Contenu

Introduction

Conditions préalables

Conditions requises

Components Used

Conventions

Procédure

Présentation des OID dans CISCO-ENTITY-SENSOR-MIB

Présentation des OID dans ENTITY-MIB

Sortie de la commande show environment température via l'interface de ligne de commande

Dépannage

Le commutateur envoie ciscoEnvMonTemperatureStatusDescr=module[no]

Informations connexes

Introduction

Ce document explique le processus pour obtenir les valeurs de température du Cisco Catalyst 6500/6000. La commande « show environment temperature » de l'interface de ligne de commande (CLI), qui utilise le protocole de gestion de réseau simple (SNMP) affiche ces valeurs.

Conditions préalables

Conditions requises

Aucune spécification déterminée n'est requise pour ce document.

Components Used

Les informations contenues dans ce document sont basées sur les versions de matériel et de logiciel suivantes :

- Commutateurs de la gamme Catalyst 6500/6000:

- qui exécutent Catalyst OS (CatOS)—Prise en charge de CISCO-ENTITY-SENSOR-MIB à partir de la version logicielle initiale du module Supervisor Engine.

Reportez-vous à la liste de prise en charge MIB des systèmes d'exploitation Catalyst 6000 et 7600.

- qui exécutent le logiciel Cisco IOS® - prend en charge CISCO-ENTITY-SENSOR-MIB à partir de la version 12.1(8a)EX du logiciel Cisco IOS.

Référez-vous à la liste de prise en charge MIB de Cisco IOS Catalyst 6000 et 7600 pour vérification.

Remarque : les capteurs des périphériques 1 et 2 sont pris en charge depuis la version 12.1(14)E du logiciel Cisco IOS. Voir la sortie de la commande show environment température via la section CLI de ce document.

- CatOS version 5.5.7

- SNMPWalk de HP OpenView Network Node Manager, installé sur Sun Solaris 2.7

Vous pouvez également utiliser les utilitaires SNMP de Net-SNMP à cette fin.

Remarque : Ce document utilise les MIB suivantes :

- CISCO-ENTITY-SENSOR-MIB

- ENTITY-MIB-V1SMI

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Pour plus d'informations sur les conventions utilisées dans ce document, reportez-vous à Conventions relatives aux conseils techniques Cisco.

Procédure

Procédez comme suit :

1. Utilisez l'identificateur d'objet (OID) entSensorValue (1.3.6.1.4.1.9.9.91.1.1.1.4) pour obtenir les valeurs de température.

Cet OID provient de CISCO-ENTITY-SENSOR-MIB. Pour tous les autres OID qui se rapportent à cette MIB, consultez la section Présentation des OID dans CISCO-ENTITY-SENSOR-MIB de ce document. La base MIB fournit cette description :

entSensorValue OBJECT-TYPE

SYNTAX SensorValue

--    Rsyntax INTEGER(-1000000000..1000000000)

ACCESS read-only

STATUS mandatory

DESCRIPTION

"This variable reports the most recent measurement seen

by the sensor.

To correctly display or interpret this variable's value,

you must also know entSensorType, entSensorScale, and

entSensorPrecision.

However, you can compare entSensorValue with the threshold

values given in entSensorThresholdTable without any semantic

knowledge."

::= { entSensorValueEntry 4 }

Recherchez le périphérique pour la valeur entSensorValue (1.3.6.1.4.1.9.9.91.1.1.1.1.4). Dans cet exemple, le nom d'hôte du périphérique est zatar :

