内容

概要

前提条件

要件

使用するコンポーネント

表記法

設定

ネットワーク図

設定

確認

トラブルシュート

トラブルシューティングのためのコマンド

関連情報

概要

このドキュメントでは、ISDN バックアップの設定例と、この種の設定に関する基本的なトラブルシューティング情報を提供します。

ISDN バックアップの最も一般的な実装に関する情報とさまざまな実装の比較については、次のドキュメントを参照してください。技術情報：アクセス技術

前提条件

要件

このドキュメントに関しては個別の前提条件はありません。

使用するコンポーネント

このドキュメントの情報は、次のソフトウェアとハードウェアのバージョンに基づくものです。

- Cisco IOS®ソフトウェアリリース12.2および12.2(5)が稼働する2台のCisco 2500ルータ(フレームリレーデータ端末装置(DTE))。

- フレームリレー スイッチとして機能している 1 台の Cisco 4500 ルータ

このマニュアルの情報は、特定のラボ環境に置かれたデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。実稼動中のネットワークで作業をしている場合、実際にコマンドを使用する前に、その潜在的な影響について理解しておく必要があります。

表記法

ドキュメント表記の詳細は、『シスコ テクニカル ティップスの表記法』を参照してください。

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注：この文書で使用されているコマンドの詳細を調べるには、「Command Lookup ツール」を使用してください（登録ユーザのみ）。

ネットワーク図

このドキュメントでは次の図に示すネットワーク構成を使用しています。

設定

このドキュメントでは、次に示す設定を使用しています。

krimson（Cisco 2500 ルータ）

krimson#show running-config

Building configuration...

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname krimson

!

!

username kevin password 0 <password> !

isdn switch-type basic-net3

!

!

interface Loopback0

ip address 10.7.7.1 255.255.255.0

ip ospf network point-to-point

!

interface Ethernet0

ip address 10.200.16.30 255.255.255.0

!

interface Serial1

bandwidth 64

no ip address

encapsulation frame-relay

no ip route-cache

no ip mroute-cache

!

interface Serial1.1 point-to-point

backup interface Dialer0

ip address 10.5.5.2 255.255.255.0

no ip route-cache

frame-relay interface-dlci 20

!

interface BRI0

description Testanschluss ISDN(intern), Nr. 4420038

no ip address

encapsulation ppp

no ip route-cache

no ip mroute-cache

load-interval 30

no keepalive

dialer pool-member 1

isdn switch-type basic-net3

no fair-queue

no cdp enable

ppp authentication chap

!

interface Dialer0

ip address 10.9.9.1 255.255.255.0

encapsulation ppp

no ip route-cache

no ip mroute-cache

dialer pool 1

dialer remote-name kevin

dialer string 6120

dialer-group 1

no cdp enable

ppp authentication chap

!

router ospf 10

log-adjacency-changes

network 10.5.5.0 0.0.0.255 area 0

network 10.7.7.0 0.0.0.255 area 0

network 10.9.9.0 0.0.0.255 area 0

!

ip default-gateway 10.200.16.1

no ip classless

no ip http server

!

access-list 105 permit ip any host 10.7.7.1

access-list 105 permit ip any host 10.8.8.1

access-list 105 permit ip any any

dialer-list 1 protocol ip permit

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

transport input all

line vty 0 4

exec-timeout 0 0

password <password> login

!

end

kevin（Cisco 2500 ルータ）

kevin#show running-config

Building configuration...

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname kevin

!

!

username krimson password 0 <password> !

isdn switch-type basic-net3

!

!

interface Loopback0

ip address 10.8.8.1 255.255.255.0

ip ospf network point-to-point

!

interface Loopback1

ip address 172.19.0.1 255.255.255.255

!

interface Ethernet0

ip address 10.200.16.26 255.255.255.0

!

interface Serial0

no ip address

encapsulation frame-relay

!

interface Serial0.1 point-to-point

ip address 10.5.5.1 255.255.255.0

no cdp enable

frame-relay interface-dlci 20

!

interface BRI0

no ip address

encapsulation ppp

dialer pool-member 1

isdn switch-type basic-net3

no cdp enable

ppp authentication chap

!

