内容

概要

前提条件

要件

使用するコンポーネント

重要事項

EtherChannel

トランキング

表記法

設定

ネットワーク図

設定

確認

Catalyst 6500 の show コマンド

Cisco 7500 ルータの show コマンド

トラブルシュート

関連情報

概要

このドキュメントでは、CatalystOS（CatOS）を実行している Catalyst 6500 スイッチと Cisco 7500 ルータ間の Fast EtherChannel（FEC）、スイッチ間リンク（ISL）、および 802.1q トランキングの設定例を紹介します。各コマンドの結果は、そのコマンドを実行するたびに表示されます。この設定では Catalyst 6000 スイッチが使用されていますが、CatOS を実行している Catalyst 4000 または Catalyst 5000 ファミリ スイッチと置き換えることができます。

前提条件

要件

この設定を行う前に、次の要件が満たされていることを確認します。

- Catalyst 6000 シリーズ スイッチ

- EtherChannel をサポートするには、CatOS リリース 5.1(1) CSX 以降が必要です。

- Cisco 7000 または 7500 シリーズ ルータ

- 7000シリーズルートスイッチプロセッサ(RSP7000)またはシャーシインターフェイス(RSP7000CI)、またはファストイーサネットインターフェイスプロセッサ(FEIP)またはVersatile Interface Processor(VIP2)を搭載したCisco 7000シリーズルータ（ポートアダプタ）

- PA-2FEISLポートアダプタを使用している場合は、ハードウェアリビジョン1.2以降が必要です。

詳細については、Field Notice：*Expired* FN8791_11301999:PA-2FEISL 2ポートファストイーサネットISLの交換に関する推奨事項』を参照してください。

- encapsulation dot1Q nativeコマンドは、Cisco IOS®ソフトウェアリリース12.1(3) Tで導入されました。このコマンドは設定を変更します。

詳細は、このドキュメントの「Cisco IOSソフトウェアリリース12.1Tより前のCisco 7500 802.1Qの設定」セクションを参照してください。

- Cisco 7500 シリーズ ルータでは Cisco Express Forwarding がデフォルトで有効になっています。ただし、IEEE 802.1Q VLAN間のIPルーティングに対するCisco Express Forwarding(CEF)のサポートは、Cisco IOSソフトウェアリリース12.2および12.2Tまでは利用できませんでした。以前のリリースでも802.1Qカプセル化を設定することは可能ですが、Cisco Express Forwardingを無効にするには、まずグローバルno ip cefコマンドを発行する必要があります。

- 7500シリーズルータがマルチプロトコルラベルスイッチング(MPLS)およびFEC用に設定されている場合、MPLSインターフェイスからFECインターフェイスに流れるルーティング(MPLS" IP)パケットのサポートは現在利用できません。したがって、MPLSとFECの設定が1つのルータ上に共存することは推奨されません。

- EtherChannelをサポートするには、Cisco IOSソフトウェアリリース11.1(14)CA以降が必要です。

ISLトランキングをサポートするには、Cisco IOSソフトウェアリリース11.3(1)T(any plus feature set)以降が必要です。

IEEE 802.1Qトランキングをサポートするには、Cisco IOSソフトウェアリリース12.0(1)T（any plusフィーチャセット）以降が必要です。

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づいています。

- CatOSバージョン5.5.14が稼働するCatalyst 6500

- Cisco IOSソフトウェアリリース12.2.7bが稼働するCisco 7500

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

重要事項

- Catalyst 4000 シリーズ スイッチは、ISL トランキングをサポートしていない点に留意してください。また、Catalyst 5000 シリーズ スイッチのスイッチング モジュールの中には、EtherChannel に対応していないものがあります。show port capabilities moduleコマンドを発行して、特定のモジュールがEtherChannel対応かどうか、およびサポートされているトランキングカプセル化を確認します。

- EtherChannel およびトランキングの設定に関しては、いくつかのガイドラインがあります。必ずスイッチのソフトウェアマニュアルを参照してください。

たとえば、Catalyst 5000 上でソフトウェア リリース 5.5.x を実行している場合、『ソフトウェア コンフィギュレーション ガイド（5.5）』を参照し、「Fast EtherChannel および Gigabit EtherChannel の設定」という節に記載されている設定のガイドラインと制限事項を慎重に確認してください。

