Contenido

Introducción

Antes de comenzar

Convenciones

Prerequisites

Componentes Utilizados

Teoría Precedente

Configurar

Creación de un canal de puerto

Diagrama de la red

Configuraciones

Verificación

Comandos show para Catalyst 2950

Comandos show para Catalyst 2948G-L3

Troubleshoot

Información Relacionada

Introducción

Este documento describe la configuración de un EtherChannel y un trunking 802.1Q entre switches Catalyst 2950 y Catalyst 2948G-L3. EtherChannel puede llamarse Fast EtherChannel (FEC) o Gigabit EtherChannel (GEC), según la velocidad de las interfaces o los puertos utilizados para formar el EtherChannel.

Nota: El switch Catalyst 2950 sólo admite enlaces troncales 802.1Q y no admite enlaces troncales de protocolo de enlace entre switches (ISL). Los switches Catalyst 2948G-L3 y Catalyst 4908G-L3 comparten la misma imagen de software, por lo que la configuración Catalyst 2948G-L3 utilizada en este documento también se aplica al switch Catalyst 4908G-L3.

En este ejemplo de configuración, dos interfaces Fast Ethernet en un switch Catalyst 2950 se agrupan en un FEC con dos interfaces Fast Ethernet de un switch Catalyst 2948G-L3. FEC, GEC, canal de puerto y grupo de canal se refieren a EtherChannel en este documento.

Antes de comenzar

Convenciones

Para obtener más información sobre las convenciones del documento, consulte Convenciones de Consejos Técnicos de Cisco.

Prerequisites

Este documento describe la configuración de ejemplo de los switches y el resultado de los comandos show relacionados. Para obtener detalles y advertencias o pautas específicas sobre switches individuales, consulte los siguientes documentos:

- Switch Catalyst 2950 Configuración de EtherChannel

- Configuración de troncales VLAN del switch Catalyst 2950

- Switch Catalyst 2948G-L3 Configuración de EtherChannel

- Switch Catalyst 2948G-L3 Configuración de la Encapsulación VLAN

Componentes Utilizados

La información que contiene este documento se basa en las versiones de software y hardware indicadas a continuación.

- Switch Catalyst 2948G-L3 que ejecuta el software Cisco IOS® 12.0(14)W5(20)

- Switch Catalyst 2950 que ejecuta Cisco IOS Software 12.1(12c)EA1

La información que se presenta en este documento se originó a partir de dispositivos dentro de un ambiente de laboratorio específico. All of the devices used in this document started with a cleared (default) configuration. Si la red está funcionando, asegúrese de haber comprendido el impacto que puede tener un comando antes de ejecutarlo.

Teoría Precedente

Desde el punto de vista de la configuración, el switch Catalyst 2948G-L3 es un router. Utiliza una línea de comandos de Cisco IOS y, de forma predeterminada, todas las interfaces son interfaces enrutadas.

El switch Catalyst 2948G-L3 no amplía las VLAN de forma predeterminada. Dado que todas las interfaces son interfaces enrutadas, cada interfaz debe pertenecer a una red o subred diferente. Si desea que dos o más interfaces pertenezcan a la misma subred, el puente debe configurarse en estas interfaces.

El switch Catalyst 2948G-L3 no admite los protocolos de negociación que se encuentran en otros switches Catalyst, como el protocolo de enlace troncal VLAN (VTP), el protocolo de enlace troncal dinámico (DTP) y el protocolo de agresión de puertos (PAgP). Se recomienda desactivar estos protocolos en las interfaces Catalyst 2950 que se conectan al switch Catalyst 2948G-L3.

En el switch Catalyst 2948G-L3, todo el tráfico recibido en la VLAN nativa en un trunk se rutea en software. Esto significa que este tráfico se envía a la CPU. Cuando se envía una gran cantidad de tráfico en esta VLAN, puede resultar en una carga de CPU alta en el switch Catalyst 2948G-L3 y tener un efecto adverso en el rendimiento de la red. Se recomienda crear una VLAN ficticia (como VLAN 99) que pueda convertirse en la VLAN nativa para el tronco. Todo el tráfico del usuario se envía a través de las otras VLAN y éstas se enrutan en hardware, lo que se traduce en un mejor rendimiento.

Configurar

En esta sección encontrará la información para configurar las funciones descritas en este documento.

