内容

概要

はじめに

表記法

前提条件

使用するコンポーネント

背景理論

設定

ネットワーク図

設定

ダイヤラ ウォッチ コマンド

確認

トラブルシュート

トラブルシューティングのためのコマンド

トラブルシューティング出力例

関連情報

概要

この文書は、ダイヤラ ウォッチ機能を使用して専用回線、WAN、またはシリアル接続をバックアップするための ISDN Basic Rate Interface（BRI; 基本インターフェイス）の使用について説明しています。ダイヤラ ウォッチの機能と動作の詳細については、『Evaluating Backup Interfaces, Floating Static Routes, and Dialer Watch for DDR Backup』を参照してください。

はじめに

表記法

ドキュメント表記の詳細は、『シスコ テクニカル ティップスの表記法』を参照してください。

前提条件

DDR バックアップの設定では、2 つの異なる手順を行います。

1. DDR を、レガシー DDR とダイヤラ プロファイルのどちらかを使用して設定します。DDR 接続が正常に機能することを確認してから、バックアップ設定を実装します。これにより、バックアップを設定する前に、使用されるダイヤル方式、ポイントツーポイントプロトコル(PPP)ネゴシエーション、および認証が成功していることを確認できます。

2. プライマリ リンクに障害が発生したときにバックアップ DDR 接続を開始するようルータを設定します。この設定ではダイヤラ ウォッチ機能を使用してダイヤルアウトします。

バックアップの設定に必要な手順の詳細については、ドキュメント『DDRバックアップの設定とトラブルシューティング』を参照してください。

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づくものです。

- Cisco IOS??が稼働する2台のCisco 2500ルータ（フレームリレーDTE）ソフトウェアリリース12.2(3)および12.2(5)。

- フレームリレー スイッチとして機能する 1 台の Cisco 4500 ルータ。

このマニュアルの情報は、特定のラボ環境に置かれたデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。実稼動中のネットワークで作業をしている場合、実際にコマンドを使用する前に、その潜在的な影響について理解しておく必要があります。

背景理論

この例では、バックアップBRIリンクにダイヤラプロファイルを使用しています。また、バックアップBRI接続にdialer mapコマンドを使用するレガシーダイヤルオンデマンドルーティング(DDR)を使用することもできます。ダイヤラマップを使用したダイヤラウォッチの設定の詳細については、『BRIとダイヤラウォッチを使用したDDRバックアップの設定』を参照してください。

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注：このドキュメントで使用されているコマンドの詳細を調べるには、Command Lookupツールを使用してください

ネットワーク図

このドキュメントでは次の図に示すネットワーク構成を使用しています。

設定

このドキュメントでは、次に示す設定を使用しています。

- krimson（Cisco 2500 ルータ）

- kevin(2500)

krimson（Cisco 2500 ルータ）

krimson#show running-config

Building configuration...

Current configuration : 5055 bytes

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname krimson

!

logging buffered 500000 debugging

no logging console

enable password <deleted>

!

username kevin password 0 <deleted>

ip subnet-zero

no ip domain-lookup

!

isdn switch-type basic-net3

!

interface Ethernet0

ip address 10.200.16.30 255.255.255.0

no ip route-cache

no ip mroute-cache

no cdp enable

! <<- Unused interface configuration omitted

!

interface Serial1

!--- Primary Link (Frame Relay)

bandwidth 64

no ip address

encapsulation frame-relay

no ip route-cache

no ip mroute-cache

!

interface Serial1.1 point-to-point

!--- Point-to-point Frame Relay subinterface

ip address 10.5.5.2 255.255.255.0

no ip route-cache

frame-relay interface-dlci 20

!

interface BRI0

!--- Backup physical interface

description Backup ISDN, Nr. 4420038

no ip address

encapsulation ppp

no ip route-cache

no ip mroute-cache

load-interval 30

no keepalive

dialer pool-member 1

!--- BRI 0 is a member of dialer pool 1

isdn switch-type basic-net3

no fair-queue

no cdp enable

ppp authentication chap

!

interface Dialer0

!--- Logical interface for the backup

ip address 10.9.9.1 255.255.255.0

!--- The dialer is in the same network as the remote dialer interface

encapsulation ppp

no ip route-cache

no ip mroute-cache

dialer pool 1

!--- Dialer pool 1. BRI 0 is a member of this pool

dialer remote-name kevin

!--- Authenticated remote name of the peer. !--- Verify that this name exactly matches the authenticated name !--- of the remote dialer

dialer string 6120

!--- Number for outbound call. For inbound calls this is not needed

dialer watch-group 1

!--- Enable dialer watch on this backup interface. !--- Watch the route specified with dialer watch-list 1

dialer-group 1

!--- Apply interesting traffic defined in dialer-list 1

no cdp enable

ppp authentication chap

!