#snmpwalk -c public zatar 1.3.6.1.4.1.9.9.91.1.1.1.1.4

9.9.91.1.1.1.1.4.15 : INTEGER: 1

9.9.91.1.1.1.1.4.16 : INTEGER: 1

9.9.91.1.1.1.1.4.17 : INTEGER: 2

9.9.91.1.1.1.1.4.18 : INTEGER: 1

9.9.91.1.1.1.1.4.19 : INTEGER: 20

9.9.91.1.1.1.1.4.20 : INTEGER: 1

9.9.91.1.1.1.1.4.21 : INTEGER: 21

9.9.91.1.1.1.1.4.22 : INTEGER: 1

9.9.91.1.1.1.1.4.23 : INTEGER: 20

9.9.91.1.1.1.1.4.1001 : INTEGER: 19

9.9.91.1.1.1.1.4.1002 : INTEGER: 28

9.9.91.1.1.1.1.4.1003 : INTEGER: 22

9.9.91.1.1.1.1.4.1004 : INTEGER: 28

9.9.91.1.1.1.1.4.1007 : INTEGER: 19

9.9.91.1.1.1.1.4.1008 : INTEGER: 23

9.9.91.1.1.1.1.4.1009 : INTEGER: 0

9.9.91.1.1.1.1.4.1010 : INTEGER: 0

9.9.91.1.1.1.1.4.2001 : INTEGER: 16

9.9.91.1.1.1.1.4.2002 : INTEGER: 25

9.9.91.1.1.1.1.4.2003 : INTEGER: 26

9.9.91.1.1.1.1.4.2004 : INTEGER: 0

9.9.91.1.1.1.1.4.3001 : INTEGER: 17

9.9.91.1.1.1.1.4.3002 : INTEGER: 20

9.9.91.1.1.1.1.4.3003 : INTEGER: 19

9.9.91.1.1.1.1.4.3004 : INTEGER: 24

9.9.91.1.1.1.1.4.4001 : INTEGER: 25

9.9.91.1.1.1.1.4.4002 : INTEGER: 29

9.9.91.1.1.1.1.4.4003 : INTEGER: 0

9.9.91.1.1.1.1.4.4004 : INTEGER: 0

9.9.91.1.1.1.1.4.5001 : INTEGER: 20

9.9.91.1.1.1.1.4.5002 : INTEGER: 20

9.9.91.1.1.1.1.4.5003 : INTEGER: 0

9.9.91.1.1.1.1.4.5004 : INTEGER: 0

#

2. Déterminez comment lier toutes les valeurs de température au module approprié dans le Catalyst.

Par exemple, que fait l'index 9.9.91.1.1.1.1.4.1001 : INTEGER : 19 pour ? Pour le savoir, vous devez monter un niveau dans l'arbre. Sauter un niveau du 1.3.6.1.4.1.9.9.91.1.1.1.1.4 vers le 1.3.6.1.4.1.9.9.91.1.1.1.1 ; déposez le 4 à la fin. Cela vous amène à la valeurEntry de entSensor (1.3.6.1.4.1.9.9.91.1.1.1.1). La base MIB fournit cette description :

entSensorValueEntry OBJECT-TYPE

SYNTAX EntSensorValueEntry

ACCESS not-accessible

STATUS mandatory

DESCRIPTION

"An entSensorValueTable entry describes the

present reading of a sensor, the measurement units

and scale, and sensor operational status."

INDEX { entPhysicalIndex }

::= { entSensorValueTable 1 }

La description montre que cet OID utilise des index, comme vous le voyez dans la commande snmpwalk 1001, 1002, etc. La description entSensorValueEntry montre un autre OID, entPhysicalIndex, qui fournit une autre MIB, ENTITY-MIB.

IMPORTS

Integer32

FROM SNMPv2-SMI-v1

OBJECT-TYPE

FROM RFC-1212

TRAP-TYPE

FROM RFC-1215

TimeStamp, TruthValue

FROM SNMPv2-TC-v1

entPhysicalIndex

FROM ENTITY-MIB

ciscoMgmt

Le entPhysicalIndex provient de ENTITY-MIB. ENTITY-MIB fournit cette description de entPhysicalIndex :

entPhysicalEntry ::= SEQUENCE {

entPhysicalIndex PhysicalIndex,

entPhysicalDescr SnmpAdminString,

entPhysicalVendorType AutonomousType,

entPhysicalContainedIn INTEGER,

entPhysicalClass PhysicalClass,

entPhysicalParentRelPos INTEGER,

entPhysicalName SnmpAdminString,

entPhysicalHardwareRev SnmpAdminString,

entPhysicalFirmwareRev SnmpAdminString,

entPhysicalSoftwareRev SnmpAdminString,

entPhysicalSerialNum SnmpAdminString,

entPhysicalMfgName SnmpAdminString,

entPhysicalModelName SnmpAdminString,

entPhysicalAlias SnmpAdminString,

entPhysicalAssetID SnmpAdminString,

entPhysicalIsFRU TruthValue

}

entPhysicalIndex OBJECT-TYPE

SYNTAX PhysicalIndex

--    Rsyntax INTEGER(1..2147483647)

ACCESS not-accessible

STATUS mandatory

DESCRIPTION

"The index for this entry."

