Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Configurar

Procedimiento de recuperación de contraseña para Virtual 9800 (9800-CL)

Procedimiento de recuperación de contraseña para el dispositivo mediante ROMMON

Procedimiento de recuperación de contraseña para el dispositivo mediante USB

Arranque el WLC desde ROMMON

Cargar imagen a través de USB

Cargar una imagen desde TFTP

Troubleshoot

Otros comandos útiles de ROMMON

Información Relacionada

Introducción

Este documento describe cómo recuperar un controlador Catalyst 9800 basado en el modo ROMMON y sin imagen en la memoria flash.

Prerequisites

Requirements

Cisco recomienda que tenga conocimiento sobre estos temas:

- Controladores inalámbricos Catalyst 9800

Componentes Utilizados

La información que contiene este documento se basa en las siguientes versiones de software y hardware.

- Catalyst 9800 versión 16.10.1

La información que contiene este documento se creó a partir de los dispositivos en un ambiente de laboratorio específico. Todos los dispositivos que se utilizan en este documento se pusieron en funcionamiento con una configuración verificada (predeterminada). Si tiene una red en vivo, asegúrese de entender el posible impacto de cualquier comando.

Configurar

Procedimiento de recuperación de contraseña para Virtual 9800 (9800-CL)

Paso 1. Reinicie el 9800-CL. Verá rápidamente una pantalla de selección de arranque:

Paso 2. Presione C en esta pantalla para obtener la indicación de grub.

Paso 3. Puede cambiar el registro de configuración en esa indicación con el comando config 0x2142.

Paso 4. Presione la tecla ESC para volver a la indicación de selección de inicio y elija packages.conf para iniciar en la imagen normal.

Paso 5. Su WLC arranca sin configuración. Recuperarlo.

Paso 6. No olvide repetir el procedimiento del paso 1 y establecer el registro de configuración nuevamente al valor original de 0x2002 para que la configuración se guarde y se cargue al reiniciar.

Procedimiento de recuperación de contraseña para el dispositivo mediante ROMMON

Paso 1. Envíe la tecla break cuando vea ##### impreso en la consola para el sistema que carga la imagen. Luego, el sistema interrumpe el proceso de inicio y va a la indicación ROMMON. Puede hacer esto al presionar break o ctrl+break en el teclado. También puede enviar la interrupción desde el programa de terminal (por ejemplo, Comando especial de masilla > Interrupción, Control de término > Enviar interrupción).

Precaución: la recuperación de contraseña requiere que el sistema se descarte en ROMMON. En el Cisco IOS® clásico, la configuración config-register determina si el sistema podría volver a ROMMON. Un config-register de 0x2102 impediría el retorno a ROMMON cuando se emite break. De forma predeterminada, todos los dispositivos 9800 (9800-40, 9800-80, 9800-L) tienen el conjunto config-register 0x2102. Sin embargo, dado que ejecutan Cisco IOS XE® basado en Linux, esto se ignora y la única manera de evitar que regrese a ROMMON es configurar el comando no service password-recovery.

Advertencia: en 9800-L que ejecuta ROMMON anterior a 16.12(3r), este bit en config-register evita que se interrumpa ROMMON para realizar la recuperación de contraseña.

Solución: si ejecuta ROMMON antiguo, actualice ROMMON con las instrucciones documentadas en: Upgrade Field Programmables for Cisco Catalyst 9800-L Wireless Controller

Solución: si no se puede realizar la actualización, modifique config-register a 0x2002 como solución alternativa y evite el bloqueo de ROMMON.

File size is 0x01d191f3 Located C9800-rpboot.16.10.01.SPA.pkg Image size 30511603 inode num 874837, bks cnt 7450 blk size 8*512 ################################################################################ ################################################################################ ################################################################################ ########################################################## Boot image size = 30511603 (0x1d191f3) bytes ROM:RSA Self Test Passed ROM:Sha512 Self Test Passed Package header rev 3 structure detected Calculating SHA-1 hash...done validate_package_cs: SHA-1 hash: calculated e36f46af:2c06b38d:eeb6e65b:ffaeb429:a6982d29 expected e36f46af:2c06b38d:eeb6e65b:ffaeb429:a6982d29 Validating main package signatures monitor: command "boot" aborted due to user interrupt rommon 1 >

