内容

概要

前提条件

要件

使用するコンポーネント

表記法

設定

ネットワーク図

設定

show のサンプル出力

show コマンド

show のサンプル出力

トラブルシュート

デバッグ コマンド

debug 出力例

関連情報

概要

この文書では、BRI インターフェイスが装備された 2 つのルータ間のダイヤルオンデマンド ルーティング（DDR）の構成方法を説明します。この設定では、スモール オフィス、ホーム オフィス（SOHO）ルータは、セントラル ネットワークにトラフィックを送信する必要が発生するたびにセントラル サイトのルータにダイヤルします。この場合、ユーザが定義した期間にトラフィックが存在しなければコネクションは自動的に停止されます。また、このネットワークは ip ospf demand-circuit コマンドで Open Shortest Path First（OSPF）ルーティング プロトコルを使用して、DDR リンクの停止時にリモート側のネットワークへのルートが削除されないようにします。しかし、このリンク上でルーティング プロトコルを実行する必要はありません。

前提条件

要件

次のポイントは、DDR リンクの構成に先立って決めなければならない設計要素を説明しています。

- DDR の実装：ダイヤラ マップ（レガシー DDR）またはダイヤラ プロファイルを使用できます。この 2 つの実装の違いに関する詳細は、ダイヤラ プロファイルを使用した ISDN DDR の設定 を参照してください。ここではダイヤラ マップを使用します。

- 単一方向ダイヤリングまたは双方向ダイヤリング：お互いのルータにダイヤルして DDR リンクを起動するように各ルータを構成する、またはダイヤル コネクションを起動する一方向だけのルータ（通常 SOHO）を設定する。使用するダイヤル方式を決める前に、トラフィック パターンを調べて次の情報を検討します。

- 両方のルータがダイヤルする場合

- 他のルータのネットワークに向けられたトラフィックがある場合、どちらのサイトもリンクを起動できる。

- 両方のルータから同時にダイヤルできるが、この場合はビジー メッセージが発生する可能性がある。

- ダイヤリングが SOHO ルータに制限されている場合

- リンクが起動していない場合、SOHO ルータに向けられたセントラル サイトからのトラフィックは通過しない。

- コールの「衝突」によるビジー メッセージを回避できる。

注：この例では、SOHOルータだけがDDRリンクを開始します。

- ルーティング プロトコル：リンク上で実行するルーティング プロトコルを選択できるが、定期的なトラフィックによりリンクが起動したままにならないように、hello に対象外のタグをつけることなどの配慮が必要です。また、ルーティング プロトコルはルーティング テーブルを元のままの状態に保ち、いったんリンクが停止されてもルートを破棄しないようにする必要があります。これは、ip ospf demand-circuit コマンドまたはスナップショット ルーティングで行えます。ルーティング プロトコルを使用しない場合、ネクストホップをお互いのBRIインターフェースに指定するスタティックルートを設定できます。

- 対象トラフィック：DDR 対象トラフィックを定義する際に注意が必要です。どちらかで対象トラフィックが間違って定義されると、希望するときにリンクを起動することや早期にリンクを停止することができない状態、またはリンクがまったく停止できない状態になります。たとえば、リンクをアップしたままにしないよう、すべてのルーティング プロトコル トラフィックに対象外のタグを付けます。

使用するコンポーネント

この設定では、次のソフトウェアおよびハードウェアのバージョンを使用して開発とテストを行いました。

- Cisco IOS ® ソフトウェア リリース 12.1(5）T が稼動する 1 つの BRI U インターフェイスが装備された Cisco 1604 SOHO ルータ

- Cisco IOS 12.1(2） が稼動する NM-4B-U（4 つの BRI U インターフェイス）が装備された Cisco 3640 ルータ

表記法

ドキュメント表記の詳細は、『シスコ テクニカル ティップスの表記法』を参照してください。

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注：このドキュメントで使用されているコマンドの詳細を調べるには、IOS Command Lookupツールを使用してください

ネットワーク図

このドキュメントでは次の図に示すネットワーク構成を使用しています。

設定

このドキュメントでは、次に示す設定を使用しています。

注：このドキュメントの情報は、隔離されたラボ環境から取得されたものです。実際に稼動するネットワーク上でコマンドを使用する前に、コマンドの潜在的な影響を考慮する必要があります。

maui-soho-01（1600）

maui-soho-01#show running-config

Building configuration...

