Contenu

Introduction

Conditions préalables

Conditions requises

Composants

Conventions

Fond

Détails des variables MIB, y compris les identifiants d’objet (OID)

Ajouter un réseau VLAN à un commutateur Cisco Catalyst avec SNMP

Step-by-Step Instructions

Ajouter un réseau VLAN à un commutateur Cisco Catalyst avec SNMP

Instructions en une étape

Supprimer un réseau VLAN d’un commutateur Cisco Catalyst avec SNMP

Step-by-Step Instructions

Ajouter un port à un réseau VLAN sur un commutateur Cisco Catalyst avec SNMP

Comment changer un port d’un réseau VLAN à un autre

Informations connexes

Introduction

Ce document explique comment créer et supprimer des VLAN sur un commutateur Cisco Catalyst qui utilise le protocole SNMP. Il décrit également comment ajouter des ports à un VLAN avec le protocole SNMP.

Conditions préalables

Conditions requises

Avant d’utiliser le contenu de ce document, assurez-vous de maîtriser ce qui suit :

- Le fonctionnement de l’ifTable et de l’ifIndex

- Le fonctionnement des réseaux VLAN sur les commutateurs Cisco Catalyst

- L’affichage des renseignements du réseau VLAN sur les commutateurs Cisco Catalyst

- L’utilisation générale des commandes SNMP get, set et walk

Composants

Ce document traite des commutateurs Catalyst qui exécutent des systèmes d’exploitation Catalyst OS ou Catalyst IOS compatibles avec IF-MIB, CISCO-VTP-MIB et CISCO-VLAN-MEMBERSHIP-MIB. Les informations contenues dans ce document sont basées sur les versions de matériel et de logiciel suivantes :

- Catalyst 3524XL exécutant CatIOS 12.0(5)WC5a

- NET-SNMP version 5.0.6 disponible au http://www.net-snmp.org/

Les informations présentées dans ce document ont été créées à partir de périphériques dans un environnement de laboratoire spécifique. All of the devices used in this document started with a cleared (default) configuration. Si vous travaillez sur un réseau qui fonctionne en permanence, assurez-vous de bien comprendre l’incidence possible d’une commande avant de l’utiliser.

Conventions

Pour plus d'informations sur les conventions des documents, référez-vous aux Conventions utilisées pour les conseils techniques de Cisco.

Fond

Détails des variables MIB, y compris les identifiants d’objet (OID)

1.3.6.1.4.1.9.9.46.1.3.1.1.2 (CISCO-VTP-MIB)

vtpVlanState  OBJECT-TYPE

SYNTAX     INTEGER { operational(1),

suspended(2),

mtuTooBigForDevice(3),

mtuTooBigForTrunk(4) }

MAX-ACCESS read-only

STATUS     current

DESCRIPTION            "The state of this VLAN.

The state 'mtuTooBigForDevice' indicates that this device

cannot participate in this VLAN because the VLAN's MTU is

larger than the device can support.

The state 'mtuTooBigForTrunk' indicates that while this

VLAN's MTU is supported by this device, it is too large for

one or more of the device's trunk ports."

::= { vtpVlanEntry 2 }

1.3.6.1.4.1.9.9.46.1.4.1.1.1 (CISCO-VTP-MIB)

vtpVlanEditOperation OBJECT-TYPE

SYNTAX     INTEGER { none(1),

copy(2),

apply(3),

release(4),

restartTimer(5)

}

MAX-ACCESS read-create

STATUS     current

DESCRIPTION            "This object always has the value 'none' when read.  When

written, each value causes the appropriate action:

'copy' - causes the creation of rows in the

vtpVlanEditTable exactly corresponding to the current global

VLAN information for this management domain.  If the Edit

Buffer (for this management domain) is not currently empty,

a copy operation fails.  A successful copy operation starts

the deadman-timer.

'apply' - first performs a consistent check on the the

modified information contained in the Edit Buffer, and if

consistent, then tries to instanciate the modified

information as the new global VLAN information.  Note that

an empty Edit Buffer (for the management domain) would

always result in an inconsistency since the default VLANs

are required to be present.

'release' - flushes the Edit Buffer (for this management

domain), clears the Owner information, and aborts the

deadman-timer.  A release is generated automatically if the

deadman-timer ever expires.

'restartTimer' - restarts the deadman-timer.

'none' - no operation is performed."