EtherChannel

FEC または Gigabit EtherChannel（GEC）機能を使用すると、複数のポイントツーポイント リンクを 1 つの論理リンクにバンドルできます。Catalyst 6000は、全二重モードで最大8個のポートをサポートし、FECでは1600 Mbpsまたは1.6 Gbpsのスループット、GECでは16 Gbpsのスループットを提供します。Cisco 7500シリーズは、800 MbpsでFECごとに最大4ポートをサポートします。EtherChannel の機能とパフォーマンスは、スイッチまたはルータによって異なります。詳細については、「Catalyst スイッチに EtherChannel を実装するためのシステム要件」を参照してください。

EtherChannelはすべてのリンクにトラフィックを分散し、1つ以上のリンクに障害が発生した場合に冗長性を提供します。EtherChannelに関する詳細と設定例は、『CatalystスイッチにおけるEtherChannelのロードバランシングと冗長性について 』を参照してください。

詳細については、シスコテクニカルサポートおよびドキュメントの「EtherChannel」ページを参照してください。

トランキング

トランキングは、2つのデバイス間のポイントツーポイントリンクまたはEtherChannelバンドルを介して、複数のVLANからのトラフィックを伝送する方法です。イーサネットトランキングを実装するには、次の2つの方法があります。

- ISL（シスコ独自のトランク カプセル化）

- 802.1Q（IEEE標準トランクカプセル化）

詳細は、『Ciscoテクニカニカルサポート&ドキュメント』の「VLANトランキングプロトコル」ページを参照してください。

表記法

ドキュメント表記の詳細は、『シスコ テクニカル ティップスの表記法』を参照してください。

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注： このドキュメントで使用されているコマンドの詳細を調べるには、Command Lookup Tool（登録ユーザ専用）を使用してください。

次の設定例では、これらの方法を示します。

- Catalyst 6500で、VLAN 1のWorkstation 1とVLAN 2のWorkstation 2に2つのアクセスポートを設定します。

- Workstation 1のデフォルトゲートウェイを10.10.10.1 /24に、Workstation 2のデフォルトゲートウェイをCisco 7500の10.10.11.1/24に設定します。

- Catalyst 6500スイッチとCisco 7500ルータ間の2ポートFECでISLおよび802.1Qトランクを設定します。

- InterVLANルーティング用のIPアドレスを使用して、2つのポートチャネルサブインターフェイスを設定します。

ネットワーク図

このドキュメントでは、次のネットワーク セットアップを使用します。

2ポートFECでのVLAN 1およびVLAN 2のトランキング

設定

このドキュメントでは、次の構成を使用します。

- Catalyst 6500 スイッチ

- Cisco 7500 ルータ

- 12.1(3)Tより前のCisco IOSソフトウェアリリースのCisco 7500 802.1Q設定

Catalyst 6500 スイッチ

!--- Set the IP address and default gateway for VLAN 1 for management purposes.

Catalyst6500> (enable) set interface sc0 10.10.10.2 255.255.255.0

Interface sc0 IP address and netmask set.

Catalyst6500> (enable) set ip route default 10.10.10.1

Route added.

!--- Set the VTP mode. In this example, the mode is set to be transparent. Depending on your !--- network, set the VTP mode accordingly. !--- For details on VTP, refer to Understanding and Configuring VLAN Trunk Protocol (VTP).

Catalyst6500> (enable) set vtp mode transparent

VTP domain modified

!--- Add VLAN 2. VLAN 1 already exists by default.

Catalyst6500> (enable) set vlan 2

VLAN 2 configuration successful

!--- Add port 3/4 to VLAN 2. Port 3/3 is already in VLAN 1 by default.

Catalyst6500> (enable) set vlan 2 3/4

VLAN 2 modified.

VLAN 1 modified.