Current configuration : 1656 bytes

!

version 12.1

no service single-slot-reload-enable

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname maui-soho-01

!

logging rate-limit console 10 except errors

aaa new-model

aaa authentication login default local

aaa authentication login NO_AUTHEN none

aaa authentication ppp default local

!--- basic AAA configuration for PPP calls

enable secret 5 <deleted>

!

username admin password <deleted>

username maui-nas-05 password cisco

!--- username for remote router (maui-nas-05) and shared secret !--- (used for CHAP authentication) !--- Shared secret must be the same on both sides.

ip subnet-zero

!

isdn switch-type basic-ni

!

interface Loopback0

ip address 172.17.1.1 255.255.255.0

!--- The loopback address will be used by OSPF for the router ID.

!

interface Ethernet0

ip address 172.16.1.1 255.255.255.0

!

interface Serial0

no ip address

shutdown

no fair-queue

!

interface BRI0

!--- BRI interface used for DDR dialout

ip address 172.20.10.2 255.255.255.0

!--- IP address !--- The remote address is in the same subnet.

encapsulation ppp

ip ospf demand-circuit

!--- This forces OSPF to keep the routing table intact when the DDR link !--- is down. This should only be configured on one router for a !--- point-to-point circuit.

dialer idle-timeout 900

!--- Idle timeout is set to 900 seconds (15 minutes). !--- The link will be disconnected if there is no interesting traffic !--- for 900 secs.

dialer map ip 172.20.10.1 name maui-nas-05 broadcast 5551111

dialer map ip 172.20.10.1 name maui-nas-05 broadcast 5551112

!--- dialer map statements for the remote router !--- The name must match the one used by the remote router to identify !--- itself. The broadcast keyword is required to send broadcast traffic !--- over the link(for OSPF). The two different phone numbers correspond !--- to the b-channels of the remote side. The multiple statements allow !--- the router to dial the second number if the first number is busy.

dialer load-threshold 80 outbound

!--- This set the load level for traffic at which additional connections !--- will be added to the Multilink PPP bundle. !--- Load level values range from 1 (unloaded) to 255 (fully loaded). !--- The threshold in this case is 80/255 = 32%.

dialer-group 1

!--- apply interesting traffic definition from dialer-list 1

isdn switch-type basic-ni

isdn spid1 51255522220101 5552222

isdn spid2 51255522230101 5552223

ppp authentication chap

!--- Use chap authentication.

ppp multilink

!--- Use multilink to bring up both BRI channels.

!

router ospf 5

log-adjacency-changes

network 172.16.1.0 0.0.0.255 area 0

network 172.17.1.0 0.0.0.255 area 0

network 172.20.10.0 0.0.0.255 area 0

!

ip classless

ip route 172.20.0.0 255.255.0.0 172.20.10.0

no ip http server

!

access-list 101 remark Define Interesting Traffic

access-list 101 deny   ospf any any

!--- mark OSPF as uninteresting !--- This will prevent OSPF hellos from keeping the link up.

access-list 101 permit ip any any

dialer-list 1 protocol ip list 101

!--- Interesting traffic is defined by access-list 101. !--- This is applied to BRI0 using dialer-group 1.

!

line con 0

exec-timeout 0 0

login authentication NO_AUTHEN

transport input none

line vty 0 4

!

end

maui-nas-05（3640）

maui-nas-05#show running-config

Building configuration...