::= { vtpEditControlEntry 1 }

1.3.6.1.4.1.9.9.46.1.4.1.1.3 (CISCO-VTP-MIB)

vtpVlanEditBufferOwner OBJECT-TYPE

SYNTAX     OwnerString

MAX-ACCESS read-create

STATUS     current

DESCRIPTION            "The management station which is currently using the Edit

Buffer for this management domain.  When the Edit Buffer for

a management domain is not currently in use, the value of

this object is the zero-length string.  Note that it is also

the zero-length string if a manager fails to set this object

when invoking a copy operation."

::= { vtpEditControlEntry 3 }

1.3.6.1.4.1.9.9.46.1.4.2.1.11 (CISCO-VTP-MIB)

vtpVlanEditRowStatus OBJECT-TYPE

SYNTAX     RowStatus

1:active

2:notInService

3:notReady

4:createAndGo

5:createAndWait

6:destroy

MAX-ACCESS read-create

STATUS     current

DESCRIPTION            "The status of this row.  Any and all columnar objects in an

existing row can be modified irrespective of the status of

the row.

A row is not qualified for activation until instances of at

least its vtpVlanEditType, vtpVlanEditName and

vtpVlanEditDot10Said columns have appropriate values.

The management station should endeavor to make all rows

consistent in the table before 'apply'ing the buffer.  An

inconsistent entry in the table will cause the entire

buffer to be rejected with the vtpVlanApplyStatus object

set to the appropriate error value."

::= { vtpVlanEditEntry 11 }

1.3.6.1.4.1.9.9.46.1.4.2.1.3.1.48 (CISCO-VTP-MIB)

vtpVlanEditType OBJECT-TYPE

SYNTAX     VlanType

MAX-ACCESS read-create

STATUS     current

DESCRIPTION            "The type which this VLAN would have.

An implementation may restrict access to this object."

DEFVAL     { ethernet }

::= { vtpVlanEditEntry 3 }

1.3.6.1.4.1.9.9.46.1.4.2.1.4.1.48 (CISCO-VTP-MIB)

vtpVlanEditName OBJECT-TYPE

SYNTAX     DisplayString (SIZE (1..32))

MAX-ACCESS read-create

STATUS     current

DESCRIPTION            "The name which this VLAN would have.  This name would be

used as the ELAN-name for an ATM LAN-Emulation segment of

this VLAN.

An implementation may restrict access to this object."

::= { vtpVlanEditEntry 4 }

1.3.6.1.4.1.9.9.46.1.4.2.1.6.1.48 (CISCO-VTP-MIB)

vtpVlanEditDot10Said OBJECT-TYPE

SYNTAX     OCTET STRING (SIZE (4))

MAX-ACCESS read-create

STATUS     current

DESCRIPTION            "The value of the 802.10 SAID field which would be used for

this VLAN.

An implementation may restrict access to this object."

::= { vtpVlanEditEntry 6 }

1.3.6.1.4.1.9.9.46.1.4.1.1.2.1 (CISCO-VTP-MIB)

vtpVlanApplyStatus OBJECT-TYPE

SYNTAX     INTEGER { inProgress(1),

succeeded(2),

configNumberError(3),

inconsistentEdit(4),

tooBig(5),

localNVStoreFail(6),

remoteNVStoreFail(7),

editBufferEmpty(8),

someOtherError(9)

}

MAX-ACCESS read-only

STATUS     current

DESCRIPTION            "The current status of an 'apply' operation to instanciate

the Edit Buffer as the new global VLAN information (for this

management domain).  If no apply is currently active, the

status represented is that of the most recently completed

apply.  The possible values are:

inProgress - 'apply' operation in progress;

succeeded - the 'apply' was successful (this value is

also used when no apply has been invoked since the

last time the local system restarted);

configNumberError - the apply failed because the value of

vtpVlanEditConfigRevNumber was less or equal to

the value of current value of

managementDomainConfigRevNumber;

inconsistentEdit - the apply failed because the modified

information was not self-consistent;

tooBig - the apply failed because the modified

information was too large to fit in this VTP

Server's non-volatile storage location;

localNVStoreFail - the apply failed in trying to store

the new information in a local non-volatile

storage location;

remoteNVStoreFail - the apply failed in trying to store

the new information in a remote non-volatile

storage location;

editBufferEmpty - the apply failed because the Edit

Buffer was empty (for this management domain).

someOtherError - the apply failed for some other reason

(e.g., insufficient memory)."

::= { vtpEditControlEntry 2 }

1.3.6.1.4.1.9.9.68.1.2.2.1.2 (CISCO-VLAN-MEMBERSHIP-MIB)

vmVlan  OBJECT-TYPE

SYNTAX     INTEGER(0..4095)

MAX-ACCESS read-write

STATUS     current

DESCRIPTION                "The VLAN id of the VLAN the port is assigned to

when vmVlanType is set to static or dynamic.

