Contenu

Introduction

Conditions préalables

Conditions requises

Components Used

Conventions

Configuration

Diagramme du réseau

Configurations

Vérification

Dépannage

Dépannage des commandes

Informations connexes

Introduction

Cet exemple de configuration effectue le chiffrement du trafic du réseau derrière Light au réseau derrière House (le réseau 192.168.100.x à 192.168.200.x). La surcharge de traduction d'adresses de réseau (NAT) est également effectuée. Les connexions de client VPN chiffrées sont permises dans Light avec des caractères de remplacement, des clés pré-partagées et la configuration de mode. Le trafic à Internet est traduit, mais non chiffré.

Conditions préalables

Conditions requises

Aucune spécification déterminée n'est requise pour ce document.

Components Used

Les informations contenues dans ce document sont basées sur les versions de matériel et de logiciel suivantes :

- Logiciel Cisco IOS® versions 12.2.7 et 12.2.8T

- Cisco Secure VPN Client 1.1 (voir 2.1.12 dans le menu Aide du client IRE > À propos)

- Routeurs Cisco 3600

Remarque : si vous utilisez les routeurs de la gamme Cisco 2600 pour ce type de scénario VPN, les routeurs doivent être installés avec des images IOS VPN IPsec cryptées.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Pour plus d'informations sur les conventions utilisées dans ce document, reportez-vous à Conventions relatives aux conseils techniques Cisco.

Configuration

Cette section vous fournit des informations pour configurer les fonctionnalités décrites dans ce document.

Remarque : Utilisez l’outil de recherche de commandes (clients inscrits seulement) pour en savoir plus sur les commandes figurant dans le présent document.

Diagramme du réseau

Ce document utilise la configuration réseau suivante :

Configurations

Ce document utilise les configurations suivantes.

- Configuration de la lumière

- Configuration de la maison

- Configuration du client VPN

Configuration de la lumière

Current configuration : 2047 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Light

!

boot system flash:c3660-ik9o3s-mz.122-8T

!

ip subnet-zero

!

ip audit notify log

ip audit po max-events 100

ip ssh time-out 120

ip ssh authentication-retries 3

!

!--- IPsec Internet Security Association and !--- Key Management Protocol (ISAKMP) policy.

crypto isakmp policy 5

hash md5

authentication pre-share

!--- ISAKMP key for static LAN-to-LAN tunnel !--- without extended authenticaton (xauth).

crypto isakmp key cisco123 address 10.64.10.45 no-xauth

!--- ISAKMP key for the dynamic VPN Client.

crypto isakmp key 123cisco address 0.0.0.0 0.0.0.0

!--- Assign the IP address to the VPN Client.

crypto isakmp client configuration address-pool local test-pool

!

!

!

crypto ipsec transform-set testset esp-des esp-md5-hmac

!

crypto dynamic-map test-dynamic 10

set transform-set testset

!

!

!--- VPN Client mode configuration negotiation, !--- such as IP address assignment and xauth.

crypto map test client configuration address initiate

crypto map test client configuration address respond

!--- Static crypto map for the LAN-to-LAN tunnel.

crypto map test 5 ipsec-isakmp

set peer 10.64.10.45

set transform-set testset

!--- Include the private network-to-private network traffic !--- in the encryption process.

match address 115

!--- Dynamic crypto map for the VPN Client.

crypto map test 10 ipsec-isakmp dynamic test-dynamic

!

call rsvp-sync

!

!

!

!

!

fax interface-type modem

mta receive maximum-recipients 0

!

controller E1 2/0

!

!

!

interface FastEthernet0/0

ip address 10.64.10.44 255.255.255.224

ip nat outside

duplex auto

speed auto

crypto map test

!

interface FastEthernet0/1

ip address 192.168.100.1 255.255.255.0

ip nat inside

duplex auto

speed auto

!

interface BRI4/0

no ip address

shutdown

!

interface BRI4/1

no ip address

shutdown

!

interface BRI4/2

no ip address

shutdown

!

interface BRI4/3

no ip address

shutdown

!

!--- Define the IP address pool for the VPN Client.

ip local pool test-pool 192.168.1.1 192.168.1.254

!--- Exclude the private network and VPN Client !--- traffic from the NAT process.

ip nat inside source route-map nonat interface FastEthernet0/0 overload

ip classless

ip route 0.0.0.0 0.0.0.0 10.64.10.33

ip http server

ip pim bidir-enable

!

!--- Exclude the private network and VPN Client !--- traffic from the NAT process.

access-list 110 deny   ip 192.168.100.0 0.0.0.255 192.168.200.0 0.0.0.255

access-list 110 deny   ip 192.168.100.0 0.0.0.255 192.168.1.0 0.0.0.255

access-list 110 permit ip 192.168.100.0 0.0.0.255 any

!--- Include the private network-to-private network traffic !--- in the encryption process.

access-list 115 permit ip 192.168.100.0 0.0.0.255 192.168.200.0 0.0.0.255

!

!--- Exclude the private network and VPN Client !--- traffic from the NAT process.

route-map nonat permit 10

match ip address 110

!

