Contenu

Introduction

Conditions préalables

Conditions requises

Components Used

Conventions

Configuration

Diagramme du réseau

Configurations

Vérification

Dépannage

Dépannage des commandes

Informations connexes

Introduction

Cet exemple de configuration décrit comment configurer GRE (Generic Routing Encapsulation) sur IPSec entre un concentrateur VPN 5000 Cisco et un routeur Cisco IOS®. La fonction d'encapsulation GRE sous IPSec a été introduite dans la version 6.0(19) du logiciel du concentrateur VPN 5000.

Le protocole RIP (Routing Information Protocol) est utilisé comme protocole de routage dynamique dans cet exemple pour acheminer le trafic à travers le tunnel VPN.

Conditions préalables

Conditions requises

Aucune spécification déterminée n'est requise pour ce document.

Components Used

Les informations contenues dans ce document sont basées sur les versions de matériel et de logiciel suivantes :

- Logiciel Cisco IOS Version 12.1(5)T7

- Logiciel du concentrateur VPN 5000 version 6.0(19)

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Pour plus d'informations sur les conventions des documents, référez-vous aux Conventions utilisées pour les conseils techniques de Cisco.

Configuration

Cette section vous fournit des informations pour configurer les fonctionnalités décrites dans ce document.

Remarque : Pour en savoir plus sur les commandes utilisées dans le présent document, utilisez l’outil de recherche de commandes (clients inscrits seulement).

Diagramme du réseau

Ce document utilise la configuration réseau indiquée dans le diagramme suivant.

GRE sur IPSec est configuré entre le routeur Cisco IOS (7140) et le concentrateur Cisco VPN 5008. Derrière ces périphériques, plusieurs réseaux sont annoncés via le protocole RIP, qui fonctionne dans le tunnel GRE entre 7140 et VPN 5008.

Les réseaux derrière le Cisco 7140 sont les suivants :

- 10.31.0.0/17

Les réseaux derrière le VPN 5008 sont les suivants :

- 172.18.124.0.0/24

- 20.20.20.0/24

- 10.0.0.0/24

Configurations

Ce document utilise les configurations indiquées ici.

- Routeur Cisco IOS

- Concentrateur VPN 5000

- CVC

Routeur Cisco IOS

Building configuration...

Current configuration : 1607 bytes

!

version 12.1

no service single-slot-reload-enable

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 03-vpn-7140

!

boot system flash disk1:c7100-ik8s-mz.122-3

logging rate-limit console 10 except errors

enable password <removed>

!

ip subnet-zero

ip cef

!

!

no ip finger

!

!

!--- Define phase 1 policy.

crypto isakmp policy 10

authentication pre-share

!--- Define the PreShared Key for the Remote peer !--- (5000 ) in this example.

crypto isakmp key cisco123 address 10.32.1.161

!

!--- Define Phase 2 policy. !--- Make sure that Transport Mode is enabled.

crypto ipsec transform-set www esp-des esp-sha-hmac

mode transport

!

!--- Define the crypto map that is later !--- applied on the outbound interface.

crypto map temp 10 ipsec-isakmp

set peer 10.32.1.161

set transform-set www

match address 100

!

call rsvp-sync

!

!

!

!

!

!

!

controller ISA 5/1

!

!--- Define the GRE tunnel on the router. !--- Tunnel source is the outbound interface !--- and tunnel destination is VPN 5000.

interface Tunnel0

ip address 10.1.1.2 255.255.255.0

tunnel source FastEthernet0/0

tunnel destination 10.32.1.161

crypto map temp

!

!--- Outbound Interface that is connected to the Internet.

interface FastEthernet0/0

ip address 10.32.1.162 255.255.128.0

duplex auto

speed auto

crypto map temp

!

!

!--- Inside interface.

interface FastEthernet0/1

ip address 10.31.100.1 255.255.128.0

no keepalive

duplex auto

speed auto

!

interface Serial1/0

no ip address

shutdown

framing c-bit

cablelength 10

dsu bandwidth 44210

!

interface Serial1/1

no ip address

shutdown

framing c-bit

cablelength 10

dsu bandwidth 44210

!

!--- Define RIP Routing Protocol on the router. !--- This example shows Version 2 for classless routing.

router rip

version 2

network 10.0.0.0

no auto-summary

!

ip classless

ip route 0.0.0.0 0.0.0.0 10.32.1.1

no ip http server

!

!--- Encryption access-list that is used !--- to encrypt the GRE packets.

access-list 100 permit gre host 10.32.1.162 host 10.32.1.161

!