This object is not instantiated if not applicable.

The value may be 0 if the port is not assigned

to a VLAN.

If vmVlanType is static, the port is always

assigned to a VLAN and the object may not be

set to 0.

If vmVlanType is dynamic the object's value is

0 if the port is currently not assigned to a VLAN.

In addition, the object may be set to 0 only."

::= { vmMembershipEntry 2 }

Ajouter un réseau VLAN à un commutateur Cisco Catalyst avec SNMP

Step-by-Step Instructions

Dans l’exemple ci-dessous, le réseau VLAN 11 est ajouté au commutateur :

1. Pour vérifier quels réseaux VLAN sont actuellement configurés sur le commutateur, émettez un snmpwalk sur l’OID de vtpVlanState :

Remarque : Le dernier numéro de l’OID est le numéro du réseau VLAN.

snmpwalk -c public crumpy vtpVlanState

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.48 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1002 : INTEGER: operational

2. Vérifiez si l’édition est utilisée par une autre station ou un autre appareil NMS. L’édition n’est pas utilisée si vous voyez ce message : Aucun objet MIB contenu dans la sous-arborescence :

snmpwalk -c public crumpy vtpVlanEditTable

no MIB objects contained under subtree.

3. L’édition n’est pas utilisée, il est donc prudent de commencer à la modifier. Réglez l’état de copie de vtpVlanEditOperation (nombre entier 2). Vous pourrez ainsi créer le réseau VLAN.

snmpset -c private crumpy vtpVlanEditOperation.1 integer 2

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpEditControlTable.vtpEditControlEntry.vtpVlanEditOperation.1 : INTEGER: copy

4. Pour que soit visible le propriétaire actuel de l’autorisation de modification, vous pouvez définir le propriétaire lorsque vous saisissez la commande vtpVlanEditBufferOwner.

snmpset -c private crumpy vtpVlanEditBufferOwner.1 octetstring "Gerald"

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpEditControlTable.vtpEditControlEntry.vtpVlanEditBufferOwner.1 : OCTET STRING- (ascii):    Gerald

5. Cet exemple montre comment vérifier que la table existe :

snmpwalk -c public crumpy vtpVlanEditTable

vtpVlanEditState.1.1 : INTEGER: operational

vtpVlanEditState.1.2 : INTEGER: operational

vtpVlanEditState.1.3 : INTEGER: operational

..

6. Cet exemple est VLAN 11 et vous montre comment créer une ligne et définir le type et le nom :

snmpset -c private crumpy vtpVlanEditRowStatus.1.11 integer 4

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpVlanEditTable.vtpVlanEditEntry.vtpVlanEditRowStatus.1.11 : INTEGER: createAndGo

snmpset -c private crumpy vtpVlanEditType.1.11 integer 1

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpVlanEditTable.vtpVlanEditEntry.vtpVlanEditType.1.11 : INTEGER: ethernet

snmpset -c private crumpy vtpVlanEditName.1.11 octetstring "test_11_gerald"

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpVlanEditTable.vtpVlanEditEntry.vtpVlanEditName.1.11 : DISPLAY STRING- (ascii):  test_11_gerald

7. Définissez vtpVlanEditDot10Said. Il s’agit du numéro de VLAN + 100000 converti en hexadécimal. Cet exemple crée le réseau VLAN 11, donc vtpVlanEditDot10Said devrait être : 11 + 100000 = 100011 -> Hex : 000186AB

snmpset -c private crumpy vtpVlanEditDot10Said.1.11 octetstringhex 000186AB

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpVlanEditTable.vtpVlanEdi

ntry.vtpVlanEditDot10Said.1.11 : OCTET STRING-   (hex): length = 4

0:  00 01 86 ab -- -- -- -- -- -- -- -- -- -- -- --     ................

