内容

はじめに

前提条件

要件

使用するコンポーネント

背景説明

設定

ネットワーク図

コンフィギュレーション

FMCを使用したFTDでのIPSec VPNの設定

FMCを使用したFTDのループバックインターフェイスの設定

ASAでのIPSec VPNの設定

ASAでのループバックインターフェイスの設定

FMCを使用したFTDでのオーバーレイBGPの設定

ASAでのオーバーレイBGPの設定

確認

FTDの出力

ASAでの出力

トラブルシュート

はじめに

このドキュメントでは、ダイナミックルーティングのBorder Gateway Protocol(BGP)をオーバーレイとして使用するFirepower Management Center(FMC)によって、適応型セキュリティアプライアンス(ASA)とFirepower Threat Defense managed(FTD)の間にルートベースのサイト間VPN(IPSec)トンネルを設定する方法について説明します。

前提条件

要件

次の項目に関する知識があることが推奨されます。

- IPSecサイト間VPNの基本的な知識

- FTDおよびASAでのBGPの設定

- FMCの使用経験

使用するコンポーネント

- Cisco ASAvバージョン9.20(2)2

- Cisco FMCバージョン7.4.1

- Cisco FTDバージョン7.4.1

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、クリアな（デフォルト）設定で作業を開始しています。本稼働中のネットワークでは、各コマンドによって起こる可能性がある影響を十分確認してください。

背景説明

ルートベースのVPNでは、暗号化するトラフィック、またはVPNトンネルを介して送信するトラフィックを判別できます。また、ポリシーベースまたは暗号マップベースのVPNのように、ポリシー/アクセスリストの代わりにトラフィックルーティングを使用します。 暗号化ドメインは、IPsecトンネルに入るすべてのトラフィックを許可するように設定されます。IPsecローカルおよびリモートトラフィックセレクタは0.0.0.0/0.0.0.0に設定されます。IPSecトンネルにルーティングされるトラフィックは、送信元/宛先サブネットに関係なく暗号化されます。

このドキュメントでは、ダイナミックルーティングBGPをオーバーレイとして使用したスタティック仮想トンネルインターフェイス(SVTI)の設定を中心に説明します。

設定

このセクションでは、SVTI IPSecトンネルを介してBGPネイバーシップを起動するためにASAおよびFTDで必要な設定について説明します。

ネットワーク図

ネットワーク図

コンフィギュレーション

FMCを使用したFTDでのIPSec VPNの設定

ステップ 1：Devices > VPN > Site To Siteに移動します。

ステップ 2：+Site to Site VPNをクリックします。

サイト間 VPN

ステップ 3：Topology Nameを入力し、VPNのタイプとしてRoute Based (VTI)を選択します。IKE Versionを選択します。

このデモンストレーションでは、次の操作を行います。

トポロジ名：ASAv-VTI

IKEバージョン：IKEv2

VPNトポロジ

ステップ 4：トンネルを設定する必要があるDeviceを選択します。新しい仮想トンネルインターフェイスを追加するか(+アイコンをクリック)、既存のリストから選択します。

エンドポイントノードA

ステップ 5：New Virtual Tunnel Interfaceのパラメータを定義します。をクリックします。Ok

このデモンストレーションでは、次の操作を行います。

名前：ASA-VTI

説明（オプション）：エクストラネットASAを使用したVTIトンネル

セキュリティゾーン：VTIゾーン

トンネルID:1

IPアドレス：169.254.2.1/24

トンネル送信元：GigabitEthernet0/1（外部）

IPsecトンネルモード：IPv4

仮想トンネルインターフェイス

手順 6：新しいVTIが作成されたことを示すポップアップをクリックOK。

仮想トンネルインターフェイスの追加

手順 7：新しく作成したVTIまたはVirtual Tunnel Interfaceの下のVTIを選択します。ノードB（ピアデバイス）の情報を入力します。

このデモンストレーションでは、次の操作を行います。

デバイス：エクストラネット

デバイス名：ASAv-Peer

エンドポイントIPアドレス：10.197.226.187

エンドポイントノードB

ステップ 8：IKEタブに移動します。をクリックします。定義済みのPolicyを使用するか、Policyタブの横にあるボタ+ンをクリックして新しいタブを作成するかを選択できます。

ステップ9:（新しいIKEv2ポリシーを作成する場合はオプション） ポリシーにNameを指定し、ポリシーで使用するAlgorithmsを選択します。をクリックします。Save

