWise の設定とステータスを表示するには、show energywise コマンドを使用します。

以下に、いくつかの例を示します。

Switch#show energywise

Module/

Interface   Role              Name                  Usage      Lvl   Imp  Type

---------   ----              ----                  -----      ---   ---  ----

access4lab1       Switch                45.0  (W)  10    80   parent

接続されたエンドポイントのステータスを表示するには、show energywise children コマンドを使用します。

以下に、いくつかの例を示します。

Switch#show energywise children

Module/

Interface   Role              Name                  Usage      Lvl   Imp  Type

---------   ----              ----                  -----      ---   ---  ----

access4lab1       Switch                45.0  (W)  10    80   parent

Fa1/0/3     IP Phone 7975     SEP0022905B90D4       12.0  (W)  10    1    PoE

Total Displayed: 2      Usage: 143.3

スイッチおよび接続されたエンドポイントの EnergyWise 情報の概要を表示するには、show energywise children provisioned コマンドを使用します。

以下に、いくつかの例を示します。

Switch#show energywise children provisioned

Module/

Interface   Role              Name                  Usage      Lvl   Imp  Type

---------   ----              ----                  -----      ---   ---  ----

access4lab1       Switch                45.0  (W)  10    80   parent

Fa1/0/1     interface         Fa0.5                 0.0   (W)  10    1    PoE

Fa1/0/2     interface         Fa0.5                 0.0   (W)  10    1    PoE

Fa1/0/3     IP Phone 7975     SEP0022905B90D4       12.0  (W)  10    1    PoE

Fa1/0/4     interface         Fa0.5                 0.0   (W)  10    1    PoE

<output truncated>

Total Displayed: 24     Usage: 139.9

EnergyWise ドメイン情報を表示するには、show energywise domain コマンドを使用します。

以下に、いくつかの例を示します。

Switch#show energywise domain

Name      : Switch

Domain    : Cisco

Protocol  : udp

IP        : 10.78.4.48

Port      : 43440

ドメイン メンバーおよび接続されたエンドポイントの実際の電力を表示するには、show energywise usage children コマンドを使用します。

以下に、いくつかの例を示します。

Switch#show energywise usage children

Interface   Name                     Usage      Caliber

---------   ----                     _____      _____

Switch                   45.0  (W)   max

Fa1/0/1     Fa1.0.1                  0.0   (W)   presumed

Fa1/0/2     Fa1.0.2                  0.0   (W)   presumed

Fa1/0/3     SEP0022905B90D4          12.0  (W)   trusted

Fa1/0/2     Fa1.0.4                  0.0   (W)   presumed

<output truncated>

Total Displayed: 24     Usage: 139.9

スイッチのネイバー テーブルを表示するには、show energywise neighbors コマンドを使用します。

以下に、いくつかの例を示します。

Switch#show energywise neighbors

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater, P - Phone, U - Unknown

Id   Neighbor Name                 Ip:Port                 Prot   Capability

--   -------------                 -------                 ----   ----------

1                                  10.78.4.49:43440        static U

2    IP_phone A                    10.78.4.50:43440        udp    U

3    3560e-37-222                  20.1.2.222:6767         cdp    S I

ドメイン メンバーの実際の電力レベルを表示するには、show energywise level current コマンドを使用します。energywise level level recurrence importance importance time-range time-range-name グローバル設定コマンドを使用すると、show energywise level current の出力が次の例のように表示されます。

以下に、いくつかの例を示します。

Switch#show energywise level current

Interface   Name                     Level  Value

---------   ----                     -----  -----

Switch                   10     45.0  (W)

繰り返しイベントに関する EnergyWise の設定およびステータスを表示するには、show energywise recurrences コマンドを使用します。

以下に、いくつかの例を示します。

Switch#show energywise recurrences

Id     Addr       Class Action Lvl Cron/Time-range

--     ----       ----- ------ --- ---------------

1      Fa2/0/3    QUERY SET    10  onlabfloor

2      Fa2/0/3    QUERY SET     0  offlabfloor

イベントおよびエラーのカウンターを表示するには、show energywise statistics コマンドを使用します。

以下に、いくつかの例を示します。

Switch#show energywise statistics

Children:  2  Errors:  0  Drops:  31  Events:  102

関連情報

- Cisco Catalyst 3750 シリーズ スイッチのサポート ページ

- スイッチ製品に関するサポート ページ

- LAN スイッチング テクノロジーに関するサポート ページ

- テクニカル サポートとドキュメント – Cisco Systems