VLAN  Mod/Ports

---- -----------------------

2     3/4

!--- Set the port speed to 100 and duplex to full. One of the requirements for EtherChannel !--- to work is for speed and duplex to be the same on both sides. To guarantee this, hard !--- code both speed and duplex on ports 3/1 and 3/2.

Catalyst6500> (enable) set port speed 3/1-2 100

Ports 3/1-2 transmission speed set to 100Mbps.

Catalyst6500> (enable) set port duplex 3/1-2 full

Ports 3/1-2 set to full-duplex.

!--- Enable FEC on ports 3/1 and 3/2. Because routers do not understand Port Aggregation !--- Protocol (PAgP), set the channel mode to one which causes ports to channel but which !--- does not generate PAgP frames.

Catalyst6500> (enable) set port channel 3/1-2 on

Port(s) 3/1-2 are assigned to admin group 105.

Port(s) 3/1-2 channel mode set to on.

!--- Enable trunking on ports 3/1 and 3/2. Because routers do not understand Dynamic !--- Trunking Protocol (DTP), set the trunking mode to nonegotiate, which causes ports to !--- trunk but which does not generate DTP frames. !--- Note: Because EtherChannel is configured first, any trunk settings that are applied !--- now to one port automatically apply to all other ports in the channel. !--- Enter the trunking encapsulation as either ISL…

Catalyst6500> (enable) set trunk 3/1 nonegotiate isl

Port(s) 3/1-2 trunk mode set to nonegotiate.

Port(s) 3/1-2 trunk type set to isl.

!--- …or as dot1q. !--- Ensure that the native VLAN (default is VLAN 1) matches across the link. For more !--- information about the native VLAN and 802.1Q trunking, refer to Trunking Between !--- Catalyst 4500/4000, 5500/5000, and 6500/6000 Series Switches Using 802.1Q !--- Encapsulation with Cisco CatOS System Software.

Catalyst6500> (enable) set trunk 3/1 nonegotiate dot1q

Port(s) 3/1-2 trunk mode set to nonegotiate.

Port(s) 3/1-2 trunk type set to dot1q.

Catalyst6500> (enable) show config

This command shows non-default configurations only.

Use 'show config all' to show both default and non-default configurations.

.........

..................

..

begin

!

# ***** NON-DEFAULT CONFIGURATION *****

!

!

#time: Thu May 2 2002, 01:26:26

!

#version 5.5(14)

!

!

#system

set system name  Catalyst6500

!

#!

#vtp

set vtp mode transparent

set vlan 1 name default type ethernet mtu 1500 said 100001 state active

set vlan 2 name VLAN0002 type ethernet mtu 1500 said 100002 state active

set vlan 1002 name fddi-default type fddi mtu 1500 said 101002 state active

set vlan 1004 name fddinet-default type fddinet mtu 1500 said 101004 state active stp ieee

set vlan 1005 name trnet-default type trbrf mtu 1500 said 101005 state active stp ibm

set vlan 1003 name token-ring-default type trcrf mtu 1500 said 101003 state active

mode srb aremaxhop 7 stemaxhop 7

backupcrf off

!

#ip

set interface sc0 1 10.10.10.2/255.255.255.0 10.10.10.255

set ip route 0.0.0.0/0.0.0.0 10.10.10.1

!

#set boot command

set boot config-register 0x2102

set boot system flash bootflash:cat6000-sup.5-5-14.bin

!

#port channel

set port channel 3/1-2 105

!

# default port status is enable

!

!

#module 1 empty

!

#module 2 : 2-port 1000BaseX Supervisor

!

#module 3 : 48-port 10/100BaseTX Ethernet

set vlan 2    3/4

set port disable    3/5

set port speed      3/1-2  100

set port duplex     3/1-2  full

set trunk 3/1  nonegotiate isl 1-1005

set trunk 3/2  nonegotiate isl 1-1005

!--- If IEEE 802.1Q is configured, you will see this output instead: set trunk 3/1 nonegotiate dot1q 1-1005 set trunk 3/2 nonegotiate dot1q 1-1005

set port channel 3/1-2 mode on

!

#module 4 : 24-port 100BaseFX MM Ethernet

!

