Table des matières

Introduction

Conditions préalables

Exigences

Composants utilisés

Conventions

Configurer

Diagramme du réseau

Configurations

Vérifier

Dépannage

Dépannage des commandes

Informations connexes

Introduction

Ce document fournit un exemple de configuration du VPN multipoint dynamique (DMVPN) par l'utilisation de l'Encapsulation de routage générique (GRE) pour IPsec avec l'Open Shortest Path First (OSPF), la Traduction d'adresses réseau (NAT), et le pare-feu Cisco IOS®.

Conditions préalables

Exigences

Avant de pouvoir établir un tunnel multipoint GRE (mGRE) et IPsec, vous devez définir une stratégie IKE (Internet Key Exchange) à l'aide de la commande crypto isakmp policy.

Remarque : utilisez l'outil de recherche de commandes (clients enregistrés uniquement) pour obtenir plus d'informations sur les commandes utilisées dans cette section.

Composants utilisés

Les informations contenues dans ce document sont basées sur les versions de matériel et de logiciel suivantes :

- Logiciel Cisco IOS® version 12.2(15)T1 sur le routeur concentrateur et logiciel Cisco IOS version 12.3(1.6) sur les routeurs satellites

- Cisco 3620 comme routeur concentrateur, deux routeurs Cisco 1720 et un routeur Cisco 3620 comme routeurs satellites

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Pour plus d’informations sur les conventions utilisées dans ce document, reportez-vous aux Conventions relatives aux conseils techniques Cisco.

Configurer

Cette section vous fournit des informations pour configurer les fonctionnalités décrites dans ce document.

Remarque : utilisez l'outil de recherche de commandes (clients enregistrés uniquement) pour obtenir plus d'informations sur les commandes utilisées dans cette section.

Diagramme du réseau

Ce document utilise cette configuration du réseau.

Configurations

Ce document utilise les configurations suivantes.

- Concentrateur - 3620-B

- Satellite 1 - 3620-A

- Satellite 2 - 1720-b

- Satellite 3 - 1720-A

Concentrateur - 3620-B

W2N-6.16-3620-B#write terminal

Building configuration...

Current configuration : 2613 bytes

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname W2N-6.16-3620-B

!

logging queue-limit 100

!

memory-size iomem 10

ip subnet-zero

!

!

ip cef

no ip domain lookup

!

!--- This is the Cisco IOS Firewall configuration and what to inspect. !--- This is applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out ftp

ip inspect name in2out tftp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out http

ip inspect name in2out udp

ip audit po max-events 100

!

!

!

!--- Create an Internet Security Association and Key Management !--- Protocol (ISAKMP) policy for Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

crypto isakmp nat keepalive 20

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPsec profile to be applied dynamically !--- to the GRE over IPsec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!

!

!

!

!

!

!

!

!

no voice hpi capture buffer

no voice hpi capture destination

!

!

mta receive maximum-recipients 0

!

!

!

!--- This is the inbound interface.

interface Loopback1

ip address 192.168.117.1 255.255.255.0

ip nat inside

!

!--- Create a GRE tunnel template to be applied !--- to all the dynamically created GRE tunnels.

interface Tunnel1

description MULTI-POINT GRE TUNNEL for BRANCHES

bandwidth 1000

ip address 172.16.0.1 255.255.255.0

no ip redirects

ip mtu 1416

ip nhrp authentication dmvpn

ip nhrp map multicast dynamic

ip nhrp network-id 99

ip nhrp holdtime 300

no ip route-cache

ip ospf network broadcast

no ip mroute-cache

delay 1000

tunnel source FastEthernet0/0

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

!--- This is the outbound interface.

interface FastEthernet0/0

ip address 14.24.117.1 255.255.0.0

ip nat outside

ip access-group 100 in

ip inspect in2out out

no ip mroute-cache

duplex auto

speed auto

!

interface Serial0/0

no ip address

shutdown

clockrate 2000000

no fair-queue

!

interface FastEthernet0/1

no ip address

no ip mroute-cache

duplex auto

speed auto

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router ospf 1

log-adjacency-changes

network 172.16.0.0 0.0.0.255 area 0

network 192.168.117.0 0.0.0.255 area 0

!