::= { entPhysicalEntry 1 }

À partir de cette description, vous pouvez revenir en arrière et conclure que l'entPhysicalIndex provient de entPhysicalEntry.

3. Requête pour le entPhysicalIndex (1.3.6.1.2.1.47.1.1.1.1.1) puis le entPhysicalDescr (1.3.6.1.2.1.47.1.1.1.1.2).

Cette commande vous donne la description de 1001, 1002, 1003, 1004, etc. :

#snmpwalk -c public zatar 1.3.6.1.2.1.47.1.1.1.1.2

47.1.1.1.1.2.1 : OCTET STRING- (ascii): Cisco Systems WS-C6506 6 slot switch

47.1.1.1.1.2.2 : OCTET STRING- (ascii): WS-C6506 6 slot switch chassis slot

47.1.1.1.1.2.3 : OCTET STRING- (ascii): WS-C6506 6 slot switch chassis slot

47.1.1.1.1.2.4 : OCTET STRING- (ascii): WS-C6506 6 slot switch chassis slot

47.1.1.1.1.2.5 : OCTET STRING- (ascii): WS-C6506 6 slot switch chassis slot

47.1.1.1.1.2.6 : OCTET STRING- (ascii): WS-C6506 6 slot switch chassis slot

47.1.1.1.1.2.7 : OCTET STRING- (ascii): WS-C6506 6 slot switch chassis slot

47.1.1.1.1.2.8 : OCTET STRING- (ascii): WS-C6506 6 slot switch backplane

47.1.1.1.1.2.9 : OCTET STRING- (ascii): Container of power supply group

47.1.1.1.1.2.10 : OCTET STRING- (ascii):        Container of power supply

47.1.1.1.1.2.11 : OCTET STRING- (ascii):        power supply

47.1.1.1.1.2.12 : OCTET STRING- (ascii):        Container of power supply

47.1.1.1.1.2.14 : OCTET STRING- (ascii):        Container of Fan

47.1.1.1.1.2.15 : OCTET STRING- (ascii):        Fan

47.1.1.1.1.2.16 : OCTET STRING- (ascii):        Clock

47.1.1.1.1.2.17 : OCTET STRING- (ascii):        Clock

47.1.1.1.1.2.18 : OCTET STRING- (ascii):        VTT

47.1.1.1.1.2.19 : OCTET STRING- (ascii):        VTT Temp Sensor

47.1.1.1.1.2.20 : OCTET STRING- (ascii):        VTT

47.1.1.1.1.2.21 : OCTET STRING- (ascii):        VTT Temp Sensor

47.1.1.1.1.2.22 : OCTET STRING- (ascii):        VTT

47.1.1.1.1.2.23 : OCTET STRING- (ascii):        VTT Temp Sensor

47.1.1.1.1.2.1000 : OCTET STRING- (ascii):      WS-X6K-SUP1A-2GE 1000BaseX

Supervisor Rev. 3.1

47.1.1.1.1.2.1001 : OCTET STRING- (ascii):      Module Intake Temp Sensor

47.1.1.1.1.2.1002 : OCTET STRING- (ascii):      Module Exhaust Temp Sensor

47.1.1.1.1.2.1003 : OCTET STRING- (ascii):      Module  Device 1 Temp Sensor

47.1.1.1.1.2.1004 : OCTET STRING- (ascii):      Module  Device 2 Temp Sensor

47.1.1.1.1.2.1005 : OCTET STRING- (ascii):      L3 Switching Engine Container

47.1.1.1.1.2.1006 : OCTET STRING- (ascii):      L3 Switching Engine

47.1.1.1.1.2.1007 : OCTET STRING- (ascii):      L3 SE Intake Temp Sensor

47.1.1.1.1.2.1008 : OCTET STRING- (ascii):      L3 SE Exhaust Temp Sensor

47.1.1.1.1.2.1009 : OCTET STRING- (ascii):      L3 SE device1 Temp Sensor

47.1.1.1.1.2.1010 : OCTET STRING- (ascii):      L3 SE device2 Temp Sensor

47.1.1.1.1.2.1011 : OCTET STRING- (ascii):      CPU of supervisor

47.1.1.1.1.2.1012 : OCTET STRING- (ascii):      Ethernet Gigabit port interface

47.1.1.1.1.2.1013 : OCTET STRING- (ascii):      Ethernet Gigabit port interface

47.1.1.1.1.2.1014 : OCTET STRING- (ascii):      Container of Router Switch

Feature Card

47.1.1.1.1.2.2000 : OCTET STRING- (ascii):      WS-X6182-2PA FlexWAN Module Rev.

1.3

47.1.1.1.1.2.2001 : OCTET STRING- (ascii):      Module Intake Temp Sensor

47.1.1.1.1.2.2002 : OCTET STRING- (ascii):      Module Exhaust Temp Sensor

47.1.1.1.1.2.2003 : OCTET STRING- (ascii):      Module  Device 1 Temp Sensor

47.1.1.1.1.2.2004 : OCTET STRING- (ascii):      Module  Device 2 Temp Sensor

47.1.1.1.1.2.3000 : OCTET STRING- (ascii):      WS-X6248-RJ-45 10/100BaseTX

Ethernet Rev. 1.1

47.1.1.1.1.2.3001 : OCTET STRING- (ascii):      Module Intake Temp Sensor

47.1.1.1.1.2.3002 : OCTET STRING- (ascii):      Module Exhaust Temp Sensor

47.1.1.1.1.2.3003 : OCTET STRING- (ascii):      Module  Device 1 Temp Sensor

47.1.1.1.1.2.3004 : OCTET STRING- (ascii):      Module  Device 2 Temp Sensor