!

dial-peer cor custom

!

!

!

!

!

line con 0

line 97 108

line aux 0

line vty 0 4

!

end

Configuration de la maison

Current configuration : 1689 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname house

!

boot system flash:c3660-jk8o3s-mz.122-7.bin

!

ip subnet-zero

!

!

no ip domain-lookup

!

ip audit notify log

ip audit po max-events 100

ip ssh time-out 120

ip ssh authentication-retries 3

!

!--- IPsec ISAKMP policy.

crypto isakmp policy 5

hash md5

authentication pre-share

!--- ISAKMP key for static LAN-to-LAN tunnel without xauth authenticaton.

crypto isakmp key cisco123 address 10.64.10.44 no-xauth

!

!

crypto ipsec transform-set testset esp-des esp-md5-hmac

!

!--- Static crypto map for the LAN-to-LAN tunnel.

crypto map test 5 ipsec-isakmp

set peer 10.64.10.44

set transform-set testset

!--- Include the private network-to-private network traffic !--- in the encryption process.

match address 115

!

call rsvp-sync

cns event-service server

!

!

!

!

!

fax interface-type modem

mta receive maximum-recipients 0

!

!

!

interface FastEthernet0/0

ip address 10.64.10.45 255.255.255.224

ip nat outside

duplex auto

speed auto

crypto map test

!

interface FastEthernet0/1

ip address 192.168.200.1 255.255.255.0

ip nat inside

duplex auto

speed auto

!

interface BRI2/0

no ip address

shutdown

!

interface BRI2/1

no ip address

shutdown

!

interface BRI2/2

no ip address

shutdown

!

interface BRI2/3

no ip address

shutdown

!

interface FastEthernet4/0

no ip address

shutdown

duplex auto

speed auto

!

!--- Exclude the private network traffic !--- from the dynamic (dynamic association to a pool) NAT process.

ip nat inside source route-map nonat interface FastEthernet0/0 overload

ip classless

ip route 0.0.0.0 0.0.0.0 10.64.10.33

no ip http server

ip pim bidir-enable

!

!--- Exclude the private network traffic from the NAT process.

access-list 110 deny   ip 192.168.200.0 0.0.0.255 192.168.100.0 0.0.0.255

access-list 110 permit ip 192.168.200.0 0.0.0.255 any

!--- Include the private network-to-private network traffic !--- in the encryption process.

access-list 115 permit ip 192.168.200.0 0.0.0.255 192.168.100.0 0.0.0.255

!--- Exclude the private network traffic from the NAT process.

route-map nonat permit 10

match ip address 110

!

!

!

dial-peer cor custom

!

!

!

!

!

line con 0

line aux 0

line vty 0 4

login

!

end

Configuration du client VPN

Network Security policy:

1- TOLIGHT

My Identity

Connection security: Secure

Remote Party Identity and addressing

ID Type: IP subnet

192.168.100.0

255.255.255.0

Port all Protocol all

Connect using secure tunnel

ID Type: IP address

10.64.10.44

Pre-shared Key=123cisco

Authentication (Phase 1)

Proposal 1

Authentication method: pre-shared key

Encryp Alg: DES

Hash Alg: MD5

SA life: Unspecified

Key Group: DH 1

Key exchange (Phase 2)

Proposal 1

Encapsulation ESP

Encrypt Alg: DES

Hash Alg: MD5

Encap: tunnel

SA life: Unspecified

no AH

2- Other Connections

Connection security: Non-secure

Local Network Interface

Name: Any

IP Addr: Any

Port: All

Vérification

Référez-vous à cette section pour vous assurer du bon fonctionnement de votre configuration.

L'Outil Interpréteur de sortie (clients enregistrés uniquement) (OIT) prend en charge certaines commandes show. Utilisez l'OIT pour afficher une analyse de la sortie de la commande show .

- show crypto ipsec sa - Affiche les associations de sécurité (SA) de phase 2.

- show crypto isakmp sa - Affiche les SA de phase 1.

Dépannage

Utilisez cette section pour dépanner votre configuration.

Dépannage des commandes

L'Outil Interpréteur de sortie (clients enregistrés uniquement) (OIT) prend en charge certaines commandes show. Utilisez l'OIT pour afficher une analyse de la sortie de la commande show .

Remarque : Consulter les renseignements importants sur les commandes de débogage avant d’utiliser les commandes de débogage.

- debug crypto ipsec : Cette commande affiche les négociations IPSec de la phase 2.

- debug crypto isakmp - Affiche les négociations ISAKMP de la phase 1.

- debug crypto engine - Montre le trafic crypté.

- clear crypto isakmp : efface les SA liées à la phase 1.

- clear crypto sa : efface les SA liées à la phase 2.

Informations connexes

- Configuration de la sécurité des réseaux IPSec

- Configuration du protocole IKE (Internet Key Exchange)

- Page de support pour Protocole IKE/Négociation Ipsec

- Pages d'assistance Cisco Secure VPN Client

- Support technique - Cisco Systems