Contenu

Introduction

Conditions préalables

Conditions requises

Components Used

Conventions

Configuration

Diagramme du réseau

Configurations

Vérification

Dépannage

Dépannage des commandes

Informations connexes

Introduction

Ce document fournit un exemple de configuration pour le VPN DMVPN (Hub and Spoke Dynamic Multipoint VPN) utilisant l'encapsulation de routage générique (GRE) sur IPSec avec le protocole EIGRP (Enhanced Interior Gateway Routing Protocol), la traduction d'adresses réseau (NAT) et le contrôle d'accès basé sur le contexte (CBAC).

Conditions préalables

Conditions requises

Avant d'établir un tunnel GRE (mGRE) multipoint et IPSec, vous devez définir une stratégie IKE (Internet Key Exchange) à l'aide de la commande crypto isakmp policy.

Remarque : Pour en savoir plus sur les commandes utilisées dans le présent document, utilisez l’outil de recherche de commandes (clients inscrits seulement).

Components Used

Les informations contenues dans ce document sont basées sur les versions de matériel et de logiciel suivantes :

- Logiciel Cisco IOS® Version 12.2(15)T1 sur le routeur concentrateur et 12.3(1.6) sur les routeurs en étoile

- Cisco 3620 comme routeur concentrateur, deux routeurs Cisco 1720 et un routeur Cisco 3620 comme routeur en étoile

Les informations présentées dans ce document ont été créées à partir de périphériques dans un environnement de laboratoire spécifique. All of the devices used in this document started with a cleared (default) configuration. Si vous travaillez dans un réseau opérationnel, assurez-vous de bien comprendre l'impact potentiel de toute commande avant de l'utiliser.

Conventions

Pour plus d'informations sur les conventions des documents, référez-vous aux Conventions utilisées pour les conseils techniques de Cisco.

Configuration

Cette section vous fournit des informations pour configurer les fonctionnalités décrites dans ce document.

Remarque : Pour en savoir plus sur les commandes utilisées dans le présent document, utilisez l’outil de recherche de commandes (clients inscrits seulement).

Diagramme du réseau

Ce document utilise la configuration réseau indiquée dans le diagramme suivant :

Configurations

Ce document utilise les configurations présentées ci-dessous.

- Concentrateur - 3620-B

- Spoke 1 - 3620-A

- Spoke 2 - 1720-b

- Spoke 3 - 1720-A

Concentrateur - 3620-B

3620-B#write terminal

Building configuration...

Current configuration : 2607 bytes

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname 3620-B

!

logging queue-limit 100

!

memory-size iomem 10

ip subnet-zero

!

!

ip cef

no ip domain lookup

!

!--- This is the CBAC configuration and what to inspect. !--- This will be applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out ftp

ip inspect name in2out tftp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out http

ip inspect name in2out udp

ip audit po max-events 100

!

!

!

!--- Create an Internet Security Association and Key Management !--- Protocol (ISAKMP) policy for Phase 1 negotiations.

!

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

!--- Here "dmvpn" is the word that is used as the key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

crypto isakmp nat keepalive 20

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPSec profile to be applied dynamically !--- to the GRE over IPSec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

no voice hpi capture buffer

no voice hpi capture destination

!

!

mta receive maximum-recipients 0

!

!

!--- This is the inside interface.

interface Loopback1

ip address 192.168.117.1 255.255.255.0

ip nat inside

!

!--- This is the mGRE interface for dynamic GRE tunnels.

interface Tunnel1

description MULTI-POINT GRE TUNNEL for BRANCHES

bandwidth 1000

ip address 172.16.0.1 255.255.255.0

no ip redirects

ip mtu 1400

ip nhrp authentication dmvpn

ip nhrp map multicast dynamic

ip nhrp network-id 99

ip nhrp holdtime 300

no ip split-horizon eigrp 1

no ip mroute-cache

delay 1000

tunnel source FastEthernet0/0

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

!--- This is the outside interface.

interface FastEthernet0/0

ip address 14.24.117.1 255.255.0.0

ip nat outside

ip access-group 100 in

ip inspect in2out out

no ip mroute-cache

duplex auto

speed auto

!

interface Serial0/0

no ip address

shutdown

clockrate 2000000

no fair-queue

!

interface FastEthernet0/1

no ip address

no ip mroute-cache

duplex auto

speed auto

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks over the tunnels.

router eigrp 1

network 172.16.0.0 0.0.0.255

network 192.168.117.0

no auto-summary

!

!--- Perform NAT on local traffic !--- going directly out FastEthernet0/0.

ip nat inside source list 110 interface FastEthernet0/0 overload

ip http server

no ip http secure-server

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

ip route 2.0.0.0 255.0.0.0 14.24.121.1

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- CBAC will open other inbound access as needed.

access-list 100 permit udp any host 14.24.117.1 eq 500

access-list 100 permit esp any host 14.24.117.1

access-list 100 permit gre any host 14.24.117.1

access-list 100 deny ip any any

access-list 110 permit ip 192.168.117.0 0.0.0.255 any

!