47.1.1.1.1.2.3005 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3006 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3007 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3008 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3009 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3010 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3011 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3012 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3013 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3014 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3015 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3016 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3017 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3018 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3019 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3020 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3021 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3022 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3023 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3024 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3025 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3026 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3027 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3028 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3029 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3030 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3031 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3032 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3033 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3034 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3035 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3036 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3037 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3038 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3039 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3040 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3041 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3042 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3043 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3044 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3045 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3046 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3047 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3048 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3049 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3050 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3051 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.3052 : OCTET STRING- (ascii):      10/100BaseTX

47.1.1.1.1.2.4000 : OCTET STRING- (ascii):      Router Switch feature Card

47.1.1.1.1.2.4001 : OCTET STRING- (ascii):      RSFC Intake Temp Sensor

47.1.1.1.1.2.4002 : OCTET STRING- (ascii):      RSFC Temp Sensor

47.1.1.1.1.2.4003 : OCTET STRING- (ascii):      RSFC device1 Temp Sensor

47.1.1.1.1.2.4004 : OCTET STRING- (ascii):      RSFC device2 Temp Sensor

47.1.1.1.1.2.4005 : OCTET STRING- (ascii):      Route Switch

47.1.1.1.1.2.5000 : OCTET STRING- (ascii):      WS-X6380-NAM Network Analysis

Module Rev. 1.1

47.1.1.1.1.2.5001 : OCTET STRING- (ascii):      Module Intake Temp Sensor

47.1.1.1.1.2.5002 : OCTET STRING- (ascii):      Module Exhaust Temp Sensor

47.1.1.1.1.2.5003 : OCTET STRING- (ascii):      Module  Device 1 Temp Sensor

47.1.1.1.1.2.5004 : OCTET STRING- (ascii):      Module  Device 2 Temp Sensor

47.1.1.1.1.2.5005 : OCTET STRING- (ascii):      Net Analysis

47.1.1.1.1.2.5006 : OCTET STRING- (ascii):      Net Analysis

#

Maintenant, vous avez lié les index à la description et les index aux valeurs de température.