!

router ospf 10

log-adjacency-changes

network 10.5.5.0 0.0.0.255 area 0

network 10.7.7.0 0.0.0.255 area 0

network 10.9.9.0 0.0.0.255 area 0

!

no ip classless

ip route 0.0.0.0 0.0.0.0 10.200.16.1

!--- Default route through ethernet 0

no ip http server

!

access-list 101 deny ospf any any

!--- Mark OSPF as uninteresting. !--- This will prevent OSPF hellos from keeping the link up

access-list 101 permit ip any any

!--- All other IP traffic is interesting

dialer watch-list 1 ip 10.8.8.0 255.255.255.0

!--- This defines the route(s) to be watched. !--- This exact route(including subnet mask) must exist in the routing table. !--- Use the dialer watch-group 1 command to apply this list to the backup !--- interface (interface dialer 0)

dialer-list 1 protocol ip list 101

!--- Interesting traffic is defined by access-list 101. !--- This is applied to BRI0 using dialer-group 1

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

transport input all

line vty 0 4

exec-timeout 0 0

password <deleted>

login

!

end

kevin(2500)

kevin#show running-config

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname kevin

!

username krimson password 0 <password>

!

isdn switch-type basic-net3

!

!

interface Loopback0

ip address 10.8.8.1 255.255.255.0

!--- This is the network the remote side is watching

ip ospf network point-to-point

!

interface Loopback1

ip address 172.19.0.1 255.255.255.255

!

interface Ethernet0

ip address 10.200.17.26 255.255.255.0

!

interface Serial0

no ip address

encapsulation frame-relay

!

interface Serial0.1 point-to-point

!--- Primary link (Frame Relay sub-interface)

ip address 10.5.5.1 255.255.255.0

frame-relay interface-dlci 20

!

interface BRI0

!--- Physical interface

no ip address

encapsulation ppp

dialer pool-member 1

!--- Member of dialer pool 1

isdn switch-type basic-net3

no cdp enable

ppp authentication chap

!

interface Dialer0

!--- Logical interface for incoming call

ip address 10.9.9.2 255.255.255.0

!--- The dialer is in the same network as the remote dialer interface

encapsulation ppp

dialer pool 1

!--- Dialer pool 1. BRI 0 is a member of this pool

dialer remote-name krimson

!--- Authenticated remote name of the peer. !--- Verify that this name exactly matches the authenticated name !--- of the remote dialer.

dialer-group 1

!--- Apply interesting traffic defined in dialer-list 1

no cdp enable

ppp authentication chap

!

router ospf 10

log-adjacency-changes

network 10.5.5.0 0.0.0.255 area 0

network 10.8.8.0 0.0.0.255 area 0

!--- Advertise the network the remote router is watching

network 10.9.9.0 0.0.0.255 area 0

!

ip classless

ip route 0.0.0.0 0.0.0.0 10.200.17.1

no ip http server

!

dialer-list 1 protocol ip permit

!--- Interesting traffic definition. All IP traffic is interesting. !--- This is applied to BRI0 using dialer-group 1. !--- Since the remote router activates and deactivates the backup, this router !--- does not need to restrict interesting traffic

no cdp run

!

line con 0

exec-timeout 0 0

line aux 0

modem InOut

line vty 0 4

exec-timeout 0 0

password <password>

login

!

end

注：  maui-nas-05の設定には、バックアップ関連のコマンドは含まれていません。maui-nas-05では、バックアップリンクは単なる別のダイヤルインクライアントです。これにより、多数のデバイスが同じ中央サイトへのバックアップ リンクを確立する、中央サイトの設定を簡略化できます。バックアップのシナリオでは、一方からのみダイヤルを開始し、他方ではコールの受信だけを行うのが理想です。