Paso 2.Cambie config register a 0x2142 con el confreg 0x2142 comando de la indicación ROMMON.

rommon 1 > confreg 0x2142 You must reset or power cycle for new config to take effect

Paso 3. Para guardar el cambio de configuración de rommon, ejecute sync en el prompt rommon, reset  rommon para aplicar el cambio desde el prompt rommon.

rommon 2 > sync rommon 3 > reset Resetting ....... Initializing Hardware ... System integrity status: 90170200 12030107 System Bootstrap, Version 16.10(2r), RELEASE SOFTWARE Copyright (c) 1994-2018 by cisco Systems, Inc. Current image running: Boot ROM0 Last reset cause: LocalSoft C9800-40-K9 platform with 33554432 Kbytes of main memory File size is 0x000015c9 Located packages.conf Image size 5577 inode num 874834, bks cnt 2 blk size 8*512 # File size is 0x01d191f3 Located C9800-rpboot.16.10.01.SPA.pkg Image size 30511603 inode num 874837, bks cnt 7450 blk size 8*512 ################################################################################ ################################################################################ ################################################################################ ########################################################## Boot image size = 30511603 (0x1d191f3) bytes ROM:RSA Self Test Passed ROM:Sha512 Self Test Passed Package header rev 3 structure detected Calculating SHA-1 hash...done validate_package_cs: SHA-1 hash: calculated e36f46af:2c06b38d:eeb6e65b:ffaeb429:a6982d29 expected e36f46af:2c06b38d:eeb6e65b:ffaeb429:a6982d29 Validating main package signatures RSA Signed RELEASE Image Signature Verification Successful. Image validated Jun 21 02:30:21.565: %PMAN-3-PROC_EMPTY_EXEC_FILE: R0/0: pvp: Empty executable u sed for process bt_logger Jun 21 02:30:24.561: %PMAN-3-PROC_EMPTY_EXEC_FILE: R0/0: pvp: Empty executable u sed for process bt_logger Both links down, not waiting for other chassis Chassis number is 1 Jun 21 02:30:25.327: %PMAN-3-PROC_EMPTY_EXEC_FILE: R0/0: pvp: Empty executable u sed for process bt_logger Jun 21 02:30:27.293: %PMAN-3-PROC_EMPTY_EXEC_FILE: R0/0: pvp: Empty executable u sed for process bt_logger Jun 21 02:30:33.770: %PMAN-3-PROC_EMPTY_EXEC_FILE: R0/0: pvp: Empty executable u sed for process bt_logger Jun 21 02:30:37.045: %PMAN-3-PROC_EMPTY_EXEC_FILE: R0/0: pvp: Empty executable u sed for process bt_logger Restricted Rights Legend Use, duplication, or disclosure by the Government is subject to restrictions as set forth in subparagraph (c) of the Commercial Computer Software - Restricted Rights clause at FAR sec. 52.227-19 and subparagraph (c) (1) (ii) of the Rights in Technical Data and Computer Software clause at DFARS sec. 252.227-7013. Cisco Systems, Inc. 170 West Tasman Drive San Jose, California 95134-1706 Cisco IOS Software [Gibraltar], C9800 Software (C9800_IOS XE), Version 16.10.1, R ELEASE SOFTWARE (fc4) Technical Support: http://www.cisco.com/techsupport Copyright (c) 1986-2018 by Cisco Systems, Inc. Compiled Mon 19-Nov-18 08:27 by mcpre PLEASE READ THE FOLLOWING TERMS CAREFULLY. INSTALLING THE LICENSE OR LICENSE KEY PROVIDED FOR ANY CISCO SOFTWARE PRODUCT, PRODUCT FEATURE, AND/OR SUBSEQUENTLY PROVIDED SOFTWARE FEATURES (COLLECTIVELY, THE "SOFTWARE"), AND/OR WITH SUCH SOFTWARE CONSTITUTES YOUR FULL ACCEPTANCE OF THE FOLLOWING TERMS. YOU MUST NOT PROCEED FURTHER IF YOU ARE NOT WILLING TO BE BOUND BY ALL THE TERMS SET FORTH HEREIN. Your use of the Software is subject to the Cisco End User License Agreement (EULA) and any relevant supplemental terms (SEULA) found at http://www.cisco.com/c/en/us/about/legal/cloud-and-software/software-terms.html. You hereby acknowledge and agree that certain Software and/or features are licensed for a particular term, that the license to such Software and/or features is valid only for the applicable term and that