interface Dialer0

ip address 10.9.9.2 255.255.255.0

encapsulation ppp

dialer pool 1

dialer remote-name krimson

dialer-group 1

no cdp enable

ppp authentication chap

!

router ospf 10

log-adjacency-changes

network 10.5.5.0 0.0.0.255 area 0

network 10.8.8.0 0.0.0.255 area 0

network 10.9.9.0 0.0.0.255 area 0

!

ip default-gateway 10.200.16.1

ip classless

!

dialer-list 1 protocol ip permit

no cdp run

!

line con 0

exec-timeout 0 0

line aux 0

modem InOut

line vty 0 4

exec-timeout 0 0

password <password> login

!

ntp clock-period 17180102

ntp server 10.200.20.134

end

確認

ここでは、設定が正しく機能していることを確認するために使用する情報を示します。

設定を確認するには、次のコマンドを使用します。

特定の show コマンドは、アウトプット インタープリタでサポートされています。このツールを使用すると、show コマンド出力を分析できます。

- show interfaces serial：マルチキャスト データリンク接続識別子（DLCI）、インターフェイスで使用する DLCI、およびローカル管理インターフェイス（LMI）に使用する DLCI に関する情報を表示します。

- show interface dialer：ダイヤラ インターフェイスに関する情報を表示します。

- show ip route：IP ルーティング テーブルのエントリを表示します。

krimson#show interface serial 1.1

! --- The initial state before the simulated Frame Relay network failure. ! --- The primary link is up and functional.

Serial1.1 is up, line protocol is up

Hardware is HD64570

Internet address is 10.5.5.2/24

Backup interface Dialer0, failure delay 0 sec,

secondary disable delay 0 sec

MTU 1500 bytes, BW 64 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation FRAME-RELAY

krimson#show int dialer 0

! --- Initial state. The backup interface is in standby mode and inactive.

Dialer0 is standby mode (spoofing), line protocol is down (spoofing)

Hardware is Unknown

Internet address is 10.9.9.1/24

MTU 1500 bytes, BW 56 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

DTR is pulsed for 1 seconds on reset

Last input 1w6d, output never, output hang never

Last clearing of "show interface" counters 6w4d

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations 0/1/16 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 42 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

596 packets input, 48924 bytes

600 packets output, 49280 bytes

krimson#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.200.16.1 to network 0.0.0.0

192.168.64.0/30 is subnetted, 1 subnets

C 192.168.64.0 is directly connected, Dialer4

10.0.0.0/24 is subnetted, 6 subnets

O 10.9.9.0 [110/3347] via 10.5.5.1, 00:03:34, Serial1.1

O 10.8.8.0 [110/1563] via 10.5.5.1, 00:03:34, Serial1.1

! --- The route to the tested destination network points to the ! --- still-active primary link.

C 10.5.5.0 is directly connected, Serial1.1

C 10.7.7.0 is directly connected, Loopback0

C 10.9.8.0 is directly connected, Dialer1

C 10.200.16.0 is directly connected, Ethernet0

S* 0.0.0.0/0 [1/0] via 10.200.16.1

ここでは、フレームリレーのインターフェイスがダウンするところが確認できます。

krimson#

*Apr 16 23:56:47.840: %LINK-3-UPDOWN: Interface Serial1,

changed state to down

*Apr 16 23:56:47.848: OSPF: Interface Serial1.1 going Down

! --- Here we have simulated a failure within the Frame Relay network. ! --- We can see what was conducted to the Frame Relay DTE router, ! --- and the subinterface going down.

*Apr 16 23:56:47.852: %OSPF-5-ADJCHG: Process 10,

Nbr 172.19.0.1 on Serial1.1

from FULL to DOWN, Neighbor Down: Interface down or detached

*Apr 16 23:56:48.736: BACKUP(Serial1.1): event = primary went down

*Apr 16 23:56:48.740: BACKUP(Serial1.1): changed state to

"waiting to backup"

*Apr 16 23:56:48.744: BACKUP(Serial1.1): event = timer expired

*Apr 16 23:56:48.748: Di0 DDR is shutdown, could not clear interface.

*Apr 16 23:56:48.752: BACKUP(Serial1.1):

secondary interface (Dialer0) made active

! --- The configured backup interface is active.

