Sommario

Introduzione

Premesse

Differenza tra le unità primarie e secondarie nella configurazione di failover

Differenza tra le unità attive e in standby nella configurazione di failover

Sostituire l'errore del firewall secondario

Sostituire l'errore del firewall primario

Introduzione

In questo documento viene descritto come sostituire un firewall ASA (Adaptive Security Appliance) con una coppia di failover attivo/standby.

Premesse

I firewall ASA supportano due configurazioni di failover, il failover attivo/attivo e il failover attivo/standby.

Sono disponibili 2 firewall:

- firewall-a è principale/attivo

- firewall-b è secondario/in standby

Differenza tra le unità primarie e secondarie nella configurazione di failover

Questo comando indica che il firewall esegue sempre il push della configurazione attiva nel firewall secondario.

# failover lan unit primary

Questo comando indica che il firewall riceve sempre la configurazione attiva dal firewall primario.

# failover lan unit secondary

Differenza tra le unità attive e in standby nella configurazione di failover

Questo comando indica che il firewall è il firewall attivo in esecuzione nella coppia di failover.

# failover active

Questo comando indica che il firewall è in standby e esegue un firewall nella coppia di failover.

# failover standby

Sostituire l'errore del firewall secondario

1. Verificare che il firewall primario sia attivo e in linea. Ad esempio:

firewall-a/pri/act# show failover

Failover On

Failover unit Primary

Failover LAN Interface: sync Port-channel1 (up)

Reconnect timeout 0:00:00

Unit Poll frequency 1 seconds, holdtime 15 seconds

Interface Poll frequency 5 seconds, holdtime 25 seconds

Interface Policy 1

Monitored Interfaces 0 of 1292 maximum

MAC Address Move Notification Interval not set

Version: Ours 9.12(4)56, Mate 9.12(4)56

Serial Number: Ours JADSERIAL1, Mate JADSERIAL2

Last Failover at: 19:54:29 GMT May 23 2023

This host: Primary - Active

Active time: 2204 (sec)

slot 0: FPR-2110 hw/sw rev (49.46/9.12(4)56) status (Up Sys)

Interface inside (10.0.0.1): Normal (Not-Monitored)

Interface outside (10.1.1.1): Normal (Not-Monitored)

Interface management (10.2.2.1): Normal (Not-Monitored)

Other host: Secondary - Failed

Active time: 0 (sec)

slot 0: FPR-2110 hw/sw rev (49.46/9.12(4)56) status (Up Sys)

Interface inside (10.0.0.2): Normal (Not-Monitored)

Interface outside (10.1.1.2): Normal (Not-Monitored)

Interface management (10.2.2.2): Normal (Not-Monitored)

2. Arrestare e rimuovere fisicamente il firewall secondario.

3. Aggiungere fisicamente il nuovo firewall secondario e accenderlo.

4. Una volta che il nuovo firewall secondario è attivo con la configurazione predefinita di fabbrica, abilitare il collegamento di failover, ovverono shutdownil collegamento fisico di failover.

Esempio:

firewall-a/pri/act#conf t

firewall-a/pri/act#(config)#interface Port-channel1

firewall-a/pri/act#(config-if)#no shutdown

firewall-a/pri/act#(config)#exit

firewall-a/pri/act#

firewall-b/sec/stby#conf t

firewall-b/sec/stby#(config)#interface Port-channel1

firewall-b/sec/stby#(config-if)#no shutdown

firewall-b/sec/stby#(config)#exit

firewall-b/sec/stby#

5. Configurare i comandi di failover. Ad esempio:

firewall-a/pri/act# sh run | inc fail

failover

failover lan unit primary

failover lan interface sync Port-channel1

failover link sync Port-channel1

failover interface ip sync 10.10.13.9 255.255.255.252 standby 10.10.13.10

no failover wait-disable

firewall-a/pri/act#

firewall-b/sec/stby# sh run | inc fail

no failover

failover lan unit secondary

failover lan interface sync Port-channel1

failover link sync Port-channel1

failover interface ip sync 10.10.13.9 255.255.255.252 standby 10.10.13.10

no failover wait-disable

firewall-b/sec/stby#

6. Abilitare il failover sul nuovo firewall secondario. Ad esempio:

firewall-b/sec/stby#conf t

firewall-b/sec/stby#(config)#failover

firewall-b/sec/stby#(config)#exit

firewall-b/sec/stby#

firewall-b/sec/stby# sh run | inc fail

failover

firewall-b/sec/stby#

7. Attendere che la configurazione attiva venga sincronizzata con la nuova unità e convalidare lo stato di failover corretto. Ad esempio:

firewall-a/pri/act#

Beginning configuration replication: Sending to mate.