such Software and/or features may be shut down or otherwise terminated by Cisco after expiration of the applicable license term (for example, 90-day trial period). Cisco reserves the right to terminate any such Software feature electronically or by any other means available. While Cisco may provide alerts, it is your sole responsibility to monitor your usage of any such term Software feature to ensure that your systems and networks are prepared for a shutdown of the Software feature. cisco C9800-40-K9 (1GL) processor (revision 1GL) with 7866660K/6147K bytes of me mory. FIPS: Flash Key Check : Key Not Found, FIPS Mode Not Enabled Processor board ID TTM22500DAL 1 Virtual Ethernet interface 4 Ten Gigabit Ethernet interfaces 32768K bytes of non-volatile configuration memory. 33554432K bytes of physical memory. 26255359K bytes of eUSB flash at bootflash:. 234365527K bytes of SATA hard disk at hard disk:. 0K bytes of WebUI ODM Files at webui:. Base Ethernet MAC Address : D4:C9:3C:CC:F2:E0 Installation mode is INSTALL Press RETURN to get started! *Jun 21 02:31:00.165: %IOS XE_PLATFORM-3-WDC_NOT_FOUND: WDC returned length: 0 *Jun 21 02:31:00.185: %SMART_LIC-6-EXPORT_CONTROLLED: Usage of export controlled features is not allowedAdding registry invocations for the WLC platform *Jun 21 02:31:01.743: %SMART_LIC-6-AGENT_READY: Smart Agent for Licensing is ini tialized *Jun 21 02:31:01.743: %SMART_LIC-6-AGENT_ENABLED: Smart Agent for Licensing is e nabled *Jun 21 02:31:01.743: %SMART_LIC-6-EXPORT_CONTROLLED: Usage of export controlled features is not allowed *Jun 21 02:31:04.732: mcp_pm_subsys_init : Init done sucessfullyRA Tracing tool registry return: 0SID Manager, starting initialization ... *Jun 21 02:31:05.511: Notifications initializedSID Manager, completed initializa tion ... *Jun 21 02:31:07.298: %SPANTREE-5-EXTENDED_SYSID: Extended SysId enabled for typ e vlan *Jun 21 02:31:08.999: %CRYPTO-4-AUDITWARN: Encryption audit check could not be p erformed *Jun 21 02:31:09.081: %VOICE_HA-7-STATUS: CUBE HA-supported platform detected. *Jun 21 02:31:09.317: %IOSXE_VMAN-3-MSGINITFAIL: Failed to initialize required V irt-manager resource: Initalize MQIPC *Jun 21 02:31:09.333: mcp_pm_init_done : Called *Jun 21 02:31:09.338: %LINK-3-UPDOWN: Interface Lsmpi0, changed state to up *Jun 21 02:31:09.345: %LINK-3-UPDOWN: Interface EOBC0, changed state to up *Jun 21 02:31:09.345: %LINEPROTO-5-UPDOWN: Line protocol on Interface VoIP-Null0 , changed state to up *Jun 21 02:31:09.346: %LINEPROTO-5-UPDOWN: Line protocol on Interface LI-Null0, changed state to up *Jun 21 02:31:09.346: %LINK-3-UPDOWN: Interface GigabitEthernet0, changed state to down *Jun 21 02:31:09.351: %LINK-3-UPDOWN: Interface LIIN0, changed state to up *Jun 21 02:30:33.738: %PMAN-3-PROC_EMPTY_EXEC_FILE: Chassis 1 R0/0: pvp: Empty e xecutable used for process bt_logger *Jun 21 02:30:37.011: %PMAN-3-PROC_EMPTY_EXEC_FILE: Chassis 1 R0/0: pvp: Empty e xecutable used for process bt_logger *Jun 21 02:30:39.576: %CMFP-6-CRYPTO_MODULE: Chassis 1 R0/0: cman_fp: Crypto Har dware Module is present *Jun 21 02:31:01.754: %LMRP-3-RTU_UNINITIALIZED: Chassis 1 R0/0: lman: RTU not y et initialized: stack enabled 0 *Jun 21 02:31:09.489: %SMART_LIC-6-HA_ROLE_CHANGED: Smart Agent HA role changed to Active. *Jun 21 02:31:10.295: %IOSXE_MGMTVRF-6-CREATE_SUCCESS_INFO: Management vrf Mgmt- intf created with ID 1, ipv4 table-id 0x1, ipv6 table-id 0x1E000001 *Jun 21 02:31:10.344: %LINEPROTO-5-UPDOWN: Line protocol on Interface Vlan1, cha nged state to down *Jun 21 02:31:10.345: %LINEPROTO-5-UPDOWN: Line protocol on Interface Lsmpi0, ch anged state to up *Jun 21 02:31:10.394: %LINEPROTO-5-UPDOWN: Line protocol on Interface EOBC0, cha nged state to up *Jun 21 02:31:10.394: %LINEPROTO-5-UPDOWN: Line protocol on Interface GigabitEth