内容

概要

前提条件

要件

使用するコンポーネント

表記法

背景説明

設定

ネットワーク図

Microsoft L2TP クライアントの設定

PIX ファイアウォールの証明書の取得

PIX ファイアウォールの設定

確認

トラブルシュート

トラブルシューティングのためのコマンド

debug 出力例

CA での登録の正常なデバッグ

CA での登録に関する正常でないデバッグ

関連情報

概要

Layer 2 Tunneling Protocol（L2TP）over IPsec は、Cisco Secure PIX ファイアウォール ソフトウェア リリース 6.x 以降でサポートされています。Windows 2000 が稼働しているユーザでは、ネイティブの IPsec クライアントと L2TP クライアントを使用して、PIX ファイアウォールへの L2TP トンネルを確立できます。トラフィックは IPsec Security Association（SA; セキュリティ アソシエーション）によって暗号化されて L2TP トンネルを流れます。

注：Windows 2000 L2TP IPsecクライアントを使用してPIXにTelnet接続することはできません。

注：スプリットトンネリングは、PIXのL2TPでは使用できません。

ユーザ認証に Microsoft Windows 2003 Internet Authentication Service（IAS）RADIUS サーバと事前共有キーを使用して、リモートの Microsoft Windows 2000/2003 および XP のクライアントから PIX/ASA セキュリティ アプライアンス企業オフィスへの L2TP over IPsec を設定するには、『事前共有キーを使用した Windows 2000/XP PC と PIX/ASA 7.2 の間の L2TP Over IPsec 設定例』を参照してください。

暗号化方式を使用して、リモートの Microsoft Windows 2000 および XP のクライアントから企業サイトへの L2TP over IPsec を設定するには、『Windows 2000 または XP のクライアントから Cisco VPN 3000 シリーズ コンセントレータへの事前共有キーを使用する L2TP over IPSec の設定』を参照してください。

前提条件

要件

このドキュメントに特有の要件はありません。

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに適用されます。

- PIX ソフトウェア リリース 6.3(3)

- Windows 2000（SP2がインストールされている場合とインストールされていない場合）(SP1に関する情報は、Microsoftのヒント Q276360を参照してください)。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

表記法

ドキュメント表記の詳細は、『シスコ テクニカル ティップスの表記法』を参照してください。

背景説明

Cisco Secure PIX バージョン 6.x 以降では、Baltimore、Microsoft、VeriSign、および Entrust サーバの証明書がサポートされています。現在 PIX では、IPsec で保護されていない L2TP 要求は許可されません。

この例では、前述のシナリオを実現するための PIX ファイアウォールの設定方法を示します。Internet Key Exchange（IKE; インターネット キー エクスチェンジ）認証には rsa-sig コマンドを使用します（証明書）。 RADIUS サーバによって認証が行われます。

PIX に対する暗号化クライアント接続にあまり関係しないオプションについては、『IPSec/PPTP/L2TP をサポートするシスコ ハードウェアと VPN クライアント』を参照してください。

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注： このドキュメントで使用されているコマンドの詳細を調べるには、Command Lookup Tool（登録ユーザ専用）を使用してください。

ネットワーク図

このドキュメントでは、次のネットワーク セットアップを使用します。

Microsoft L2TP クライアントの設定

Microsoft L2TP クライアントの設定方法の詳細については、『Step-by-Step Guide to Internet Protocol Security』を参照してください。

このドキュメントに記されているとおり、このクライアントでは多数のテスト済み Certificate Authority（CA; 認証局）サーバがサポートされています。Microsoft CA の設定方法の詳細については、『Step-by-Step Guide to Setting up a Certificate Authority』を参照してください。

PIX ファイアウォールの証明書の取得

VeriSign、Entrust、Baltimore、および Microsoft の証明書との相互運用性を実現する PIX の設定方法については、『CA のコンフィギュレーション例』を参照してください。

PIX ファイアウォールの設定

このドキュメントでは次の設定を使用します。

PIX ファイアウォール

PIX Version 6.3(3)

nameif ethernet0 outside security0

nameif ethernet1 inside security100

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname PIX-506-2

domain-name sjvpn.com

fixup protocol ftp 21

fixup protocol http 80

fixup protocol h323 1720

fixup protocol rsh 514

fixup protocol smtp 25

fixup protocol sqlnet 1521

fixup protocol sip 5060

fixup protocol skinny 2000

names

!--- Access Control List (ACL) configured to bypass !--- Network Address Translation (NAT) for the L2TP IP pool.