ダイヤラ ウォッチ コマンド

ダイヤラ ウォッチで使用できるコマンドの一覧を次に示します。これらのコマンドの一部は上の設定にすでに含まれており、その他は参考のために記載されています。

- dialer watch-list group-number ip ip-address address-mask：監視する IP アドレスまたはネットワークを定義します。設定するアドレスまたはネットワーク（正しいマスク付き）はルーティング テーブルに存在する必要があります。dialer watch-list コマンドを使用して複数の経路を監視することもできます。次に例を示します。

dialer watch-list 1 ip 10.1.1.0 255.255.255.0

dialer watch-list 1 ip 10.1.2.0 255.255.255.0

dialer watch-list 1 ip 10.1.3.0 255.255.255.0

- dialer watch-group group-number：バックアップ インターフェイスでダイヤラ ウォッチを有効化します。ここで使用する group number は、監視対象の経路を定義している dialer watch-list の group number と一致します。特定のグループ番号を指定した dialer watch-group コマンドは 1 つのインターフェイスでのみ設定できます。このため、ルータで複数のインターフェイスを使用して特定の経路のバックアップを提供することはできません。しかし、グループ番号の異なる複数の dialer watch-group コマンドを 1 つのインターフェイスに設定することは可能です。したがって、1 つのインターフェイスを使用して複数の経路のバックアップを提供できます。

- dialer watch-disable seconds：ディセーブル遅延時間をインターフェイスに適用します。プライマリ インターフェイスの回復後、この遅延によってバックアップ インターフェイスの接続解除が指定の時間間隔だけ抑えられます。この遅延タイマーは、アイドル タイマーが時間切れになり、なおかつプライマリ ルートのステータスがチェックされ、アップになったことが判明したときにスタートします。この遅延により、特にフラッピングが発生しているインターフェイスや経路変更が頻繁に起こるインターフェイスが安定します。

- dialer watch-list group-number delay route-check initial seconds：このコマンドにより、ルータの初期始動が完了して、タイマー（秒単位）の期限が切れた後、プライマリ ルートがアップしているかどうかがルータでチェックできます。このコマンドがないと、ダイヤラ ウォッチはプライマリ ルートがルーティング テーブルから削除されたときにしか開始されません。ルータの初期始動中にプライマリ リンクのアップが失敗すると、経路がルーティング テーブルに追加されないため、経路を監視できません。したがって、このコマンドにより、ルータの初期始動中にプライマリ リンクに万一障害が起きてもダイヤラ ウォッチがバックアップ リンクにダイヤルするようにします。

確認

ここでは、設定が正しく機能していることを確認するために使用する情報を示します。

特定の show コマンドは、アウトプット インタープリタでサポートされています。このツールを使用すると、show コマンド出力を分析できます。

- show interfaces serial：マルチキャスト データリンク接続識別子（DLCI）、インターフェイスで使用する DLCI、およびローカル管理インターフェイス（LMI）に使用する DLCI に関する情報を表示します。 プライマリインターフェイスがアップまたはダウンしていることを確認するには、これを使用します。

- show interface dialer：ダイヤラインターフェイスのステータスを表示します。

- show ip route：IP ルーティング テーブルのエントリを表示します。監視対象のネットワークがルーティングテーブルに存在することを確認します（プライマリリンクがアップしている場合）。 プライマリリンクがダウンし、バックアップがダイヤルされると、ルーティングテーブルが再コンバージェンスされ、監視ネットワークが再び表示されます（ダイヤラインターフェイスとしてネクストホップ）。

トラブルシュート

ここでは、設定のトラブルシューティングに使用できる情報を示します。

ここで使用するフレームリレー設定では、 ポイントツーポイント サブインターフェイスを使用し、 ルーティング プロトコルとして Open Shortest Path First（OSPF）を使用しています。このフレームリレー設定は、ここに記載する設定に固有のものです。ただし、下記のトラブルシューティングの手順は一般的なものであり、使用するルーティング プロトコルに無関係に、フレームリレー ポイントツーマルチポイントやハイレベル データリンク制御（HDLC）の 1 次リンク、Point to Point Protocol（PPP）などの設定の場合にも使用できます。