!

line con 0

exec-timeout 0 0

transport input none

line aux 0

line vty 5 15

!

end

Concentrateur VPN 5000

show configuration

Edited Configuration not Present, using Running

[ IP Ethernet 0:0 ]

SubnetMask = 255.255.255.0

IPAddress = 1.1.1.1

[ IP Ethernet 1:0 ]Mode = Routed

SubnetMask = 255.255.128.0

IPAddress = 10.32.1.161

[ General ]

VPNGateway = 10.32.1.1

EnablePassword = <removed>

Password = <removed>

EthernetAddress = 00:00:a5:e9:c8:00

DeviceType = VPN 5002/8 Concentrator

ConfiguredOn = Timeserver not configured

ConfiguredFrom = Command Line, from Console

[ IKE Policy ]

Protection = SHA_DES_G1

[ IP Static ]

0.0.0.0 0.0.0.0 10.32.1.1 1 redist=none

[ Context List ]

flash://rip.cfg

[ Logging ]

Enabled = On

Level = 7

Configuration size is 822 out of 65500 bytes.

VPN5002_8_A5E9C800: Main#

CVC

show configuration

Edited Configuration not Present, using Running

[ General ]

Context = "rip"

[ IP Ethernet 1:0.1 ]

VLANID = 124

Encapsulation = dot1q

Mode = Routed

SubnetMask = 255.255.255.0

IPAddress = 172.18.124.219

[ IP Static ]

[ Tunnel Partner VPN 1 ]

InactivityTimeout = 120

Transform = esp(sha,des)

KeyManage = ReliablePeer = "10.31.0.0/17"

LocalAccess = "10.5.1.0/24"

SharedKey = "cisco123"

Mode = Main

TunnelType = GREinIPSec

BindTo = "Ethernet 1:0"

Partner = 10.32.1.162

[ IP VPN 1 ]

RIPIn = On

RIPOut = On

RIPVersion = V2

DirectedBroadcast = Off

Numbered = On

Mode = Routed

SubnetMask = 255.255.255.0

IPAddress = 10.1.1.1

[ IP Ethernet 1:0.2 ]

Mode = Routed

SubnetMask = 255.255.255.0

IPAddress = 20.20.20.20

Configuration size is 1127 out of 65500 bytes.

VPN5002_8_A5E9C800: rip#

Vérification

Cette section présente des informations que vous pouvez utiliser pour vous assurer que votre configuration fonctionne correctement.

Certaines commandes show sont prises en charge par l'Output Interpreter Tool (clients enregistrés uniquement), qui vous permet de voir une analyse de la sortie de la commande show.

- show ip route : affiche l'état actuel de la table de routage.

- show crypto engine connection active - Affiche le compteur de chiffrement/déchiffrement de paquet par association de sécurité IPSec.

- show crypto ipsec sa - Affiche toutes les associations de sécurité IPSec actuelles.

- show system log buffer : affiche les informations Syslog de base.

- vpn trace dump : affiche des informations détaillées sur les processus VPN.

03-vpn-7140#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.32.1.1 to network 0.0.0.0

20.0.0.0/24 is subnetted, 1 subnets

R 20.20.20.0 [120/1] via 10.1.1.1, 00:00:10, Tunnel0

172.18.0.0/16 is variably subnetted, 2 subnets, 2 masks

R 172.18.124.0/24 [120/1] via 10.1.1.1, 00:00:10, Tunnel0

10.0.0.0/8 is variably subnetted, 4 subnets, 2 masks

R 10.0.0.0/24 [120/2] via 10.1.1.1, 00:00:10, Tunnel0

C 10.1.1.0/24 is directly connected, Tunnel0

C 10.31.0.0/17 is directly connected, FastEthernet0/1

C 10.32.0.0/17 is directly connected, FastEthernet0/0

S* 0.0.0.0/0 [1/0] via 10.32.1.1

03-vpn-7140#

03-vpn-7140#show crypto enggine connection active

ID Interface IP-Address State Algorithm Encrypt Decrypt

3 FastEthernet0/0 10.32.1.162 set HMAC_SHA+DES_56_CB 0 0

4 FastEthernet0/0 10.32.1.162 set HMAC_SHA+DES_56_CB 0 0

5 FastEthernet0/0 10.32.1.162 set HMAC_SHA+DES_56_CB 0 0

2098 FastEthernet0/0 10.32.1.162 set HMAC_SHA+DES_56_CB 0 1892

2099 FastEthernet0/0 10.32.1.162 set HMAC_SHA+DES_56_CB 11552 0

03-vpn-7140#show crypto ipsec sa

interface: FastEthernet0/0

Crypto map tag: temp, local addr. 10.32.1.162

local ident (addr/mask/prot/port): (10.32.1.162/255.255.255.255/0/0)

remote ident (addr/mask/prot/port): (10.32.1.161/255.255.255.255/0/0)

current_peer: 10.32.1.161

PERMIT, flags={transport_parent,}

#pkts encaps: 0, #pkts encrypt: 0, #pkts digest 0

#pkts decaps: 0, #pkts decrypt: 0, #pkts verify 0

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0, #pkts decompress failed: 0