4. Faites le lien entre les valeurs de température et la description.

Extrayez ces informations de l'étape 3 :

47.1.1.1.1.2.1001 : OCTET STRING- (ascii):      Module Intake Temp Sensor

47.1.1.1.1.2.1002 : OCTET STRING- (ascii):      Module Exhaust Temp Sensor

47.1.1.1.1.2.1003 : OCTET STRING- (ascii):      Module  Device 1 Temp Sensor

47.1.1.1.1.2.1004 : OCTET STRING- (ascii):      Module  Device 2 Temp Sensor

Et extrayez ces informations de l'étape 1 :

9.9.91.1.1.1.1.4.1001 : INTEGER: 19

9.9.91.1.1.1.1.4.1002 : INTEGER: 28

9.9.91.1.1.1.1.4.1003 : INTEGER: 22

9.9.91.1.1.1.1.4.1004 : INTEGER: 28

Le résultat donne :

- Capteur de température d'entrée de module = 19C

- Capteur de température d'échappement du module = 28C

- Module Device 1 Temp Sensor = 22C

- Capteur de température du périphérique 2 du module = 28C

Présentation des OID dans CISCO-ENTITY-SENSOR-MIB

"org"                                   "1.3"

"dod"                                   "1.3.6"

"internet"                              "1.3.6.1"

"directory"                             "1.3.6.1.1"

"mgmt"                                  "1.3.6.1.2"

"experimental"                          "1.3.6.1.3"

"private"                               "1.3.6.1.4"

"enterprises"                           "1.3.6.1.4.1"

"cisco"                                 "1.3.6.1.4.1.9"

"ciscoMgmt"                             "1.3.6.1.4.1.9.9"

"entitySensorMIB"                       "1.3.6.1.4.1.9.9.91"

"entitySensorMIBObjects"                "1.3.6.1.4.1.9.9.91.1"

"entitySensorMIBNotificationPrefix"     "1.3.6.1.4.1.9.9.91.2"

"entitySensorMIBConformance"            "1.3.6.1.4.1.9.9.91.3"

"entSensorValues"                       "1.3.6.1.4.1.9.9.91.1.1"

"entSensorThresholds"                   "1.3.6.1.4.1.9.9.91.1.2"

"entSensorValueTable"                   "1.3.6.1.4.1.9.9.91.1.1.1"

"entSensorValueEntry"                   "1.3.6.1.4.1.9.9.91.1.1.1.1"

"entSensorType"                         "1.3.6.1.4.1.9.9.91.1.1.1.1.1"

"entSensorScale"                        "1.3.6.1.4.1.9.9.91.1.1.1.1.2"

"entSensorPrecision"                    "1.3.6.1.4.1.9.9.91.1.1.1.1.3"

"entSensorValue"                        "1.3.6.1.4.1.9.9.91.1.1.1.1.4"

"entSensorStatus"                       "1.3.6.1.4.1.9.9.91.1.1.1.1.5"

"entSensorValueTimeStamp"               "1.3.6.1.4.1.9.9.91.1.1.1.1.6"

"entSensorValueUpdateRate"              "1.3.6.1.4.1.9.9.91.1.1.1.1.7"

"entSensorThresholdTable"               "1.3.6.1.4.1.9.9.91.1.2.1"

"entSensorThresholdEntry"               "1.3.6.1.4.1.9.9.91.1.2.1.1"

"entSensorThresholdIndex"               "1.3.6.1.4.1.9.9.91.1.2.1.1.1"

"entSensorThresholdSeverity"            "1.3.6.1.4.1.9.9.91.1.2.1.1.2"

"entSensorThresholdRelation"            "1.3.6.1.4.1.9.9.91.1.2.1.1.3"

"entSensorThresholdValue"               "1.3.6.1.4.1.9.9.91.1.2.1.1.4"

"entSensorThresholdEvaluation"          "1.3.6.1.4.1.9.9.91.1.2.1.1.5"

"entSensorThresholdNotificationEnable"  "1.3.6.1.4.1.9.9.91.1.2.1.1.6"

"entitySensorMIBNotifications"          "1.3.6.1.4.1.9.9.91.2"

"entitySensorMIBCompliances"            "1.3.6.1.4.1.9.9.91.3.1"

"entitySensorMIBGroups"                 "1.3.6.1.4.1.9.9.91.3.2"

"entitySensorMIBComplianceV01"          "1.3.6.1.4.1.9.9.91.3.1.1"

"entitySensorValueGroup"                "1.3.6.1.4.1.9.9.91.3.2.1"