Current configuration:

!

version 12.1

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname maui-nas-05

!

aaa new-model

aaa authentication login default local

aaa authentication login NO_AUTHEN none

aaa authentication ppp default local

!--- basic AAA configuration for PPP calls

enable secret 5 <deleted>

!

username admin password 7 <deleted>

username maui-soho-01 password 7 cisco

!--- username for remote router (maui-soho-01) and shared secret !--- (used for CHAP authentication) !--- Shared secret must be the same on both sides.

ip subnet-zero

!

isdn switch-type basic-ni

!

interface Loopback0

ip address 172.22.1.1 255.255.255.0

!--- The loopback address is used by OSPF for the router ID.

!

interface Ethernet0/0

ip address 172.22.53.105 255.255.255.0

!

interface Ethernet0/1

no ip address

shutdown

!

interface BRI1/0

!--- BRI interface used to accept dialin

ip address 172.20.10.1 255.255.255.0

!--- IP address !--- The remote address is in the same subnet.

encapsulation ppp

dialer idle-timeout 900

!--- Idle timeout is set to 900 seconds (15 minutes). !--- Set this value to be equal to or higher than the idle-timeout on the !--- client side. A higher idle-timeout permits the client side to !--- determine when to bring down the link.

!

dialer map ip 172.20.10.2 name maui-soho-01 broadcast

!--- dialer map statement for the BRI interface of the remote router !--- The name must be the one used by the remote router to identify !--- itself. The broadcast keyword is required to send broadcast traffic !--- over the link(for OSPF). Note: There is no phone number, as we are !--- not configuring this side to dial. If you want this router to dial, !--- add the remote side phone number to the dialer map statement

dialer-group 1

!--- apply interesting traffic definition from dialer-list 1

isdn switch-type basic-ni

isdn spid1 51255511110101 5551111

isdn spid2 51255511120101 5551112

ppp authentication chap

ppp multilink

!--- allow multilink connections

!

! <<--unused interface configurations have been removed.

!

router ospf 5

network 172.20.10.0 0.0.0.255 area 0

network 172.22.1.0 0.0.0.255 area 0

network 172.22.53.0 0.0.0.255 area 0

default-information originate always

!--- transmit OSPF default information !--- This may be required for remote router to use the BRI DDR link.

!

ip classless

ip route 0.0.0.0 0.0.0.0 Ethernet0/0

ip route 172.22.0.0 255.255.0.0 172.22.53.0

no ip http server

!

dialer-list 1 protocol ip permit

!--- All IP traffic is defined interesting. !--- This is applied to BRI0 using dialer-group 1.

!

line con 0

login authentication NO_AUTHEN

transport input none

line 97 102

line aux 0

line vty 0 4

!

end

注：ルータがOSPFポイントツーポイントトポロジ（2台のルータ）の一部である場合、デマンド回線の一端だけをip ospf demand-circuitコマンドで設定する必要があります。しかし、すべてのルータがロードされたエリア内にこの機能を備える必要があり、ip ospf demand-circuit コマンドをサポートする必要があります。ルータが OSPF ポイントツーマルチポイント トポロジの一部になっている場合（たとえばハブおよびスポーク）、マルチポイントの終端だけをこのコマンドで構成する必要があります。

show のサンプル出力

show コマンド

特定の show コマンドは、アウトプット インタープリタでサポートされています。このツールを使用すると、show コマンド出力を分析できます。

- show dialer [interface type number] ：DDR 用に構成されたインターフェイスの一般的な診断情報、タイマー構成、およびコネクションがタイムアウトするまでの時間を表示する。次のメッセージを確認してください。

- "Dialer state is data link layer up" - ダイヤラが正常にアップしました。

- "Physical layer up" - 回線プロトコルはアップしましたが、Network Control Protocol（NCP; ネットワーク制御プロトコル）はアップしませんでした。

- "Dial reason" - ダイヤリングを開始したパケットの送信元アドレスと宛先アドレスを表示します。

- show isdn status - ルータが ISDN スイッチと適切に通信していることを確認します。このコマンドは、アクティブ コールの番号も表示します。次のメッセージを確認します。

- "Layer 1 Status is ACTIVE",

- "Layer 2 Status state = MULTIPLE_FRAME_ESTABLISHED"