#send errors 0, #recv errors 0

local crypto endpt.: 10.32.1.162, remote crypto endpt.: 10.32.1.161

path mtu 1500, media mtu 1500

current outbound spi: 0

inbound esp sas:

inbound ah sas:

inbound pcp sas:

outbound esp sas:

outbound ah sas:

outbound pcp sas:

local ident (addr/mask/prot/port): (10.32.1.162/255.255.255.255/47/0)

remote ident (addr/mask/prot/port): (10.32.1.161/255.255.255.255/47/0)

current_peer: 10.32.1.161

PERMIT, flags={origin_is_acl,transport_parent,}

#pkts encaps: 12912, #pkts encrypt: 12912, #pkts digest 12912

#pkts decaps: 2382, #pkts decrypt: 2382, #pkts verify 2382

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0, #pkts decompress failed: 0

#send errors 0, #recv errors 0

local crypto endpt.: 10.32.1.162, remote crypto endpt.: 10.32.1.161

path mtu 1500, media mtu 1500

current outbound spi: 101

inbound esp sas:

spi: 0x4624F3AD(1176826797)

transform: esp-des esp-sha-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 2098, flow_id: 69, crypto map: temp

sa timing: remaining key lifetime (k/sec): (1048130/3179)

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0x101(257)

transform: esp-des esp-sha-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 2099, flow_id: 70, crypto map: temp

sa timing: remaining key lifetime (k/sec): (1046566/3179)

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

interface: Tunnel0

Crypto map tag: temp, local addr. 10.32.1.162

local ident (addr/mask/prot/port): (10.32.1.162/255.255.255.255/0/0)

remote ident (addr/mask/prot/port): (10.32.1.161/255.255.255.255/0/0)

current_peer: 10.32.1.161

PERMIT, flags={transport_parent,}

#pkts encaps: 0, #pkts encrypt: 0, #pkts digest 0

#pkts decaps: 0, #pkts decrypt: 0, #pkts verify 0

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0, #pkts decompress failed: 0

#send errors 0, #recv errors 0

local crypto endpt.: 10.32.1.162, remote crypto endpt.: 10.32.1.161

path mtu 1500, media mtu 1500

current outbound spi: 0

inbound esp sas:

inbound ah sas:

inbound pcp sas:

outbound esp sas:

outbound ah sas:

outbound pcp sas:

local ident (addr/mask/prot/port): (10.32.1.162/255.255.255.255/47/0)

remote ident (addr/mask/prot/port): (10.32.1.161/255.255.255.255/47/0)

current_peer: 10.32.1.161

PERMIT, flags={origin_is_acl,transport_parent,}

#pkts encaps: 13017, #pkts encrypt: 13017, #pkts digest 13017

#pkts decaps: 2410, #pkts decrypt: 2410, #pkts verify 2410

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0, #pkts decompress failed: 0

#send errors 0, #recv errors 0

local crypto endpt.: 10.32.1.162, remote crypto endpt.: 10.32.1.161

path mtu 1500, media mtu 1500

current outbound spi: 101

inbound esp sas:

spi: 0x4624F3AD(1176826797)

transform: esp-des esp-sha-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 2098, flow_id: 69, crypto map: temp

sa timing: remaining key lifetime (k/sec): (1048124/3176)

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0x101(257)

transform: esp-des esp-sha-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 2099, flow_id: 70, crypto map: temp

sa timing: remaining key lifetime (k/sec): (1046566/3176)

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

Dépannage

Cette section fournit des informations que vous pouvez utiliser pour dépanner votre configuration.

Dépannage des commandes

Certaines commandes show sont prises en charge par l'Output Interpreter Tool (clients enregistrés uniquement), qui vous permet de voir une analyse de la sortie de la commande show.

Note : Avant d'émettre des commandes debug, consultez Informations importantes sur les commandes de débogage.

- debug crypto isakmp (routeur Cisco IOS) : affiche des informations détaillées sur la négociation IKE (Internet Key Exchange) phase I (Main Mode).

- debug crypto ipsec (Cisco IOS Router) : affiche des informations détaillées sur la négociation IKE phase II (Quick Mode).

- debug crypto engine (Cisco IOS Router) : débogue le processus de chiffrement/déchiffrement des paquets et Diffie-Hellman (DH).

- debug ip rip (Cisco IOS Router) : débogue le protocole de routage RIP.

Exécutez la commande show ip routing à partir du concentrateur VPN 5000.