access-list nonat permit ip 20.1.1.0 255.255.255.0 50.1.1.0 255.255.255.0

!--- ACL configured to permit L2TP traffic (UDP port 1701).

access-list l2tp permit udp host 171.68.9.57 any eq 1701

no pager

logging on

logging console debugging

logging buffered debugging

interface ethernet0 10baset

interface ethernet1 10baset

mtu outside 1500

mtu inside 1500

ip address outside 171.68.9.57 255.255.255.0

ip address inside 20.1.1.1 255.255.255.0

ip audit info action alarm

ip audit attack action alarm

!--- Pool for L2TP address assignment.

ip local pool l2tp 50.1.1.1-50.1.1.5

pdm history enable

arp timeout 14400

!--- NAT configuration that matches previously defined !--- ACL for the L2TP IP pool.

nat (inside) 0 access-list nonat

route outside 0.0.0.0 0.0.0.0 171.68.9.1 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h323

0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

!--- AAA (RADIUS) server configuration.

aaa-server RADIUS (inside) host 20.1.1.2 cisco timeout 5

no snmp-server location

no snmp-server contact

snmp-server community public

no snmp-server enable traps

floodguard enable

!--- sysopt command entry to permit L2TP !--- traffic, while bypassing all ACLs.

sysopt connection permit-l2tp

no sysopt route dnat

!--- The IPsec configuration.

crypto ipsec transform-set l2tp esp-des esp-md5-hmac

!--- Only transport mode is supported.

crypto ipsec transform-set l2tp mode transport

crypto ipsec security-association lifetime seconds 3600

crypto dynamic-map dyna 20 match address l2tp

crypto dynamic-map dyna 20 set transform-set l2tp

crypto map mymap 10 ipsec-isakmp dynamic dyna

crypto map mymap client authentication RADIUS

crypto map mymap interface outside

!--- The IKE configuration.

isakmp enable outside

isakmp policy 20 authentication rsa-sig

isakmp policy 20 encryption des

isakmp policy 20 hash md5

isakmp policy 20 group 1

isakmp policy 20 lifetime 86400

ca identity sjvpn 171.68.9.149:/certsrv/mscep/mscep.dll

ca configure sjvpn ra 1 20 crloptional

telnet 171.68.9.0 255.255.255.0 inside

telnet 20.1.1.2 255.255.255.255 inside

telnet timeout 60

ssh timeout 5

!--- The L2TP configuration parameters.

vpdn group l2tpipsec accept dialin l2tp

vpdn group l2tpipsec ppp authentication chap

vpdn group l2tpipsec ppp authentication mschap

vpdn group l2tpipsec client configuration address local l2tp

vpdn group l2tpipsec client configuration dns 20.1.1.250 20.1.1.251

vpdn group l2tpipsec client configuration wins 20.1.1.250

vpdn group l2tpipsec client authentication aaa RADIUS

vpdn group l2tpipsec client accounting RADIUS

vpdn group l2tpipsec l2tp tunnel hello 60

vpdn enable outside

terminal width 80

Cryptochecksum:06a53009d1e9f04740256d9f0fb82837

: end

[OK]

確認

ここでは、設定が正常に機能しているかどうかを確認します。

アウトプット インタープリタ ツール（登録ユーザ専用）（OIT）は、特定の show コマンドをサポートします。OIT を使用して、show コマンドの出力の分析を表示します。

- show crypto ca cert：証明書、CAの証明書、および登録局(RA)証明書に関する情報を表示します。

Certificate

Status: Available

Certificate Serial Number: 03716308000000000022

Key Usage: General Purpose

Subject Name

Name: PIX-506-2.sjvpn.com

Validity Date:

start date: 16:29:10 Apr 27 2001

end date: 16:39:10 Apr 27 2002

RA Signature Certificate

Status: Available

Certificate Serial Number: 0347dc82000000000002

Key Usage: Signature

CN = scott

OU = tac

O = cisco

L = san jose

ST = ca

C = US

EA =<16> zaahmed@cisco.com

Validity Date:

start date: 18:47:45 Jul 27 2000

end date: 18:57:45 Jul 27 2001

CA Certificate

Status: Available

Certificate Serial Number: 1102485095cbf8b3415b2e96e86800d1

Key Usage: Signature

CN = zakca

OU = vpn

O = cisco

L = sj

ST = california

C = US

EA =<16> zaahmed@cisco.com

Validity Date:

start date: 03:15:09 Jul 27 2000

end date: 03:23:48 Jul 27 2002

RA KeyEncipher Certificate

Status: Available

Certificate Serial Number: 0347df0d000000000003

Key Usage: Encryption

CN = scott

OU = tac

O = cisco

L = san jose

ST = ca

C = US

EA =<16> zaahmed@cisco.com

Validity Date:

start date: 18:47:46 Jul 27 2000

end date: 18:57:46 Jul 27 2001

- show crypto isakmp sa：現在ピアにあるすべての IKE SA を表示します。

dst src state pending created

171.68.9.57 171.68.9.149 QM_IDLE 0 1

- show crypto ipsec sa：現在の SA で使用されている設定を表示します。

interface: outside

Crypto map tag: mymap, local addr. 171.68.9.57

local ident (addr/mask/prot/port): (171.68.9.57/255.255.255.255/17/1701)

remote ident (addr/mask/prot/port): (171.68.9.149/255.255.255.255/17/1701)

current_peer: 171.68.9.149

dynamic allocated peer ip: 0.0.0.0

PERMIT, flags={reassembly_needed,transport_parent,}

#pkts encaps: 20, #pkts encrypt: 20, #pkts digest 20

#pkts decaps: 45, #pkts decrypt: 45, #pkts verify 45

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0, #pkts decompress failed: 0

#send errors 0, #recv errors 0

local crypto endpt.: 171.68.9.57, remote crypto endpt.: 171.68.9.149

path mtu 1500, ipsec overhead 36, media mtu 1500

current outbound spi: a8c54ec8

inbound esp sas:

spi: 0xfbc9db43(4224310083)

transform: esp-des esp-md5-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 1, crypto map: mymap

sa timing: remaining key lifetime (k/sec): (99994/807)

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0xa8c54ec8(2831503048)

transform: esp-des esp-md5-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 2, crypto map: mymap

sa timing: remaining key lifetime (k/sec): (99999/807)

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

- show vpdn tunnel：仮想プライベートダイヤルアップネットワーク(VPDN)内のアクティブなL2TPまたはLevel 2 Forwarding(L2F)トンネルに関する情報を表示します。

L2TP Tunnel Information (Total tunnels=1 sessions=1)

Tunnel id 4 is up, remote id is 19, 1 active sessions

Tunnel state is established, time since change 96 secs

Remote Internet Address 171.68.9.149, port 1701

Local Internet Address 171.68.9.57, port 1701

15 packets sent, 38 received, 420 bytes sent, 3758 received

Control Ns 3, Nr 5

Local RWS 16, Remote RWS 8

Retransmission time 1, max 1 seconds

Unsent queuesize 0, max 0

Resend queuesize 0, max 1

Total resends 0, ZLB ACKs 3

Retransmit time distribution: 0 0 0 0 0 0 0 0 0

% No active PPTP tunnels

PIX-506-2# sh uauth

Current Most Seen

Authenticated Users 1 2

Authen In Progress 0 2

vpdn user 'vpnclient' at 50.1.1.1, authenticated

- show vpdn session:VPDN内のアクティブなL2TPまたはL2Fセッションに関する情報を表示します。

L2TP Session Information (Total tunnels=1 sessions=1)

Call id 4 is up on tunnel id 4

Remote tunnel name is zaahmed-pc

Internet Address is 171.68.9.149

Session username is vpnclient, state is established

Time since change 201 secs, interface outside

Remote call id is 1

PPP interface id is 1

15 packets sent, 56 received, 420 bytes sent, 5702 received

Sequencing is off

- show vpdn pppinterface:show vpdn sessionコマンドのインターフェイス識別値に関して、PPTPトンネル用に作成されたPPP仮想インターフェイスのステータスと統計情報を表示します。

PPP virtual interface id = 1

PPP authentication protocol is CHAP

Client ip address is 50.1.1.1

Transmitted Pkts: 15, Received Pkts: 56, Error Pkts: 0

MPPE key strength is None

MPPE_Encrypt_Pkts: 0, MPPE_Encrypt_Bytes: 0

MPPE_Decrypt_Pkts: 0, MPPE_Decrypt_Bytes: 0

Rcvd_Out_Of_Seq_MPPE_Pkts: 0

- show uauth：現在のユーザの認証および許可情報を表示します。

Current Most Seen

Authenticated Users 1 2

Authen In Progress 0 2

vpdn user 'vpnclient' at 50.1.1.1, authenticated

トラブルシュート

ここでは、設定のトラブルシューティングに使用できる情報を示します。

トラブルシューティングのためのコマンド

アウトプット インタープリタ ツール（登録ユーザ専用）（OIT）は、特定の show コマンドをサポートします。OIT を使用して、show コマンドの出力の分析を表示します。