Nota: Para encontrar información adicional sobre los comandos usados en este documento, utilice la Command Lookup Tool (sólo clientes registrados) .

Creación de un canal de puerto

Al configurar el EtherChannel, se recomienda crear un canal de puerto siguiendo los pasos a continuación. Esto evitará posibles problemas con Spanning Tree Protocol (STP) (protocolo de árbol de expansión) durante el proceso de configuración. Un loop STP puede ocurrir si un lado se configura como canal antes de que el otro lado se configure como canal. Como resultado, el switch puede poner las interfaces involucradas en el loop en el estado Errordisabled.Los siguientes pasos son pautas para este escenario de configuración específico.

En el switch Catalyst 2948G-L3:

1. Configure las interfaces que se utilizarán en la canalización de puertos en el modo apagado administrativo.

2. Cree el canal de puerto (grupo de canales). El canal de puerto transporta diferentes VLAN, así que cree una subinterfaz para cada VLAN que esté presente en el trunk. En un tronco 802.1Q, todos los paquetes que pasan por el tronco están etiquetados excepto el tráfico en la VLAN nativa. Debido a esto, debe distinguir la subinterfaz correspondiente a la VLAN nativa poniendo la palabra clave "native" al final. Como se mencionó anteriormente, es mejor utilizar una VLAN ficticia que no tenga tráfico de usuario.

3. El switch Catalyst 2948G-L3 tiene de forma predeterminada todos los puertos enrutados. Para que los puertos en 2948G-L3 puedan comunicarse en diferentes VLAN en el 2950, debe implementar el bridging. Las interfaces (y subinterfaces) que pertenecen a la misma VLAN (red o subred) deben configurarse para que pertenezcan al mismo grupo de puente. Para enrutar entre estos diferentes grupos de puentes, se debe habilitar el routing y el puente integrados (IRB).

En el switch Catalyst 2950:

1. Configure las interfaces que pertenecerán al canal como tronco y asegúrese de que el DTP esté apagado. Esto se hace ejecutando el comando switchport nonegotiate en las interfaces físicas. Configure una VLAN ficticia (VLAN 99 en este ejemplo) en la base de datos de VLAN que se utilizará como VLAN nativa en el trunk. A menos que se especifique lo contrario, la VLAN nativa en un troncal 802.1Q es VLAN 1. Debe especificar en ambas interfaces que está utilizando VLAN 99 como VLAN nativa. Esto se realiza ejecutando el comando switchport trunk native vlan 99.

2. Cree el canal de puerto y asegúrese de establecer el modo de canal en on (esto apaga el PAgP).

3. Vuelva a habilitar las interfaces que fueron desactivadas anteriormente en el switch Catalyst 2948G-L3 ejecutando el comando no shut.

Diagrama de la red

Este documento utiliza la instalación de red que se muestra en el siguiente diagrama.

Configuraciones

Este documento usa las configuraciones detalladas a continuación.

- Catalyst 2948G-L3

- Catalyst 2950

Catalyst 2948G-L3

2948G-L3#show run

!--- The following configuration shows how to configure Catalyst 2948G-L3 !--- for bridging and connect to a Catalyst 2950 with 802.1Q trunking !--- over EtherChannel. For configuring interVLAN-routing on Catalyst !--- 2948G-L3, refer to Catalyst 2948G-L3 Sample Configurations.

Building configuration...

Current configuration:

!

!

version 12.0

no service pad

service timestamps debug uptime

service timestamps log datetime

no service password-encryption

!

hostname 2948G-L3

!

!

ip subnet-zero

!

!--- Enable IRB when routing between different !--- bridge groups is needed.

bridge irb

!

!--- Configure a logical interface for the EtherChannel.

interface Port-channel1

no ip address

no ip directed-broadcast

hold-queue 300 in

!

!--- Create a subinterface for each VLAN on the port channel.

!

interface Port-channel1.1

!--- Specify the encapsulation and VLAN number.

encapsulation dot1Q 1

no ip redirects

no ip directed-broadcast

!--- Add the subinterface to the appropriate bridge group. !--- All the interfaces (and subinterfaces) that belong to the !--- same VLAN (network or subnet) should be configured to fall !--- in the same bridge group.

bridge-group 1

!

!--- Configure a subinterface for the second VLAN. !--- This procedure must be repeated for every VLAN.

!

interface Port-channel1.2

encapsulation dot1Q 2

no ip redirects

no ip directed-broadcast

bridge-group 2

!