注：詳細は、『show isdn statusコマンドを使用したBRIのトラブルシューティング』を参照してください。

- show caller user username detail：詳細な LCP ネゴシエート パラメータを表示します。

show のサンプル出力

show ip route コマンドは、DDR リンクがアップになった後で、SOHO のルーティング テーブルを表示します。リモート サイトからの OSPF ルートがインストールされていることに注意してください。

maui-soho-01#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - ISIS level-1, L2 - ISIS level-2, ia - ISIS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 172.20.10.1 to network 0.0.0.0

172.17.0.0/24 is subnetted, 1 subnets

C       172.17.1.0 is directly connected, Loopback0

172.16.0.0/24 is subnetted, 1 subnets

C       172.16.1.0 is directly connected, Ethernet0

172.20.0.0/16 is variably subnetted, 3 subnets, 3 masks

C       172.20.10.0/24 is directly connected, BRI0

C       172.20.10.1/32 is directly connected, BRI0

S       172.20.0.0/16 [1/0] via 172.20.10.0

172.22.0.0/16 is variably subnetted, 2 subnets, 2 masks

O       172.22.53.0/24 [110/1572] via 172.20.10.1, 00:01:37, BRI0

O       172.22.1.1/32 [110/1563] via 172.20.10.1, 00:01:37, BRI0

O*E2 0.0.0.0/0 [110/1] via 172.20.10.1, 00:01:37, BRI0

注：リモート側からのOSPFルート（特にデフォルトルート）がルーティングテーブルに追加されます。これにより、リンク上でトラフィックを送信する必要がある場合は常にクライアント（maui-soho-01）が BRI リンクにダイヤルできます。これは OSPF デマンド回線であることから、ダイヤラのアイドルタイムアウトが期限切れになったことが原因でリンクがダウンしても、ルーティング テーブルの OSPF エントリは削除（エージング）されません。

show caller user username detail の出力で、接続のアイドル タイムアウトを確認します。

maui-soho-01#show caller user maui-nas-05 detail

User: maui-nas-05, line BR0:1, service PPP

Active time 00:02:33, Idle time 00:00:00

Timeouts:            Absolute  Idle

Limits:          -         -

Disconnect in:   -         -

PPP: LCP Open, multilink Open, CHAP (AAA <--> AAA)

LCP: -> peer, AuthProto, MagicNumber, MRRU, EndpointDisc

<- peer, AuthProto, MagicNumber, MRRU, EndpointDisc

NCP: Closed IPCP, CDPCP

Dialer: Connected to 5551111, outbound

Type is ISDN, group BR0

Cause: ip (s=172.20.10.2, d=172.20.10.1)

IP: Local 172.20.10.2/24

Bundle: Member of maui-nas-05, last input 00:00:00

Counts: 945 packets input, 147302 bytes, 0 no buffer

0 input errors, 0 CRC, 0 frame, 0 overrun

972 packets output, 150964 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

User: maui-nas-05, line Vi1, service PPP Bundle

Active time 00:02:32, Idle time 00:02:32

Timeouts:            Absolute  Idle

Limits:          -         00:15:00

Disconnect in:   -         00:12:26

!--- time after which this call will be disconnected unless it receives !--- interesting traffic

PPP: LCP Open, multilink Open, IPCP, CDPCP

LCP: -> peer, MagicNumber, MRRU, EndpointDisc

<- peer

NCP: Open IPCP, CDPCP

IPCP: <- peer, Address

-> peer, Address

Dialer: Connected to 5551111, outbound

Idle timer 900 secs, idle 153 secs

Type is IN-BAND SYNC, group BR0

IP: Local 172.20.10.2/24, remote 172.20.10.1

Bundle: First link of maui-nas-05, 1 link, last input 00:02:33

Counts: 20 packets input, 2916 bytes, 0 no buffer

0 input errors, 0 CRC, 0 frame, 0 overrun

23 packets output, 2683 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

トラブルシュート

デバッグ コマンド

注：debug コマンドを使用する前に、「debug コマンドに関する重要な情報」を参照してください。

- debug isdn q931：ISDN ネットワーク接続（レイヤ 3）のコール セットアップおよびティアダウンを表示します。

- debug isdn q921 - ルータと ISDN スイッチ間の D チャネルにおけるデータ リンク層のメッセージ（レイヤ 2）を表示する。show isdn status コマンドでレイヤ 1 とレイヤ 2 がアップしていることが表示されない場合は、このデバッグを使用します。