バックアップの機能性を検証するために、シャットダウン状態のフレームリレー スイッチとして機能する Cisco 4500 ルータのインターフェイスの 1 つを用意し、フレームリレー ネットワーク内の問題をシミュレートしています。この結果、フレームリレー ネットワーク経由で DTE ルータが PVC 非アクティブ状態になり、フレームリレー サブインターフェイス ダウン イベントが発生します。その結果、監視対象ルートが消失し、バックアップリンクがアクティブになります。

ダイヤラウォッチのトラブルシューティングの詳細については、ドキュメント『DDRバックアップの設定とトラブルシューティング』を参照してください。

トラブルシューティングのためのコマンド

特定の show コマンドは、アウトプット インタープリタでサポートされています。このツールを使用すると、show コマンド出力を分析できます。

注：debug コマンドを使用する前に、「debug コマンドに関する重要な情報」を参照してください。

- debug isdn q931：ローカル ルータ（ユーザ側）とネットワーク間の ISDN ネットワーク接続（レイヤ 3）のコール セットアップやティアダウンに関する情報を表示。

- debug backup：バックアップ イベントをデバッグします。

- debug dialer：ダイヤラ インターフェイス上のパケットまたはイベントに関するデバッグ情報を表示。

- debug ppp negotiation：PPP 始動（PPP オプションのネゴシエート）中に伝送される PPP パケットを表示させる。

- debug ppp authentication：debug ppp コマンドに、 Challenge Authentication Protocol（CHAP）パケットの交換や パスワード認証プロトコル（PAP）交換などの認証プロトコル メッセージを表示させる。

- debug ip ospf events：隣接関係、フラッディング情報、代表ルータの選択、 Shortest Path First（SPF）の計算などの OSPF 関連のイベントに関する情報を表示する。

- debug frame-relay events：マルチキャスト チャネルをサポートし、 ダイナミック アドレッシングを使用するネットワークにおける フレームリレー アドレス解決プロトコル（ARP）応答に関するデバッグ情報を表示する。

トラブルシューティング出力例

次の出力では、フレームリレーインターフェイスはアップしています。

krimson#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.200.16.1 to network 0.0.0.0

10.0.0.0/24 is subnetted, 6 subnets

C 10.5.5.0 is directly connected, Serial1.1

O 10.8.8.0 [110/1563] via 10.5.5.1, 00:01:31, Serial1.1

!--- Initial state through the primary Frame Relay interface, !--- before line failure occurred

C 10.9.9.0 is directly connected, Dialer0

C 10.7.7.0 is directly connected, Loopback0

C 10.200.16.0 is directly connected, Ethernet0

S* 0.0.0.0/0 [1/0] via 10.200.16.1

krimson#

*Apr 17 01:00:50.591: OSPF: Rcv hello from 172.19.0.1 area 0

from Serial1.1 10.5.5.1

*Apr 17 01:00:50.595: OSPF: End of hello processing

*Apr 17 01:00:51.127: %SYS-5-CONFIG_I: Configured from console by console

*Apr 17 01:01:00.591: OSPF: Rcv hello from 172.19.0.1 area 0 from Serial1.1

10.5.5.1

*Apr 17 01:01:00.595: OSPF: End of hello processing

*Apr 17 01:01:05.243: %LINK-3-UPDOWN: Interface Serial1, changed state to down

!--- Frame Relay failure simulated by shutting down the interface on !--- the Cisco 4500 router(acting as switch)

*Apr 17 01:01:05.251: OSPF: Interface Serial1.1 going Down

*Apr 17 01:01:05.255: %OSPF-5-ADJCHG: Process 10, Nbr 172.19.0.1 on Serial1.1

from FULL to DOWN, Neighbor Down: Interface down or detached

*Apr 17 01:01:05.399: DDR: Dialer Watch: watch-group = 1

*Apr 17 01:01:05.403: DDR: network 10.8.8.0/255.255.255.0 DOWN,

!--- Watched network is down

*Apr 17 01:01:05.407: DDR: primary DOWN

*Apr 17 01:01:05.407: DDR: Dialer Watch: Dial Reason: Primary of group 1 DOWN

*Apr 17 01:01:05.411: DDR: Dialer Watch: watch-group = 1,

*Apr 17 01:01:05.411: BR0 DDR: rotor dialout [priority]