!--- Configure a subinterface for the native VLAN.

!

interface Port-channel1.99

encapsulation dot1Q 99 native

no ip redirects

no ip directed-broadcast

!--- Note in this case you do not put any bridge group !--- statements under this subinterface. A dummy VLAN has been chosen !--- as the native VLAN on which you do not put any traffic, !--- so there is no need to have this routed.

!

interface FastEthernet1

no ip address

no ip directed-broadcast

!--- Configure the port to channel 1.

channel-group 1

!

interface FastEthernet2

no ip address

no ip directed-broadcast

!--- Configure the port to channel 1.

channel-group 1

!

interface FastEthernet3

no ip address

no ip directed-broadcast

!--- The device connected on this interface belongs !--- to the same subnet (VLAN 1) as subinterface 1 on !--- the port channel, so this interface has to be added to !--- bridge-group 1.

bridge-group 1

!

!--- If there are any other interfaces that belong to !--- the same VLAN (subnet), they all have to be added to !--- the respective bridge group.

( .... Output is suppressed)

!

!

! a routed interface for bridge-group 1

interface BVI1

ip address 1.1.1.1 255.255.255.0

no ip directed-broadcast

no ip route-cache cef

!

! a routed interface for bridge-group 2

interface BVI2

ip address 2.2.2.1 255.255.255.0

no ip directed-broadcast

no ip route-cache cef

!

ip classless

!

! bridge 1 protocol ieee command enables bridging using the IEEE 802.1d spanning-tree

bridge 1 protocol ieee

! The bridge 1 route ip command specifies that IP will be routed

bridge 1 route ip

! bridge 2 protocol ieee command enables bridging using the IEEE 802.1d spanning-tree

bridge 2 protocol ieee

! bridge 2 route ip command specifies that IP will be routed

bridge 2 route ip

!

line con 0

transport input none

line aux 0

line vty 0 4

login

!

end

Catalyst 2950

5-2950-24##show run

Building configuration...

Current configuration : 1986 bytes

!

version 12.1

no service single-slot-reload-enable

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 5-2950-24#

!

!

!

!--- VLAN 2 is created for this lab set up, !--- and VLAN 1 is created by default.

vlan 2

ip subnet-zero

!--- For information on VTP, refer to !--- Understanding and Configuring VLAN Trunk Protocol (VTP)

vtp domain cisco

vtp mode transparent

!

spanning-tree extend system-id

!

!--- A logical port-channel interface is automatically created !--- when ports are grouped into a channel group.

!

interface Port-channel1

!--- The switchport trunk native vlan 99 command is !--- issued on the Fast Ethernet interface.

switchport trunk native vlan 99

!--- The switchport mode trunk command is !--- issued on the Fast Ethernet interface.

switchport mode trunk

!-- The switchport nonegotiate command is !--- issued on the Fast Ethernet interface.

switchport nonegotiate

no ip address

flowcontrol send off

!

interface FastEthernet0/1

!--- Configure the port to be in trunking mode.

switchport mode trunk

!--- Configure a dummy VLAN as the native VLAN. !--- For this example, VLAN 99 is used.

switchport trunk native vlan 99

!--- Disable the DTP negotiation on this interface !--- (the Catalyst 2948G-L3 switch does not support these frames).

switchport nonegotiate

no ip address

!--- Configure the port to channel without PAgP.

channel-group 1 mode on

!

interface FastEthernet0/2

!--- Configure the port to be in trunking mode.

switchport mode trunk

!--- Configure a dummy VLAN as the native VLAN. !--- For this example, VLAN 99 is used.

switchport trunk native vlan 99

!--- Disable the DTP negotiation on this interface !--- (the Catalyst 2948G-L3 switch does not support these frames).

switchport nonegotiate

no ip address

!--- Configure the port to channel without PAgP.

channel-group 1 mode on

!

interface FastEthernet0/3

!--- The PC2 on this interface belongs to VLAN 2.

switchport access vlan 2

switchport mode access

no ip address

!--- On the userports, enable portfast to increase !--- the STP convergence time.

spanning-tree portfast

!

( .... Output is suppressed)

!

interface Vlan1

ip address 1.1.1.2 255.255.255.0

no ip route-cache

!

ip http server

!