注：debug コマンドを使用する前に、『debug コマンドの重要な情報』を参照してください。

- debug crypto ipsec：IPsec イベントを表示します。

- debug crypto isakmp：IKE イベントに関するメッセージを表示します。

- debug crypto engine：暗号化と復号化を行う暗号化エンジンに関するデバッグ メッセージを表示します。

- debug ppp io:PPTP PPP仮想インターフェイスのパケット情報を表示します。

- debug crypto ca:CAと交換されたデバッグメッセージを表示します。

- debug ppp error ：PPP 接続のネゴシエーションと操作に関するプロトコル エラーとエラー統計情報を表示します。

- debug vpdn errors：PPP トンネルの確立を阻害するエラー、または確立されたトンネルをクローズする原因になるエラーを表示します。

- debug vpdn packet:VPDNの通常のトンネル確立またはシャットダウンの一部であるL2TPエラーとイベントを表示します。

- debug vpdn event：通常のPPPトンネル確立またはシャットダウンの一部であるイベントに関するメッセージを表示します。

- debug ppp uauth:PPTP PPP仮想インターフェイスAAAユーザ認証デバッグメッセージを表示します。

debug 出力例

PIX ファイアウォールの正常な状態のデバッグ例を示します。

crypto_isakmp_process_block: src 171.68.9.149, dest 171.68.9.57

ISAKMP: Created a peer node for 171.68.9.149

OAK_MM exchange

ISAKMP (0): processing SA payload. message ID = 0

ISAKMP (0): Checking ISAKMP transform 1 against priority 20 policy

ISAKMP: encryption DES-CBC

ISAKMP: hash MD5

ISAKMP: default group 1

ISAKMP: auth RSA sig

ISAKMP: life type in seconds

ISAKMP: life duration (VPI) of 0x0 0x0 0xe 0x10

ISAKMP (0): atts are acceptable. Next payload is 0

ISAKMP (0): processing vendor id payload

ISAKMP (0): speaking to a MSWIN2K client

ISAKMP (0): SA is doing RSA signature authentication using id type ID_FQDN

return status is IKMP_NO_ERROR

crypto_isakmp_process_block: src 171.68.9.149, dest 171.68.9.57

OAK_MM exchange

ISAKMP (0): processing KE payload. message ID = 0

ISAKMP (0): processing NONCE payload. message ID = 0

return status is IKMP_NO_ERROR

crypto_isakmp_process_block: src 171.68.9.149, dest 171.68.9.57

OAK_MM exchange

ISAKMP (0): processing ID payload. message ID = 0

ISAKMP (0): processing CERT payload. message ID = 0

ISAKMP (0): processing a CT_X509_SIGNATURE cert

CRYPTO_PKI: status = 0: crl check ignored

PKI: key process suspended and continued

CRYPTO_PKI: WARNING: Certificate, private key or CRL was not found

while selecting CRL

CRYPTO_PKI: cert revocation status unknown.

ISAKMP (0): cert approved with warning

ISAKMP (0): processing SIG payload. message ID = 0

ISAKMP (0): processing CERT_REQ payload. message ID = 0

ISAKMP (0): peer wants a CT_X509_SIGNATURE cert

ISAKMP (0): SA has been authenticated

ISAKMP (0): ID payload

next-payload : 6

type : 2

protocol : 17

port : 500

length : 23

ISAKMP (0): Total payload length: 27

return status is IKMP_NO_ERROR

crypto_isakmp_process_block: src 171.68.9.149, dest 171.68.9.57

OAK_QM exchange

oakley_process_quick_mode:

OAK_QM_IDLE

ISAKMP (0): processing SA payload. message ID = 3800855889

ISAKMP : Checking IPSec proposal 1

ISAKMP: transform 1, ESP_DES

ISAKMP: attributes in transform:

ISAKMP: SA life type in seconds

ISAKMP: SA life duration (VPI) of 0x0 0x0 0x3 0x84

ISAKMP: SA life type in kilobytes

ISAKMP: SA life duration (VPI) of 0x0 0x1 0x86 0xa0

ISAKMP: encaps is 2

ISAKMP: authenticator is HMAC-MD5

ISAKMP (0): atts are acceptable.IPSEC(validate_proposal_request): proposal part #1,

