内容

概要

前提条件

要件

使用するコンポーネント

表記法

設定

ネットワーク図

設定

確認

トラブルシュート

関連情報

概要

トンネルで Cisco Encryption Technology（CET）暗号化を設定するには、トンネルのインターフェイスで暗号化を設定する必要があります。また、トンネルの最終的な接続先に向う物理インターフェイスでも暗号化を設定する必要があります。

注：CET暗号化はサポート終了です。移行のためには、暗号化方式として IP Security（IPSec）をお勧めします。

前提条件

要件

このドキュメントに特有の要件はありません。

使用するコンポーネント

このドキュメントの内容は、特定のソフトウェアやハードウェアのバージョンに限定されるものではありません。

表記法

ドキュメントの表記法の詳細は、「シスコ テクニカル ティップスの表記法」を参照してください。

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注：この文書で使用されているコマンドの詳細を調べるには、「Command Lookup ツール」を使用してください（登録ユーザのみ）。

ネットワーク図

このドキュメントでは、次のネットワーク セットアップを使用します。

ネットワーク構成図に関する注記

- r3-4k の背後の 8.8.8.8、および R6-2500 の背後の 7.7.7.4 は端末です。これらが互いに ping を実行すると、トラフィックはトンネルを通過します。

- Generic Routing Encapsulation（GRE; 総称ルーティング カプセル化）トンネルは、トンネルの発信元および送信先としてループバック インターフェイスが設定されています。

- トンネルを通過するトラフィックも暗号化を行います。この機能を実行するにはトンネル トラフィックを暗号化するために、トンネル インターフェイスと物理送信インターフェイスの両方において暗号化マップを結びつける必要があります。

設定

このドキュメントでは、次の構成を使用します。

- r3-4k

- R1-AGS

- R6-2500

r3-4k

hostname r3-4k

!

crypto public-key r6-2500 02014544

F3681B5D 32372A19 0C0CCC4B E707F829 D882CF30 A9B4DBE3 E1911E9C F6A9E162

732558DF A20FEFAD 2ACC400E 8DDB10B1 3566FA3A E55A9BBE 00916AAD 20A0C75C

quit

!

crypto map my_crypto_map 10

set algorithm 40-bit-des

set peer r6-2500

match address 128

!

interface Loopback0

ip address 1.1.6.1 255.255.255.0

!

interface Tunnel0

ip address 5.5.5.1 255.255.255.0

tunnel source Loopback0

tunnel destination 2.2.6.3

crypto map my_crypto_map

!

interface Ethernet0

ip address 1.1.1.1 255.255.255.0

description inside interface

media-type 10BaseT

crypto map my_crypto_map

!

!

interface Serial0

encapsulation frame-relay

no ip route-cache

!

interface Serial0.1 point-to-point

description outside interface

ip address 8.8.8.1 255.255.255.0

frame-relay interface-dlci 100

!

!ip classless

ip route 0.0.0.0 0.0.0.0 1.1.1.2

ip route 7.0.0.0 255.0.0.0 5.5.5.2

access-list 128 permit gre host 1.1.6.1 host 2.2.6.3

!

R1-AGS

!

hostname R1-AGS

!

interface Ethernet0

ip address 1.1.1.2 255.255.255.0

!

interface Serial1

ip address 2.2.5.2 255.255.255.0

!

ip classless

ip route 1.0.0.0 255.0.0.0 1.1.1.1

ip route 2.0.0.0 255.0.0.0 2.2.5.3

R6-2500

hostname R6-2500

!

crypto public-key r3-4k 04D6265A

512A7D84 43C348B7 959D2FE2 3122B285 FDA2A362 7272A835 84D03134 DB160DE1

27CA2D24 D6C23EFE 3BE25A95 D62EA30B 0F2C3BA8 9AB6DB82 D8127238 266AC987

quit

!

crypto map my_crypto_map 10

set algorithm 40-bit-des

set peer r3-4k

match address 128

!

interface Loopback0

ip address 2.2.6.3 255.255.255.0

!

interface Tunnel0

ip address 5.5.5.2 255.255.255.0

tunnel source Loopback0

tunnel destination 1.1.6.1

crypto map my_crypto_map

!

interface Ethernet 0

description inside interface

ip address 7.7.7.3 255.255.255.0

!

interface Serial0

description outside interface

ip address 2.2.5.3 255.255.255.0

crypto map my_crypto_map

!

ip classless

ip route 0.0.0.0 0.0.0.0 2.2.5.2

ip route 7.0.0.0 255.0.0.0 7.7.7.0

ip route 8.0.0.0 255.0.0.0 5.5.5.1

!

access-list 128 permit gre host 2.2.6.3 host 1.1.6.1

確認

現在、この設定に使用できる確認手順はありません。

トラブルシュート

現在、この設定に関する特定のトラブルシューティング情報はありません。

関連情報

- IPSec に関するサポート ページ

- テクニカルサポート - Cisco Systems