8. Une fois que vous avez créé le réseau VLAN 11, vous devez appliquer les modifications. Utilisez de nouveau l’OID vtpVlanEditOperation. Cliquez cette fois sur le bouton Apply [appliquer] pour confirmer les paramètres :

snmpset -c private crumpy vtpVlanEditOperation.1 integer 3

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpEditControlTable.vtpEditControlEntry.vtpVlanEditOperation.1 : INTEGER: apply

9. Vérifiez que le réseau VLAN a été créé avec succès. Utilisez l’OID vtpVlanApplyStatus. Vérifiez le processus jusqu’à ce que l’état indique succeeded :

snmpget –c public crumpy vtpVlanApplyStatus.1

vtpVlanApplyStatus.1 : INTEGER: inProgress

snmpget –c public crumpy vtpVlanApplyStatus.1

vtpVlanApplyStatus.1 : INTEGER: inProgress

snmpget –c public crumpy vtpVlanApplyStatus.1

vtpVlanApplyStatus.1 : INTEGER: succeeded

10. La dernière action consiste à valider les modifications et à octroyer les autorisations afin que les autres utilisateurs puissent, dans leur système NMS, ajouter, modifier ou supprimer des réseaux VLAN.

snmpset  -c private crumpy vtpVlanEditOperation.1 integer 4

vtpVlanEditOperation.1 : INTEGER: release

11. Vérifiez que la mémoire tampon est vide :

snmpwalk –c public crumpy vtpVlanEditTable

no MIB objects contained under subtree.

12. Vérifiez que le réseau VLAN 11 a été créé sur le commutateur au moyen de la commande CLI show vlan ou d’un snmpwalk :

snmpwalk -c public crumpy vtpVlanState

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.11 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.48 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1002 : INTEGER: operational

…

Ajouter un réseau VLAN à un commutateur Cisco Catalyst avec SNMP

Instructions en une étape

Le processus en une étape utilise les numéros OID au lieu des noms OID comme le processus étape par étape précédent. Consultez les détails de la MIB pour la traduction. Cet exemple illustre la création du réseau VLAN 6 :

snmpset -c private crumpy 1.3.6.1.4.1.9.9.46.1.4.1.1.1.1 integer 2 1.3.6.1.4.1.9.9.46.1.4.1.1.3.1 octetstring "gcober"

snmpset -c private gooroo 1.3.6.1.4.1.9.9.46.1.4.2.1.11.1.6 integer 4 1.3.6.1.4.1.9.9.46.1.4.2.1.3.1.6 integer 1 1.3.6.1.4.1.9.9.46.1.4.2.1.4.1.6 octetstring "vlan6" 1.3.6.1.4.1.9.9.46.1.4.2.1.6.1.6 octetstringhex 000186A6 1.3.6.1.4.1.9.9.46.1.4.1.1.1.1 integer 3

snmpset -c private gooroo 1.3.6.1.4.1.9.9.46.1.4.1.1.1.1 integer 4

snmpwalk -c public crumpy 1.3.6.1.4.1.9.9.46.1.3.1.1.2

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.6 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.11 : INTEGER: operational

Remarque : Certaines versions de SNMP exigent l’utilisation d’un (.) avant l’OID dans les commandes SNMP SET.

Supprimer un réseau VLAN d’un commutateur Cisco Catalyst avec SNMP

Step-by-Step Instructions

Dans cet exemple, le réseau VLAN 48 est supprimé du commutateur. Consultez la section Ajouter un réseau VLAN à un commutateur Cisco Catalyst avec SNMP pour en savoir plus. La différence entre la section où vous supprimez un réseau VLAN et celle où vous ajoutez un réseau VLAN est que vous utilisez la commande destroy au lieu de la commande CreateAndGo pour vtpVlanEditRowStatus :

1. Saisissez la commande pour supprimer le réseau VLAN 48 :

snmpset -c private crumpy vtpVlanEditOperation.1 integer 2

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpEditControlTable.vtpEditControlEntry.vtpVlanEditOperation.1 : INTEGER: copy

snmpset -c private crumpy vtpVlanEditRowStatus.1.48 integer 6

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanEdit.vtpVlanEditTable.vtpVlanEditEntry.vtpVlanEditRowStatus.1.48 : INTEGER: destroy

2. Pour vérifier que le réseau VLAN 48 a été supprimé, utilisez vtpVlanState ou show vlan sur la CLI :

snmpwalk -c public crumpy vtpVlanState

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1 : INTEGER: operational

cisco.ciscoMgmt.ciscoVtpMIB.vtpMIBObjects.vlanInfo.vtpVlanTable.vtpVlanEntry.vtpVlanState.1.1002 : INTEGER: operational

…

Ajouter un port à un réseau VLAN sur un commutateur Cisco Catalyst avec SNMP

Cet exemple montre comment ajouter un port Fast Ethernet 0/5 au VLAN 48.