(key eng. msg.) dest= 171.68.9.57, src= 171.68.9.149,

dest_proxy= 171.68.9.57/255.255.255.255/17/1701 (type=1),

src_proxy= 171.68.9.149/255.255.255.255/17/1701 (type=1),

protocol= ESP, transform= esp-des esp-md5-hmac ,

lifedur= 0s and 0kb,

spi= 0x0(0), conn_id= 0, keysize= 0, flags= 0x0

ISAKMP (0): processing NONCE payload. message ID = 3800855889

ISAKMP (0): processing ID payload. message ID = 3800855889

ISAKMP (0): ID_IPV4_ADDR src 171.68.9.149 prot 17 port 1701

ISAKMP (0): processing ID payload. message ID = 3800855889

ISAKMP (0): ID_IPV4_ADDR dst 171.68.9.57 prot 17 port 1701IPSEC(key_engine):

got a queue event...

IPSEC(spi_response): getting spi 0xfbc9db43(4224310083) for SA

from 171.68.9.149 to 171.68.9.57 for prot 3

return status is IKMP_NO_ERROR

crypto_isakmp_process_block: src 171.68.9.149, dest 171.68.9.57

OAK_QM exchange

oakley_process_quick_mode:

OAK_QM_AUTH_AWAIT

ISAKMP (0): Creating IPSec SAs

inbound SA from 171.68.9.149 to 171.68.9.57 (proxy 171.68.9.149 to 171.68.9.57)

has spi 4224310083 and conn_id 1 and flags 0

lifetime of 900 seconds

lifetime of 100000 kilobytes

outbound SA from 171.68.9.57 to 171.68.9.149 (proxy 171.68.9.57 to 171.68.9.149)

has spi 2831503048 and conn_id 2 and flags 0

lifetime of 900 seconds

lifetime of 100000 kilobytesIPSEC(key_engine): got a queue event...

IPSEC(initialize_sas): ,

(key eng. msg.) dest= 171.68.9.57, src= 171.68.9.149,

dest_proxy= 171.68.9.57/0.0.0.0/17/1701 (type=1),

src_proxy= 171.68.9.149/0.0.0.0/17/1701 (type=1),

protocol= ESP, transform= esp-des esp-md5-hmac ,

lifedur= 900s and 100000kb,

spi= 0xfbc9db43(4224310083), conn_id= 1, keysize= 0, flags= 0x0

IPSEC(initialize_sas): ,

(key eng. msg.) src= 171.68.9.57, dest= 171.68.9.149,

src_proxy= 171.68.9.57/0.0.0.0/17/1701 (type=1),

dest_proxy= 171.68.9.149/0.0.0.0/17/1701 (type=1),

protocol= ESP, transform= esp-des esp-md5-hmac ,

lifedur= 900s and 100000kb,

spi= 0xa8c54ec8(2831503048), conn_id= 2, keysize= 0, flags= 0x0

return status is IKMP_NO_ERROR

show log

603102: PPP virtual interface 1 - user: vpnclient aaa authentication started

603103: PPP virtual interface 1 - user: vpnclient aaa authentication succeed

109011: Authen Session Start: user 'vpnclient', sid 0

603106: L2TP Tunnel created, tunnel_id is 1, remote_peer_ip is 171.68.9.149

ppp_virtual_interface_id is 1, client_dynamic_ip is 50.1.1.1

username is vpnclient

CA での登録の正常なデバッグ

CI thread sleeps!

Crypto CA thread wakes up!%

% Start certificate enrollment ..

% The subject name in the certificate will be: PIX-506-2.sjvpn.com

CI thread wakes up!% Certificate request sent to Certificate Authority

% The certificate request fingerprint will be displayed.

PIX-506-2(config)#

PIX-506-2(config)#     Fingerprint:  d8475977 7198ef1f 17086f56 9e3f7a89

CRYPTO_PKI: transaction PKCSReq completed

CRYPTO_PKI: status:

Crypto CA thread sleeps!

