Contenu

Introduction

Conditions préalables

Conditions requises

Components Used

Diagramme du réseau

Conventions

Configuration de l'authentification RADIUS via la procédure Cache Engine

Vérification

Dépannage

Dépannage des commandes

Informations connexes

Introduction

Ce document fournit des instructions sur la configuration de l'authentification RADIUS via le Cache Engine vers Cisco Secure Access Control Server (ACS) pour Microsoft Windows NT. Vous devez exécuter Web Cache Communication Protocol Version 2 (WCCPv2) pour suivre correctement cette procédure. Reportez-vous à Configuration du protocole de communication Web Cache version 2 sur un moteur et un routeur Cisco Cache Engine pour plus d'informations sur WCCP version 2.

Conditions préalables

Conditions requises

Avant d'essayer cette configuration, assurez-vous de respecter les conditions suivantes :

- Connaissance de Cisco Secure ACS pour Windows ou UNIX.

- Connaissance de la configuration WCCPv2 sur le routeur et le moteur de cache.

Components Used

Les informations contenues dans ce document sont basées sur les versions de matériel et de logiciel suivantes :

- Cisco Cache Engine 505 dans un environnement de laboratoire avec des configurations effacées

- Routeur Cisco 2600

- Logiciel Cisco Cache Engine version 2.31

- Logiciel Cisco IOS® Version 12.1(3)T 3

- Cisco Secure ACS pour serveurs Microsoft Windows NT/2000

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Diagramme du réseau

Ce document utilise la configuration réseau suivante :

Conventions

For more information on document conventions, refer to the Cisco Technical Tips Conventions.

Configuration de l'authentification RADIUS via la procédure Cache Engine

Utilisez ces étapes pour configurer le Cache Engine pour l'authentification RADIUS :

1. Configurez le Cache Engine en tant que serveur d'accès au réseau (NAS) dans Cisco Secure ACS pour Windows NT.

2. Configurez les informations utilisateur dans Cisco Secure ACS pour Windows NT.

3. Configurez le Cache Engine pour RADIUS et spécifiez l'hôte et les informations de clé.

radius-server host 172.18.124.106

radius-server key cisco123

4. Configurez le routeur pour WCCP.

Vos lignes de commande pour le Cache Engine doivent apparaître comme suit :

cepro#configure terminal

!--- Enter configuration commands, one per line. !--- End with CNTL/Z.

cepro(config)#radius-server host 172.18.124.106

cepro(config)#radius-server key cisco123

cepro#

Voici la configuration Cache Engine/NAS de Cisco Secure ACS pour Windows NT :

Voici la page User Setup de Cisco Secure ACS pour Windows NT :

Vérification

Cette section présente des informations que vous pouvez utiliser pour vous assurer que votre configuration fonctionne correctement.

Certaines commandes show sont prises en charge par l'Output Interpreter Tool (clients enregistrés uniquement), qui vous permet de voir une analyse de la sortie de la commande show.

Commandes Cache Engine :

- show version : affiche la version du logiciel exécutée sur le Cache Engine.

- show hardware : affiche la version du logiciel et le type de matériel sur le Cache Engine.

- show running-config : affiche la configuration en cours réelle sur le Cache Engine.

- show stat http usage : affiche les statistiques d'utilisation.

- show radius stat [all | primaire | secondary ]—Affiche les statistiques d'authentification pour les serveurs RADIUS principal et secondaire.

Voici un exemple de sortie de commande de la commande show version :

cepro#show version

Cisco Cache Engine

Copyright (c) 1986-2001 by Cisco Systems, Inc.

Software Release: CE ver 2.31 (Build: FCS  02/16/01)

Compiled: 11:20:14 Feb 22 2001 by bbalagot

Image text-base 0x108000, data_base 0x437534

System restarted by Reload

The system has been up for 3 hours, 52 minutes, 33 seconds.

System booted from "flash"

Voici un exemple de sortie de commande de la commande show hardware :

cepro#show hardware

Cisco Cache Engine

Copyright (c) 1986-2001 by Cisco Systems, Inc.

Software Release: CE ver 2.31 (Build: FCS  02/16/01)

Compiled: 11:20:14 Feb 22 2001 by bbalagot

Image text-base 0x108000, data_base 0x437534

System restarted by Reload

The system has been up for 3 hours, 52 minutes, 54 seconds.

System booted from "flash"

Cisco Cache Engine CE505 with CPU AMD-K6 (model 8) (rev. 12) AuthenticAMD

2 Ethernet/IEEE 802.3 interfaces

1 Console interface.

134213632 bytes of Physical Memory

131072 bytes of ROM memory.