*Apr 17 01:01:05.411: DDR: dialing secondary by dialer string 6120 on Di0

!--- router dials 6120 on interface Dialer 1

*Apr 17 01:01:05.415: BR0 DDR: Attempting to dial 6120

*Apr 17 01:01:05.523: ISDN BR0: TX -> SETUP pd = 8 callref = 0x43

*Apr 17 01:01:05.531: Bearer Capability i = 0x8890

*Apr 17 01:01:05.535: Channel ID i = 0x83

*Apr 17 01:01:05.543: Called Party Number i = 0x80, '6120', Plan:Unknown,

Type:Unknown

*Apr 17 01:01:05.599: ISDN BR0: RX <- CALL_PROC pd = 8 callref = 0xC3

*Apr 17 01:01:05.603: Channel ID i = 0x89

*Apr 17 01:01:05.855: ISDN BR0: RX <- CONNECT pd = 8 callref = 0xC3

*Apr 17 01:01:05.875: %LINK-3-UPDOWN: Interface BRI0:1, changed state to up

*Apr 17 01:01:05.875: BR0:1 DDR: Dialer Watch: resetting call in progress

*Apr 17 01:01:05.883: %DIALER-6-BIND: Interface BR0:1 bound to profile Di0

*Apr 17 01:01:05.891: BR0:1 PPP: Treating connection as a callout

*Apr 17 01:01:05.895: BR0:1 PPP: Phase is ESTABLISHING, Active Open

[0 sess, 0 load]

*Apr 17 01:01:05.899: BR0:1 LCP: O CONFREQ [Closed] id 54 len 15

*Apr 17 01:01:05.903: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Apr 17 01:01:05.903: BR0:1 LCP: MagicNumber 0xF24F182E (0x0506F24F182E)

*Apr 17 01:01:05.911: ISDN BR0: TX -> CONNECT_ACK pd = 8 callref = 0x43

*Apr 17 01:01:05.939: BR0:1 LCP: I CONFREQ [REQsent] id 88 len 15

*Apr 17 01:01:05.943: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Apr 17 01:01:05.943: BR0:1 LCP: MagicNumber 0x9B15A6B0 (0x05069B15A6B0)

*Apr 17 01:01:05.947: BR0:1 LCP: O CONFACK [REQsent] id 88 len 15

*Apr 17 01:01:05.951: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Apr 17 01:01:05.955: BR0:1 LCP: MagicNumber 0x9B15A6B0 (0x05069B15A6B0)

*Apr 17 01:01:05.959: BR0:1 LCP: I CONFACK [ACKsent] id 54 len 15

*Apr 17 01:01:05.963: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Apr 17 01:01:05.963: BR0:1 LCP: MagicNumber 0xF24F182E (0x0506F24F182E)

*Apr 17 01:01:05.967: BR0:1 LCP: State is Open

*Apr 17 01:01:05.967: BR0:1 PPP: Phase is AUTHENTICATING, by both

[0 sess, 0 load]

*Apr 17 01:01:05.971: BR0:1 CHAP: O CHALLENGE id 54 len 28 from "krimson"

*Apr 17 01:01:06.051: BR0:1 CHAP: I CHALLENGE id 56 len 26 from "kevin"

*Apr 17 01:01:06.055: BR0:1 CHAP: O RESPONSE id 56 len 28 from "krimson"

*Apr 17 01:01:06.151: BR0:1 CHAP: I SUCCESS id 56 len 4

*Apr 17 01:01:06.167: BR0:1 CHAP: I RESPONSE id 54 len 26 from "kevin"

*Apr 17 01:01:06.175: BR0:1 CHAP: O SUCCESS id 54 len 4

*Apr 17 01:01:06.179: BR0:1 PPP: Phase is UP [0 sess, 0 load]

*Apr 17 01:01:06.183: BR0:1 IPCP: O CONFREQ [Not negotiated] id 46 len 10

*Apr 17 01:01:06.187: BR0:1 IPCP: Address 10.9.9.1 (0x03060A090901)

