Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Convenciones

Antecedentes

Configurar

Diagrama de la red

Configuraciones

Verificación

Información Relacionada

Introducción

Este documento proporciona una configuración y verificación de ejemplo de las funciones de Cisco EnergyWise en los switches Catalyst serie 3750. Específicamente, este documento muestra cómo configurar las funciones de Cisco EnergyWise en un switch Catalyst 3750.

Prerequisites

Requirements

Asegúrese de cumplir estos requisitos antes de realizar esta configuración:

- Conozca la configuración básica de los switches Catalyst de Cisco serie 3750

- Comprender de forma básica las funciones de Cisco EnergyWise

Componentes Utilizados

La información de este documento se basa en los switches Catalyst de Cisco serie 3750.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Convenciones

Consulte Convenciones de Consejos Técnicos de Cisco para obtener más información sobre las convenciones sobre documentos.

Antecedentes

Cisco EnergyWise es una función de gestión energética que permite supervisar y controlar la energía en toda la infraestructura de TI. Cisco EnergyWise proporciona un marco mediante el cual se puede utilizar la propia red para abrir la administración de energía a todos los tipos de dispositivos.

Un dominio Cisco EnergyWise es una agrupación administrativa de dispositivos con el fin de supervisar y controlar la energía. Los terminales de Cisco EnergyWise que admiten el cliente de EnergyWise SDK responden a las consultas de EnergyWise iniciadas desde aplicaciones de gestión u otros miembros de dominio mediante el protocolo Cisco EnergyWise.

Configurar

En esta sección, se le presenta la información necesaria para configurar las funciones de Cisco EnergyWise descritas en este documento.

Nota: Use el Command Lookup Tool (únicamente clientes registrados) para obtener más información sobre los comandos que se utilizan en esta sección.

Diagrama de la red

En este documento, se utiliza esta configuración de red:

Configuraciones

En este documento, se utilizan estas configuraciones:

Catalyst 3750 Switch

configure terminal

!--- Enable Cisco EnergyWise on supported platforms.

Switch(config)#energywise domain Cisco security shared-secret 0 cisco protocol

udp port 43440 ip 10.78.4.48

!--- Set the EnergyWise importance for the platform.

Switch(config)#energywise importance 80

!--- Set the EnergyWise keywords for the platform.

Switch(config)#energywise keywords lab1,lab2

Switch(config)#service password-encryption

!--- Enable communication between management applications which support EnergyWise protocol and domain.

Switch(config)#energywise management security shared-secret 7 070C285F4D06 port 60500

!--- Set the EnergyWise name for the platform.

Switch(config)#energywise name floor.lab

!--- Configure a static neighbor.

Switch(config)#energywise neighbor 2.2.4.31 43440

!--- Set the EnergyWise role for the platform.

Switch(config)#energywise role access4lab1

Switch(config)#energywise allow query save

!--- Configure Cisco EnergyWise on a port.

Switch(config)#time-range onlabfloor

Switch(config-time-range)#absolute start 00:00 01 January 2012 end 23:59 01 Jan 2012

Switch(config-time-range)#periodic weekdays 7:00 to 19:00

Switch(config-time-range)#periodic weekend 10:00 to 17:00

Switch(config)#time-range offlabfloor

Switch(config-time-range)#absolute start 00:00 01 January 2012 end 23:59 01 Jan 2012

Switch(config-time-range)#periodic weekdays 00:00 to 08:00

Switch(config-time-range)#periodic weekdays 20:00 to 23:59

Switch(config-time-range)#periodic weekend 00:00 to 10:00

Switch(config-time-range)#periodic weekend 17:00 to 23:59

Switch(config)#interface fastEthernet 1/0/3

!--- Configure a recurring event on the interface.

Switch(config-if)#energywise level 10 recurrence importance 80 time-range onlabfloor

Switch(config-if)#energywise level 0 recurrence importance 80 time-range offlabfloor

Switch(config-if)#energywise name IP_phone

Switch(config-if)#energywise role manager

Switch(config-if)#end

!--- Save the configurations in the device.

switch(config)#copy running-config startup-config

Switch(config)#exit

Verificación

Use esta sección para confirmar que su configuración funciona correctamente.

La herramienta Output Interpreter Tool (clientes registrados solamente) (OIT) soporta ciertos comandos show. Utilice la OIT para ver un análisis del resultado del comando show.