"entitySensorThresholdGroup"            "1.3.6.1.4.1.9.9.91.3.2.2"

Présentation des OID dans ENTITY-MIB

"org"                                   "1.3"

"dod"                                   "1.3.6"

"internet"                              "1.3.6.1"

"directory"                             "1.3.6.1.1"

"mgmt"                                  "1.3.6.1.2"

"experimental"                          "1.3.6.1.4.1"

"private"                               "1.3.6.1.4"

"enterprises"                           "1.3.6.1.4.1"

"mib-2"                                 "1.3.6.1.2.1"

"entityMIB"                             "1.3.6.1.2.1.47"

"entityMIBObjects"                      "1.3.6.1.2.1.47.1"

"entityMIBTraps"                        "1.3.6.1.2.1.47.2"

"entityConformance"                     "1.3.6.1.2.1.47.3"

"entityPhysical"                        "1.3.6.1.2.1.47.1.1"

"entityLogical"                         "1.3.6.1.2.1.47.1.2"

"entityMapping"                         "1.3.6.1.2.1.47.1.3"

"entityGeneral"                         "1.3.6.1.2.1.47.1.4"

"entPhysicalTable"                      "1.3.6.1.2.1.47.1.1.1"

"entPhysicalEntry"                      "1.3.6.1.2.1.47.1.1.1.1"

"entPhysicalIndex"                      "1.3.6.1.2.1.47.1.1.1.1.1"

"entPhysicalDescr"                      "1.3.6.1.2.1.47.1.1.1.1.2"

"entPhysicalVendorType"                 "1.3.6.1.2.1.47.1.1.1.1.3"

"entPhysicalContainedIn"                "1.3.6.1.2.1.47.1.1.1.1.4"

"entPhysicalClass"                      "1.3.6.1.2.1.47.1.1.1.1.5"

"entPhysicalParentRelPos"               "1.3.6.1.2.1.47.1.1.1.1.6"

"entPhysicalName"                       "1.3.6.1.2.1.47.1.1.1.1.7"

"entPhysicalHardwareRev"                "1.3.6.1.2.1.47.1.1.1.1.8"

"entPhysicalFirmwareRev"                "1.3.6.1.2.1.47.1.1.1.1.9"

"entPhysicalSoftwareRev"                "1.3.6.1.2.1.47.1.1.1.1.10"

"entPhysicalSerialNum"                  "1.3.6.1.2.1.47.1.1.1.1.11"

"entPhysicalMfgName"                    "1.3.6.1.2.1.47.1.1.1.1.12"

"entPhysicalModelName"                  "1.3.6.1.2.1.47.1.1.1.1.13"

"entPhysicalAlias"                      "1.3.6.1.2.1.47.1.1.1.1.14"

"entPhysicalAssetID"                    "1.3.6.1.2.1.47.1.1.1.1.15"

"entPhysicalIsFRU"                      "1.3.6.1.2.1.47.1.1.1.1.16"

"entLogicalTable"                       "1.3.6.1.2.1.47.1.2.1"

"entLogicalEntry"                       "1.3.6.1.2.1.47.1.2.1.1"

"entLogicalIndex"                       "1.3.6.1.2.1.47.1.2.1.1.1"

"entLogicalDescr"                       "1.3.6.1.2.1.47.1.2.1.1.2"

"entLogicalType"                        "1.3.6.1.2.1.47.1.2.1.1.3"

"entLogicalCommunity"                   "1.3.6.1.2.1.47.1.2.1.1.4"

"entLogicalTAddress"                    "1.3.6.1.2.1.47.1.2.1.1.5"

"entLogicalTDomain"                     "1.3.6.1.2.1.47.1.2.1.1.6"

"entLogicalContextEngineID"             "1.3.6.1.2.1.47.1.2.1.1.7"

"entLogicalContextName"                 "1.3.6.1.2.1.47.1.2.1.1.8"

"entLPMappingTable"                     "1.3.6.1.2.1.47.1.3.1"

"entAliasMappingTable"                  "1.3.6.1.2.1.47.1.3.2"

"entPhysicalContainsTable"              "1.3.6.1.2.1.47.1.3.3"