ernet0, changed state to down *Jun 21 02:31:10.394: %LINEPROTO-5-UPDOWN: Line protocol on Interface LIIN0, cha nged state to up *Jun 21 02:31:10.966: %ONEP_BASE-6-SS_ENABLED: ONEP: Service set Base was enable d by Default *Jun 21 02:31:12.842: %SYS-6-STARTUP_CONFIG_IGNORED: System startup configuratio n is ignored based on the configuration register setting. *Jun 21 02:31:12.854: %IOSXE_OIR-6-REMSPA: SPA removed from subslot 0/0, interfa ces disabled *Jun 21 02:31:12.913: %SPA_OIR-6-OFFLINECARD: SPA (BUILT-IN-4X10G/1G) offline in subslot 0/0 *Jun 21 02:31:12.919: %IOSXE_OIR-6-INSCARD: Card (fp) inserted in slot F0 *Jun 21 02:31:12.920: %IOSXE_OIR-6-ONLINECARD: Card (fp) online in slot F0 *Jun 21 02:31:12.946: %IOSXE_OIR-6-INSCARD: Card (cc) inserted in slot 0 *Jun 21 02:31:12.946: %IOSXE_OIR-6-ONLINECARD: Card (cc) online in slot 0 *Jun 21 02:31:13.111: % Redundancy mode change to SSO *Jun 21 02:31:13.112: %VOICE_HA-7-STATUS: NONE->SSO; SSO mode can not take effe ct until after a platform reload. *Jun 21 02:31:13.231: %IOSXE_OIR-6-INSSPA: SPA inserted in subslot 0/0 *Jun 21 02:31:14.793: %SYS-5-RESTART: System restarted -- Cisco IOS Software [Gibraltar], C9800 Software (C9800_IOSXE), Version 16.10.1, R ELEASE SOFTWARE (fc4) Technical Support: http://www.cisco.com/techsupport Copyright (c) 1986-2018 by Cisco Systems, Inc. Compiled Mon 19-Nov-18 08:27 by mcpre *Jun 21 02:31:14.834: %CRYPTO-6-ISAKMP_ON_OFF: ISAKMP is OFF *Jun 21 02:31:14.834: %CRYPTO-6-GDOI_ON_OFF: GDOI is OFF *Jun 21 02:31:16.976: %LINK-3-UPDOWN: Interface GigabitEthernet0, changed state to up *Jun 21 02:31:17.079: %SYS-6-BOOTTIME: Time taken to reboot after reload = 325 seconds *Jun 21 02:31:17.977: %LINEPROTO-5-UPDOWN: Line protocol on Interface GigabitEth ernet0, changed state to up *Jun 21 02:31:21.579: %SPA_OIR-6-ONLINECARD: SPA (BUILT-IN-4X10G/1G) online in s ubslot 0/0 *Jun 21 02:31:21.638: %IOSXE_SPA-6-UPDOWN: Interface TenGigabitEthernet0/0/0, li nk down due to remote fault *Jun 21 02:31:21.708: %IOSXE_SPA-6-UPDOWN: Interface TenGigabitEthernet0/0/1, li nk down due to local fault *Jun 21 02:31:21.748: %IOSXE_SPA-6-UPDOWN: Interface TenGigabitEthernet0/0/2, li nk down due to local fault *Jun 21 02:31:21.788: %IOSXE_SPA-6-UPDOWN: Interface TenGigabitEthernet0/0/3, li nk down due to local fault *Jun 21 02:31:21.855: %PNP-6-PNP_DISCOVERY_STOPPED: PnP Discovery stopped (Start up Config Present) *Jun 21 02:31:23.541: %LINK-3-UPDOWN: Interface TenGigabitEthernet0/0/0, changed state to down *Jun 21 02:31:23.571: %LINK-3-UPDOWN: Interface TenGigabitEthernet0/0/1, changed state to down *Jun 21 02:31:23.572: %LINK-3-UPDOWN: Interface TenGigabitEthernet0/0/2, changed state to down *Jun 21 02:31:23.575: %LINK-3-UPDOWN: Interface TenGigabitEthernet0/0/3, changed state to down *Jun 21 02:31:24.680: %IOSXE_SPA-6-UPDOWN: Interface TenGigabitEthernet0/0/0, li nk down due to local fault *Jun 21 02:31:23.618: %LINK-3-UPDOWN: SIP0/0: Interface TenGigabitEthernet0/0/0, changed state to down *Jun 21 02:31:29.036: %PKI-2-NON_AUTHORITATIVE_CLOCK: PKI functions can not be i nitialized until an authoritative time source, like NTP, can be obtained. *Jun 21 02:31:29.491: %LINK-3-UPDOWN: Interface TenGigabitEthernet0/0/0, changed state to up *Jun 21 02:31:30.492: %LINEPROTO-5-UPDOWN: Line protocol on Interface TenGigabit Ethernet0/0/0, changed state to up *Jun 21 02:31:29.491: %LINK-3-UPDOWN: SIP0/0: Interface TenGigabitEthernet0/0/0, changed state to up *Jun 21 02:31:30.495: %LINEPROTO-5-UPDOWN: Line protocol on Interface Vlan1, cha nged state to up *Jun 21 02:31:37.119: %CRYPTO_ENGINE-5-KEY_ADDITION: A key named CISCO_IDEVID_SU DI_LEGACY has been generated or imported by pki-sudi *Jun 21 02:31:39.050: %CRYPTO_ENGINE-5-KEY_ADDITION: A key named CISCO_IDEVID_SU DI has been generated or imported by pki-sudi

