Contenido

Introducción

Procedimiento de postproceso

Introducción

Este documento describe cómo debe cambiar la configuración de inicio del entorno de ejecución previa al arranque (PXE) antes de reiniciar cualquiera de los nodos de SAP High Performance Analytic Appliance (HANA) cuando realiza una actualización del sistema operativo (OS) con otra herramienta de configuración (YaST) o instala nuevos controladores de Ethernet Network Interface Controller (ENIC)/Fabric Network Interface Controller (FNIC). La instalación del parche/controlador debe tener lugar en cada nodo SAP HANA.

Procedimiento de postproceso

Utilice este procedimiento cuando actualice el SO con YaST.

1. Realice la actualización SUSE con YaST o la instalación del controlador ENIC/FNIC.
Nota: Consulte el documento Cómo actualizar a SLES/SLED 11 SP3  Micro Focus para obtener detalles sobre cómo actualizar de SP2 a SP3.

2. Copie el kernel actualizado en el mgmtsrv de uno de los nodos SAP HANA.

server01 # cd /boot

# Prepare initrd for the PXEBoot and include the nfs packages/drivers

mkinitrd -f nfs -D eth0

# Copy the initrd and vmlinuz to the tftpboot directory of the mgmtsrv

server01 # scp initrd-3.0.101-0.31-default mgmtsrv01:/tftpboot

server01 # scp vmlinuz-3.0.101-0.31-default mgmtsrv01:/tftpboot

3. Inicie sesión en mgmtsrv01 para preparar el disco RAM inicial (initrd) para el arranque PXE e incluir los paquetes/drivers del sistema de archivos de red (NFS):

# Check the new run_all.sh script is available (attached to this article as well)

ll /tftboot/tmp/run_all.sh

# Change the initrd

cd /tftpboot

mkdir /tftpboot/tmp2

cp initrd-3.0.101-0.31-default  /tftpboot/tmp2/

cd /tftpboot/tmp2

mv initrd-3.0.101-0.31-default  initrd-3.0.101-0.31-default.gz

gunzip initrd-3.0.101-0.31-default.gz

# Now the initrd is in a CPIO format

cpio -idumf < initrd-3.0.101-0.31-default

rm initrd-3.0.101-0.31-default

# Udev files needs to be empty to avoid issues running different nodes with

that initrd

# During the kernel creation it captures all MAC addresses and align them to

the addresses in the UDEV rules file, so we empty the file before.

# During restart every server will create its own persistent-net rules again.

echo > etc/udev/rules.d/70-persistent-net.rules

# Copy the run_all script generic to all versions of the kernel

cp ../tmp/run_all.sh .

find . | cpio --create --format="newc" > ../initrd-3.0.101-0.31-default

cd ..

gzip -9 initrd-3.0.101-0.31-default

mv initrd-3.0.101-0.31-default.gz initrd-3.0.101-0.31-default

# For simplification …

ln -s ./initrd-3.0.101-0.31-default initrd_3.0.101

ln -s ./vmlinuz-3.0.101-0.31-default kernel_3.0.101

# Now prepare the PXE boot configuration

cd /tftpboot/pxelinux.cfg

vi <hostname|IP address>

# If there is no link available you can check with the command "gethostip

server01"

copy the current SLES11_SP2 (or Default) section and adapt the values for default

and LABEL as well as the kernel and initrd links

# SAP UCS PXE Boot Definition

display ../boot.msg

default SLES11_SP3_101

prompt 1

timeout 10

LABEL SLES11_SP3_101

KERNEL kernel_3.0.101

APPEND initrd=initrd_3.0.101 rw rootdev=192.168.xx.xx:/FS_OS_01/SLES11SP3

intel_idle.max_cstate=0 processor.max_cstate=0 ip=dhcp

OS_VOLUME="FS_OS_01/SLES4SAPSP3" MAC="00:25:B5:12:00:FF" OS_SERVER="192.168.127.11"

4. En el primer nodo SAP HANA, asegúrese de que SAP HANA se detenga como <SID>ADM.

(sapcontrol -nr <InstanceNumber> -function StopSystem)

5. Reinicie todos los nodos SAP HANA en el nuevo núcleo.

Si hay nodos SAP HANA adicionales en esta solución, debe ejecutar la actualización a través de YaST en el nodo y adaptar la configuración de inicio PXE para apuntar al kernel/initrd correcto después.