8388608 bytes of flash memory.

List of disk drives:

/c0t0d0  (scsi bus 0, unit 0, lun 0)

Voici un exemple de sortie de commande de la commande show running-config :

cepro#show running-config

Building configuration...

Current configuration:

!

!

logging recycle 64000

logging trap information

!

user add admin uid 0  password 1 "eeSdy9dcy"  capability admin-access

!

!

!

hostname cepro

!

interface ethernet 0

ip address 10.27.2.2 255.255.255.0

ip broadcast-address 10.27.2.255

exit

!

!

interface ethernet 1

exit

!

ip default-gateway 10.27.2.1

ip name-server 161.44.11.21

ip name-server 161.44.11.206

ip domain-name cisco.com

ip route 0.0.0.0 0.0.0.0 10.27.2.1

cron file /local/etc/crontab

!

bypass timer 1

!--- Specify the router list for use with WCCPv2.

wccp router-list 1 10.27.2.1 172.18.124.211

!--- Instruct the router to run web cache service with WCCPv2.

wccp web-cache router-list-num 1

!--- WCCPv2 enabled.

wccp version 2

!

!--- RADIUS Server host and port is defined.

radius-server host 172.18.124.106 auth-port 1645

radius-server host 172.18.124.103 auth-port 1645

!--- RADIUS key defined.

radius-server key ****

authentication login local enable

authentication configuration local enable

transaction-logs enable

rule no-cache url-regex .*cgi-bin.*

rule no-cache url-regex .*aw-cgi.*

!

!

end

cepro#

Commandes du routeur :

- show running-config : affiche la configuration en cours réelle sur le routeur.

- show ip wccp : affiche tous les services enregistrés.

- show ip wccp <service-id> detail : affiche la distribution du compartiment WCCP pour chaque cache du cluster. Par exemple, show ip wccp web-cache detail.

Voici un exemple de sortie de commande de la commande show running-config :

33-ns-gateway#show running-config

Building configuration...

Current configuration:

!

version 12.1

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname 33-Ns-gateway

!

logging buffered 64000 debugging

enable secret 5 $1$IWJr$nI.NcIr/b9DN7jEQQC17R/

!

!

!

!

!

ip subnet-zero

!--- WCCP enabled.

ip wccp web-cache

ip cef

no ip domain-lookup

ip domain-name testdomain.com

ip name-server 161.44.11.21

ip name-server 161.44.11.206

!

!

!

!

interface Ethernet0/0

ip address 10.1.3.50 255.255.255.0

no ip route-cache cef

!

interface Ethernet1/0

description interface to the CE .5

bandwidth 100

ip address 10.27.2.1 255.255.255.0

full-duplex

!

interface Ethernet1/1

description inter to DMZ

ip address 172.18.124.211 255.255.255.0

!--- Configure the interface to enable the router !--- to verify that the appropriate !--- packets are redirected to the cache engine.

ip wccp web-cache redirect out

no ip route-cache cef

no ip route-cache

no ip mroute-cache

!

interface Ethernet1/2

description Preconfigured for recreates 10.27.3.0/24 net

ip address 10.27.3.1 255.255.255.0

no ip route-cache cef

!

interface Ethernet1/3

no ip address

shutdown

!

ip classless

ip route 0.0.0.0 0.0.0.0 172.18.124.1

no ip http server

!

!

line con 0

exec-timeout 0 0

transport input none

line aux 0

exec-timeout 0 0

line vty 0 4

exec-timeout 0 0

password ww

login

!

end

33-Ns-gateway#

Dépannage

Cette section fournit des informations que vous pouvez utiliser pour dépanner votre configuration.

Dépannage des commandes

Certaines commandes show sont prises en charge par l'Output Interpreter Tool (clients enregistrés uniquement), qui vous permet de voir une analyse de la sortie de la commande show.

Note : Avant d'émettre des commandes debug, consultez Informations importantes sur les commandes de débogage.

Commandes Cache Engine :

- debug authentication all all : débogue l'authentification.

- debug radius all all - Affiche le débogage du module RADIUS de l'interface Web.

- type var/log/translog/working.log : vérifie que les URL sont mises en cache et que l'utilisateur accède aux pages. Tout autre type de message doit être renvoyé à l'assistance technique de Cisco pour obtenir des éclaircissements. Le type de messages d'erreur le plus courant dans ce journal est l'authentification a échoué en raison d'un utilisateur inconnu, ou de la clé de serveur incorrecte.