*Apr 16 23:56:48.752: BACKUP(Serial1.1): changed state to "backup mode"

*Apr 16 23:56:48.756: OSPF: Interface Dialer0 going Up

*Apr 16 23:56:48.760: BR0 DDR: rotor dialout [priority]

*Apr 16 23:56:48.764: BR0 DDR: Dialing cause ip (s=10.9.9.1, d=224.0.0.5)

! --- OSPF packets trigger the call.

*Apr 16 23:56:48.768: BR0 DDR: Attempting to dial 6120

*Apr 16 23:56:48.784: ISDN BR0: TX -> SETUP pd = 8 callref = 0x3E

*Apr 16 23:56:48.792: Bearer Capability i = 0x8890

*Apr 16 23:56:48.796: Channel ID i = 0x83

*Apr 16 23:56:48.804: Called Party Number i = 0x80, '6120',

Plan:Unknown, Type:Unknown

*Apr 16 23:56:48.844: %LINEPROTO-5-UPDOWN: Line protocol on

Interface Serial1, changed state to down

*Apr 16 23:56:48.884: ISDN BR0: RX <- CALL_PROC pd = 8 callref = 0xBE

*Apr 16 23:56:48.892: Channel ID i = 0x89

*Apr 16 23:56:49.144: ISDN BR0: RX <- CONNECT pd = 8 callref = 0xBE

*Apr 16 23:56:49.160: %LINK-3-UPDOWN: Interface BRI0:1,

changed state to up

*Apr 16 23:56:49.168: %DIALER-6-BIND:

Interface BR0:1 bound to profile Di0

*Apr 16 23:56:49.176: BR0:1 PPP: Treating connection as a callout

*Apr 16 23:56:49.180: BR0:1 PPP: Phase is ESTABLISHING, Active Open

[0 sess, 0 load]

*Apr 16 23:56:49.184: BR0:1 LCP: O CONFREQ [Closed] id 49 len 15

*Apr 16 23:56:49.188: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Apr 16 23:56:49.188: BR0:1 LCP: MagicNumber 0xF2143EDB (0x0506F2143EDB)

*Apr 16 23:56:49.196: ISDN BR0: TX -> CONNECT_ACK pd = 8 callref = 0x3E

*Apr 16 23:56:49.224: BR0:1 LCP: I CONFREQ [REQsent] id 83 len 15

*Apr 16 23:56:49.228: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Apr 16 23:56:49.232: BR0:1 LCP: MagicNumber 0x9ADACD69 (0x05069ADACD69)

*Apr 16 23:56:49.236: BR0:1 LCP: O CONFACK [REQsent] id 83 len 15

*Apr 16 23:56:49.236: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Apr 16 23:56:49.240: BR0:1 LCP: MagicNumber 0x9ADACD69 (0x05069ADACD69)

*Apr 16 23:56:49.244: BR0:1 LCP: I CONFACK [ACKsent] id 49 len 15

*Apr 16 23:56:49.248: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Apr 16 23:56:49.252: BR0:1 LCP: MagicNumber 0xF2143EDB (0x0506F2143EDB)

*Apr 16 23:56:49.252: BR0:1 LCP: State is Open

*Apr 16 23:56:49.256: BR0:1 PPP: Phase is AUTHENTICATING, by both

[0 sess, 0 load]

*Apr 16 23:56:49.260: BR0:1 CHAP: O CHALLENGE id 49 len 28 from "krimson"

*Apr 16 23:56:49.276: BR0:1 CHAP: I CHALLENGE id 51 len 26 from "kevin"

*Apr 16 23:56:49.284: BR0:1 CHAP: O RESPONSE id 51 len 28 from "krimson"

*Apr 16 23:56:49.332: BR0:1 CHAP: I SUCCESS id 51 len 4

*Apr 16 23:56:49.344: BR0:1 CHAP: I RESPONSE id 49 len 26 from "kevin"

*Apr 16 23:56:49.352: BR0:1 CHAP: O SUCCESS id 49 len 4

*Apr 16 23:56:49.356: BR0:1 PPP: Phase is UP [0 sess, 0 load]