このデモンストレーションでは、次の操作を行います。

名前：ASAv-IKEv2-policy

整合性アルゴリズム：SHA-256

暗号化アルゴリズム：AES-256

PRFアルゴリズム：SHA-256

Diffie-Hellmanグループ：14

IKEv2ポリシー

ステップ 10：新しく作成したPolicyまたは既存のPolicyを選択します。Authentication Typeを選択します。事前共有手動キーを使用する場合は、KeyおよびConfirm Key ボックスにキーを入力します。

このデモンストレーションでは、次の操作を行います。

ポリシー：ASAv-IKEv2-Policy

認証タイプ：事前共有手動キー

[Authentication]

ステップ 11IPsec タブに移動します。をクリックすると、事前定義されたIKEv2 IPsecプロポーザルを使用するか、新しいプロポーザルを作成するかを選択できます。タIKEv2 IPsec Proposal ブの横にある+ボタンをクリックします。

ステップ12.（新しいIKEv2 IPsecプロポーザルを作成する場合はオプション） 提案のNameを入力し、提案で使用するAlgorithmsを選択します。をクリックします。Save

このデモンストレーションでは、次の操作を行います。

名前：ASAv-IPSec-Policy

ESPハッシュ：SHA-256

ESP暗号化：AES-256

IKEv2-IPsec – プロポーザル

ステップ 13 使用可能なプロポーザルのリストから、新しく作成したProposalまたは既存のプロポーザルProposalを選択します。をクリックします。OK

変換セット

ステップ14:（オプション）Perfect Forward Secrecyの設定を選択します。IPSecの設定Lifetime Duration and Lifetime Size

このデモンストレーションでは、次の操作を行います。

完全転送秘密：モジュラスグループ14

有効期間： 28800 （既定値）

Lifetime Size（ライフタイムサイズ）:4608000（デフォルト）

PFSの設定

ステップ 15：設定を確認します。次の図に示すように、Saveをクリックします。

設定を保存します。

FMCを使用したFTDのループバックインターフェイスの設定

Devices > Device Managementに移動します。ループバックを設定する必要があるデバイスを編集します。

ステップ 1：次に.Interfaces > Add Interfaces > Loopback Interface

ループバックインターフェイスに移動します

ステップ 2：「loopback」という名前を入力し、ループバックID「1」を指定して、インターフェイスを有効にします。

ループバックインターフェイスの有効化

ステップ 3：インターフェイスのIPアドレスを設定し、OK をクリックします。

ループバックインターフェイスにIPアドレスを提供する

ASAでのIPSec VPNの設定

!--- Configure IKEv2 Policy ---!

crypto ikev2 policy 1

encryption aes-256

integrity sha256

group 14

prf sha256

lifetime seconds 86400

!--- Enable IKEv2 on the outside interface ---!

crypto ikev2 enable outside

!---Configure Tunnel-Group with pre-shared-key---!

tunnel-group 10.197.226.222 type ipsec-l2l

tunnel-group 10.197.226.222 ipsec-attributes

ikev2 remote-authentication pre-shared-key *****

ikev2 local-authentication pre-shared-key *****

!--- Configure IPSec Policy ---!

crypto ipsec ikev2 ipsec-proposal ipsec_proposal_for_FTD

protocol esp encryption aes-256

protocol esp integrity sha-256

!--- Configure IPSec Profile ---!

crypto ipsec profile ipsec_profile_for_FTD

set ikev2 ipsec-proposal FTD-ipsec-proposal

set pfs group14

!--- Configure VTI ---!

interface Tunnel1

nameif FTD-VTI

ip address 169.254.2.2 255.255.255.0

tunnel source interface outside

tunnel destination 10.197.226.222

tunnel mode ipsec ipv4

tunnel protection ipsec profile ipsec_profile_for_FTD

!--- Configure the WAN routes ---!

route outside 0.0.0.0 0.0.0.0 10.197.226.1 1

ASAでのループバックインターフェイスの設定

interface Loopback1

nameif loopback

ip address 1.1.1.1 255.255.255.0

FMCを使用したFTDでのオーバーレイBGPの設定

Devices > Device Management.Edit VTIトンネルが設定されているデバイスに移動し、Routing >General Settings > BGPに移動します。

ステップ 1：BGPを有効にして、自律システム(AS)番号とルータIDを設定します（次の図を参照）。

AS番号は、デバイスFTDとASAの両方で同じである必要があります。

ルータIDは、BGPに参加している各ルータを識別するために使用されます。

BGPを設定します

ステップ 2：FTDでBGP > IPv4に移動し、BGP IPv4を有効にします。

BGPの有効化

ステップ 3：タブでNeighbor、ASAv VTIトンネルIPアドレスをネイバーとして追加し、ネイバーを有効にします。

BGPネイバーの追加

ステップ 4：Networksで、BGPを通じてアドバタイズするネットワークのうち、VTIトンネルを通過する必要があるネットワーク（この場合はloopback1）を追加します。