PKI: key process suspended and continued

CRYPTO_PKI: http connection opened

CRYPTO_PKI:  received msg of 711 bytes

CRYPTO_PKI: WARNING: Certificate, private key or CRL was not found

while selecting CRL

CRYPTO_PKI: signed attr: pki-message-type:

13 01 33

CRYPTO_PKI: signed attr: pki-status:

13 01 33

CRYPTO_PKI: signed attr: pki-recipient-nonce:

04 10 70 0d 4e e8 03 09 71 4e c8 24 7a 2b 03 70 55 97

CRYPTO_PKI: signed attr: pki-transaction-id:

13 20 65 66 31 32 32 31 30 33 31 37 30 61 30 38 65 32 33 38

38 35 61 36 30 65 32 35 31 31 34 66 62 37

CRYPTO_PKI: status = 102: certificate request pending

CRYPTO_PKI: http connection opened

CRYPTO_PKI:  received msg of 711 bytes

CRYPTO_PKI: WARNING: Certificate, private key or CRL was not found

while selecting CRL

CRYPTO_PKI: signed attr: pki-message-type:

13 01 33

CRYPTO_PKI: signed attr: pki-status:

13 01 33

CRYPTO_PKI: signed attr: pki-recipient-nonce:

04 10 c8 9f 97 4d 88 24 92 a5 3b ba 9e bc d6 7c 75 57

CRYPTO_PKI: signed attr: pki-transaction-id:

13 20 65 66 31 32 32 31 30 33 31 37 30 61 30 38 65 32 33 38

38 35 61 36 30 65 32 35 31 31 34 66 62 37

CRYPTO_PKI: status = 102: certificate request pending

!--- After approval from CA.

Crypto CA thread wakes up!

CRYPTO_PKI: resend GetCertInitial, 1

Crypto CA thread sleeps!

CRYPTO_PKI: resend GetCertInitial for session: 0

CRYPTO_PKI: http connection opened

The certificate has been granted by CA!

CRYPTO_PKI:  received msg of 1990 bytes

CRYPTO_PKI: WARNING: Certificate, private key or CRL was not found

while selecting CRL

PKI: key process suspended and continued

CRYPTO_PKI: signed attr: pki-message-type:

13 01 33

CRYPTO_PKI: signed attr: pki-status:

13 01 30

CRYPTO_PKI: signed attr: pki-recipient-nonce:

04 10 c8 9f 97 4d 88 24 92 a5 3b ba 9e bc d6 7c 75 57

CRYPTO_PKI: signed attr: pki-transaction-id:

13 20 65 66 31 32 32 31 30 33 31 37 30 61 30 38 65 32 33 38

38 35 61 36 30 65 32 35 31 31 34 66 62 37

CRYPTO_PKI: status = 100: certificate is granted

CRYPTO_PKI: WARNING: Certificate, private key or CRL was not found

while selecting CRL

CRYPTO_PKI: All enrollment requests completed.

CRYPTO_PKI: All enrollment requests completed.

CRYPTO_PKI: WARNING: Certificate, private key or CRL was not found

while selecting CRL

CA での登録に関する正常でないデバッグ

この例では、ca identity コマンドで誤った URL 構文が使用されています。

CI thread sleeps!

Crypto CA thread wakes up!

CRYPTO_PKI: http connection opened

msgsym(GETCARACERT, CRYPTO)!

%Error in connection to Certificate Authority: status = FAIL

CRYPTO_PKI: status = 266: failed to verify

CRYPTO_PKI: transaction GetCACert completed

Crypto CA thread sleeps!

登録モードに RA ではなく CA が指定されたため、デバッグ結果が次のようになりました。

CI thread sleeps!

Crypto CA thread wakes up!

CRYPTO_PKI: http connection opened

Certificate has the following attributes:

Fingerprint: 49dc7b2a cd5fc573 6c774840 e58cf178

CRYPTO_PKI: transaction GetCACert completed

CRYPTO_PKI: Error:  Invalid format for BER encoding while

CRYPTO_PKI: can not set ca cert object.

CRYPTO_PKI: status = 65535: failed to process RA certiifcate

Crypto CA thread sleeps!

この例では、mode transport コマンドがありません。

ISAKMP:      SA life type in seconds

ISAKMP:      SA life duration (VPI) of  0x0 0x0 0x70 0x80

ISAKMP:      SA life type in kilobytes

ISAKMP:      SA life duration (VPI) of  0x0 0x46 0x50 0x0

ISAKMP:      encaps is 2

ISAKMP:      authenticator is HMAC-MD5IPSEC(validate_proposal):

invalid transform proposal flags -- 0x0

この例では、crypto map mymap 10 ipsec-isakmp dynamic dyna コマンドがないために、デバッグで次のようなメッセージが表示されています。

no IPSEC cryptomap exists for local address a.b.c.d

関連情報

- RADIUS に関するサポート ページ

- PIX コマンド リファレンス

- PIX に関するサポート ページ

- IPSec ネゴシエーション/IKE プロトコルに関するサポート ページ

- Requests for Comments (RFCs)