End Configuration Replication to mate

firewall-a/pri/act#

firewall-b/sec/stby#

Beginning configuration replication from mate.

End configuration replication from mate.

firewall-b/sec/stby#

Nota: si noti che il firewall principale (firewall-a) invia la configurazione al firewall secondario (firewall-b).

8. Salvare la configurazione sul database primario/attivo e convalidare la memoria di scrittura sul nuovo database secondario/standby. Ad esempio:

firewall-a/pri/act#write memory

Building configuration...

Cryptochecksum: ad317407 935a773c 6c5fb66a c5edc342

64509 bytes copied in 9.290 secs (7167 bytes/sec)

[OK]

firewall-a/pri/act#

firewall-b/sec/stby#

May 24 2023 15:16:21 firewall-b : %ASA-5-111001: Begin configuration: console writing to memory

May 24 2023 15:16:22 firewall-b : %ASA-5-111004: console end configuration: OK

May 24 2023 15:16:22 firewall-b : %ASA-5-111008: User 'failover' executed the 'write memory' command.

May 24 2023 15:16:22 firewall-b : %ASA-5-111010: User 'failover', running 'N/A' from IP x.x.x.x , executed 'write memory'

firewall-b/sec/stby#

9. Verificare che la coppia di failover sia attiva/attiva su entrambi i firewall. Ad esempio:

firewall-a/pri/act# show failover

Failover On

Failover unit Primary

Failover LAN Interface: sync Port-channel1 (up)

Reconnect timeout 0:00:00

Unit Poll frequency 1 seconds, holdtime 15 seconds

Interface Poll frequency 5 seconds, holdtime 25 seconds

Interface Policy 1

Monitored Interfaces 0 of 1292 maximum

MAC Address Move Notification Interval not set

Version: Ours 9.12(4)56, Mate 9.12(4)56

Serial Number: Ours JADSERIAL1, Mate JADSERIAL2

Last Failover at: 19:54:29 GMT May 23 2023

This host: Primary - Active

Active time: 71564 (sec)

slot 0: FPR-2110 hw/sw rev (49.46/9.12(4)56) status (Up Sys)

Interface inside (10.0.0.1): Normal (Not-Monitored)

Interface outside (10.1.1.1): Normal (Not-Monitored)

Interface management (10.2.2.1): Normal (Not-Monitored)

Other host: Secondary - Standby Ready

Active time: 0 (sec)

slot 0: FPR-2110 hw/sw rev (49.46/9.12(4)56) status (Up Sys)

Interface inside (10.0.0.2): Normal (Not-Monitored)

Interface outside (10.1.1.2): Normal (Not-Monitored)

Interface management (10.2.2.2): Normal (Not-Monitored)

firewall-b/sec/stby# show failover

Failover On

Failover unit Secondary

Failover LAN Interface: sync Port-channel1 (up)

Reconnect timeout 0:00:00

Unit Poll frequency 1 seconds, holdtime 15 seconds

Interface Poll frequency 5 seconds, holdtime 25 seconds

Interface Policy 1

Monitored Interfaces 0 of 1292 maximum

MAC Address Move Notification Interval not set

Version: Ours 9.12(4)56, Mate 9.12(4)56

Serial Number: Ours JADSERIAL2, Mate JADSERIAL1

Last Failover at: 20:51:27 GMT May 23 2023

This host: Secondary - Standby Ready

Active time: 0 (sec)

slot 0: FPR-2110 hw/sw rev (49.46/9.12(4)56) status (Up Sys)

Interface inside (10.0.0.2): Normal (Not-Monitored)

Interface outside (10.1.1.2): Normal (Not-Monitored)

Interface management (10.2.2.2): Normal (Not-Monitored)

Other host: Primary - Active

Active time: 71635 (sec)

slot 0: FPR-2110 hw/sw rev (49.46/9.12(4)56) status (Up Sys)

Interface inside (10.0.0.1: Normal (Not-Monitored)

Interface outide (10.1.1.1): Normal (Not-Monitored)

Interface management (10.2.2.1): Normal (Not-Monitored)

Sostituire l'errore del firewall primario

1. Verificare che il firewall secondario sia attivo e in linea. Ad esempio:

firewall-b/sec/act# show failover

Failover On

Failover unit Secondary

Failover LAN Interface: sync Port-channel1 (up)

Reconnect timeout 0:00:00

Unit Poll frequency 1 seconds, holdtime 15 seconds

Interface Poll frequency 5 seconds, holdtime 25 seconds

Interface Policy 1

Monitored Interfaces 0 of 1292 maximum

MAC Address Move Notification Interval not set

Version: Ours 9.12(4)56, Mate 9.12(4)56

Serial Number: Ours JADSERIAL2, Mate JADSERIAL1

Last Failover at: 19:54:29 GMT May 23 2023

This host: Secondary - Active

Active time: 2204 (sec)

slot 0: FPR-2110 hw/sw rev (49.46/9.12(4)56) status (Up Sys)