Paso 4. Ahora el sistema arranca sin ninguna configuración. Omitir asistente para configuración de inicio.

Paso 5. Una vez que el sistema se active, copie startup-config a running-config.

Paso 6. Vuelva a configurar la contraseña de activación o las credenciales de inicio de sesión y compruebe si puede acceder al dispositivo a través de telnet o ssh.

C9800-40#telnet 172.22.175.1 Trying 172.22.175.1 ... Open User Access Verification Username: admin Password: C9800-40#

Paso 7. Vuelva a cambiar config-register a 0x2002.

C9800-40(config)#config-register 0x2002

Nota: No utilice 0x2102. Con 0x2102, ya no se le permite enviar interrupciones.

Paso 8. Guarde la configuración.

C9800-40#write memory Building configuration... [OK]

Procedimiento de recuperación de contraseña para el dispositivo mediante USB

Arranque el WLC desde ROMMON

Si se atasca en ROMMON y el arranque no funciona:

rommon 12 > boot File size is 0x0001dfe6 Located memleak.tcl Image size 122854 inode num 12, bks cnt 30 blk size 8*512 ## Boot image size = 122854 (0x1dfe6) bytes Unsigned package found, aborting package loading... Failed to Free memory block at address 0x00000000cd50b000 File size is 0x00000023 Located pnp-tech-time Image size 35 inode num 13, bks cnt 1 blk size 8*512 Boot image size = 35 (0x23) bytes Unsigned package found, aborting package loading... Failed to Free memory block at address 0x00000000cd4d3000 File size is 0x0001ad3f Located pnp-tech-discovery-summary Image size 109887 inode num 14, bks cnt 27 blk size 8*512 # Boot image size = 109887 (0x1ad3f) bytes Unsigned package found, aborting package loading... Failed to Free memory block at address 0x00000000cd49b000 File size is 0x00000268 Located vlan.dat Image size 616 inode num 15, bks cnt 1 blk size 8*512 Boot image size = 616 (0x268) bytes Unsigned package found, aborting package loading... Failed to Free memory block at address 0x00000000cd463000 boot: cannot determine first file name on device "bootflash:/" rommon 13 >