*Apr 16 23:56:49.360: BR0:1 IPCP: O CONFREQ [Not negotiated] id 41 len 10

*Apr 16 23:56:49.364: BR0:1 IPCP: Address 10.9.9.1 (0x03060A090901)

*Apr 16 23:56:49.376: BR0:1 IPCP: I CONFREQ [REQsent] id 29 len 10

*Apr 16 23:56:49.380: BR0:1 IPCP: Address 10.9.9.2 (0x03060A090902)

*Apr 16 23:56:49.384: BR0:1 IPCP: O CONFACK [REQsent] id 29 len 10

*Apr 16 23:56:49.388: BR0:1 IPCP: Address 10.9.9.2 (0x03060A090902)

*Apr 16 23:56:49.396: BR0:1 IPCP: I CONFACK [ACKsent] id 41 len 10

*Apr 16 23:56:49.400: BR0:1 IPCP: Address 10.9.9.1 (0x03060A090901)

*Apr 16 23:56:49.400: BR0:1 IPCP: State is Open

*Apr 16 23:56:49.408: BR0:1 DDR: dialer protocol up

*Apr 16 23:56:49.416: Di0 IPCP: Install route to 10.9.9.2

*Apr 16 23:56:49.960: OSPF: Rcv hello from 172.19.0.1 area 0 from

Dialer0 10.9.9.2

*Apr 16 23:56:49.964: OSPF: End of hello processing

*Apr 16 23:56:50.356: %LINEPROTO-5-UPDOWN:

Line protocol on Interface BRI0:1, changed state to up

*Apr 16 23:56:50.748: %LINK-3-UPDOWN: Interface Dialer0,

changed state to up

*Apr 16 23:56:50.752: Di0 LCP: Not allowed on a Dialer Profile

*Apr 16 23:56:50.752: BACKUP(Dialer0): event = primary came up

*Apr 16 23:56:55.176: %ISDN-6-CONNECT:

Interface BRI0:1 is now connected to 6120 kevin

*Apr 16 23:56:58.804: OSPF: Rcv DBD from 172.19.0.1 on Dialer0

seq 0x988 opt 0x42 flag 0x7 len 32 mtu 1500 state INIT

*Apr 16 23:56:58.808: OSPF: 2 Way Communication to 172.19.0.1

on Dialer0, state 2WAY

krimson#show interface serial 1.1

Serial1.1 is down, line protocol is down

! --- The primary link is down.

Hardware is HD64570

Internet address is 10.5.5.2/24

Backup interface Dialer0, failure delay 0 sec,

secondary disable delay 0 sec

MTU 1500 bytes, BW 64 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation FRAME-RELAY

krimson#show interface dialer 0

Dialer0 is up, line protocol is up (spoofing)

! --- The backup interface is active and bearing traffic.

Hardware is Unknown

Internet address is 10.9.9.1/24

MTU 1500 bytes, BW 56 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

DTR is pulsed for 1 seconds on reset

Interface is bound to BR0:1

Last input 1w6d, output never, output hang never

Last clearing of "show interface" counters 6w4d

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations 0/1/16 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 42 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

614 packets input, 50240 bytes

618 packets output, 50584 bytes

Bound to:

BRI0:1 is up, line protocol is up

Hardware is BRI

MTU 1500 bytes, BW 64 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive not set

DTR is pulsed for 1 seconds on reset

Time to interface disconnect: idle 00:01:57

Interface is bound to Di0 (Encapsulation PPP)

LCP Open

Open: IPCP

Last input 00:00:01, output 00:00:02, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

30 second input rate 0 bits/sec, 0 packets/sec

30 second output rate 0 bits/sec, 0 packets/sec

3910 packets input, 394443 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

29 input errors, 18 CRC, 0 frame, 0 overrun, 0 ignored, 11 abort

3613 packets output, 222417 bytes, 0 underruns

0 output errors, 0 collisions, 27 interface resets

0 output buffer failures, 0 output buffers swapped out

607 carrier transitions

krimson#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.200.16.1 to network 0.0.0.0

192.168.64.0/30 is subnetted, 1 subnets

C 192.168.64.0 is directly connected, Dialer4

10.0.0.0/8 is variably subnetted, 6 subnets, 2 masks

C 10.9.9.2/32 is directly connected, Dialer0

O 10.8.8.0/24 [110/1786] via 10.9.9.2, 00:00:53, Dialer0

! --- The route entry to the destination network is now pointing to ! --- the backup interface as a next hop.