- debug dialer [events | packets]：ダイヤラインターフェイスで受信されたパケットに関するDDRデバッグ情報を表示します。

- debug ppp negotiation：PPP トラフィックに関する情報と、Link Control Protocol（LCP; リンク コントロール プロトコル）、認証、および NCP などの PPP コンポーネントのネゴシエーションの際に交換される情報を表示します。成功した PPP ネゴシエーションが最初に LCP ステートを開いて認証し、最後に NCP（通常 IPCP）をネゴシエートします。

- debug ppp authentication：Challenge Authentication Protocol（CHAP）パケット交換や Password Authentication Protocol（PAP; パスワード認証プロトコル）交換など、PPP の認証プロトコル メッセージを表示します。

- debug ppp error - PPP 接続のネゴシエーションと接続操作に関するプロトコル エラーとエラー統計情報を表示します。

詳細ヘルプについては、「ダイヤルアップ テクノロジー：トラブルシューティング テクニック」を参照してください。

debug 出力例

デバッグの出力は、リモート ルータの BRI インターフェイスに対する ICMP ping によって発生した DDR コールを表示します。デバッグは、SOHO ルータのダイヤリング、セントラル サイトへの接続、PPP のネゴシエーション、および CHAP 認証の実行を表示します。

maui-soho-01#debug dialer

Dial on demand events debugging is on

maui-soho-01#debug ppp negotiation

PPP protocol negotiation debugging is on

maui-soho-01#debug ppp authentication

PPP authentication debugging is on

maui-soho-01#debug isdn q931

ISDN Q931 packets debugging is on

maui-soho-01#

maui-soho-01#

maui-soho-01#

maui-soho-01#ping 172.20.10.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 172.20.10.1, timeout is 2 seconds:

*Mar  1 21:57:42.625: BR0 DDR: Dialing cause ip (s=172.20.10.2, d=172.20.10.1)

!--- The ping destined for 172.20.10.1 dials the BRI.

*Mar  1 21:57:42.629: BR0 DDR: Attempting to dial 5551111

!--- phone number of the remote router that is dialed

*Mar  1 21:57:42.653: ISDN BR0: TX ->  SETUP pd = 8  callref = 0x09

*Mar  1 21:57:42.661:         Bearer Capability i = 0x8890

*Mar  1 21:57:42.669:         Channel ID i = 0x83

*Mar  1 21:57:42.677:         Keypad Facility i = '5551111'

*Mar  1 21:57:43.002: ISDN BR0: RX <-  CALL_PROC pd = 8  callref = 0x89

*Mar  1 21:57:43.010:         Channel ID i = 0x89

*Mar  1 21:57:43.189: ISDN BR0: RX <-  CONNECT pd = 8  callref = 0x89

*Mar  1 21:57:43.216: %LINK-3-UPDOWN: Interface BRI0:1, changed state to up

*Mar  1 21:57:43.236: BR0:1 PPP: Treating connection as a callout

!--- PPP negotiation begins.

*Mar  1 21:57:43.236: BR0:1 PPP: Phase is ESTABLISHING,

Active Open [0 sess, 1 load]

*Mar  1 21:57:43.248: BR0:1 LCP: O CONFREQ [Closed] id 10 len 34

*Mar  1 21:57:43.252: BR0:1 LCP:    AuthProto CHAP (0x0305C22305)

*Mar  1 21:57:43.256: BR0:1 LCP:    MagicNumber 0x153BEFE7 (0x0506153BEFE7)

*Mar  1 21:57:43.260: BR0:1 LCP:    MRRU 1524 (0x110405F4)