La memoria flash no tiene ninguna imagen desde la que arrancar:

rommon 13 > dir bootflash: File System: EXT2/EXT3 11 16384 drwx------ lost+found 850305 4096 drwxr-xr-x .installer 588673 4096 drwxrwxrwx .prst_sync 948417 4096 drwxr-xr-x .rollback_timer 1381745 4096 drwxr-xr-x dc_profile_dir 12 122854 -rw-r--r-- memleak.tcl 506913 4096 drwxr-x--- vman_fdb 670433 4096 drwxr-xr-x .dbpersist 793073 4096 drwxr-xr-x onep 13 35 -rw-r--r-- pnp-tech-time 14 109887 -rw-r--r-- pnp-tech-discovery-summary 15 616 -rw-r--r-- vlan.dat

Puede recuperar la caja mediante:

- Carga de una imagen a través de una unidad de lápiz USB.

- Carga de una imagen a través de Gigabit0 (interfaz de administración fuera de banda).

Cargar imagen a través de USB

Paso 1. Tenga una memoria USB con el archivo .bin para cargarla en el controlador 9800. (en 9800-80, debido al ID de bug de Cisco CSCvn82287, una unidad flash USB 3.0 no se puede reconocer en ROMMON).

Nota: El procedimiento es el mismo en el caso de un 9800-CL virtual, pero debe conectar la unidad USB en el host de VM y asignarla a la VM.

Paso 2. Conecte el controlador USB al puerto USB 0 del 9800.

Vista frontal:

Paso 3. Inicie sesión desde la consola en el controlador y asegúrese de que puede leer el USB.

rommon 19 > dir usb0: File System: FAT32 ! !--Output omitted-- ! 335644 1009389904-rw- <filename>SSA.bin

Paso 4. Configure el 9800 para arrancar desde la imagen USB.

rommon 21 > boot usb0:<filename>.bin Located qwlc-universalk9_wlc.BLD_V169_THROTTLE_LATEST_20180601_191011.SSA.bin, start cluster is 335644 ########################################################################################################

########################################################################################################

########################################################################################################

Paso 5. Una vez que el 9800 se ejecute, copie la imagen del USB a la memoria de inicialización:

WLC# copy usb0:<filename>.bin bootflash:

Destination filename [qwlc-universalk9_wlc.BLD_V169_THROTTLE_LATEST_20180601_191011.SSA.bin]?

Copy in progress...CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

Paso 6. Cambie el 9800 del modo de agrupamiento al modo de instalación.

Cuando inicia el controlador desde un USB, se inicia en el modo Bundle:

! !--Output omitted-- ! FIPS: Flash Key Check : Key Not Found, FIPS Mode Not Enabled Processor board ID TTM22071510 1 Virtual Ethernet interface 4 Ten Gigabit Ethernet interfaces 32768K bytes of non-volatile configuration memory. 33554432K bytes of physical memory. 26910719K bytes of eUSB flash at bootflash:. 234365527K bytes of SATA hard disk at hard disk:. 15243680K bytes of USB flash at usb0:. 0K bytes of WebUI ODM Files at webui:. Base Ethernet MAC Address : 00:A3:8E:23:A2:40 Installation mode is BUNDLE %INIT: waited 0 seconds for NVRAM to be available

Desde la versión 16.12, en la interfaz de usuario, puede optar por pasar al modo INSTALL en la siguiente actualización. Proporcione cualquier archivo de software, que incluya la versión actual para pasar al modo INSTALAR.

Paso 7. Edite la variable de arranque si no apunta ya hacia un archivo packages.conf.