C 10.9.9.0/24 is directly connected, Dialer0

C 10.7.7.0/24 is directly connected, Loopback0

C 10.9.8.0/24 is directly connected, Dialer1

C 10.200.16.0/24 is directly connected, Ethernet0

S* 0.0.0.0/0 [1/0] via 10.200.16.1

krimson#ping 10.8.8.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.8.8.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 36/36/40 ms

ここでは、フレームリレー ネットワークの障害が解決した後に、システムが初期状態に復帰するところを確認できます。

krimson#show interface serial 1.1

Serial1.1 is up, line protocol is up

Hardware is HD64570

Internet address is 10.5.5.2/24

Backup interface Dialer0, failure delay 0 sec,

secondary disable delay 0 sec

MTU 1500 bytes, BW 64 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation FRAME-RELAY

krimson#show interface dialer 0

Dialer0 is standby mode (spoofing), line protocol is down (spoofing)

Hardware is Unknown

Internet address is 10.9.9.1/24

MTU 1500 bytes, BW 56 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

DTR is pulsed for 1 seconds on reset

Last input 1w6d, output never, output hang never

Last clearing of "show interface" counters 6w5d

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations 0/1/16 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 42 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

665 packets input, 54008 bytes

671 packets output, 54548 bytes

krimson#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.200.16.1 to network 0.0.0.0

192.168.64.0/30 is subnetted, 1 subnets

C 192.168.64.0 is directly connected, Dialer4

10.0.0.0/24 is subnetted, 6 subnets

O 10.9.9.0 [110/3347] via 10.5.5.1, 00:08:39, Serial1.1

O 10.8.8.0 [110/1563] via 10.5.5.1, 00:08:39, Serial1.1

C 10.5.5.0 is directly connected, Serial1.1

C 10.7.7.0 is directly connected, Loopback0

C 10.9.8.0 is directly connected, Dialer1

C 10.200.16.0 is directly connected, Ethernet0

S* 0.0.0.0/0 [1/0] via 10.200.16.1

krimson#

注：着信側で特定の設定は必要ありません。

正常な動作中に記録された同じ show の出力には、次のような情報が含まれています。

kevin#show interface serial 0.1

Serial0.1 is up, line protocol is up

! --- The primary interface is up and running.

Hardware is HD64570

Internet address is 10.5.5.1/24

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation FRAME-RELAY

kevin#show interface dialer 0

Dialer0 is up (spoofing), line protocol is up (spoofing)

! --- Note: On the called side, the dialer interface is active ! --- and not in standby mode.

Hardware is Unknown

Internet address is 10.9.9.2/24

MTU 1500 bytes, BW 56 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

DTR is pulsed for 1 seconds on reset

Last input 1w6d, output never, output hang never

Last clearing of "show interface" counters 4w2d

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations 0/1/16 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 42 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

598 packets input, 49252 bytes

596 packets output, 48924 bytes

kevin#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.200.16.1 to network 0.0.0.0

172.17.0.0/32 is subnetted, 1 subnets

S 172.17.247.195 [1/0] via 10.200.16.1

172.19.0.0/32 is subnetted, 1 subnets

C 172.19.0.1 is directly connected, Loopback1

10.0.0.0/24 is subnetted, 5 subnets

C 10.5.5.0 is directly connected, Serial0.1

O 10.7.7.0 [110/65] via 10.5.5.2, 00:04:27, Serial0.1

C 10.9.9.0 is directly connected, Dialer0

C 10.8.8.0 is directly connected, Loopback0

C 10.200.16.0 is directly connected, Ethernet0

S* 0.0.0.0/0 [1/0] via 10.200.16.1

障害発生中に記録される同じ情報は、次のようになります。

kevin#show interface serial 0.1

Serial0.1 is down, line protocol is down

Hardware is HD64570

Internet address is 10.5.5.1/24

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation FRAME-RELAY

kevin#show interface dialer 0

Dialer0 is up, line protocol is up (spoofing)

