Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Convenzioni

Premesse

Configurazione

Esempio di rete

Configurazioni

Verifica

Catalyst 2948G-L3 show Comandi

Catalyst 6500 show Commands

Risoluzione dei problemi

Riepilogo comandi

Informazioni correlate

Introduzione

In questo documento viene fornita una configurazione di esempio per un trunk IEEE 802.1Q tra uno switch Catalyst serie 6500 con software Catalyst OS (CatOS) e lo switch Catalyst 2948G-L3. Questo documento contiene una rete di esempio con Catalyst 2948G-L3 come switch core e Catalyst 6500 come switch del livello di accesso. Dopo una breve descrizione del meccanismo di trunking 802.1Q, viene descritta la configurazione sugli switch Catalyst 6500 e Catalyst 2948G-L3.

Prerequisiti

Requisiti

Nessun requisito specifico previsto per questo documento.

Componenti usati

Le informazioni fornite in questo documento si basano sulle seguenti versioni software e hardware:

- Router dello switch Catalyst 2948G-L3 con software Cisco IOS® versione 12.0(18)W5(22b)

- Switch Catalyst serie 6500 con software CatOS 8.5

Convenzioni

Fare riferimento a Cisco Technical Tips Conventions per ulteriori informazioni sulle convenzioni dei documenti.

Premesse

Il trunking trasferisce il traffico da diverse VLAN su un collegamento point-to-point tra i due dispositivi. Due metodi di trunking sono il protocollo ISL (Inter-Switch Link), un protocollo proprietario di Cisco, o 802.1Q (uno standard IEEE). Questo documento tratta in modo specifico del trunking 802.1Q. Nell'esempio, le VLAN nello switch Catalyst 6500 vengono estese allo switch Catalyst 2948G-L3 tramite collegamenti trunk 802.1Q.

Catalyst 2948G-L3 è un router con Cisco IOS e tutte le interfacce sono interfacce di routing per impostazione predefinita. Per usare il concetto di VLAN sullo switch Catalyst 2948G-L3, è necessario usare i gruppi di bridge. Ogni gruppo di bridge è considerato una VLAN separata. Questi gruppi di bridge corrispondono al numero di VLAN dello switch connesso. Per supportare il routing tra VLAN sugli switch Catalyst 2948G-L3, le interfacce BVI (Bridge and Routing) e IRB (Integrated Routing and Bridging) sono configurate in modo da indirizzare gli IP tra VLAN diverse.

Catalyst 2948G-L3 non supporta diversi protocolli orientati al layer 2, ad esempio il protocollo VTP (Virtual Terminal Protocol), il protocollo DTP (Distributed Diagnostics and Service Network) e il protocollo PAgP (Port Aggregation Protocol). Il software Catalyst 2948G-L3 Cisco IOS versione 12.0(7)W5(15d) e precedenti non supporta il bridging sulle sottointerfacce 802.1Q.

Lo switch Catalyst 2948G-L3 ha raggiunto la fine del ciclo di vita (EoL). Per informazioni sui prodotti sostitutivi consigliati e su switch Cisco Catalyst 2948G-L3 e 4908G-L3, fare riferimento a EoS /EoS.

Configurazione

Nell'esempio, lo switch Catalyst 2948G-L3 viene implementato come router inter-VLAN. Catalyst 6500 con CatOS e collegamento trunk 802.1Q per il collegamento allo switch Catalyst 2948G-L3. Catalyst 6500 è configurato come switch del layer di accesso con due VLAN, 20 e 30. Il routing tra queste due VLAN è fornito da Catalyst 2948G-L3. La configurazione del trunk 802.1Q tra Catalyst 6500 e Catalyst 2948G-L3 e la configurazione del routing tra VLAN sullo switch Catalyst 2948G-L3, sono descritte in questo documento.

In questa sezione vengono presentate le informazioni necessarie per configurare le funzionalità descritte più avanti nel documento.

Nota: per ulteriori informazioni sui comandi menzionati in questa sezione, usare lo strumento di ricerca dei comandi (solo utenti registrati).

Esempio di rete

Nel documento viene usata questa impostazione di rete:

Configurazioni

Nel documento vengono usate queste configurazioni:

- Catalyst 6500

- Catalyst 2948G-L3

Catalyst 6500

Current configuration:

!

version 8.1

!

hostname 6500

!

Catalyst 6500(enable)#

set vtp mode transparent

!--- In this example, the VTP mode is set to be transparent. !--- Set the VTP mode accordingly. This depends on your network.

!

#module 3 : 48-port 10/100BaseTX Ethernet

set vlan 20 3/20

set vlan 30 3/40

!--- The ports are assigned to the single VLAN and are !--- used as access ports.

set trunk 3/30 nonegotiate dot1q

!--- Port 3/30 is configured as dot1q trunk port and !--- the trunk mode is set to nonegotiate. !--- Trunk mode should be nonegotiate because 2948G-L3 does not support DTP.

set port enable 3/20,3/30,3/40

!--- Use the set port enable command !--- to enable a port or a range of ports.

!--- Output is suppressed.

