内容

はじめに

問題

解決方法

はじめに

このドキュメントでは、ISE分散導入でコンテキストの可視性のリセットと同期を実行する方法について説明します。

問題

Context Visibility GUIのロードが失敗してエラーメッセージ「Unable to load Context Visibility page」が表示されるか、ダッシュボードカウンタが空の場合は、この手順を実行することをお勧めします。MACアドレスの追加が失敗し、エラー「Unable to create the endpoint, Endpoint XX:XX:XX:XX:XX already exists.これは、コンテキストの可視性データベースがそのエンドポイントのOracleデータベースと同期していないときに発生します。

このドキュメントでは、ISE分散導入でコンテキストの可視性のリセットと同期を実行してこれらの問題を解決する方法について説明します。

解決方法

コンソールまたはSSH経由でプライマリ管理ノードに接続し（一部の出力は簡略化のために省略）、application configure iseコマンドを実行した後、オプション[20] Reset Context Visibility'を実行してyに進みます。 最後の質問には返信しないでください。

primary-node/admin# application configure ise

Selection configuration option

~

[20]Reset Context Visibility

[21]Synchronize Context Visibility With Database

~

20

This will remove all data from Context Visibility. Do you want to proceed [y/n]: y

Checking ISE persona

- Done

Reset of indexing engine on this node needs to be run only after running it on Secondary Admin Node(secondary-node)

Is reset indexing engine started on Secondary Admin Node(secondary-node) [ Y/N ] :

最後の質問に対する応答がない場合は、SSHを開くか、セカンダリ管理ノードにコンソール接続して、コマンドapplication configure iseを実行し、続いてオプション[20] Reset Context Visibilityを実行して、yに進むことを同意します。最後の質問に対する応答は行いません。

secondary-node/admin# application configure ise

Selection configuration option

~

[20]Reset Context Visibility

[21]Synchronize Context Visibility With Database

~

20

This will remove all data from Context Visibility. Do you want to proceed [y/n]: y

Checking ISE persona

- Done

Stopping monit services

- Done

Stopping ISE indexing engine

- Done

Unzip and making changes to vcs jar

- Done

Modifying ISE indexing engine configuration

- Done

Starting ISE indexing engine

- Done

Performing reset of ISE indexing engine

- Done

Stopping ISE indexing engine

- Done

Removing backup of vcs jar

- Done

Reverting changes to ISE indexing engine configuration

- Done

Please proceed with running reset indexing engine on Primary Admin Node(primary-node) now. Once reset finishes on Primary Admin Node, please come back and press Y here

Is reset indexing engine done on Primary Admin Node(primary-node) [ Y/N ] :

最後の質問に対する応答がない状態で、プライマリ管理ノードのSSHまたはコンソールでYを使用して続行します。

Is reset indexing engine started on Secondary Admin Node(secondary-node) [ Y/N ] :Y

Verifying ISE indexing engine services on Secondary Admin Node

- Done

Stopping monit services

- Done

Stopping ISE indexing engine

- Done

Unzip and making changes to vcs jar

- Done

Modifying ISE indexing engine configuration

- Done

Starting ISE indexing engine

- Done

Performing reset of ISE indexing engine

- Done

Stopping ISE indexing engine

- Done

Removing backup of vcs jar

- Done

Reverting changes to ISE indexing engine configuration

- Done

Starting ISE indexing engine

- Done

Starting monit services

- Done

Reset of indexing engine on this node is complete. Please proceed with remaining steps on Secondary Admin Node(secondary-node)

Reset of Context Visibility is successful on this node

[0]設定メニューを終了し、セカンダリ管理ノードのSSHまたはコンソールでYを使用して続行します。

Is reset indexing engine done on Primary Admin Node(primary-node) [ Y/N ] :Y

Verifying ISE indexing engine services on Primary Admin Node

- Done

Starting ISE indexing engine

- Done

Starting monit services

- Done

Reset of Context Visibility is successful on this node

[0]設定メニューを終了します。

両方のノードで実行されたコンテキストの可視性のリセット後、プライマリ管理ノードで同期に進みます。

primary-node/admin# application configure ise

Selection configuration option

~

[20]Reset Context Visibility

[21]Synchronize Context Visibility With Database

~

21

This will synchronize Context Visibility with database. Do you want to proceed [y/n]: y

Copying files

- Done

Changing permissions

- Done

Exporting endpoints from database

- Done

Importing endpoints into context visibility

- Done

Synchronization of Context Visibility with Oracle is successful

[0]設定メニューを終了します。

両方の管理ノードでインデックスエンジンが実行されていることを確認します。

primary-node/admin# show application status ise

ISE PROCESS NAME STATE PROCESS ID

--------------------------------------------------------------------

Database Listener running 3010

Database Server running 80 PROCESSES

Application Server running 8877

Profiler Database running 5420

ISE Indexing Engine running 13865

AD Connector running 11922

M&T Session Database running 5322

M&T Log Collector running 9019

M&T Log Processor running 8927

Certificate Authority Service disabled

EST Service disabled

SXP Engine Service disabled

Docker Daemon running 11469

TC-NAC Service disabled

Wifi Setup Helper Container disabled

pxGrid Infrastructure Service disabled

pxGrid Publisher Subscriber Service disabled

pxGrid Connection Manager disabled

pxGrid Controller disabled

PassiveID WMI Service disabled

PassiveID Syslog Service disabled

PassiveID API Service disabled

PassiveID Agent Service disabled

PassiveID Endpoint Service disabled

PassiveID SPAN Service disabled

DHCP Server (dhcpd) disabled

DNS Server (named) disabled