*Apr 17 01:01:06.279: BR0:1 IPCP: I CONFREQ [REQsent] id 34 len 10

*Apr 17 01:01:06.283: BR0:1 IPCP: Address 10.9.9.2 (0x03060A090902)

*Apr 17 01:01:06.287: BR0:1 IPCP: O CONFACK [REQsent] id 34 len 10

*Apr 17 01:01:06.291: BR0:1 IPCP: Address 10.9.9.2 (0x03060A090902)

*Apr 17 01:01:06.295: BR0:1 IPCP: I CONFACK [ACKsent] id 46 len 10

*Apr 17 01:01:06.299: BR0:1 IPCP: Address 10.9.9.1 (0x03060A090901)

*Apr 17 01:01:06.303: BR0:1 IPCP: State is Open

*Apr 17 01:01:06.315: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial1,

changed state to down

*Apr 17 01:01:06.319: BR0:1 DDR: dialer protocol up

*Apr 17 01:01:06.327: Di0 IPCP: Install route to 10.9.9.2

*Apr 17 01:01:07.175: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0:1,

changed state to up

!--- Call connects

*Apr 17 01:01:10.775: OSPF: Rcv hello from 172.19.0.1 area 0 from Dialer0 10.9.9.2

!--- OSPF hello from the peer

*Apr 17 01:01:10.779: OSPF: End of hello processing

*Apr 17 01:01:11.891: %ISDN-6-CONNECT: Interface BRI0:1 is now connected to 6120

kevin#show interface serial 1.1

Serial1.1 is down, line protocol is down

!--- Primary link is still down

Hardware is HD64570

Internet address is 10.5.5.2/24

MTU 1500 bytes, BW 64 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation FRAME-RELAY

krimson#show interface dialer 0

!--- Backup interface is up and active

Dialer0 is up, line protocol is up (spoofing)

Hardware is Unknown

Internet address is 10.9.9.1/24

MTU 1500 bytes, BW 56 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

DTR is pulsed for 1 seconds on reset

Interface is bound to BR0:1

Last input 1w6d, output never, output hang never

Last clearing of "show interface" counters 6w5d

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations 0/1/16 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 42 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

882 packets input, 69656 bytes

892 packets output, 70436 bytes

Bound to:

BRI0:1 is up, line protocol is up

Hardware is BRI

MTU 1500 bytes, BW 64 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive not set

DTR is pulsed for 1 seconds on reset

Time to interface disconnect: idle 00:01:38

Interface is bound to Di0 (Encapsulation PPP)

LCP Open

Open: IPCP

Last input 00:00:03, output 00:00:01, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

30 second input rate 0 bits/sec, 0 packets/sec

30 second output rate 0 bits/sec, 0 packets/sec

4213 packets input, 414529 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

29 input errors, 18 CRC, 0 frame, 0 overrun, 0 ignored, 11 abort

3922 packets output, 242959 bytes, 0 underruns

0 output errors, 0 collisions, 27 interface resets

0 output buffer failures, 0 output buffers swapped out

622 carrier transitions

krimson#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.200.16.1 to network 0.0.0.0

192.168.64.0/30 is subnetted, 1 subnets

C 192.168.64.0 is directly connected, Dialer4

10.0.0.0/8 is variably subnetted, 6 subnets, 2 masks

C 10.9.9.2/32 is directly connected, Dialer0

O 10.8.8.0/24 [110/1786] via 10.9.9.2, 00:00:25, Dialer0

!--- New route to the same destination (through dialer 0). !--- Network now points to backup interface