Interface inside (10.0.0.1): Normal (Not-Monitored)

Interface outside (10.1.1.1): Normal (Not-Monitored)

Interface management (10.2.2.1): Normal (Not-Monitored)

Other host: Primary - Failed

Active time: 0 (sec)

slot 0: FPR-2110 hw/sw rev (49.46/9.12(4)56) status (Up Sys)

Interface inside (10.0.0.2): Normal (Not-Monitored)

Interface outside (10.1.1.2): Normal (Not-Monitored)

Interface management (10.2.2.2): Normal (Not-Monitored)

2. Arrestare e rimuovere fisicamente il firewall principale.

3. Aggiungere fisicamente il nuovo firewall principale e accenderlo.

4. A questo punto, il nuovo firewall principale diventa attivo con la configurazione predefinita di fabbrica.

5. Abilitare il collegamento di failover, senza arrestare il collegamento fisico di failover. Ad esempio:

firewall-a/pri/stby#conf t

firewall-a/pri/stby#(config)#interface Port-channel1

firewall-a/pri/stby#(config-if)#no shutdown

firewall-a/pri/stby#(config)#exit

firewall-a/pri/stby#

firewall-b/sec/act#conf t

firewall-b/sec/act#(config)#interface Port-channel1

firewall-b/sec/act#(config-if)#no shutdown

firewall-b/sec/act#(config)#exit

firewall-b/sec/act#

6. Salvare la configurazione. Scrivere la memoria sul firewall secondario/attivo e verificare che l'unità secondaria della LAN di failover si trovi nella configurazione di avvio.

Esempio:

firewall-b/sec/act# write memory

Building configuration...

Cryptochecksum: ad317407 935a773c 6c5fb66a c5edc342

64509 bytes copied in 9.290 secs (7167 bytes/sec)

[OK]

firewall-b/sec/act# show start | inc unit

failover lan unit secondary

firewall-b/sec/act#

7. Configurare i comandi di failover.

1. Sul firewall secondario/attivo, impostare prima il comando failover lan unit primary per garantire che la configurazione attiva venga trasferita dal firewall secondario/attivo al nuovo firewall predefinito per la configurazione primaria/standby. Ad esempio:

firewall-b/sec/act# sh run | inc unit

failover lan unit secondary

firewall-b/sec/act#

firewall-b/sec/act#conf t

firewall-b/sec/act#(config)#failover lan unit primary

firewall-b/sec/act#(config)#exit

firewall-b/sec/act# sh run | inc unit

failover lan unit primary

firewall-b/pri/act#

b. Convalidare la configurazione di failover su entrambi i dispositivi. Ad esempio:

firewall-b/pri/act# sh run | inc fail

failover

failover lan unit primary

failover lan interface sync Port-channel1

failover link sync Port-channel1

failover interface ip sync 10.10.13.9 255.255.255.252 standby 10.10.13.10

no failover wait-disable

firewall-b/pri/act#

firewall-a/sec/stby# sh run | inc fail

no failover

failover lan unit secondary

failover lan interface sync Port-channel1

failover link sync Port-channel1

failover interface ip sync 10.10.13.9 255.255.255.252 standby 10.10.13.10

no failover wait-disable

firewall-a/sec/stby#

8. Abilitare il failover sul nuovo firewall primario. Ad esempio:

firewall-a/sec/stby#conf t

firewall-a/sec/stby#(config)#failover

firewall-a/sec/stby#(config)#exit

firewall-a/sec/stby#

firewall-a/sec/stby# sh run | inc fail

failover

firewall-a/sec/stby#

9. Attendere che la configurazione attiva venga sincronizzata con la nuova unità e convalidare lo stato di failover corretto. Ad esempio:

firewall-b/pri/act#

Beginning configuration replication: Sending to mate.

End Configuration Replication to mate

firewall-b/pri/act#

firewall-a/sec/stby#

Beginning configuration replication from mate.

End configuration replication from mate.

firewall-a/sec/stby#

Nota: si noti che il firewall principale (firewall-b) invia la configurazione al firewall secondario (firewall-a). Non scrivere memoria sul firewall attivo/primario (firewall-b).

10. Ricaricare il firewall attivo/primario (firewall-b) in modo che venga avviato come firewall secondario/standby.

firewall-b/pri/act#reload

11. Subito dopo aver eseguito il comando "firewall-b reload" (attendere 15 secondi), passare al nuovo firewall principale (firewall-a) e immettere il comando failover lan unit primary, quindi scrivere memoria.

firewall-a/sec/act#conf t

firewall-a/sec/act#(config)#failover lan unit primary

firewall-a/sec/act#(config)#exit

firewall-a/sec/act# sh run | inc unit

failover lan unit primary

firewall-a/pri/act# write memory

Building configuration...