#module 5 empty

!

#module 6 empty

!

#module 15 empty

!

#module 16 empty

end

Cisco 7500 ルータ

!--- Configure a port-channel interface to enable FEC.

7500# configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

7500(config)# interface port-channel 1

01:34:10: %LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1, changed

state to down

!--- Configure full-duplex to match the duplex setting on the Catalyst switch side.

7500(config-if)# full-duplex

7500(config-if)# exit

!--- If you are using ISL trunking, configure two port-channel sub-interfaces and issue the !--- encapsulation isl

command to enable ISL trunking. !--- Configure IP addresses for InterVLAN routing.

7500(config)# interface port-channel 1.1

7500(config-subif)# encapsulation isl 1

7500(config-subif)# ip address 10.10.10.1 255.255.255.0

7500(config-subif)# exit

7500(config)# interface port-channel 1.2

7500(config-subif)# encapsulation isl 2

7500(config-subif)# ip address 10.10.11.1 255.255.255.0

7500(config-subif)# exit

!--- If you are using 802.1Q trunking, issue the encapsulation dot1Q

native

!--- command to configure two port-channel sub-interfaces and enable 802.1Q trunking. !--- Configure the IP addresses for InterVLAN routing. !--- Note: The encapsulation dot1Q 1 native command was added in Cisco IOS Software !--- Release 12.1(3)T. If you are using an earlier version of Cisco IOS, see the !--- Cisco 7500 802.1Q Configuration for Cisco IOS Software Releases Earlier than 12.1(3)T !--- section of this document, to configure 802.1Q trunking on the router.

!--- Ensure that the native VLAN (default is VLAN 1) matches across the link. For more !--- information about the native VLAN and 802.1Q trunking, refer to Trunking Between !--- Catalyst 4500/4000, 5500/5000, and 6500/6000 Series Switches Using 802.1Q !--- Encapsulation with Cisco CatOS System Software.

7500(config)# interface port-channel 1.1

7500(config-subif)# encapsulation dot1Q 1 native

7500(config-subif)# ip address 10.10.10.1 255.255.255.0

7500(config-subif)# exit

7500(config)# interface port-channel 1.2

7500(config-subif)# encapsulation dot1Q 2

7500(config-subif)# ip address 10.10.11.1 255.255.255.0

7500(config-subif)# exit

!--- Configure the FastEthernet interfaces for speed 100, depending on the port adapter. !--- Some FastEthernet port adapters can autonegotiate speed (10 or 100) and duplex (half !--- or full). Others are only capable of 100 (half or full).

7500(config)# interface fastethernet 5/1/0

7500(config-if)# speed 100

!--- Issue the channel-group command, to configure the FastEthernet interfaces to be !--- members of port-channel 1.

7500(config-if)# channel-group 1

%Interface MTU set to channel-group MTU 1500.

7500(config-if)# no shut

7500(config-if)#

%Interface MTU set to channel-group MTU 1500.

FastEthernet5/1/0 added as member-1 to port-channel1

01:46:09: %LINK-3-UPDOWN: Interface FastEthernet5/1/0, changed state to up

01:46:10: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet5/1/0,

changed state to up

01:46:12: %LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1,

changed state to up

Router(config-if)# exit

Router(config)# interface fastethernet 5/1/1

Router(config-if)# speed 100

Router(config-if)# channel-group 1

%Interface MTU set to channel-group MTU 1500.

Router(config-if)# no shut

Router(config-if)#

%Interface MTU set to channel-group MTU 1500.

FastEthernet5/1/1 added as member-2 to port-channel1

01:54:52: %LINK-3-UPDOWN: Interface FastEthernet5/1/1, changed state to up

01:54:53: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet5/1/1,

changed state to up

Router(config-if)# exit

!--- Remember to save the configuration.

7500# write memory

Building configuration...

[OK]

7500#

!--- Note: To make this setup work and to successfully ping between Workstation 1 and !--- Workstation 2, you must ensure that the default gateways on the workstations are setup !--- properly. For Workstation 1, the default gateway should be 10.10.10.1; and for !--- Workstation 2, the default gateway should be 10.10.11.1.