Utilice el comando show energywise para mostrar la configuración y el estado de EnergyWise.

Por ejemplo:

Switch#show energywise

Module/

Interface   Role              Name                  Usage      Lvl   Imp  Type

---------   ----              ----                  -----      ---   ---  ----

access4lab1       Switch                45.0  (W)  10    80   parent

Utilice el comando show energywise children para mostrar el estado del punto final conectado.

Por ejemplo:

Switch#show energywise children

Module/

Interface   Role              Name                  Usage      Lvl   Imp  Type

---------   ----              ----                  -----      ---   ---  ----

access4lab1       Switch                45.0  (W)  10    80   parent

Fa1/0/3     IP Phone 7975     SEP0022905B90D4       12.0  (W)  10    1    PoE

Total Displayed: 2      Usage: 143.3

Utilice el comando show energywise children provisioned para mostrar un resumen de la información de EnergyWise para el switch y los terminales conectados.

Por ejemplo:

Switch#show energywise children provisioned

Module/

Interface   Role              Name                  Usage      Lvl   Imp  Type

---------   ----              ----                  -----      ---   ---  ----

access4lab1       Switch                45.0  (W)  10    80   parent

Fa1/0/1     interface         Fa0.5                 0.0   (W)  10    1    PoE

Fa1/0/2     interface         Fa0.5                 0.0   (W)  10    1    PoE

Fa1/0/3     IP Phone 7975     SEP0022905B90D4       12.0  (W)  10    1    PoE

Fa1/0/4     interface         Fa0.5                 0.0   (W)  10    1    PoE

<output truncated>

Total Displayed: 24     Usage: 139.9

Utilice el comando show energywise domain para mostrar la información del dominio EnergyWise.

Por ejemplo:

Switch#show energywise domain

Name      : Switch

Domain    : Cisco

Protocol  : udp

IP        : 10.78.4.48

Port      : 43440

Utilice el comando show energywise usage children para mostrar la potencia real para el miembro del dominio y los terminales conectados.

Por ejemplo:

Switch#show energywise usage children

Interface   Name                     Usage      Caliber

---------   ----                     _____      _____

Switch                   45.0  (W)   max

Fa1/0/1     Fa1.0.1                  0.0   (W)   presumed

Fa1/0/2     Fa1.0.2                  0.0   (W)   presumed

Fa1/0/3     SEP0022905B90D4          12.0  (W)   trusted

Fa1/0/2     Fa1.0.4                  0.0   (W)   presumed

<output truncated>

Total Displayed: 24     Usage: 139.9

Utilice el comando show energywise neighbors para mostrar la tabla de vecinos para el switch.

Por ejemplo:

Switch#show energywise neighbors

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater, P - Phone, U - Unknown

Id   Neighbor Name                 Ip:Port                 Prot   Capability

--   -------------                 -------                 ----   ----------

1                                  10.78.4.49:43440        static U

2    IP_phone A                    10.78.4.50:43440        udp    U

3    3560e-37-222                  20.1.2.222:6767         cdp    S I

Utilice el comando show energywise level current para mostrar los niveles de energía reales para el miembro del dominio. Cuando se utiliza el comando de configuración global energywise level level recurrence resonenceimportante time-range time-range-name, el resultado de show energywise level current se muestra en el siguiente ejemplo.

Por ejemplo:

Switch#show energywise level current

Interface   Name                     Level  Value

---------   ----                     -----  -----

Switch                   10     45.0  (W)

Utilice el comando show energywise recurrences para mostrar la configuración y el estado de EnergyWise para el evento recurrente.

Por ejemplo:

Switch#show energywise recurrences

Id     Addr       Class Action Lvl Cron/Time-range

--     ----       ----- ------ --- ---------------

1      Fa2/0/3    QUERY SET    10  onlabfloor

2      Fa2/0/3    QUERY SET     0  offlabfloor

Utilice el comando show energywise statistics para mostrar los contadores de eventos y errores.

Por ejemplo:

Switch#show energywise statistics

Children:  2  Errors:  0  Drops:  31  Events:  102

Información Relacionada

- Página de soporte de switches Catalyst de Cisco serie 3750

- Soporte de Productos de Switches

- Soporte de Tecnología de LAN Switching

- Soporte Técnico y Documentación - Cisco Systems