内容

概要

はじめに

表記法

前提条件

使用するコンポーネント

ネットワーク図

Microsoft Windows 2000 Server とシスコ デバイスを連携させるための設定

実行されるタスク

手順ごとの説明

Ciscoデバイスの設定

Cisco 3640 ルータの設定

PIX の設定

VPN 3000 コンセントレータの設定

VPN 5000 コンセントレータの設定

確認

トラブルシュート

トラブルシューティングのためのコマンド

関連情報

概要

このドキュメントでは、2 つのプライベート ネットワークに参加するための、事前共有キーを使用した IPSec トンネルを構成する方法を示します。シスコ デバイス内部のプライベート ネットワーク（192.168.l.X）内部および Microsoft 2000 Server 内部のプライベート ネットワーク（10.32.50.X）。シスコ デバイス内部と 2000 Server 内部からのインターネットへのトラフィック（ここでは 172.18.124.X ネットワークで表します）は、この設定を開始する前から流れているものと想定します。

Microsoft Windows 2000 Server 設定に関する詳細情報は、次の Microsoft ウェブ サイトにあります。http://support.microsoft.com/support/kb/articles/Q252/7/35.ASP

はじめに

表記法

ドキュメント表記の詳細は、『シスコ テクニカル ティップスの表記法』を参照してください。

前提条件

このドキュメントに関しては個別の前提条件はありません。

使用するコンポーネント

この構成は、次のソフトウェアとハードウェアのバージョンを使用して開発およびテストされています。

- Microsoft Windows 2000 Server 5.00.2195

- Cisco 3640 ルータと Cisco IOS(R) Software リリース c3640-ik2o3s-mz.121-5.T.bin

- Cisco Secure PIX Firewall と PIX Software リリース 5.2.1

- Cisco VPN 3000 コンセントレータ と VPN 3000 コンセントレータ ソフトウェア バージョン 2.5.2.F

- Cisco VPN 5000 コンセントレータ と VPN 5000 コンセントレータ ソフトウェア バージョン 5.2.19

このマニュアルの情報は、特定のラボ環境に置かれたデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。実稼動中のネットワークで作業をしている場合、実際にコマンドを使用する前に、その潜在的な影響について理解しておく必要があります。

ネットワーク図

このドキュメントでは次の図に示すネットワーク構成を使用しています。

Microsoft Windows 2000 Server とシスコ デバイスを連携させるための設定

実行されるタスク

次の図は、Microsoft Windows 2000 サーバの設定で実行するタスクを示しています。

手順ごとの説明

MicrosoftのWebサイトで設定の手順に従った 、次の手順を使用して、設定がシスコデバイスで動作することを確認します。コメントと変更が、スクリーン キャプチャとともに示されています。

1. Microsoft Windows 2000 Server の [スタート] > [実行] > [secpol.msc] をクリックして、次の画面で情報を検証します。

Microsoft ウェブ サイトの手順を使用して 2000 サーバを設定した後で、次のトンネル情報が表示されています。

注：例のルールは「to_cisco」と呼ばれます。

2. このルールの例には、2つのフィルタが含まれています。Microsoft-CiscoおよびCisco-Microsoft

3. Cisco-Microsoft IP Security Ruleを選択し、Editをクリックして、IPフィルタリストを表示/追加/編集します。

4. ルールの[一般] > [詳細] タブには IKE ライフタイム（480 分 = 28800 秒）が表示されています。

5. ルールの [一般] > [詳細] > [方式] タブには IKE 暗号化方式（DES）、IKE ハッシング（SHA1）、および Diffie-Helman グループ（Low(1)）が表示されています。

6. 各フィルタには、5 つのタブがあります。

1. 認証方式（IKE の事前共有キー）

2. 接続タイプ(LAN):

3. フィルタの動作（IPSec）

[フィルタの動作] > [IPSec トンネル] > [編集] > [編集]を選択して、[カスタム]をクリックします。

[設定値] - [IPSec トランスフォーム] と [IPSec ライフタイム] をクリックします。

4. IPフィルタリスト – 暗号化する送信元および宛先ネットワーク：

Cisco-Microsoftの場合：

Microsoft-Cisco:

5. トンネルの設定値：暗号化ピア

Cisco-Microsoftの場合：

Microsoft-Cisco:

Ciscoデバイスの設定

次の例に示すように、Ciscoルータ、PIX、およびVPNコンセントレータを設定します。

- Cisco 3640 ルータ

- PIX

- VPN 3000 コンセントレータ

- VPN 5000 コンセントレータ

Cisco 3640 ルータの設定

Cisco 3640 ルータ

Current configuration : 1840 bytes

!

version 12.1

no service single-slot-reload-enable

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname moss

!

logging rate-limit console 10 except errors

!

ip subnet-zero

!

no ip finger

!

ip audit notify log

ip audit po max-events 100

!

crypto isakmp policy 1

!--- The following are IOS defaults so they do not appear: !--- IKE encryption method

encryption des

!--- IKE hashing

hash sha

!--- Diffie-Hellman group

group 1

!--- Authentication method

authentication pre-share

!--- IKE lifetime

lifetime 28800

!--- encryption peer

crypto isakmp key cisco123 address 172.18.124.157

!

!--- The following is the IOS default so it does not appear: !--- IPSec lifetime

crypto ipsec security-association lifetime seconds 3600

!

!--- IPSec transforms

crypto ipsec transform-set rtpset esp-des esp-md5-hmac

!

crypto map rtp 1 ipsec-isakmp

!--- Encryption peer

set peer 172.18.124.157

set transform-set rtpset

!--- Source/Destination networks defined

match address 115

!

call rsvp-sync

!

interface Ethernet0/0

ip address 192.168.1.1 255.255.255.0

ip nat inside

half-duplex

!

interface Ethernet0/1

ip address 172.18.124.35 255.255.255.240

ip nat outside

half-duplex

crypto map rtp

!

ip nat pool INTERNET 172.18.124.35 172.18.124.35 netmask 255.255.255.240

ip nat inside source route-map nonat pool INTERNET

ip classless

ip route 0.0.0.0 0.0.0.0 172.18.124.36

no ip http server

!

access-list 101 deny ip 192.168.1.0 0.0.0.255 10.32.50.0 0.0.0.255

access-list 101 permit ip 192.168.1.0 0.0.0.255 any

!--- Source/Destination networks defined

access-list 115 permit ip 192.168.1.0 0.0.0.255 10.32.50.0 0.0.0.255

access-list 115 deny ip 192.168.1.0 0.0.0.255 any

route-map nonat permit 10

match ip address 101

!

line con 0

transport input none

line 65 94

line aux 0

line vty 0 4

!

end

PIX の設定

PIX

PIX Version 5.2(1)

nameif ethernet0 outside security0

nameif ethernet1 inside security100

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname pixfirewall

fixup protocol ftp 21

fixup protocol http 80

fixup protocol h323 1720

fixup protocol rsh 514

fixup protocol smtp 25

fixup protocol sqlnet 1521

fixup protocol sip 5060

names

!--- Source/Destination networks defined

access-list 115 permit ip 192.168.1.0 255.255.255.0 10.32.50.0 255.255.255.0

access-list 115 deny ip 192.168.1.0 255.255.255.0 any

pager lines 24

logging on

no logging timestamp

no logging standby

no logging console

no logging monitor

no logging buffered

no logging trap

no logging history

logging facility 20

logging queue 512

interface ethernet0 auto

interface ethernet1 10baset

mtu outside 1500

mtu inside 1500

ip address outside 172.18.124.35 255.255.255.240

ip address inside 192.168.1.1 255.255.255.0

ip audit info action alarm

ip audit attack action alarm

no failover

failover timeout 0:00:00

failover poll 15

failover ip address outside 0.0.0.0

failover ip address inside 0.0.0.0

arp timeout 14400

!--- Except Source/Destination from Network Address Translation (NAT):

nat (inside) 0 access-list 115

route outside 0.0.0.0 0.0.0.0 172.18.124.36 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h323 0:05:00

sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

no snmp-server location

no snmp-server contact

snmp-server community public

no snmp-server enable traps

floodguard enable

sysopt connection permit-ipsec

no sysopt route dnat

!--- IPSec transforms

crypto ipsec transform-set myset esp-des esp-md5-hmac

!--- IPSec lifetime

crypto ipsec security-association lifetime seconds 3600

crypto map rtpmap 10 ipsec-isakmp

!--- Source/Destination networks

crypto map rtpmap 10 match address 115

!--- Encryption peer

crypto map rtpmap 10 set peer 172.18.124.157

crypto map rtpmap 10 set transform-set myset

crypto map rtpmap interface outside

isakmp enable outside

!--- Encryption peer

isakmp key ******** address 172.18.124.157 netmask 255.255.255.240

isakmp identity address

!--- Authentication method

isakmp policy 10 authentication pre-share

!--- IKE encryption method

isakmp policy 10 encryption des

!--- IKE hashing

isakmp policy 10 hash sha

!--- Diffie-Hellman group

isakmp policy 10 group 1

!--- IKE lifetime

isakmp policy 10 lifetime 28800

telnet timeout 5

ssh timeout 5

terminal width 80

Cryptochecksum:c237ed11307abea7b530bbd0c2b2ec08

: end

VPN 3000 コンセントレータの設定

必要に応じてVPNコンセントレータを設定するには、次に示すメニューオプションとパラメータを使用します。

- [設定] > [システム] > [トンネリング プロトコル] > [IPSec] > [IKE 提案] > [提案の追加]：

Proposal Name = DES-SHA

!--- Authentication method

Authentication Mode = Preshared Keys

!--- IKE hashing

Authentication Algorithm = SHA/HMAC-160

!--- IKE encryption method

Encryption Algorithm = DES-56

!--- Diffie-Hellman group

Diffie Hellman Group = Group 1 (768-bits)

Lifetime Measurement = Time

Date Lifetime = 10000

!--- IKE lifetime

Time Lifetime = 28800

- LAN-to-LANトンネルを定義するには、Configuration > System > Tunneling Protocols > IPSec LAN-to-LANの順に選択します。

Name = to_2000

Interface = Ethernet 2 (Public) 172.18.124.35/28

!--- Encryption peer

Peer = 172.18.124.157

!--- Authentication method

Digital Certs = none (Use Pre-shared Keys)

Pre-shared key = cisco123

!--- IPSec transforms

Authentication = ESP/MD5/HMAC-128

Encryption = DES-56

!--- Use the IKE proposal

IKE Proposal = DES-SHA

Autodiscovery = off

!--- Source network defined

Local Network

Network List = Use IP Address/Wildcard-mask below

IP Address 192.168.1.0

Wildcard Mask = 0.0.0.255

!--- Destination network defined

Remote Network

Network List = Use IP Address/Wildcard-mask below

IP Address 10.32.50.0

Wildcard Mask 0.0.0.255

- セキュリティアソシエーションを変更するには、[Configuration] > [Policy Management] > [Traffic Management] > [Security Associations] > [Modify]を選択します。

SA Name = L2L-to_2000

Inheritance = From Rule

IPSec Parameters

!--- IPSec transforms

Authentication Algorithm = ESP/MD5/HMAC-128

Encryption Algorithm = DES-56

Encapsulation Mode = Tunnel

PFS = Disabled

Lifetime Measurement = Time

Data Lifetime = 10000

!--- IPSec lifetime

Time Lifetime = 3600

Ike Parameters

!--- Encryption peer

IKE Peer = 172.18.124.157

Negotiation Mode = Main

!--- Authentication method

Digital Certificate = None (Use Preshared Keys)

!--- Use the IKE proposal

IKE Proposal DES-SHA

VPN 5000 コンセントレータの設定

VPN 5000 コンセントレータ

[ IP Ethernet 1:0 ]

Mode = Routed

SubnetMask = 255.255.255.240

IPAddress = 172.18.124.35

[ General ]

IPSecGateway = 172.18.124.36

DeviceName = "cisco"

EthernetAddress = 00:00:a5:f0:c8:00

DeviceType = VPN 5002/8 Concentrator

ConfiguredOn = Timeserver not configured

ConfiguredFrom = Command Line, from Console

[ IP Ethernet 0:0 ]

Mode = Routed

SubnetMask = 255.255.255.0

IPAddress = 192.168.1.1

[ Tunnel Partner VPN 1 ]

!--- Encryption peer

Partner = 172.18.124.157

!--- IPSec lifetime

KeyLifeSecs = 3600

BindTo = "ethernet 1:0"

!--- Authentication method

SharedKey = "cisco123"

KeyManage = Auto

!--- IPSec transforms

Transform = esp(md5,des)

Mode = Main

!--- Destination network defined

Peer = "10.32.50.0/24"

!--- Source network defined

LocalAccess = "192.168.1.0/24"

[ IP Static ]

10.32.50.0 255.255.255.0 VPN 1 1

[ IP VPN 1 ]

Mode = Routed

Numbered = Off

[ IKE Policy ]

!--- IKE hashing, encryption, Diffie-Hellman group

Protection = SHA_DES_G1

Configuration size is 1088 out of 65500 bytes.