BGPネットワークの追加

ステップ 5：その他すべてのBGP設定はオプションであり、環境に応じて設定できます。設定を確認して、Saveをクリックします。

BGP設定の保存

手順 6：すべての設定を展開します。

導入

ASAでのオーバーレイBGPの設定

router bgp 1000

bgp log-neighbor-changes

bgp router-id 10.1.1.2

address-family ipv4 unicast

neighbor 169.254.2.1 remote-as 1000

neighbor 169.254.2.1 transport path-mtu-discovery disable

neighbor 169.254.2.1 activate

network 1.1.1.0 mask 255.255.255.0

no auto-summary

no synchronization

exit-address-family

確認

ここでは、設定が正常に機能しているかどうかを確認します。

FTDの出力

#show crypto ikev2 sa

IKEv2 SAs:

Session-id:20, Status:UP-ACTIVE, IKE count:1, CHILD count:1

Tunnel-id         Local                   Remote                fvrf/ivrf          Status       Role

666846307      10.197.226.222/500      10.197.226.187/500    Global/Global      READY        RESPONDER

Encr: AES-CBC, keysize: 256, Hash: SHA256, DH Grp:14, Auth sign: PSK, Auth verify: PSK

Life/Active Time: 86400/1201 sec

Child sa: local selector 0.0.0.0/0 - 255.255.255.255/65535

remote selector 0.0.0.0/0 - 255.255.255.255/65535

ESP spi in/out: 0xa14edaf6/0x8540d49e

#show crypto ipsec sa

interface: ASAv-VTI

Crypto map tag: __vti-crypto-map-Tunnel1-0-1, seq num: 65280, local addr: 10.197.226.222

Protected vrf (ivrf): Global

local ident (addr/mask/prot/port): (0.0.0.0/0.0.0.0/0/0)

remote ident (addr/mask/prot/port): (0.0.0.0/0.0.0.0/0/0)

current_peer: 10.197.226.187

#pkts encaps: 45, #pkts encrypt: 45, #pkts digest: 45

#pkts decaps: 44, #pkts decrypt: 44, #pkts verify: 44

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed:0, #pkts comp failed: 0, #pkts decomp failed: 0

#pre-frag successes: 0, #pre-frag failures: 0, #fragments created: 0

#PMTUs sent: 0, #PMTUs rcvd: 0, #decapsulated frgs needing reassembly: 0

#TFC rcvd: 0, #TFC sent: 0

#Valid ICMP Errors rcvd: 0, #Invalid ICMP Errors rcvd: 0

#send errors: 0, #recv errors: 0

local crypto endpt.: 10.197.226.222/500, remote crypto endpt.: 10.197.226.187/500

path mtu 1500, ipsec overhead 78(44), media mtu 1500

PMTU time remaining (sec): 0, DF policy: copy-df

ICMP error validation: disabled, TFC packets: disabled

current outbound spi: 8540D49E

current inbound spi : A14EDAF6

inbound esp sas:

spi: 0xA14EDAF6 (2706299638)

SA State: active

transform: esp-aes-256 esp-sha-256-hmac no compression

in use settings ={L2L, Tunnel, PFS Group 14, IKEv2, VTI, }

slot: 0, conn_id: 49, crypto-map: __vti-crypto-map-Tunnel1-0-1

sa timing: remaining key lifetime (kB/sec): (4331517/27595)

IV size: 16 bytes

replay detection support: Y

Anti replay bitmap:

000001FFF 0xFFFFFFFF

outbound esp sas:

spi: 0x8540D49E (2235618462)

SA State: active

transform: esp-aes-256 esp-sha-256-hmac no compression

in use settings ={L2L, Tunnel, PFS Group 14, IKEv2, VTI, }

slot: 0, conn_id: 49, crypto-map: __vti-crypto-map-Tunnel1-0-1

sa timing: remaining key lifetime (kB/sec): (4101117/27595)

IV size: 16 bytes

replay detection support: Y

Anti replay bitmap:

0x00000000 0x00000001

#show bgp summary

BGP router identifier 10.1.1.1, local AS number 1000

BGP table version is 5, main routing table version 5

2 network entries using 400 bytes of memory

2 path entries using 160 bytes of memory

2/2 BGP path/bestpath attribute entries using 416 bytes of memory

0 BGP route-map cache entries using 0 bytes of memory

0 BGP filter-list cache entries using 0 bytes of memory

BGP using 976 total bytes of memory

BGP activity 21/19 prefixes, 24/22 paths, scan interval 60 secs

Neighbor           V         AS      MsgRcvd      MsgSent       TblVer      InQ      OutQ      Up/Down      State/PfxRcd

169.254.2.2      4         1000   22               22                  5             0         0            00:19:42        1

#show bgp neighbors

BGP neighbor is 169.254.2.2, vrf single_vf, remote AS 1000, internal link

BGP version 4, remote router ID 10.1.1.2

BGP state = Established, up for 00:19:49

Last read 00:01:04, last write 00:00:38, hold time is 180, keepalive interval is 60 seconds

Neighbor sessions:

1 active, is not multisession capable (disabled)

Neighbor capabilities:

Route refresh: advertised and received(new)

Four-octets ASN Capability: advertised and received

Address family IPv4 Unicast: advertised and received

Multisession Capability:

Message statistics:

InQ depth is 0

OutQ depth is 0

Sent    Rcvd

Opens             1        1

Notifications:    0        0

Updates:          2        2

Keepalives:      19      19

Route Refresh: 0        0

Total:               22      22

Default minimum time between advertisement runs is 0 seconds

For address family: IPv4 Unicast

Session: 169.254.2.2

BGP table version 5, neighbor version 5/0

Output queue size : 0

Index 15

15 update-group member

Sent     Rcvd

Prefix activity:             ----    ----

Prefixes Current:            1          1         (Consumes 80 bytes)

Prefixes Total:              1          1

Implicit Withdraw:           0          0

Explicit Withdraw:           0          0

Used as bestpath:           n/a        1

Used as multipath:           n/a        0

Outbound           Inbound

Local Policy Denied Prefixes:   --------            -------

Bestpath from this peer:         1                          n/a

Invalid Path:                    1                          n/a

Total:                           2                            0

Number of NLRIs in the update sent: max 1, min 0

Address tracking is enabled, the RIB does have a route to 169.254.2.2

Connections established 7; dropped 6

Last reset 00:20:06, due to Peer closed the session of session 1

Transport(tcp) path-mtu-discovery is disabled

Graceful-Restart is disabled

#show route bgp

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, V - VPN

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, + - replicated route

SI - Static InterVRF, BI - BGP InterVRF

Gateway of last resort is 10.197.226.1 to network 0.0.0.0

B        1.1.1.0 255.255.255.0 [200/0] via 169.254.2.2, 00:19:55

ASAでの出力

#show crypto ikev2 sa

IKEv2 SAs:

Session-id:7, Status:UP-ACTIVE, IKE count:1, CHILD count:1

Tunnel-id    Local                       Remote                     fvrf/ivrf             Status           Role

442126361    10.197.226.187/500          10.197.226.222/500         Global/Global          READY           INITIATOR

Encr: AES-CBC, keysize: 256, Hash: SHA256, DH Grp:14, Auth sign: PSK, Auth verify: PSK

Life/Active Time: 86400/1200 sec

Child sa: local selector 0.0.0.0/0 - 255.255.255.255/65535

remote selector 0.0.0.0/0 - 255.255.255.255/65535

ESP spi in/out: 0x8540d49e/0xa14edaf6

#show crypto ipsec sa

interface: FTD-VTI

Crypto map tag: __vti-crypto-map-Tunnel1-0-1, seq num: 65280, local addr: 10.197.226.187

Protected vrf (ivrf): Global

local ident (addr/mask/prot/port): (0.0.0.0/0.0.0.0/0/0)

remote ident (addr/mask/prot/port): (0.0.0.0/0.0.0.0/0/0)

current_peer: 10.197.226.222

#pkts encaps: 44 #pkts encrypt: 44, #pkts digest: 44

#pkts decaps: 45, #pkts decrypt: 45, #pkts verify: 45

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed:0, #pkts comp failed: 0, #pkts decomp failed: 0

#pre-frag successes: 0, #pre-frag failures: 0, #fragments created: 0

#PMTUs sent: 0, #PMTUs rcvd: 0, #decapsulated frgs needing reassembly: 0

#TFC rcvd: 0, #TFC sent: 0

#Valid ICMP Errors rcvd: 0, #Invalid ICMP Errors rcvd: 0

#send errors: 0, #recv errors: 0

local crypto endpt.: 10.197.226.187/500, remote crypto endpt.: 10.197.226.222/500

path mtu 1500, ipsec overhead 78(44), media mtu 1500

PMTU time remaining (sec): 0, DF policy: copy-df

ICMP error validation: disabled, TFC packets: disabled

current outbound spi: A14EDAF6

current inbound spi : 8540D49E

inbound esp sas:

spi: 0x8540D49E (2235618462)