Catalyst 2948G-L3

Current configuration:

!

version 12.0

hostname 2948G-L3

!

interface FastEthernet 20

no ip address

no ip directed-broadcast

bridge-group 20

!--- The bridge-group 20 command adds the !--- Fast Ethernet 20 interface to bridge group 20.

interface FastEthernet 40

no ip address

no ip directed-broadcast

bridge-group 30

!--- The bridge-group 30 command adds the !--- Fast Ethernet 40 interface to bridge group 30.

!

interface Fast Ethernet 30

no ip address

no ip redirects

no ip directed-broadcast

int fast ethernet 30.1

encapsulation dot1q 30

bride-group 30

exit

int fast ethernet 30.2

encapsulation dot1q 20

bridge-group 20

exit

int fast ethernet 30.3

encapsultion dot1q 1 native

bridge-group 1

exit

!--- Fast Ethernet 30 acts as a trunk port that carries VLANs 30 and 20. !--- Subinterfaces that belong to the same VLAN (network or subnet) must !--- be configured to belong to the same bridge group.

!--- VLAN 1 is the native VLAN by default.

bridge irb

!--- The bridge irb command enables IRB on !--- the router, which allows you to route traffic within the bridge groups.

bridge 30 protocol ieee

bridge 20 protocol ieee

!--- Choose IEEE as the Spanning Tree Protocol (STP).

bridge 30 route ip

bridge 20 route ip

!--- The bridge number route ip command allows you !--- to route IP traffic between the BVI interface !--- and the other IP interfaces on the router.

interface bvi 20

ip address 192.168.20.1 255.255.255.0

exit

interface bvi 30

ip address 192.168.30.1 255.255.255.0

exit

!--- Creates BVI interfaces for bridges 20 and 30. These interfaces act !--- as the gateway for VLANs 20 and 30.

!--- Output is suppressed.

Nota: le quattro porte adiacenti sullo switch Catalyst 2948G-L3, ad esempio da f1 a f4 o da f45 a f48, su un'interfaccia 10/100 devono usare tutte lo stesso incapsulamento VLAN. L'incapsulamento VLAN è ISL o 802.1Q.

Verifica

Per verificare che la configurazione funzioni correttamente, consultare questa sezione.

Lo strumento Output Interpreter (solo utenti registrati) (OIT) supporta alcuni comandi show. Usare l'OIT per visualizzare un'analisi dell'output del comando show.

Catalyst 2948G-L3 show Comandi

- 2948G-L3#show vlan

virtual LAN ID:  30 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interface:   FastEthernet30.1

This is configured as native Vlan for the following interface(s) :

FastEthernet30

Protocols Configured:   Address:              Received:        Transmitted:

Bridging        Bridge Group 20                 1                   0

Virtual LAN ID:  20 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interface:   FastEthernet30.2

Protocols Configured:   Address:              Received:        Transmitted:

Bridging        Bridge Group 30               921                   0

- 2948G-L3#show bridge 20

Total of 300 station blocks, 298 free

Codes: P - permanent, S - self

Bridge Group 20:

Address       Action    Interface

0009.11b9.1a75    forward   Fa30.2

Catalyst 6500 show Commands

- show trunk: questo comando verifica la configurazione del trunk, come mostrato nell'output:

Console> (enable) show trunk 3/30

* - indicates vtp domain mismatch

# - indicates dot1q-all-tagged enabled on the port

$ - indicates non-default dot1q-ethertype value

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

3/30     nonegotiate  dot1q          trunking      1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

3/30     1-1005,1025-4094

Port      Vlans allowed and active in management domain

--------  ---------------------------------------------------------------------

3/30     1,20,30

- show vlan: questo comando visualizza le porte corrispondenti alle VLAN corrispondenti:

VLAN Name                             Status    IfIndex Mod/Ports, Vlans

---- -------------------------------- --------- ------- ------------------------

1    default                          active    6       1/1-2

3/1-19,3/21-39,3/41-48

20   VLAN0020                         active    71      3/20

30   VLAN0030                         active    69      3/40

1002 fddi-default                     active    7

1003 token-ring-default               active    10

1004 fddinet-default                  active    8

1005 trnet-default                    active    9

Risoluzione dei problemi

Le informazioni contenute in questa sezione permettono di risolvere i problemi relativi alla configurazione.

Lo strumento Output Interpreter (solo utenti registrati) (OIT) supporta alcuni comandi show. Usare l'OIT per visualizzare un'analisi dell'output del comando show.

Nota: consultare le informazioni importanti sui comandi di debug prima di usare i comandi di debug.

PC2#ping 192.168.20.3

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.20.3, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/4/4 ms

PC1#ping 192.168.30.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.30.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/4/4 ms

PC1#ping 192.168.20.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.20.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/4/4 ms

Riepilogo comandi

- set interface

- impostare il trunk

- set vlan

- show interface

- show port

- show port capabilities

- mostra trunk

- show vtp domain

Informazioni correlate

- Configurazione di EtherChannel e trunking 802.1Q con switch Catalyst 2948G-L3 e CatOS

- Trunking 802.1Q tra gli switch Catalyst con software CatOS e Cisco IOS

- Configurazioni di esempio di Catalyst 2948G-L3

- Switch - Supporto dei prodotti

- Supporto della tecnologia di switching LAN

- Documentazione e supporto tecnico – Cisco Systems