VPN5002_8_A5E9C800: rip#show ip routing

IP Routing Table for rip

Directly Connected Routes:

Destination Mask Ref Uses Type Interface

10.1.1.0 FFFFFF00 5 STIF VPN0:1

10.1.1.0 FFFFFFFF 0 STIF Local

10.1.1.1 @FFFFFFFF 5 LocalLocal

10.1.1.255 FFFFFFFF 0 STIF Local

20.20.20.0 FFFFFF00 1352 STIF Ether1:0.2

20.20.20.0 FFFFFFFF 0 STIF Local

20.20.20.20 @FFFFFFFF 14 LocalLocal

20.20.20.255 FFFFFFFF 1318 STIF Local

127.0.0.1 FFFFFFFF 0 STIF Local

172.18.124.0 FFFFFF00 13789 STIF Ether1:0.1

172.18.124.0 FFFFFFFF 0 STIF Local

172.18.124.219 @FFFFFFFF 6 LocalLocal

172.18.124.255 FFFFFFFF 13547 STIF Local

224.0.0.5 FFFFFFFF 0 STIF Local

224.0.0.6 FFFFFFFF 0 STIF Local

224.0.0.9 FFFFFFFF 15 STIF Local

255.255.255.255 @FFFFFFFF 221 LocalLocal

Static Routes:

Destination Mask Gateway Metric Ref Uses Type Interface

10.31.0.0 FFFF0000 Interface 1 0 Stat VPN0:1

10.32.1.162 @FFFFFFFF 10.32.1.161 2 0 *Stat VPN0:1

Dynamic Routes:

Src/

Destination Mask Gateway Metric Ref Uses Type TTL Interface

DEFAULT 10.1.1.2 1 293 RIP2 165 VPN0:1

10.0.0.0 FFFFFF00 172.18.124.216 1 0 RIP1 160 Ether1:0.1

10.31.0.0 FFFF8000 10.1.1.2 1 0 RIP2 165 VPN0:1

10.32.0.0 FFFF8000 10.1.1.2 1 0 RIP2 165 VPN0:1

Configured IP Routes:

Destination Mask Gateway Metric IFnum Flags

10.31.0.0 FFFF0000 Interface 1 VPN 0:1 Redist = none

Total Routes in use: 23 Mask -> @Host route Type -> Redist *rip #ospf

VPN5002_8_A5E9C800: rip#show vpn stat ver

Current In High Running Script Script Script

Active Negot Water Total Starts OK Error

--------------------------------------------------------------

Users 0 0 0 0 0 0 0

Partners 1 0 1 1 1 0 0

Total 1 0 1 1 1 0 0

Stats VPN0:1

Wrapped 2697

Unwrapped 14439

BadEncap 0

BadAuth 0

BadEncrypt 0

rx IP 14439

rx IPX 0

rx Other 0

tx IP 2697

tx IPX 0

tx Other 0

IKE rekey 0

Input VPN pkts dropped due to no SA: 1

Input VPN pkts dropped due to no free queue entries: 0

IOP slot 1:

Current In High Running Script Script Script

Active Negot Water Total Starts OK Error

--------------------------------------------------------------

Users 0 0 0 0 0 0 0

Partners 0 0 0 0 0 0 0

Total 0 0 0 0 0 0 0

Stats

Wrapped

Unwrapped

BadEncap

BadAuth

BadEncrypt

rx IP

rx IPX

rx Other

tx IP

tx IPX

tx Other

IKE rekey

Input VPN pkts dropped due to no SA: 0

Input VPN pkts dropped due to no free queue entries: 0

IOP slot 2:

Current In High Running Script Script Script

Active Negot Water Total Starts OK Error

--------------------------------------------------------------

Users 0 0 0 0 0 0 0

Partners 0 0 0 0 0 0 0

Total 0 0 0 0 0 0 0

Stats

Wrapped

Unwrapped

BadEncap

BadAuth

BadEncrypt

rx IP

rx IPX

rx Other

tx IP

tx IPX

tx Other

IKE rekey

Input VPN pkts dropped due to no SA: 0

Input VPN pkts dropped due to no free queue entries: 0

IOP slot 3:

Current In High Running Script Script Script

Active Negot Water Total Starts OK Error

--------------------------------------------------------------

Users 0 0 0 0 0 0 0

Partners 0 0 0 0 0 0 0

Total 0 0 0 0 0 0 0

Stats

Wrapped

Unwrapped

BadEncap

BadAuth

BadEncrypt

rx IP

rx IPX

rx Other

tx IP

tx IPX

tx Other

IKE rekey

Input VPN pkts dropped due to no SA: 0

Input VPN pkts dropped due to no free queue entries: 0

Informations connexes

- Page de support pour Concentrateurs VPN Cisco 5000

- Page d'assistance du client VPN 5000 de Cisco

- Page d'assistance d'IPSec (protocole de sécurité IP)

- Support technique - Cisco Systems