!

line con 0

line vty 5 15

!

end

Verificación

Esta sección proporciona información que puede utilizar para confirmar que sus configuraciones funcionan correctamente.

La herramienta Output Interpreter (sólo para clientes registrados) permite utilizar algunos comandos “show” y ver un análisis del resultado de estos comandos.

Comandos show para Catalyst 2950

Los siguientes comandos show verifican la configuración para el switch Catalyst 2950, como se muestra en el siguiente resultado.

5-2950-24##show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa0/4, Fa0/5, Fa0/6, Fa0/7

Fa0/8, Fa0/9, Fa0/10, Fa0/11

Fa0/12, Fa0/13, Fa0/14, Fa0/15

Fa0/16, Fa0/17, Fa0/18, Fa0/19

Fa0/20, Fa0/21, Fa0/22, Fa0/23

Fa0/24, Gi0/1, Gi0/2

2    VLAN0002                         active    Fa0/3

1002 fddi-default                     active

1003 token-ring-default               active

1004 fddinet-default                  active

1005 trnet-default                    active

VLAN Type  SAID       MTU   Parent RingNo BridgeNo Stp  BrdgMode Trans1 Trans2

---- ----- ---------- ----- ------ ------ -------- ---- -------- ------ ------

1    enet  100001     1500  -      -      -        -    -        0      0

2    enet  100002     1500  -      -      -        -    -        0      0

1002 fddi  101002     1500  -      -      -        -    -        0      0

1003 tr    101003     1500  -      -      -        -    -        0      0

1004 fdnet 101004     1500  -      -      -        ieee -        0      0

1005 trnet 101005     1500  -      -      -        ibm  -        0      0

Remote SPAN VLANs

------------------------------------------------------------------------------

Primary Secondary Type              Ports

------- --------- ----------------- ------------------------------------------

5-2950-24##show interfaces port-channel 1 trunk

Port      Mode         Encapsulation  Status        Native vlan

Po1       on           802.1q         trunking      99

Port      Vlans allowed on trunk

Po1       1-4094

Port      Vlans allowed and active in management domain

Po1       1-2

Port      Vlans in spanning tree forwarding state and not pruned

Po1       1-2

5-2950-24##show interface port-channel 1

Port-channel1 is up, line protocol is up

Hardware is EtherChannel, address is 0005.7428.0e02 (bia 0005.7428.0e02)

MTU 1500 bytes, BW 200000 Kbit, DLY 1000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Full-duplex, 100Mb/s

input flow-control is off, output flow-control is off

Members in this channel: Fa0/1 Fa0/2

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:01, output 00:00:00, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 25000 bits/sec, 39 packets/sec

5 minute output rate 39000 bits/sec, 59 packets/sec

11609 packets input, 955786 bytes, 0 no buffer

Received 11590 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog, 11583 multicast, 0 pause input

0 input packets with dribble condition detected

17396 packets output, 1442093 bytes, 0 underruns

0 output errors, 0 collisions, 1 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier, 0 PAUSE output

0 output buffer failures, 0 output buffers swapped out

5-2950-24##show interface port-channel 1 switchport

Name: Po1

Switchport: Enabled

Administrative Mode: trunk

Operational Mode: trunk

Administrative Trunking Encapsulation: dot1q

Operational Trunking Encapsulation: dot1q

Negotiation of Trunking: Off

Access Mode VLAN: 1 (default)

Trunking Native Mode VLAN: 99 (Inactive)

Administrative private-vlan host-association: none

Administrative private-vlan mapping: none

Operational private-vlan: none

Trunking VLANs Enabled: ALL

Pruning VLANs Enabled: 2-1001

Protected: false

Voice VLAN: none (Inactive)

Appliance trust: none

5-2950-24##show cdp neighbors

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater

Device ID        Local Intrfce     Holdtme    Capability  Platform  Port ID

5-2948G-L3       Fas 0/1            144         R T       Cat2948G  Port-channe1

5-2948G-L3       Fas 0/2            178         R T       Cat2948G  Fas 2

5-2948G-L3       Fas 0/1            178         R T       Cat2948G  Fas 1

PC2#ping 1.1.1.3

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 1.1.1.3, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/4/4 ms

Comandos show para Catalyst 2948G-L3

Los siguientes comandos show verifican la configuración para el switch Catalyst 2948-L3, como se muestra en el siguiente resultado.