7500# show running-config

Building configuration...

Current configuration : 1593 bytes

!

version 12.2

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

no service single-slot-reload-enable

!

hostname 7500

!

boot system disk1:rsp-jsv-mz.122-7b.bin

!

ip subnet-zero

!

ip cef

call rsvp-sync

!

!

!

interface Port-channel1

no ip address

full-duplex

hold-queue 300 in

!

interface Port-channel1.1

encapsulation isl 1

ip address 10.10.10.1 255.255.255.0

!

interface Port-channel1.2

encapsulation isl 2

ip address 10.10.11.1 255.255.255.0

!--- If 802.1Q trunking is configured, you will see this output instead: interface Port-channel1.1 encapsulation dot1Q 1 native ip address 10.10.10.1 255.255.255.0 ! interface Port-channel1.2 encapsulation dot1Q 2 ip address 10.10.11.1 255.255.255.0

!

interface FastEthernet5/1/0

no ip address

no ip mroute-cache

speed 100

full-duplex

channel-group 1

!

interface FastEthernet5/1/1

no ip address

no ip mroute-cache

speed 100

full-duplex

channel-group 1

!

!

ip classless

no ip http server

ip pim bidir-enable

!

!

!

!

line con 0

line aux 0

line vty 0 4

login

!

end

12.1(3)Tより前のCisco IOSソフトウェアリリースのCisco 7500 802.1Q設定

12.1(3)T よりも前のバージョンの Cisoco IOS では、サブインターフェイスで encapsulation dot1Q 1 native コマンドを使用できません。ただし、上記のとおり、リンク間で本来の VLAN を一致させる必要があることに変わりありません。12.1(3)Tよりも前のソフトウェアバージョンで802.1Qトランキングを設定するには、ポートチャネルサブインターフェイスではなく、メインポートチャネル1インターフェイスでVLAN 1のIPアドレスを設定します。

!--- Configure a port-channel interface to enable FEC.

7500# configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

7500(config)# interface port-channel 1

01:34:10: %LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1, changed

state to down

!--- Configure full-duplex to match the duplex setting on the Catalyst switch side.

7500(config-if)# full-duplex

7500(config-if)# exit

!--- Do not configure an interface port-channel 1.1 !--- Instead, create a port-channel 1 main interface and configure the IP address !--- for VLAN 1 here.

7500(config)# interface port-channel 1

7500(config-if)# full-duplex

7500(config-if)# ip address 10.10.10.1 255.255.255.0

7500(config-if)# exit

7500(config)#

!--- It is still necessary to create a subinterface for VLAN 2.

7500(config)# interface port-channel 1.2

7500(config-subif)# encapsulation dot1Q 2

7500(config-subif)# ip address 10.10.11.1 255.255.255.0

7500(config-subif)# exit

!--- Configure the FastEthernet interfaces for speed 100, depending on the port adapter. !--- Some FastEthernet port adapters can autonegotiate speed (10 or 100) and duplex (half !--- or full). Others are only capable of 100 (half or full).

7500(config)# interface fastethernet 5/1/0

7500(config-if)# speed 100

!--- Issue the channel-group command to configure the FastEthernet interfaces to be !--- members of port-channel 1.

7500(config-if)# channel-group 1

%Interface MTU set to channel-group MTU 1500.

7500(config-if)# no shut

7500(config-if)#

%Interface MTU set to channel-group MTU 1500.

FastEthernet5/1/0 added as member-1 to port-channel1

01:46:09: %LINK-3-UPDOWN: Interface FastEthernet5/1/0, changed state to up

01:46:10: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet5/1/0,

changed state to up

01:46:12: %LINEPROTO-5-UPDOWN: Line protocol on Interface Port-channel1,

changed state to up

Router(config-if)# exit

Router(config)# interface fastethernet 5/1/1

Router(config-if)# speed 100

Router(config-if)# channel-group 1

%Interface MTU set to channel-group MTU 1500.

Router(config-if)# no shut

Router(config-if)#

%Interface MTU set to channel-group MTU 1500.