"entLPMappingEntry"                     "1.3.6.1.2.1.47.1.3.1.1"

"entLPPhysicalIndex"                    "1.3.6.1.2.1.47.1.3.1.1.1"

"entAliasMappingEntry"                  "1.3.6.1.2.1.47.1.3.2.1"

"entAliasLogicalIndexOrZero"            "1.3.6.1.2.1.47.1.3.2.1.1"

"entAliasMappingIdentifier"             "1.3.6.1.2.1.47.1.3.2.1.2"

"entPhysicalContainsEntry"              "1.3.6.1.2.1.47.1.3.3.1"

"entPhysicalChildIndex"                 "1.3.6.1.2.1.47.1.3.3.1.1"

"entLastChangeTime"                     "1.3.6.1.2.1.47.1.4.1"

"entityMIBTrapPrefix"                   "1.3.6.1.2.1.47.2"

"entityCompliances"                     "1.3.6.1.2.1.47.3.1"

"entityGroups"                          "1.3.6.1.2.1.47.3.2"

"entityCompliance"                      "1.3.6.1.2.1.47.3.1.1"

"entity2Compliance"                     "1.3.6.1.2.1.47.3.1.2"

"entityPhysicalGroup"                   "1.3.6.1.2.1.47.3.2.1"

"entityLogicalGroup"                    "1.3.6.1.2.1.47.3.2.2"

"entityMappingGroup"                    "1.3.6.1.2.1.47.3.2.3"

"entityGeneralGroup"                    "1.3.6.1.2.1.47.3.2.4"

"entityPhysical2Group"                  "1.3.6.1.2.1.47.3.2.6"

"entityLogical2Group"                   "1.3.6.1.2.1.47.3.2.7"

"entityNotificationsGroup"              "1.3.6.1.2.1.47.3.2.5"

Sortie de la commande show environment température via l'interface de ligne de commande

Remarque : Vous devez être en mode enable afin d'émettre la commande show environment températures.

zatar> (enable)#show environment temperature

Intake        Exhaust       Device 1     Device 2

Slot             Temperature   Temperature   Temperature   Temperature

---------------  ------------  ------------  ------------  ------------

1                19C(50C,65C)  28C(60C,75C)  21C           27C

2                20C(50C,65C)  20C(60C,75C)  N/A           N/A

3                16C(50C,65C)  25C(60C,75C)  26C(70C,85C)  N/A

4                17C(50C,65C)  20C(60C,75C)  19C           24C

1  (Switch-Eng)  19C(50C,65C)  23C(60C,75C)  N/A           N/A

1  (MSFC)        24C(50C,65C)  29C(60C,75C)  N/A           N/A

Chassis Modules

------------------

VTT1: 20C(85C,100C)

VTT2: 21C(85C,100C)

VTT3: 19C(85C,100C)

zatar> (enable)

Dépannage

Le commutateur envoie ciscoEnvMonTemperatureStatusDescr=module[no]

Le commutateur envoie le message SNMP ciscoEnvMonTemperatureStatusDescr=Module [no] en tant que notification indiquant que la température mesurée à un point de test donné est en dehors de la plage normale du point de test. La plage peut se situer à l'une des étapes suivantes :

- Avertissement

- Critique

- Arrêt

L'option de plage d'état actuelle dans le déroutement de notification SNMP spécifie dans quelle plage de températures se trouve le module. L'option de durée de contrôle dans le déroutement de notification SNMP spécifie la durée pendant laquelle la température du commutateur est supérieure à la plage normale.

Si l'état actuel de la température au point d'essai du module est à l'arrêt, le commutateur arrête automatiquement le module. Les messages ciscoEnvMonTemperatureStatusDescr = module[no] sont des messages d'information.

La solution de contournement suggérée pour éviter les problèmes inattendus consiste à s'assurer que la température autour du commutateur est conforme aux normes opérationnelles que les spécifications du module spécifient. Consultez la sortie de la commande show environment température via la section CLI de ce document afin de déterminer cette température. Assurez-vous également que les ventilateurs internes du commutateur fonctionnent normalement.

Informations connexes

- Notes techniques de conception des services d'applications IP

- Surveillance de l'environnement Administration du commutateur

- Support et documentation techniques - Cisco Systems