!

call rsvp-sync

!

!

mgcp profile default

!

dial-peer cor custom

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

!

end

3620-B#

Spoke 1 - 3620-A

3620-A#write terminal

Building configuration...

Current configuration : 2559 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 3620-A

!

boot system flash slot0:c3620-ik9o3s7-mz.122-15.T1.bin

logging queue-limit 100

!

memory-size iomem 15

ip subnet-zero

!

!

ip cef

no ip domain lookup

!

!--- This is the CBAC configuration and what to inspect. !--- This will be applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out tftp

ip inspect name in2out udp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out realaudio

ip inspect name in2out vdolive

ip inspect name in2out netshow

ip audit po max-events 100

!

!

!

!--- Create an ISAKMP policy for !--- Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPSec profile to be applied dynamically !--- to the GRE over IPSec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

no voice hpi capture buffer

no voice hpi capture destination

!

!

mta receive maximum-recipients 0

!

!

!--- This is the inside interface.

interface Loopback1

ip address 192.168.118.1 255.255.255.0

ip nat inside

!

!--- This is the mGRE interface for dynamic GRE tunnels.

interface Tunnel1

description HOST DYNAMIC TUNNEL

bandwidth 1000

ip address 172.16.0.2 255.255.255.0

no ip redirects

ip mtu 1400

ip nhrp authentication dmvpn

ip nhrp map 172.16.0.1 14.24.117.1

ip nhrp map multicast 14.24.117.1

ip nhrp network-id 99

ip nhrp holdtime 300

ip nhrp nhs 172.16.0.1

no ip mroute-cache

delay 1000

tunnel source Ethernet0/0

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

!--- This is the outside interface.

interface Ethernet0/0

ip address 14.24.118.1 255.255.0.0

ip nat outside

ip inspect in2out out

ip access-group 100 in

no ip mroute-cache

half-duplex

!

interface Ethernet0/1

no ip address

half-duplex

!

interface Ethernet0/2

no ip address

shutdown

half-duplex

!

interface Ethernet0/3

no ip address

shutdown

half-duplex

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks over the tunnel.

router eigrp 1

network 172.16.0.0 0.0.0.255

network 192.168.118.0

no auto-summary

!

!--- Perform NAT on local traffic !--- going directly out Ethernet0/0.

ip nat inside source list 110 interface Ethernet0/0 overload

ip http server

no ip http secure-server

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- CBAC will open inbound access as needed.

access-list 100 permit udp any host 14.24.118.1 eq 500

access-list 100 permit esp any host 14.24.118.1

access-list 100 permit gre any host 14.24.118.1

access-list 100 deny ip any any

access-list 110 permit ip 192.168.118.0 0.0.0.255 any

!

!

call rsvp-sync

!

!

mgcp profile default

!

dial-peer cor custom

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

!

end

3620-A#

Spoke 2 - 1720-b

1720-b#write terminal

Building configuration...

Current configuration : 2543 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 1720-b

!

boot system flash flash:c1700-ny-mz.122-8.YJ

logging queue-limit 100

enable password cisco

!

username 7206-B password 0 cisco

ip subnet-zero

!

!

no ip domain lookup

!

ip cef

!--- This is the CBAC configuration and what to inspect. !--- This will be applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out tftp

ip inspect name in2out udp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out realaudio

ip inspect name in2out vdolive

ip inspect name in2out netshow

ip audit po max-events 100

!

!

vpdn-group 1

request-dialin

protocol pppoe

!

!

!--- Create an ISAKMP policy for !--- Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPSec profile to be applied dynamically !--- to the GRE over IPSec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!--- This is the inside interface.

interface Loopback1

ip address 192.168.116.1 255.255.255.0

ip nat inside

!

!--- This is the mGRE interface for dynamic GRE tunnels.

interface Tunnel1

description HOST DYNAMIC TUNNEL

bandwidth 1000

ip address 172.16.0.3 255.255.255.0

no ip redirects

ip mtu 1400

ip nhrp authentication dmvpn

ip nhrp map 172.16.0.1 14.24.117.1

ip nhrp map multicast 14.24.117.1

ip nhrp network-id 99

ip nhrp holdtime 300

ip nhrp nhs 172.16.0.1

no ip mroute-cache

delay 1000

tunnel source Dialer1

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

interface Ethernet0

no ip address

half-duplex

!

interface FastEthernet0

no ip address

no ip mroute-cache

speed auto

pppoe enable

pppoe-client dial-pool-number 1

!

!--- This is the outside interface.

interface Dialer1

ip address 2.2.2.10 255.255.255.0

ip inspect in2out out

ip access-group 100 in

encapsulation ppp

dialer pool 1

dialer-group 1

ppp authentication pap chap callin

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router eigrp 1

network 172.16.0.0 0.0.0.255

network 192.168.116.0

no auto-summary

!