*Mar  1 21:57:43.268: BR0:1 LCP:    EndpointDisc 1 Local

(0x130F016D6175692D736F686F2D3031)

*Mar  1 21:57:43.280: ISDN BR0: TX ->  CONNECT_ACK pd = 8  callref = 0x09

*Mar  1 21:57:43.300: BR0:1 LCP: I CONFREQ [REQsent] id 7 Len 33

*Mar  1 21:57:43.304: BR0:1 LCP:    AuthProto CHAP (0x0305C22305)

*Mar  1 21:57:43.308: BR0:1 LCP:    MagicNumber 0x354AAC53 (0x0506354AAC53)

*Mar  1 21:57:43.312: BR0:1 LCP:    MRRU 1524 (0x110405F4)

*Mar  1 21:57:43.320: BR0:1 LCP:    EndpointDisc 1 Local

(0x130E016D6175692D6E61732D3035)

*Mar  1 21:57:43.327: BR0:1 LCP: O CONFACK [REQsent] id 7 Len 33

*Mar  1 21:57:43.331: BR0:1 LCP:    AuthProto CHAP (0x0305C22305)

*Mar  1 21:57:43.335: BR0:1 LCP:    MagicNumber 0x354AAC53 (0x0506354AAC53)

*Mar  1 21:57:43.339: BR0:1 LCP:    MRRU 1524 (0x110405F4)

*Mar  1 21:57:43.347: BR0:1 LCP:    EndpointDisc 1 Local

(0x130E016D6175692D6E61732D3035)

*Mar  1 21:57:43.359: BR0:1 LCP: I CONFACK [ACKsent] id 10 Len 34

*Mar  1 21:57:43.363: BR0:1 LCP:    AuthProto CHAP (0x0305C22305)

*Mar  1 21:57:43.367: BR0:1 LCP:    MagicNumber 0x153BEFE7 (0x0506153BEFE7)

*Mar  1 21:57:43.371: BR0:1 LCP:    MRRU 1524 (0x110405F4)

*Mar  1 21:57:43.379: BR0:1 LCP:    EndpointDisc 1 Local

(0x130F016D6175692D736F686F2D3031)

*Mar  1 21:57:43.383: BR0:1 LCP: State is Open

*Mar  1 21:57:43.383: BR0:1 PPP: Phase is AUTHENTICATING, by both

[0 sess, 1 load]

!--- PPP Authentication begins.

*Mar  1 21:57:43.391: BR0:1 CHAP: O CHALLENGE id 6 Len 33 from "maui-soho-01"

!--- outgoing challenge for the remote router !--- This username should be configured in the dialer map statement !--- at the remote router.

*Mar  1 21:57:43.399: BR0:1 CHAP: I CHALLENGE id 6 Len 32 from "maui-nas-05"

!--- incoming challenge from remote router

!--- This username should be configured in the dialer map statement.

*Mar  1 21:57:43.415: BR0:1 CHAP: O RESPONSE id 6 Len 33 from "maui-soho-01"

*Mar  1 21:57:43.443: BR0:1 CHAP: I SUCCESS id 6 Len 4

!--- Incoming CHAP Authentication is successful.

*Mar  1 21:57:43.450: BR0:1 CHAP: I RESPONSE id 6 Len 32 from "maui-nas-05"

*Mar  1 21:57:43.466: BR0:1 CHAP: O SUCCESS id 6 Len 4

!--- Outgoing CHAP Authentication is successful.

*Mar  1 21:57:43.474: BR0:1 PPP: Phase is VIRTUALIZED [0 sess, 1 load]

*Mar  1 21:57:43.581: Vi1 PPP: Phase is DOWN, Setup [0 sess, 1 load]

*Mar  1 21:57:43.601: BR0:1 IPCP: Packet buffered while building

MLP bundle interface

*Mar  1 21:57:43.605: BR0:1 CDPCP: Packet buffered while building

MLP bundle interface

*Mar  1 21:57:43.609: %LINK-3-UPDOWN: Interface Virtual-Access1,

changed state to up

!--- Virtual access interface is automatically created (needed for multilink).