Hardware is Unknown

Internet address is 10.9.9.2/24

MTU 1500 bytes, BW 56 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

DTR is pulsed for 1 seconds on reset

Interface is bound to BR0:1

Last input 1w6d, output never, output hang never

Last clearing of "show interface" counters 4w2d

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations 0/1/16 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 42 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

618 packets input, 50700 bytes

616 packets output, 50384 bytes

Bound to:

BRI0:1 is up, line protocol is up

Hardware is BRI

MTU 1500 bytes, BW 64 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

DTR is pulsed for 1 seconds on reset

Time to interface disconnect: idle 00:01:57

Interface is bound to Di0 (Encapsulation PPP)

LCP Open

Open: IPCP

Last input 00:00:03, output 00:00:02, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

1280 packets input, 138077 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

9789 input errors, 9789 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

1309 packets output, 138487 bytes, 0 underruns

0 output errors, 0 collisions, 15 interface resets

0 output buffer failures, 0 output buffers swapped out

351 carrier transitions

kevin#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.200.16.1 to network 0.0.0.0

172.17.0.0/32 is subnetted, 1 subnets

S 172.17.247.195 [1/0] via 10.200.16.1

172.19.0.0/32 is subnetted, 1 subnets

C 172.19.0.1 is directly connected, Loopback1

10.0.0.0/8 is variably subnetted, 5 subnets, 2 masks

O 10.7.7.0/24 [110/1786] via 10.9.9.1, 00:01:21, Dialer0

C 10.9.9.0/24 is directly connected, Dialer0

C 10.8.8.0/24 is directly connected, Loopback0

C 10.9.9.1/32 is directly connected, Dialer0

C 10.200.16.0/24 is directly connected, Ethernet0

S* 0.0.0.0/0 [1/0] via 10.200.16.1

トラブルシュート

ここでは、設定のトラブルシューティングに使用できる情報を示します。

ここで使用したフレームリレーの設定では、ポイントツーポイントのサブインターフェイスを使用し、Open Shortest Path First（OSPF）をルーティング プロトコルとして使用していますが、これはこの設定例に特定した設定です。ただし、説明しているトラブルシューティング手順は一般的な内容であるため、使用するルーティング プロトコルに関係なく、さまざまな構成（フレームリレーのポイントツーマルチポイント、High-Level Data Link Control（HDLC; ハイレベル データリンク コントロール）のプライマリ リンク、Point to Point Protocol（PPP; ポイントツーポイント プロトコル）のカプセル化など）で使用できます。

バックアップ機能を確認するために、フレームリレー スイッチとして機能している Cisco 4500 ルータのインターフェイスの 1 つをシャットダウン状態にして、フレームリレー ネットワークで問題をシミュレートしました。この結果、フレームリレー ネットワーク経由で DTE ルータが PVC 非アクティブ状態になり、フレームリレー サブインターフェイス ダウン イベントが発生します。これによって、バックアップ インターフェイスがアクティブになっています。

トラブルシューティングのためのコマンド

注：debug コマンドを使用する前に、「debug コマンドに関する重要な情報」を参照してください。

- debug isdn q931

- debug backup：バックアップ イベントをデバッグします。

- debug dialer：ダイヤラ インターフェイス上のパケットまたはイベントに関するデバッグ情報を表示。

- debug ppp negotiation：PPP 始動（PPP オプションのネゴシエート）中に伝送される PPP パケットを表示させる。

- debug ppp authentication：debug ppp コマンドに、 Challenge Authentication Protocol（CHAP）パケットの交換や パスワード認証プロトコル（PAP）交換などの認証プロトコル メッセージを表示させる。

- debug ip ospf events：隣接関係、フラッディング情報、指定ルータの選択、Shortest Path First（SPF）の計算などの OSPF 関連のイベントに関する情報を表示。

- debug frame-relay events：マルチキャスト チャネルをサポートし、ダイナミック アドレスを使用しているネットワークの場合に、フレーム リレー ARP の応答に関するデバッグ情報を表示します。

関連情報

- Access-Dial テクノロジーに関するサポート ページ

- テクニカルサポート - Cisco Systems