!--- Except the private network traffic from the NAT process.

ip nat inside source route-map nonat interface FastEthernet0/0 overload

ip http server

no ip http secure-server

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

ip route 2.0.0.0 255.0.0.0 14.24.121.1

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- Cisco IOS Firewall opens other inbound access as needed.

access-list 100 permit udp any host 14.24.117.1 eq 500

access-list 100 premit esp any host 14.24.117.1

access-list 100 permit gre any host 14.24.117.1

access-list 100 deny ip any any

!--- Except the private network traffic from the NAT process.

access-list 110 deny   ip 192.168.117.0 0.0.0.255 192.168.118.0 0.0.0.255

access-list 110 deny   ip 192.168.117.0 0.0.0.255 192.168.116.0 0.0.0.255

access-list 110 deny   ip 192.168.117.0 0.0.0.255 192.168.120.0 0.0.0.255

access-list 110 permit ip 192.168.117.0 0.0.0.255 any

!

!--- Except the private network traffic from the NAT process.

route-map nonat permit 10

match ip address 110

!

call rsvp-sync

!

!

mgcp profile default

!

dial-peer cor custom

!

!

!

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

!

end

W2N-6.16-3620-B#

Satellite 1 - 3620-A

W2N-6.16-3620-A#write terminal

Building configuration...

Current configuration : 2678 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname W2N-6.16-3620-A

!

boot system flash slot0:c3620-ik9o3s7-mz.122-15.T1.bin

logging queue-limit 100

!

memory-size iomem 15

ip subnet-zero

!

!

ip cef

no ip domain lookup

!

!--- This is the Cisco IOS Firewall configuration and what to inspect. !--- This is applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out tftp

ip inspect name in2out udp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out realaudio

ip inspect name in2out vdolive

ip inspect name in2out netshow

ip audit po max-events 100

!

!

!

!--- Create an ISAKMP policy for !--- Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPsec profile to be applied dynamically !--- to the GRE over IPsec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!

!

!

!

!

!

!

!

!

no voice hpi capture buffer

no voice hpi capture destination

!

!

mta receive maximum-recipients 0

!

!

!

!--- This is the inbound interface.

interface Loopback1

ip address 192.168.118.1 255.255.255.0

ip nat inside

!

!--- Create a GRE tunnel template to be applied to !--- all the dynamically created GRE tunnels.

interface Tunnel1

description HOST DYNAMIC TUNNEL

bandwidth 1000

ip address 172.16.0.2 255.255.255.0

no ip redirects

ip mtu 1416

ip nhrp authentication dmvpn

ip nhrp map multicast dynamic

ip nhrp map 172.16.0.1 14.24.117.1

ip nhrp map multicast 14.24.117.1

ip nhrp network-id 99

ip nhrp holdtime 300

ip nhrp nhs 172.16.0.1

no ip route-cache

ip ospf network broadcast

no ip mroute-cache

delay 1000

tunnel source Ethernet0/0

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

!--- This is the outbound interface.

interface Ethernet0/0

ip address 14.24.118.1 255.255.0.0

ip nat outside

ip access-group 100 in

ip inspect in2out out

no ip mroute-cache

half-duplex

!

interface Ethernet0/1

no ip address

half-duplex

!

interface Ethernet0/2

no ip address

shutdown

half-duplex

!

interface Ethernet0/3

no ip address

shutdown

half-duplex

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router ospf 1

log-adjacency-changes

redistribute connected

network 172.16.0.0 0.0.0.255 area 0

network 192.168.118.0 0.0.0.255 area 0

!

!--- Except the private network traffic from the NAT process.

ip nat inside source route-map nonat interface Ethernet0/0 overload

ip http server

no ip http secure-server

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

ip route 2.0.0.0 255.0.0.0 14.24.121.1

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- Cisco IOS Firewall opens inbound access as needed.

access-list 100 permit udp any host 14.24.118.1 eq 500

access-list 100 premit esp any host 14.24.118.1

access-list 100 permit gre any host 14.24.118.1

access-list 100 deny ip any any

!--- Except the private network traffic from the NAT process.

access-list 110 deny   ip 192.168.118.0 0.0.0.255 192.168.117.0 0.0.0.255

access-list 110 deny   ip 192.168.118.0 0.0.0.255 192.168.116.0 0.0.0.255

access-list 110 deny   ip 192.168.118.0 0.0.0.255 192.168.120.0 0.0.0.255

access-list 110 permit ip 192.168.118.0 0.0.0.255 any

!