SA State: active

transform: esp-aes-256 esp-sha-256-hmac no compression

in use settings ={L2L, Tunnel, PFS Group 14, IKEv2, VTI, }

slot: 0, conn_id: 9, crypto-map: __vti-crypto-map-Tunnel1-0-1

sa timing: remaining key lifetime (kB/sec): (4147198/27594)

IV size: 16 bytes

replay detection support: Y

Anti replay bitmap:

0x00000000 0x007FFFFF

outbound esp sas:

spi: 0xA14EDAF6 (2706299638)

SA State: active

transform: esp-aes-256 esp-sha-256-hmac no compression

in use settings ={L2L, Tunnel, PFS Group 14, IKEv2, VTI, }

slot: 0, conn_id: 9, crypto-map: __vti-crypto-map-Tunnel1-0-1

sa timing: remaining key lifetime (kB/sec): (3916798/27594)

IV size: 16 bytes

replay detection support: Y

Anti replay bitmap:

0x00000000 0x00000001

#show bgp summary

BGP router identifier 10.1.1.2, local AS number 1000

BGP table version is 7, main routing table version 7

2 network entries using 400 bytes of memory

2 path entries using 160 bytes of memory

2/2 BGP path/bestpath attribute entries using 416 bytes of memory

0 BGP route-map cache entries using 0 bytes of memory

0 BGP filter-list cache entries using 0 bytes of memory

BGP using 976 total bytes of memory

BGP activity 5/3 prefixes, 7/5 paths, scan interval 60 secs

Neighbor        V      AS      MsgRcvd      MsgSent     TblVer    InQ     OutQ     Up/Down     State/PfxRcd

169.254.2.1   4     1000       22             22       7       0         0      00:19:42      1

#show bgp neighbors

BGP neighbor is 169.254.2.1, context single_vf, remote AS 1000, internal link

BGP version 4, remote router ID 10.1.1.1

BGP state = Established, up for 00:19:42

Last read 00:01:04, last write 00:00:38, hold time is 180, keepalive interval is 60 seconds

Neighbor sessions:

1 active, is not multisession capable (disabled)

Neighbor capabilities:

Route refresh: advertised and received(new)

Four-octets ASN Capability: advertised and received

Address family IPv4 Unicast: advertised and received

Multisession Capability:

Message statistics:

InQ depth is 0

OutQ depth is 0

Sent     Rcvd

Opens:             1         1

Notifications:    0         0

Updates:          2         2

Keepalives:      19       19

Route Refresh: 0         0

Total:             22       22

Default minimum time between advertisement runs is 0 seconds

For address family: IPv4 Unicast

Session: 169.254.2.1

BGP table version 7, neighbor version 7/0

Output queue size : 0

Index 5

5 update-group member

Sent      Rcvd

Prefix activity:     ----   ----

Prefixes Current:    1         1 (Consumes 80 bytes)

Prefixes Total:      1         1

Implicit Withdraw:   0         0

Explicit Withdraw:   0         0

Used as bestpath:  n/a       1

Used as multipath:  n/a       0

Outbound        Inbound

Local Policy Denied Prefixes:     --------        -------

Bestpath from this peer:           1              n/a

Invalid Path:                      1              n/a

Total:                             2              0

Number of NLRIs in the update sent: max 1, min 0

Address tracking is enabled, the RIB does have a route to 169.254.2.1

Connections established 5; dropped 4

Last reset 00:20:06, due to Peer closed the session of session 1

Transport(tcp) path-mtu-discovery is disabled

Graceful-Restart is disabled

#show route bgp

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, V - VPN

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, + - replicated route

SI - Static InterVRF, BI - BGP InterVRF

Gateway of last resort is 10.197.226.1 to network 0.0.0.0

B       2.2.2.0 255.255.255.0 [200/0] via 169.254.2.1, 00:19:55

トラブルシュート

ここでは、設定のトラブルシューティングに使用できる情報を示します。

debug crypto ikev2 platform 255

debug crypto ikev2 protocol 255

debug crypto ipsec 255

debug ip bgp all

- IPv4インターフェイスとIPv4、保護されたネットワーク、またはVPNペイロードのみをサポート（IPv6はサポートされない）。