確認

現在、この設定に使用できる確認手順はありません。

トラブルシュート

このセクションでは、設定のトラブルシューティングに役立つ情報を提供します。

トラブルシューティングのためのコマンド

一部の show コマンドはアウトプット インタープリタ ツールによってサポートされています（登録ユーザ専用）。このツールを使用することによって、show コマンド出力の分析結果を表示できます。

注：debug コマンドを使用する前に、「debug コマンドに関する重要な情報」を参照してください。

Cisco 3640 ルータ

- debug crypto engine ：暗号化と暗号解除を実行する crypto エンジンに関するデバッグ メッセージを表示します。

- debug crypto isakmp ：IKE イベントに関するメッセージを表示します。

- debug crypto ipsec ：IPSec イベントを表示します。

- show crypto isakmp sa：ピアの現在の IKE セキュリティ アソシエーション（SA）すべてを表示します。

- show crypto ipsec sa ：現在の SA が使用する設定を表示します。

- clear crypto isakmp ：（設定モードから）すべてのアクティブな IKE 接続をクリアーします。

- clear crypto sa ：（設定モードから）すべての IPSec SAを削除します。

PIX

- debug crypto ipsec：IPSec ネゴシエーションのフェーズ 2 を表示します。

- debug crypto isakmp - フェーズ 1 の Internet Security Association and Key Management Protocol（ISAKMP）ネゴシエーションを表示します。

- debug crypto engine：暗号化されたトラフィックを表示します。

- show crypto ipsec sa - フェーズ 2 のセキュリティ アソシエーションを表示します。

- show crypto isakmp sa - フェーズ 1 のセキュリティ結合を表示します。

- clear crypto isakmp ：（設定モードから）Internet Key Exchange（IKE） SA をクリアーします。

- clear crypto ipsec sa ：（設定モードから）IPSec SA を削除します。

VPN 3000 コンセントレータ

- VPN 3000 コンセントレータのデバッグを開始するために、[設定] > [システム] > [イベント] > [クラス] > [修正] を選択します（ログ重大度 =1-13、コンソール重大度 =1-3）:IKE、IKEDBG、IKEDECODE、IPSEC、IPSECDBG、IPSECDECODE

- イベント ログをクリアーまたは取得するには、[モニタリング] > [イベント ログ]を選択します。

- LAN-to-LAN トンネル トラフィックは[モニタリング] > [セッション]でモニタできます。

- トンネルをクリアーするには、[管理] > [セッションの管理] > [LAN-to-LAN セッション] > [アクション ・ログアウト]を選択します。

VPN 5000 コンセントレータ

- vpn trace dump all ：すべての一致する VPN 接続の情報を表示します。時間、VPN 番号、ピアの実際の IP アドレス、どのスクリプトが実行されているかの情報、そしてエラーの場合はエラーが発生したソフトウェア コードのルーチンと回線番号が表示されます。

- show vpn statistics ：ユーザやパートナーの次の情報を表示します。（モジュラ モデルでは、ディスプレイには各モジュール スロットのセクションが含まれます）。 Current Active ：現在アクティブな接続です。In Negot ：現在ネゴシエート中の接続です。High Water ：最後のリブート以降のアクティブな同時接続の最高数です。Running Total ：最後のリブート以降の成功した接続の合計数です。Tunnel Starts ：トンネル開始の数です。Tunnel OK ：エラーのないトンネルの数です。Tunnel Error ：エラーが発生したトンネルの数です。

- show vpn statistics verbose ：ISAKMP ネゴシエーション統計情報と、さらに多数のアクティブ接続の統計情報を表示します。

関連情報

- Cisco VPN 5000 シリーズ コンセントレータの販売終了のお知らせ

- IPSec ネットワーク セキュリティの設定

- Internet Key Exchange セキュリティ プロトコルの設定

- テクニカルサポート - Cisco Systems