!--- Except the private network traffic from the NAT process.

route-map nonat permit 10

match ip address 110

!

call rsvp-sync

!

!

mgcp profile default

!

dial-peer cor custom

!

!

!

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

!

end

W2N-6.16-3620-A#

Satellite 2 - 1720-b

1720-b#write terminal

Building configuration...

Current configuration : 2623 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 1720-b

!

logging queue-limit 100

enable password cisco

!

username 7206-B password 0 cisco

ip subnet-zero

!

!

no ip domain lookup

!

ip cef

!--- This is the Cisco IOS Firewall configuration and what to inspect. !--- This is applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out tftp

ip inspect name in2out udp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out realaudio

ip inspect name in2out vdolive

ip inspect name in2out netshow

ip audit po max-events 100

vpdn-group 1

request-dialin

protocol pppoe

!

!

!

!

!

!--- Create an ISAKMP policy for !--- Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPsec profile to be applied dynamically !--- to the GRE over IPsec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!

!

!

!--- This is the inbound interface.

interface Loopback1

ip address 192.168.116.1 255.255.255.0

ip nat inside

!

!--- Create a GRE tunnel template to be applied to !--- all the dynamically created GRE tunnels.

interface Tunnel1

description HOST DYNAMIC TUNNEL

bandwidth 1000

ip address 172.16.0.3 255.255.255.0

no ip redirects

ip mtu 1416

ip nhrp authentication dmvpn

ip nhrp map multicast dynamic

ip nhrp map 172.16.0.1 14.24.117.1

ip nhrp map multicast 14.24.117.1

ip nhrp network-id 99

ip nhrp holdtime 300

ip nhrp nhs 172.16.0.1

no ip route-cache

ip ospf network broadcast

no ip mroute-cache

delay 1000

tunnel source Dialer1

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

interface Ethernet0

no ip address

half-duplex

!

interface FastEthernet0

no ip address

no ip mroute-cache

speed auto

pppoe enable

pppoe-client dial-pool-number 1

!

!--- This is the outbound interface.

interface Dialer1

ip address 2.2.2.10 255.255.255.0

ip inspect in2out out

ip access-group 100 in encapsulation ppp

dialer pool 1

dialer-group 1

ppp authentication pap chap callin

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router ospf 1

log-adjacency-changes

redistribute connected

network 172.16.0.0 0.0.0.255 area 0

network 192.168.116.0 0.0.0.255 area 0

!

!--- Except the private network traffic from the NAT process.

ip nat inside source route-map nonat interface Dialer1 overload

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

ip route 0.0.0.0 0.0.0.0 Dialer1

no ip http server

no ip http secure-server

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- Cisco IOS Firewall opens inbound access as needed.

access-list 100 permit udp any host 14.24.116.1 eq 500

access-list 100 premit esp any host 14.24.116.1

access-list 100 permit gre any host 14.24.116.1

access-list 100 deny ip any any

!--- Except the private network traffic from the NAT process.

access-list 110 deny   ip 192.168.116.0 0.0.0.255 192.168.117.0 0.0.0.255

access-list 110 deny   ip 192.168.116.0 0.0.0.255 192.168.118.0 0.0.0.255

access-list 110 deny   ip 192.168.116.0 0.0.0.255 192.168.120.0 0.0.0.255

access-list 110 permit ip 192.168.116.0 0.0.0.255 any

dialer-list 1 protocol ip permit

!

!--- Except the private network traffic from the NAT process.

route-map nonat permit 10

match ip address 110

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

no scheduler allocate

end

1720-b#

Satellite 3 - 1720-A

W2N-6.16-1720-A#write terminal

Building configuration...

Current configuration : 2303 bytes

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname W2N-6.16-1720-A

!

logging queue-limit 100

!

memory-size iomem 25

ip subnet-zero

!

!

no ip domain lookup

!

ip cef

!--- This is the Cisco IOS Firewall configuration and what to inspect. !--- This is applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out tftp

ip inspect name in2out udp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out realaudio

ip inspect name in2out vdolive

ip inspect name in2out netshow

ip audit notify log

ip audit po max-events 100

!