FastEthernet5/1/1 added as member-2 to port-channel1

01:54:52: %LINK-3-UPDOWN: Interface FastEthernet5/1/1, changed state to up

01:54:53: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet5/1/1,

changed state to up

Router(config-if)# exit

!--- Remember to save the configuration.

7500# write memory

Building configuration...

[OK]

7500#

!--- Note: Remember also that—in any version of software previous to 12.2 or 12.2T for the !--- 7000/7500 series—you will have to issue the no ip cef command globally before you !--- configure 802.1Q trunking on a subinterface. Otherwise, you will see this error !--- message: 802.1q encapsulation not supported with CEF configured on the interface. !--- See the Components Used section of this document for more information.

7500# show running-config

Building configuration...

Current configuration : 1593 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 7500

!

!

ip subnet-zero

!

no ip cef

!

!

!

interface Port-channel1

ip address 10.10.10.1 255.255.255.0

full-duplex

hold-queue 300 in

!

interface Port-channel1.2

encapsulation dot1Q 2

ip address 10.10.11.1 255.255.255.0

!

interface FastEthernet5/1/0

no ip address

no ip mroute-cache

speed 100

full-duplex

channel-group 1

!

interface FastEthernet5/1/1

no ip address

no ip mroute-cache

speed 100

full-duplex

channel-group 1

!

!

ip classless

no ip http server

!

!

!

line con 0

line aux 0

line vty 0 4

login

!

end

7500#

確認

ここでは、設定が正常に機能しているかどうかを確認します。

アウトプット インタープリタ ツール（登録ユーザ専用）（OIT）は、特定の show コマンドをサポートします。OIT を使用して、show コマンドの出力の分析を表示します。

Catalyst 6500 の show コマンド

- show interface:sc0管理インターフェイスのIPアドレスとVLANを表示します。この例では、デフォルトのVLAN(VLAN 1)が使用されています。

Catalyst6500> (enable) show interface

sl0: flags=51<UP,POINTOPOINT,RUNNING>

slip 0.0.0.0 dest 0.0.0.0

sc0: flags=63

VLAN 1 inet 10.10.10.2 netmask 255.255.255.0 broadcast 10.10.10.255

Catalyst6500> (enable)

- show ip route：デフォルトゲートウェイを表示します。この例では、10.10.10.1はポートチャネル1（802.1Qトランキングの場合）またはポートチャネル1.1（ISLトランキングの場合）のIPアドレスです。

Catalyst6500> (enable) show ip route

Fragmentation   Redirect   Unreachable

-------------   --------   -----------

enabled         enabled    enabled

The primary gateway: 10.10.10.1

Destination      Gateway          RouteMask    Flags   Use       Interface

---------------  ---------------  ----------   -----   --------  ---------

default          10.10.10.1       0x0          UG      0           sc0

10.10.10.0       10.10.10.2       0xffffff00   U       8           sc0

default          default          0xff000000   UH      0           sl0

Catalyst6500> (enable)

- show port capabilities mod/port：スイッチングモジュールのハードウェア機能を簡単に確認できます。この例では、ポート3/1（および3/2）がEtherChannelに対応しており、どのトランキングカプセル化がサポートされているか、およびその他の情報が表示されています。

Catalyst6500> (enable) show port capabilities 3/1

Model                    WS-X6248-RJ-45

Port                     3/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  yes

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(1q4t),tx-(2q2t)

CoS rewrite              yes

ToS rewrite              DSCP

UDLD                     yes

Inline power             no

AuxiliaryVlan            1..1000,untagged,dot1p,none

SPAN                     source,destination

COPS port group          not supported

Catalyst6500> (enable)

- show port counters mod/port：ポートエラーの可能性を簡単に確認できます。この例では、このポートにまったくエラーが発生していません。ポートでエラーが発生した場合は、「トラブルシューティング：スイッチポートとインターフェイスの問題」を参照してください。