5-2948G-L3#show interfaces port-channel 1

Port-channel1 is up, line protocol is up

Hardware is FEChannel, address is 0001.43ff.1407 (bia 0000.0000.0000)

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set, keepalive set (10 sec)

Half-duplex, Unknown Speed, Media type unknown

ARP type: ARPA, ARP Timeout 04:00:00

No. of active members in this channel: 2

Member 0 : FastEthernet1

Member 1 : FastEthernet2

Last input 00:00:00, output 00:00:00, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/300, 0 drops

5 minute input rate 2000 bits/sec, 4 packets/sec

5 minute output rate 1000 bits/sec, 1 packets/sec

27033 packets input, 2083710 bytes, 0 no buffer

Received 6194 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

0 watchdog, 0 multicast

0 input packets with dribble condition detected

12808 packets output, 1945983 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

5-2948G-L3#show vlan

Virtual LAN ID:  1 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interfaces:  GigabitEthernet49

GigabitEthernet50.1

Port-channel1.1

This is configured as native Vlan for the following interface(s) :

GigabitEthernet49

GigabitEthernet50

Protocols Configured:   Address:              Received:        Transmitted:

IP              10.10.10.1                   0                   0

Bridging        Bridge Group 1               3418                   5

Virtual LAN ID:  2 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interfaces:  GigabitEthernet50.2

Port-channel1.2

Protocols Configured:   Address:              Received:        Transmitted:

IP              20.20.20.1                   0                   0

Bridging        Bridge Group 2               3952                   9

Virtual LAN ID:  21 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interface:   GigabitEthernet49.1

Protocols Configured:   Address:              Received:        Transmitted:

Virtual LAN ID:  99 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interface:   Port-channel1.99

This is configured as native Vlan for the following interface(s) :

Port-channel1

Protocols Configured:   Address:              Received:        Transmitted:

5-2948G-L3#show spanning-tree

Bridge group 1 is executing the IEEE compatible Spanning Tree protocol

Bridge Identifier has priority 32768, address 0001.43ff.1409

Configured hello time 2, max age 20, forward delay 15

We are the root of the spanning tree

Topology change flag not set, detected flag not set

Times:  hold 1, topology change 35, notification 2

hello 2, max age 20, forward delay 15

Timers: hello 0, topology change 0, notification 0

bridge aging time 300

Port 6 (FastEthernet3) of Bridge group 1 is forwarding

Port path cost 19, Port priority 128

Designated root has priority 32768, address 0001.43ff.1409

Designated bridge has priority 32768, address 0001.43ff.1409

Designated port is 6, path cost 0

Timers: message age 0, forward delay 0, hold 0

BPDU: sent 4107, received 2

Port 58 (Port-channel1.1 DOT1Q) of Bridge group 1 is forwarding

Port path cost 12, Port priority 128

Designated root has priority 32768, address 0001.43ff.1409

Designated bridge has priority 32768, address 0001.43ff.1409

Designated port is 58, path cost 0

Timers: message age 0, forward delay 0, hold 0

BPDU: sent 5240, received 502

Bridge group 2 is executing the IEEE compatible Spanning Tree protocol

Bridge Identifier has priority 32768, address 0000.0c00.d08c

Configured hello time 2, max age 20, forward delay 15

Current root has priority 0, address 0010.0db1.804f

Root port is 59 (Port-channel1.2), cost of root path is 50

Topology change flag not set, detected flag not set

Times:  hold 1, topology change 35, notification 2

hello 2, max age 20, forward delay 15

Timers: hello 0, topology change 0, notification 0

bridge aging time 300

Port 59 (Port-channel1.2 DOT1Q) of Bridge group 2 is forwarding

Port path cost 12, Port priority 128

Designated root has priority 0, address 0010.0db1.804f

Designated bridge has priority 32770, address 0005.7428.0e00

Designated port is 65, path cost 38

Timers: message age 3, forward delay 0, hold 0

BPDU: sent 1790, received 3964

PC1#ping 2.2.2.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 2.2.2.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/4/4 ms

Troubleshoot

Actualmente, no hay información específica de troubleshooting disponible para esta configuración.

Información Relacionada

- Comprensión y configuración del protocolo de troncal VLAN

- Ejemplo de configuraciones Catalyst 2948G-L3

- Soporte de Productos de Switches

- Soporte de Tecnología de LAN Switching

- Soporte Técnico y Documentación - Cisco Systems