!

!

!

!--- Create an ISAKMP policy for !--- Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPsec profile to be applied dynamically !--- to the GRE over IPsec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!

!

!

!--- This is the inbound interface.

interface Loopback1

ip address 192.168.120.1 255.255.255.0

ip nat inside

!

!--- Create a GRE tunnel template to be applied to !--- all the dynamically created GRE tunnels.

interface Tunnel1

description HOST DYNAMIC TUNNEL

bandwidth 1000

ip address 172.16.0.4 255.255.255.0

no ip redirects

ip mtu 1416

ip nhrp authentication dmvpn

ip nhrp map multicast dynamic

ip nhrp map 172.16.0.1 14.24.117.1

ip nhrp map multicast 14.24.117.1

ip nhrp network-id 99

ip nhrp holdtime 300

ip nhrp nhs 172.16.0.1

ip ospf network broadcast

no ip mroute-cache

delay 1000

tunnel source FastEthernet0

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

interface Ethernet0

no ip address

no ip mroute-cache

half-duplex

!

!--- This is the outbound interface.

interface FastEthernet0

ip address 14.24.120.1 255.255.0.0

ip nat outside

ip inspect in2out out

ip access-group 100 in

no ip mroute-cache

speed auto

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router ospf 1

log-adjacency-changes

redistribute connected

network 172.16.0.0 0.0.0.255 area 0

network 192.168.120.0 0.0.0.255 area 0

!

!--- Except the private network traffic from the NAT process.

ip nat inside source route-map nonat interface FastEthernet0 overload

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

ip route 2.0.0.0 255.0.0.0 14.24.121.1

no ip http server

no ip http secure-server

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- Cisco IOS Firewall opens inbound access as needed.

access-list 100 permit udp any host 14.24.116.1 eq 500

access-list 100 premit esp any host 14.24.116.1

access-list 100 permit gre any host 14.24.116.1

access-list 100 deny ip any any

access-list 110 permit ip 192.168.120.0 0.0.0.255 any

!--- Except the private network traffic from the NAT process.

access-list 110 deny   ip 192.168.120.0 0.0.0.255 192.168.116.0 0.0.0.255

access-list 110 deny   ip 192.168.120.0 0.0.0.255 192.168.117.0 0.0.0.255

access-list 110 deny   ip 192.168.120.0 0.0.0.255 192.168.118.0 0.0.0.255

access-list 110 permit ip 192.168.120.0 0.0.0.255 any

!

!--- Except the private network traffic from the NAT process.

route-map nonat permit 10

match ip address 110

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

end

W2N-6.16-1720-A#

Vérifier

Référez-vous à cette section pour vous assurer du bon fonctionnement de votre configuration.

L'Outil Interpréteur de sortie (clients enregistrés uniquement) (OIT) prend en charge certaines commandes show. Utilisez l'OIT pour afficher une analyse de la sortie de la commande show .

- show crypto isakmp sa : affiche l'état de l'association de sécurité ISAKMP.

- show crypto engine connections active : affiche le total des chiffrements/déchiffrements par SA.

- show crypto ipsec sa : affiche les statistiques sur les tunnels actifs.

- show ip route : affiche la table de routage.

- show ip ospf neighbor : affiche les informations de voisinage OSPF par interface.

- show ip nhrp : affiche le cache NHRP (IP Next Hop Resolution Protocol), éventuellement limité aux entrées de cache dynamiques ou statiques pour une interface spécifique.

Dépannage

Cette section fournit des informations que vous pouvez utiliser pour dépanner votre configuration.

Dépannage des commandes

Remarque : Consultez les renseignements importants sur les commandes de débogage avant d’entrer des commandes de débogage.

- debug crypto ipsec — Affiche des événements IPsec.

- debug crypto isakmp—Affichage de messages d'événements IKE.

- debug crypto engine — Affiche des informations du moteur de chiffrement.

Vous trouverez les informations supplémentaires pour dépanner IPSec à la section Dépannage de sécurité IP - Présentation et utilisation des commandes de débogage.

Informations connexes

- Dépannage des configurations de Cisco IOS Firewall

- Présentation de DMVPN et de Cisco IOS

- Négociation IPSec/Protocoles IKE

- Assistance et documentation techniques - Cisco Systems