Catalyst6500> (enable) show port counters 3/1

Port  Align-Err  FCS-Err    Xmit-Err   Rcv-Err    UnderSize

----- ---------- ---------- ---------- ---------- ---------

3/1           0          0          0          0         0

Port  Single-Col Multi-Coll Late-Coll  Excess-Col Carri-Sen Runts     Giants

----- ---------- ---------- ---------- ---------- --------- --------- ---------

3/1           0          0          0          0         0         0         -

Last-Time-Cleared

--------------------------

Thu May 2 2002, 02:11:55

Catalyst6500> (enable)

- show port mod：ポートステータス、VLAN、トランク、および速度とデュプレックスの情報を表示します。この例では、Workstation 1のアクセスポートは3/3で、これはVLAN 1にあります。Workstation 2のアクセスポートは3/4で、これはVLAN 2です。ポート3/1および3/2はトランキングおよびFECポートです。

Catalyst6500> (enable) show port 3

Port  Name                 Status     VLAN       Duplex Speed Type

----- -------------------- ---------- ---------- ------ ----- ------------

3/1                       connected  trunk        full   100 10/100BaseTX

3/2                       connected  trunk        full   100 10/100BaseTX

3/3                       connected  1          a-half  a-10 10/100BaseTX

3/4                       connected  2          a-full a-100 10/100BaseTX

!--- Output suppressed.

- show vlan：特定のVLANに割り当てられているポートを表示します。この例のトランクポート（3/1および3/2）は、通常の出力では表示されません。

Catalyst6500> (enable) show vlan

VLAN Name                             Status    IfIndex Mod/Ports, Vlans

---- -------------------------------- --------- ------- ------------------------

1    default                          active    119     2/1-2

3/3,3/5-48

4/1-24

2    VLAN0002                         active    124     3/4

!--- Output suppressed.

- show trunk：トランキングモード、カプセル化タイプ、許可されるVLAN、およびアクティブなVLANを表示します。この例では、VLAN 1（デフォルトで常に許可されアクティブ）および VLAN 2 がトランクに対して現在アクティブな VLAN です。両方のトランク ポートが VLAN 1 にある点に注意してください。

Catalyst6500> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

3/1      nonegotiate  isl            trunking      1

3/2      nonegotiate  isl            trunking      1

Port      VLANs allowed on trunk

--------  ---------------------------------------------------------------------

3/1      1-1005

3/2      1-1005

Port      VLANs allowed and active in management domain

--------  ---------------------------------------------------------------------

3/1      1-2

3/2      1-2

Port      VLANs in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

3/1      1-2

3/2      1-2

802.1Qトランキングでは、前のコマンドの出力が次のように変わります。

Catalyst6500> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native VLAN

--------  -----------  -------------  ------------  -----------

3/1      nonegotiate  dot1q          trunking      1

3/2      nonegotiate  dot1q          trunking      1

Port      VLANs allowed on trunk

--------  ---------------------------------------------------------------------

3/1      1-1005

3/2      1-1005

Port      VLANs allowed and active in management domain

--------  ---------------------------------------------------------------------

3/1      1-2

3/2      1-2

Port      VLANs in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

3/1      1-2

3/2      1-2

Catalyst6500> (enable)

- show port channel:EtherChannelのステータスを表示します。この例では、PAgPフレームの送信を防ぐために、2ポートFEC（ポート3/1および3/2）がオンになっています。7500ルータのリモートポートチャネルインターフェイスも表示されます。

Catalyst6500> (enable)  show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

3/1  connected  on                     105   833

3/2  connected  on                     105   833

----- ---------- -------------------- ----- -----

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

3/1  7500                            Port-channel1.1           cisco RSP4

3/2

----- ------------------------------- ------------------------- ----------------

Catalyst6500> (enable)

802.1Qトランキングを使用するFECでは、前のコマンドの出力が次のように変わります。

Catalyst6500> (enable) show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

3/1   connected  on                    257   769

3/2   connected  on                    257   769

----- ---------- -------------------- ----- -----

Port  Device-ID                       Port-ID                   Platform

----- ------------------------------- ------------------------- ----------------

3/1       7500                            FastEthernet5/1/0         cisco RSP4

3/2       7500                            FastEthernet5/1/1         cisco RSP4

----- ------------------------------- ------------------------- ----------------

Catalyst6500> (enable)