1. Pour vérifier quel ifIndex a le Fast Eth 0/5, saisissez la commande snmpwalk d’ifDescr :

snmpwalk -c public crumpy ifDescr

…

interfaces.ifTable.ifEntry.ifDescr.6 : DISPLAY STRING- (ascii):  FastEthernet0/5

…

2. Comme vous savez que le port Fast Eth 0/5 a un ifIndex de 6, ajoutez le port au VLAN 48 :

snmpset -c private crumpy vmVlan.6 integer 48

cisco.ciscoMgmt.ciscoVlanMembershipMIB.ciscoVlanMembershipMIBObjects.vmMembership.vmMembershipTable.vmMembershipEntry.vmVlan.6 : INTEGER: 48

3. Vérifiez que le port a été correctement ajouté en interrogeant de nouveau le même OID.

snmpget -c public crumpy vmVlan.6

cisco.ciscoMgmt.ciscoVlanMembershipMIB.ciscoVlanMembershipMIBObjects.vmMembership.vmMembershipTable.vmMembershipEntry.vmVlan.6 : INTEGER: 48

Vous pouvez également vérifier ce qui suit sur le commutateur :

crumpy#sh vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa0/1, Fa0/2, Fa0/3, Fa0/4,

Fa0/6, Fa0/7, Fa0/8, Fa0/9,

Fa0/10, Fa0/11, Fa0/12, Fa0/13,

Fa0/14, Fa0/15, Fa0/16, Fa0/17,

Fa0/18, Fa0/19, Fa0/20, Fa0/21,

Fa0/22, Fa0/23, Fa0/24, Gi0/1,

Gi0/2

48   VLAN0048                         active    Fa0/5

Comment changer un port d’un réseau VLAN à un autre

Cet exemple montre comment le port Fast Eth 0/3 appartient au VLAN 48 et comment le déplacer vers le VLAN 1 (VLAN par défaut) :

1. Pour vérifier quel ifIndex a le Fast Eth 0/3, saisissez la commande snmpwalk de l’ifDescr :

snmpwalk -c public crumpy ifDescr

…

interfaces.ifTable.ifEntry.ifDescr.4 : DISPLAY STRING- (ascii):  FastEthernet0/3

…

2. Comme vous savez que le port Fast Eth 0/3 a un ifIndex de 4, vous pouvez vérifier à quel VLAN appartient le port actuellement :

snmpget -c public crumpy vmVlan.4

cisco.ciscoMgmt.ciscoVlanMembershipMIB.ciscoVlanMembershipMIBObjects.vmMembership.vmMembershipTable.vmMembershipEntry.vmVlan.4 : INTEGER: 48

3. Le port appartient au réseau VLAN 48.

snmpset -c private crumpy vmVlan.4 integer 1

cisco.ciscoMgmt.ciscoVlanMembershipMIB.ciscoVlanMembershipMIBObjects.vmMembership.vmMembershipTable.vmMembershipEntry.vmVlan.4 : INTEGER: 1

4. Pour déplacer le port du réseau VLAN 48 au réseau VLAN 1, saisissez la commande snmpset de vmVlan.

5. Pour vérifier si le port a été remplacé par un autre réseau VLAN, interrogez de nouveau vmVlan :

snmpget -c public crumpy vmVlan.4

cisco.ciscoMgmt.ciscoVlanMembershipMIB.ciscoVlanMembershipMIBObjects.vmMembership.vmMembershipTable.vmMembershipEntry.vmVlan.4 : INTEGER: 1

Vous pouvez également vérifier ceci sur le commutateur :

Avant la modification :

crumpy#sh vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa0/1, Fa0/2, Fa0/4, Fa0/5,

Fa0/6, Fa0/7, Fa0/8, Fa0/9,

Fa0/10, Fa0/11, Fa0/12, Fa0/13,

Fa0/14, Fa0/15, Fa0/16, Fa0/17,

Fa0/18, Fa0/19, Fa0/20, Fa0/21,

Fa0/22, Fa0/23, Fa0/24, Gi0/1,

Gi0/2

48   VLAN0048                         active    Fa0/3

Après la modification :

crumpy#sh vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa0/1, Fa0/2, Fa0/3, Fa0/4,

Fa0/5, Fa0/6, Fa0/7, Fa0/8,

Fa0/9, Fa0/10, Fa0/11, Fa0/12,

Fa0/13, Fa0/14, Fa0/15, Fa0/16,

Fa0/17, Fa0/18, Fa0/19, Fa0/20,

Fa0/21, Fa0/22, Fa0/23, Fa0/24,

Gi0/1, Gi0/2

48   VLAN0048                         active

Remarque : Vous pouvez apporter d’autres modifications notamment au nom du VLAN ou au propriétaire. Consultez l’ensemble de la MIB pour en savoir plus sur l’OID.

Informations connexes

- Support technique - Cisco Systems