WLC#configure terminal Enter configuration commands, one per line. End with CNTL/Z. WLC(config)#no boot system  WLC(config)#boot system bootflash:packages.conf WLC(config)#end WLC#write Building configuration... [OK] WLC#show boot BOOT variable = flash:packages.conf,12; CONFIG_FILE variable does not exist BOOTLDR variable does not exist Configuration register is 0x2102 Standby not ready to show bootvar

Asegúrese de que el registro de configuración sea 0x2002.

Paso 8. Recargue el WLC:

WLC#reload

Después de esto, el controlador arranca en el modo de instalación.

WLC#show version

! !--Output omitted-- !

Installation mode is INSTALL Configuration register is 0x2002

Cargar una imagen desde TFTP

Para cargar una imagen desde la red, debe tener el puerto de administración GigabitEthernet0 conectado físicamente a un puerto de acceso.

Desde ROMMON, puede verificar las variables en cualquier momento con el comando set.

rommon 1 > set PS1=rommon ! > ?=0 DEFAULT_GATEWAY=10.1.1.1 ETHER_SPEED_MODE=4 TFTP_RETRY_COUNT=36 SWITCH_NUMBER=1 DLC_DONE=TRUE RET_2_RTS= RET_2_RCALTS= MCP_STARTUP_TRACEFLAGS=00000000:00000000 TFTP_MACADDR=00:db:ad:ba:d0:52 IP_SUBNET_MASK=255.255.255.0 IP_ADDRESS=10.1.1.152 TFTP_SERVER=10.1.1.1 TFTP_FILE=C9800-80-universalk9_wlc.BLD_V1610_1_THROTTLE_LATEST_20181016_174328_2.bin BSI=0 RANDOM_NUM=1650632109

A continuación, puede establecer las variables una por una. No hay necesidad de escribir set antes del nombre de variable como lo hace para otros dispositivos ROMMON. Evite los errores tipográficos al escribir el nombre de la variable, ya que no se comprobará ningún tipo de ordenación.

rommon 2 > IP_ADDRESS=10.48.71.113 rommon 3 > IP_SUBNET_MASK=255.255.255.128 rommon 4 > DEFAULT_GATEWAY=10.48.71.5

Una vez que los parámetros de IP están en su lugar, puede iniciar desde una imagen TFTP con el siguiente comando:

rommon 5 > boot tftp://10.48.39.33/C9800-80-universalk9_wlc.16.10.01.SPA.bin IP_ADDRESS: 10.48.71.113 IP_SUBNET_MASK: 255.255.255.128 DEFAULT_GATEWAY: 10.48.71.5 TFTP_SERVER: 10.48.39.33 TFTP_FILE: C9800-80-universalk9_wlc.16.10.01.SPA.bin TFTP_MACADDR: 70:6d:15:35:99:ff TFTP_VERBOSE: Progress TFTP_RETRY_COUNT: 36 TFTP_TIMEOUT: 7200 TFTP_BLKSIZE: 1460 TFTP_CHECKSUM: Yes ETHER_PORT: 3 ETHER_SPEED_MODE: 1000MB/HD link up Receiving C9800-80-universalk9_wlc.16.10.01.SPA.bin from 10.48.39.33

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

Usted termina en la línea de comandos de Cisco IOS. No olvide copiar realmente la imagen del IOS de Cisco en la memoria flash o el disco duro y establecer la variable de inicio correctamente. Puede reanudar el procedimiento desde el USB, anterior al paso 6, una vez que el archivo se ha copiado en la memoria flash o el disco duro:

Troubleshoot

Si sigue viendo el rommon diciéndole "Por favor reinicie antes de arrancar" cuando intenta arrancar desde un archivo en la memoria, USB o TFTP como este :

rommon 4 > boot bootflash:C9800-L-universalk9_wlc.V176_1.SPA.bin Please reset before booting

Todo lo que tiene que hacer es anular el registro de configuración y restablecer. El problema desaparece después de reiniciar y puede arrancar desde cualquier origen.

confreg 0x0 reset

Otros comandos útiles de ROMMON

El dev comando enumera los dispositivos de almacenamiento disponibles (bootflash, harddisk, usb, etc.).

El comando showmon muestra la versión de ROMMON.

Información Relacionada

- Soporte técnico y descargas de Cisco