Cryptochecksum: ad317407 935a773c 6c5fb66a c5edc342

64509 bytes copied in 9.290 secs (7167 bytes/sec)

[OK]

firewall-a/pri/act# show start | inc unit

failover lan unit primary

firewall-a/pri/act#

12. Attendere che il firewall-b si avvii completamente e si unisca alla coppia di failover come database secondario/standby. Ad esempio:

firewall-a/pri/act#

Beginning configuration replication: Sending to mate.

End Configuration Replication to mate

firewall-a/pri/act#

firewall-b/sec/stby#

Beginning configuration replication from mate.

End configuration replication from mate.

firewall-b/sec/stby#

Nota: il firewall principale (firewall-a) invia la configurazione al firewall secondario (firewall-b).

13. Salvare la configurazione, scrivere la memoria sul database primario/attivo e convalidare la memoria di scrittura sul nuovo database secondario/standby. Ad esempio:

firewall-a/pri/act#write memory

Building configuration...

Cryptochecksum: ad317407 935a773c 6c5fb66a c5edc342

64509 bytes copied in 9.290 secs (7167 bytes/sec)

[OK]

firewall-a/pri/act#

firewall-b/sec/stby#

May 24 2023 15:16:21 firewall-b : %ASA-5-111001: Begin configuration: console writing to memory

May 24 2023 15:16:22 firewall-b : %ASA-5-111004: console end configuration: OK

May 24 2023 15:16:22 firewall-b : %ASA-5-111008: User 'failover' executed the 'write memory' command.

May 24 2023 15:16:22 firewall-b : %ASA-5-111010: User 'failover', running 'N/A' from IP x.x.x.x , executed 'write memory'

firewall-b/sec/stby#

14. Verificare che la coppia di failover sia attiva/attiva su entrambi i firewall. Ad esempio:

firewall-a/pri/act# show failover

Failover On

Failover unit Primary

Failover LAN Interface: sync Port-channel1 (up)

Reconnect timeout 0:00:00

Unit Poll frequency 1 seconds, holdtime 15 seconds

Interface Poll frequency 5 seconds, holdtime 25 seconds

Interface Policy 1

Monitored Interfaces 0 of 1292 maximum

MAC Address Move Notification Interval not set

Version: Ours 9.12(4)56, Mate 9.12(4)56

Serial Number: Ours JADSERIAL1, Mate JADSERIAL2

Last Failover at: 19:54:29 GMT May 23 2023

This host: Primary - Active

Active time: 71564 (sec)

slot 0: FPR-2110 hw/sw rev (49.46/9.12(4)56) status (Up Sys)

Interface inside (10.0.0.1): Normal (Not-Monitored)

Interface outside (10.1.1.1): Normal (Not-Monitored)

Interface management (10.2.2.1): Normal (Not-Monitored)

Other host: Secondary - Standby Ready

Active time: 0 (sec)

slot 0: FPR-2110 hw/sw rev (49.46/9.12(4)56) status (Up Sys)

Interface inside (10.0.0.2): Normal (Not-Monitored)

Interface outside (10.1.1.2): Normal (Not-Monitored)

Interface management (10.2.2.2): Normal (Not-Monitored)

firewall-b/sec/stby# show failover

Failover On

Failover unit Secondary

Failover LAN Interface: sync Port-channel1 (up)

Reconnect timeout 0:00:00

Unit Poll frequency 1 seconds, holdtime 15 seconds

Interface Poll frequency 5 seconds, holdtime 25 seconds

Interface Policy 1

Monitored Interfaces 0 of 1292 maximum

MAC Address Move Notification Interval not set

Version: Ours 9.12(4)56, Mate 9.12(4)56

Serial Number: Ours JADSERIAL2, Mate JADSERIAL1

Last Failover at: 20:51:27 GMT May 23 2023

This host: Secondary - Standby Ready

Active time: 0 (sec)

slot 0: FPR-2110 hw/sw rev (49.46/9.12(4)56) status (Up Sys)

Interface inside (10.0.0.2): Normal (Not-Monitored)

Interface outside (10.1.1.2): Normal (Not-Monitored)

Interface management (10.2.2.2): Normal (Not-Monitored)

Other host: Primary - Active

Active time: 71635 (sec)

slot 0: FPR-2110 hw/sw rev (49.46/9.12(4)56) status (Up Sys)

Interface inside (10.0.0.1: Normal (Not-Monitored)

Interface outide (10.1.1.1): Normal (Not-Monitored)

Interface management (10.2.2.1): Normal (Not-Monitored)