!--- Perform NAT on local traffic !--- going directly out Dialer1.

ip nat inside source list 110 interface Dialer1 overload

ip classless

ip route 0.0.0.0 0.0.0.0 Dialer1

no ip http server

no ip http secure-server

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- CBAC will open inbound access as needed.

access-list 100 permit udp any host 14.24.116.1 eq 500

access-list 100 permit esp any host 14.24.116.1

access-list 100 permit gre any host 14.24.116.1

access-list 100 deny ip any any

access-list 110 permit ip 192.168.116.0 0.0.0.255 any

dialer-list 1 protocol ip permit

!

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

no scheduler allocate

end

1720-b#

Spoke 3 - 1720-A

1720-A#write terminal

Building configuration...

Current configuration : 1770 bytes

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname 1720-A

!

logging queue-limit 100

!

memory-size iomem 25

ip subnet-zero

!

!

!

ip cef

!--- This is the CBAC configuration and what to inspect. !--- This will be applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out tftp

ip inspect name in2out udp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out realaudio

ip inspect name in2out vdolive

ip inspect name in2out netshow

ip audit po max-events 100

!

!

!--- Create an ISAKMP policy for !--- Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPSec profile to be applied dynamically !--- to the GRE over IPSec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!--- This is the inside interface.

interface Loopback1

ip address 192.168.120.1 255.255.255.0

ip nat inside

!

!--- This is the mGRE interface for dynamic GRE tunnels.

interface Tunnel1

description HOST DYNAMIC TUNNEL

bandwidth 1000

ip address 172.16.0.4 255.255.255.0

no ip redirects

ip mtu 1400

ip nhrp authentication dmvpn

ip nhrp map 172.16.0.1 14.24.117.1

ip nhrp map multicast 14.24.117.1

ip nhrp network-id 99

ip nhrp holdtime 300

ip nhrp nhs 172.16.0.1

no ip mroute-cache

delay 1000

tunnel source FastEthernet0

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

interface Ethernet0

no ip address

no ip mroute-cache

half-duplex

!

!--- This is the outside interface.

interface FastEthernet0

ip address 14.24.120.1 255.255.0.0

ip nat outside

ip inspect in2out out

ip access-group 100 in

no ip mroute-cache

speed auto

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router eigrp 1

network 172.16.0.0 0.0.0.255

network 192.168.120.0

no auto-summary

!

!--- Perform NAT on local traffic !--- going directly out FastEthernet0.

ip nat inside source list 110 interface FastEthernet0 overload

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

no ip http server

no ip http secure-server

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- CBAC will open inbound access as needed.

access-list 100 permit udp any host 14.24.116.1 eq 500

access-list 100 permit esp any host 14.24.116.1

access-list 100 permit gre any host 14.24.116.1

access-list 100 deny ip any any

access-list 110 permit ip 192.168.120.0 0.0.0.255 any

!

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

no scheduler allocate

end

1720-A#

Vérification

Cette section présente des informations que vous pouvez utiliser pour vous assurer que votre configuration fonctionne correctement.

Certaines commandes show sont prises en charge par l'Output Interpreter Tool (clients enregistrés uniquement), qui vous permet de voir une analyse de la sortie de la commande show.

- show crypto isakmp sa : affiche l'état de l'association de sécurité ISAKMP (SA).

- show crypto engine connections active : affiche le nombre total de chiffrement/déchiffrement par SA.

- show crypto ipsec sa : affiche les statistiques sur les tunnels actifs.

- show ip route : affiche la table de routage.

- show ip eigrp neighbor : affiche les voisins EIGRP.

- show ip nhrp - Affiche le cache NHRP (Next Hop Resolution Protocol) IP, éventuellement limité aux entrées de cache dynamique ou statique pour une interface spécifique.

- show crypto socket : affiche la table de socket de chiffrement entre NHRP et IPSec.

Dépannage

Cette section fournit des informations que vous pouvez utiliser pour dépanner votre configuration.

Dépannage des commandes

Note : Avant d'émettre des commandes debug, consultez Informations importantes sur les commandes de débogage.

- debug crypto ipsec — Affiche des événements IPsec.

- debug crypto isakmp—Affichage de messages d'événements IKE.

- debug crypto engine — Affiche des informations du moteur de chiffrement.

- debug crypto socket - Affiche des informations sur la table de socket entre NHRP et IPSec.

- debug nhrp - Affiche des informations sur les événements NHRP.

- debug nhrp packet : affiche des informations sur les paquets NHRP.

- debug tunnel protection : affiche des informations sur les tunnels GRE dynamiques.

Vous trouverez les informations supplémentaires pour dépanner IPSec à la section Dépannage de sécurité IP - Présentation et utilisation des commandes de débogage.

Informations connexes

- Présentation de DMVPN et de Cisco IOS

- Page d'assistance IPsec

- Support et documentation techniques - Cisco Systems