ご使用のシスコデバイスのshow-tech supportコマンドの出力データがあれば、Output Interpreter Tool(登録ユーザ専用)を使用して潜在的な問題と修正を表示できます。

Cisco 7500 ルータの show コマンド

- show interface port-channel channel number：物理インターフェイスのメンバーステータスを表示します。この例では、Catalyst 6000のポート3/1と3/2の間、および7500のインターフェイスFastEthernet 5/1/0と5/1/1の間に2ポートFECが設定されています。ポートチャネル1はup/upと表示されます。

IPアドレスが設定されています。この場合は、802.1QトランキングのネイティブVLAN IPアドレスです。詳細は、このドキュメントの「Cisco IOSソフトウェアリリース12.1Tより前のCisco 7500 802.1Qの設定」セクションを参照してください。VLAN 2 802.1Qサブインターフェイスの出力は、show interface port channel 1.2コマンドでも表示されます。

7500# show interface port-channel 1

Port-channel1 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

Internet address is 10.10.10.1/24

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

Full-duplex, Unknown Speed

ARP type: ARPA, ARP Timeout 04:00:00

No. of active members in this channel: 2

Member 0 : FastEthernet5/1/0

Member 1 : FastEthernet5/1/1

Last input 00:00:14, output never, output hang never

Last clearing of "show interface" counters never

Input queue: 0/300/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

6720 packets input, 923310 bytes, 0 no buffer

Received 5010 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog

0 input packets with dribble condition detected

1902 packets output, 573088 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

7500#

7500# show interface port-channel 1.2

Port-channel1.2 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

Internet address is 10.10.11.1/24

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation 802.1q Virtual LAN, Vlan ID  2.

ARP type: ARPA, ARP Timeout 04:00:00

ISLトランキングとFECの出力を次に示します。

7500# show interface port-channel 1

Port-channel1 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

Full-duplex, Unknown Speed

ARP type: ARPA, ARP Timeout 04:00:00

No. of active members in this channel: 2

Member 0 : FastEthernet5/1/0

Member 1 : FastEthernet5/1/1

Last input 00:00:01, output never, output hang never

Last clearing of "show interface" counters never

Input queue: 0/300/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 1 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

113 packets input, 7278 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog

0 input packets with dribble condition detected

13 packets output, 2264 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

7500# show interface port-channel 1.1

Port-channel1.1 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

Internet address is 10.10.10.1/24

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ISL Virtual LAN, Color 1.

ARP type: ARPA, ARP Timeout 04:00:00

7500# show interface port-channel 1.2

Port-channel1.2 is up, line protocol is up

Hardware is FEChannel, address is 0001.6490.f8a8 (bia 0000.0000.0000)

Internet address is 10.10.11.1/24

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ISL Virtual LAN, Color 2.

ARP type: ARPA, ARP Timeout 04:00:00

- show interfaces fastethernet slot/port-adapter/port：ルータの物理インターフェイスのステータスと、インターフェイスにエラーが存在するかどうかを表示します。この例では、エラーはありません。

7500# show interface fastethernet 5/1/0

FastEthernet5/1/0 is up, line protocol is up

Hardware is cyBus FastEthernet Interface, address is 0001.6490.f8a8

(bia 0001.6490.f8a8)

MTU 1500 bytes, BW 100000 Kbit, DLY 100 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

Full-duplex, 100Mb/s, 100BaseTX/FX

ARP type: ARPA, ARP Timeout 04:00:00

Last input 1d00h, output 00:00:07, output hang never

Last clearing of "show interface" counters 1d00h

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

2929 packets input, 425318 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog

0 input packets with dribble condition detected

12006 packets output, 1539768 bytes, 0 underruns

0 output errors, 0 collisions, 6 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

7500#

トラブルシュート

現在、この設定に関する特定のトラブルシューティング情報はありません。

関連情報

- LAN 製品に関するサポート ページ

- EtherChannel に関するサポート ページ

- LAN スイッチングに関するサポート ページ

- テクニカル サポートとドキュメント – Cisco Systems