Voici un exemple de sortie de commande de la commande debug radius all et de l'authentification debug all all commandes :

RadiusCheck(): Begin

RadiusCheck(): Begin

RadiusCheck(): Begin

RadiusBuildRequest(): Begin

RadiusBuildRequest(): Begin

RadiusBuildRequest(): Begin

[82] User-Name = "chbanks"

[82] User-Name = "chbanks"

[82] User-Name = "chbanks"

[82] NAS-IP-Address = 10.27.2.2

[82] NAS-IP-Address = 10.27.2.2

[82] NAS-IP-Address = 10.27.2.2

[82] NAS-Port = 80

[82] NAS-Port = 80

[82] NAS-Port = 80

RadiusAuthenticate(): Begin

RadiusAuthenticate(): Begin

RadiusAuthenticate(): Begin

CfgGetRadiusInfo(): Begin

CfgGetRadiusInfo(): Begin

CfgGetRadiusInfo(): Begin

UpdatePassword(): Begin

UpdatePassword(): Begin

UpdatePassword(): Begin

[82] radsend: Request to 172.18.124.106 id=1, length=171

[82] radsend: Request to 172.18.124.106 id=1, length=171

[82] radsend: Request to 172.18.124.106 id=1, length=171

RadiusReplyValidate(): Begin

RadiusReplyValidate(): Begin

RadiusReplyValidate(): Begin

RadiusReplyValidate(): [82] Received 26 byte message back

RadiusReplyValidate(): [82] Received 26 byte message back

RadiusReplyValidate(): [82] Received 26 byte message back

RadiusReplyValidate(): Got a valid response from server 172.18.124.106.

RadiusReplyValidate(): Got a valid response from server 172.18.124.106.

RadiusReplyValidate(): Got a valid response from server 172.18.124.106.

DecodeReply(): Begin

DecodeReply(): Begin

DecodeReply(): Begin

DecodeReply: WEB_YES_BLOCKING default

DecodeReply: WEB_YES_BLOCKING default

DecodeReply: WEB_YES_BLOCKING default

RadiusCheck(): WEB_YES_BLOCKING

RadiusCheck(): WEB_YES_BLOCKING

RadiusCheck(): WEB_YES_BLOCKING

RemoteUserAdd(): Begin

RemoteUserAdd(): Begin

RemoteUserAdd(): Begin

RemoteUserAdd(): Updated remote user chbanks

RemoteUserAdd(): Updated remote user chbanks

RemoteUserAdd(): Updated remote user chbanks

RemoteUserAuthenticate(): Begin

RemoteUserAuthenticate(): Begin

RemoteUserAuthenticate(): Begin

CfgGetRadiusInfo(): Begin

CfgGetRadiusInfo(): Begin

CfgGetRadiusInfo(): Begin

CfgRadiusGetExcludeState(): Begin

CfgRadiusGetExcludeState(): Begin

CfgRadiusGetExcludeState(): Begin

CfgRadiusGetExcludeState(): flag  = 0

CfgRadiusGetExcludeState(): flag  = 0

CfgRadiusGetExcludeState(): flag  = 0

RemoteUserUpdate(): Begin

RemoteUserUpdate(): Begin

RemoteUserUpdate(): Begin

CfgRadiusGetMultipleUserPromptState(): Begin

CfgRadiusGetMultipleUserPromptState(): Begin

CfgRadiusGetMultipleUserPromptState(): Begin

CfgRadiusGetMultipleUserPromptState(): flag  = 1

CfgRadiusGetMultipleUserPromptState(): flag  = 1

CfgRadiusGetMultipleUserPromptState(): flag  = 1

CfgRadiusGetMultipleUserPromptTimeout(): Begin

CfgRadiusGetMultipleUserPromptTimeout(): Begin

CfgRadiusGetMultipleUserPromptTimeout(): Begin

CfgRadiusGetMultipleUserPromptTimeout(): lMultipleUserPromptTimeout = 25

CfgRadiusGetMultipleUserPromptTimeout(): lMultipleUserPromptTimeout = 25

CfgRadiusGetMultipleUserPromptTimeout(): lMultipleUserPromptTimeout = 25

fsgetUsrInfoforIpAddr_radius will be called

fsgetUsrInfoforIpAddr_radius will be called

fsgetUsrInfoforIpAddr_radius will be called

RemoteUserUpdate() returned true

RemoteUserUpdate() returned true

RemoteUserUpdate() returned true

Commande du routeur :

- show ip wccp : affiche les statistiques WCCP globales.

Informations connexes

- Améliorations WCCP

- Protocole de communication du cache Web version 2

- Support technique - Cisco Systems