C 10.9.9.0/24 is directly connected, Dialer0

C 10.7.7.0/24 is directly connected, Loopback0

C 10.9.8.0/24 is directly connected, Dialer1

C 10.200.16.0/24 is directly connected, Ethernet0

S* 0.0.0.0/0 [1/0] via 10.200.16.1

次の出力では、フレームリレー インターフェイスがアップしています。

*Apr 17 01:02:50.631: %LINEPROTO-5-UPDOWN: Line protocol

on Interface Serial1,

changed state to up

!--- Primary is UP again

*Apr 17 01:02:50.975: OSPF: Rcv hello from 172.19.0.1 area 0

from Dialer0 10.9.9.2

*Apr 17 01:02:50.979: OSPF: End of hello processing

*Apr 17 01:03:00.975: OSPF: Rcv hello from 172.19.0.1 area 0

from Dialer0 10.9.9.2

*Apr 17 01:03:00.979: OSPF: End of hello processing

*Apr 17 01:03:05.887: BR0:1 DDR: idle timeout

*Apr 17 01:03:05.887: DDR: Dialer Watch: watch-group = 1

*Apr 17 01:03:05.887: DDR: network 10.8.8.0/255.255.255.0 UP,

!--- Watched route is UP

*Apr 17 01:03:05.891: DDR: primary DOWN

*Apr 17 01:03:10.551: OSPF: Rcv hello from 172.19.0.1 area 0

from Serial1.1

10.5.5.1

*Apr 17 01:03:10.555: OSPF: End of hello processing

*Apr 17 01:03:10.975: OSPF: Rcv hello from 172.19.0.1 area 0

from Dialer0 10.9.9.2

*Apr 17 01:03:10.979: OSPF: End of hello processing

krimson#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.200.16.1 to network 0.0.0.0

10.0.0.0/8 is variably subnetted, 7 subnets, 2 masks

C 10.9.9.2/32 is directly connected, Dialer0

C 10.5.5.0/24 is directly connected, Serial1.1

O 10.8.8.0/24 [110/1563] via 10.5.5.1, 00:00:01, Serial1.1

! -- Route entry to destination network via primary has been installed again.

C 10.9.9.0/24 is directly connected, Dialer0

C 10.7.7.0/24 is directly connected, Loopback0

C 10.9.8.0/24 is directly connected, Dialer1

C 10.200.16.0/24 is directly connected, Ethernet0

S* 0.0.0.0/0 [1/0] via 10.200.16.1

krimson#show isdn active

--------------------------------------------------------------------------------

ISDN ACTIVE CALLS

--------------------------------------------------------------------------------

Call  Calling Called Remote Seconds Seconds Seconds Charges

Type  Number  Number Name   Used    Left    Idle    Units/Currency

--------------------------------------------------------------------------------

Out   6120           kevin  149     90      29      0

--------------------------------------------------------------------------------

[Seconds Idle] フィールドは、 バックアップ インターフェイスを通過するトラフィックが存在せず、 アイドル時間が増加していることを示しています。

krimson# show isdn active

--------------------------------------------------------------------------------

ISDN ACTIVE CALLS

--------------------------------------------------------------------------------

Call Calling Called Remote Seconds Seconds Seconds Charges

Type Number  Number Name   Used    Left    Idle    Units/Currency

--------------------------------------------------------------------------------

Out          6120   kevin  165      74      45      0

--------------------------------------------------------------------------------

krimson# show isdn active

--------------------------------------------------------------------------------

ISDN ACTIVE CALLS

--------------------------------------------------------------------------------

Call Calling Called Remote Seconds Seconds Seconds  Charges

Type Number  Number Name   Used    Left    Idle     Units/Currency

--------------------------------------------------------------------------------

Out          6120   kevin   224    15      104       0

--------------------------------------------------------------------------------

krimson#show isdn active

--------------------------------------------------------------------------------

ISDN ACTIVE CALLS

--------------------------------------------------------------------------------

Call Calling Called Remote Seconds Seconds Seconds Charges

Type Number Number Name Used Left Idle Units/Currency

--------------------------------------------------------------------------------

--------------------------------------------------------------------------------

krimson#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.200.16.1 to network 0.0.0.0

192.168.64.0/30 is subnetted, 1 subnets

C 192.168.64.0 is directly connected, Dialer4

10.0.0.0/24 is subnetted, 6 subnets

C 10.5.5.0 is directly connected, Serial1.1

O 10.8.8.0 [110/1563] via 10.5.5.1, 00:01:52, Serial1.1

C 10.9.9.0 is directly connected, Dialer0

C 10.7.7.0 is directly connected, Loopback0

C 10.9.8.0 is directly connected, Dialer1

C 10.200.16.0 is directly connected, Ethernet0

S* 0.0.0.0/0 [1/0] via 10.200.16.1

関連情報

- アクセス テクノロジーに関するサポート ページ

- テクニカルサポート - Cisco Systems