*Mar  1 21:57:43.613: Vi1 DDR: Dialer statechange to up

*Mar  1 21:57:43.617: Vi1 DDR: Dialer call has been placed

*Mar  1 21:57:43.625: Vi1 PPP: Treating connection as a callout

*Mar  1 21:57:43.625: Vi1 PPP: Phase is ESTABLISHING, Active Open

[0 sess, 1 load]

*Mar  1 21:57:43.637: Vi1 LCP: O CONFREQ [Closed] id 1 Len 34

*Mar  1 21:57:43.641: Vi1 LCP:    AuthProto CHAP (0x0305C22305)

*Mar  1 21:57:43.645: Vi1 LCP:    MagicNumber 0x153BF171 (0x0506153BF171)

*Mar  1 21:57:43.649: Vi1 LCP:    MRRU 1524 (0x110405F4)

*Mar  1 21:57:43.653: Vi1 LCP:    EndpointDisc 1 Local

(0x130F016D6175692D736F686F2D3031)

*Mar  1 21:57:43.665: Vi1 PPP: Phase is UP [0 sess, 1 load]

*Mar  1 21:57:43.677: Vi1 IPCP: O CONFREQ [Closed] id 1 Len 10

*Mar  1 21:57:43.681: Vi1 IPCP:    Address 172.20.10.2 (0x0306AC140A02)

*Mar  1 21:57:43.693: Vi1 CDPCP: O CONFREQ [Closed] id 1 Len 4

*Mar  1 21:57:43.697: BR0:1 MLP: maui-nas-05, multilink up, first link

*Mar  1 21:57:43.700: Vi1 PPP: Pending ncpQ size is 2

*Mar  1 21:57:43.700: BR0:1 IPCP: Redirect packet to Vi1

*Mar  1 21:57:43.708: Vi1 IPCP: I CONFREQ [REQsent] id 1 Len 10

*Mar  1 21:57:43.712: Vi1 IPCP:    Address 172.20.10.1 (0x0306AC140A01)

*Mar  1 21:57:43.716: Vi1 IPCP: O CONFACK [REQsent] id 1 Len 10

*Mar  1 21:57:43.724: Vi1 IPCP:    Address 172.20.10.1 (0x0306AC140A01)

*Mar  1 21:57:43.728: BR0:1 CDPCP: Redirect packet to Vi1

*Mar  1 21:57:43.732: Vi1 CDPCP: I CONFREQ [REQsent] id 1 Len 4

*Mar  1 21:57:43.736: Vi1 CDPCP: O CONFACK [REQsent] id 1 Len 4

*Mar  1 21:57:43.744: Vi1 IPCP: I CONFACK [ACKsent] id 1 Len 10

*Mar  1 21:57:43.752: Vi1 IPCP:    Address 172.20.10.2 (0x0306AC140A02)

*Mar  1 21:57:43.756: Vi1 IPCP: State is Open

!--- IPCP state is open.

*Mar  1 21:57:43.764: Vi1 CDPCP: I CONFACK [ACKsent] id 1 Len 4

*Mar  1 21:57:43.768: Vi1 CDPCP: State is Open

*Mar  1 21:57:43.772: Vi1 DDR: dialer protocol up

*Mar  1 21:57:43.784: BR0 IPCP: Install route to 172.20.10.1

!--- Install route to remote side.

*Mar  1 21:57:44.462: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0:1,

changed state to up

*Mar  1 21:57:44.657: %LINEPROTO-5-UPDOWN: Line protocol on Interface

Virtual-Access1, changed state to up

*Mar  1 21:57:49.180: %ISDN-6-CONNECT: Interface BRI0:1 is now connected to

5551111 maui-nas-05

!--- BRI Dial on Demand Routing (DDR) Link is operational.

maui-soho-01#

関連情報

- BRI トラブルシューティングでの show isdn status コマンドの使用

- 基本 ISDN サービスの設定

- テクニカルサポート - Cisco Systems