Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Convenciones

Productos Relacionados

Configurar

Diagrama de la red

Configuraciones

Configuración de ESMTP TLS

Verificación

Troubleshoot

Información Relacionada

Introducción

Esta configuración de ejemplo muestra cómo configurar el Firewall PIX para el acceso a un servidor de correo ubicado en la red externa.

Consulte PIX/ASA 7.x y superiores : Ejemplo de Configuración de Mail Server Access on Inside Network para configurar el PIX/ASA Security Appliance para acceder a un servidor de correo/SMTP ubicado en la red interna.

Consulte Ejemplo de Configuración de Red PIX/ASA 7.x con Acceso al Servidor de Correo en DMZ para configurar el Dispositivo de Seguridad PIX/ASA para el acceso a un servidor de correo/SMTP ubicado en la red DMZ.

Consulte ASA 8.3 y posteriores: Ejemplo de Configuración de Mail Server Access on Outside Network (SMTP) para obtener más información sobre la configuración idéntica en Cisco Adaptive Security Appliance (ASA) con la versión 8.3 y posteriores.

Refiérase a la documentación de Cisco Secure PIX Firewall para obtener más información sobre cómo configurar Microsoft Exchange. Elija su versión de software, luego vaya a la guía de configuración y lea el capítulo sobre cómo configurar para Microsoft Exchange.

Prerequisites

Requirements

No hay requisitos específicos para este documento.

Componentes Utilizados

La información que contiene este documento se basa en las siguientes versiones de software y hardware.

- Firewall PIX 535

- Software PIX Firewall versión 7.1(1)

- Cisco 2500 Routers

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Convenciones

Consulte Convenciones de Consejos Técnicos de Cisco para obtener más información sobre las convenciones sobre documentos.

Productos Relacionados

Esta configuración también se puede utilizar con un Adaptive Security Appliance (ASA) que ejecute la versión 7.x y posteriores.

Configurar

En esta sección encontrará la información para configurar las funciones descritas en este documento.

Nota: Use el Analizador de Cisco CLI para obtener más información sobre los comandos usados en esta sección.

Diagrama de la red

En este documento, se utiliza esta configuración de red:

Configuraciones

En este documento, se utilizan estas configuraciones:

- Firewall PIX

- Router A

- Router B

Firewall PIX

PIX Version 7.1(1)

!

hostname pixfirewall

enable password 8Ry2YjIyt7RRXU24 encrypted

names

!

interface Ethernet0

shutdown

no nameif

no security-level

no ip address

!

interface Ethernet1

shutdown

no nameif

no security-level

no ip address

!

interface Ethernet2

shutdown

no nameif

no security-level

no ip address

!

!--- Define the IP address for the inside interface.

interface Ethernet3

nameif inside

security-level 100

ip address 192.168.1.1 255.255.255.252

!

!--- Define the IP address for the outside interface.

interface Ethernet4

nameif outside

security-level 0

ip address 209.64.3.1 255.255.255.252

!

interface Ethernet5

shutdown

no nameif

no security-level

no ip address

!

passwd 2KFQnbNIdI.2KYOU encrypted

ftp mode passive

pager lines 24

mtu inside 1500

mtu outside 1500

no failover

no asdm history enable

arp timeout 14400

!--- This command defines the global for the Network Address Translation !--- (NAT) statement. In this case, the two commands state that any traffic !--- from the 192.168.2.x network that passes from the inside interface (Ethernet0) !--- to the outside interface (Ethernet 1) translates into an address !--- in the range of 209.64.3.129 through 209.64.3.253 and contains a subnet !--- mask of 255.255.255.128.

global (outside) 1 209.64.3.129-209.64.3.253 netmask 255.255.255.128

!--- This command reserves the last available address (209.64.3.254) for !--- for Port Address Translation (PAT). In the previous statement, !--- each address inside that requests a connection uses one !--- of the addresses specified. If all of these addresses are in use, !--- this statement provides a failsafe to allow additional inside stations !--- to establish connections.

global (outside) 1 209.64.3.254

!--- This command indicates that all addresses in the 192.168.2.x range !--- that pass from the inside (Ethernet0) to a corresponding global !--- designation are done with NAT. !--- As outbound traffic is permitted by default on the PIX, no !--- static commands are needed.

nat (inside) 1 192.168.2.0 255.255.255.0

!--- Creates a static route for the 192.168.2.x network with 192.168.1.2. !--- The PIX forwards packets with these addresses to the router !--- at 192.168.1.2.

route inside 192.168.2.0 255.255.255.0 192.168.1.2 1

!--- Sets the default route for the PIX Firewall at 209.64.3.2.

route outside 0.0.0.0 0.0.0.0 209.64.3.2 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 icmp 0:00:02

timeout sunrpc 0:10:00 h323 0:05:00 h225 1:00:00 mgcp 0:05:00

timeout mgcp-pat 0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

no snmp-server location

no snmp-server contact

snmp-server enable traps snmp authentication linkup linkdown coldstart

telnet timeout 5

ssh timeout 5

console timeout 0

!

class-map inspection_default

match default-inspection-traffic

!

!

!--- SMTP/ESMTP is inspected since "inspect esmtp" is included in the map.

policy-map global_policy

class inspection_default

inspect dns maximum-length 512

inspect ftp

inspect h323 h225

inspect h323 ras

inspect rsh

inspect rtsp

inspect esmtp

inspect sqlnet

inspect skinny

inspect sunrpc

inspect xdmcp

inspect sip

inspect netbios

inspect tftp

!

service-policy global_policy global

Cryptochecksum:8a63de5ae2643c541a397c2de7901041

: end

Router A

Current configuration:

!

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 2522-R4

!

enable secret 5 $1$N0F3$XE2aJhJlCbLWYloDwNvcV.

!

ip subnet-zero

!

!

!

!

!

interface Ethernet0

!--- Assigns an IP address to the inside Ethernet interface.

ip address 192.168.2.1 255.255.255.0

no ip directed-broadcast

!

interface Ethernet1

!--- Assigns an IP address to the PIX-facing interface.

ip address 192.168.1.2 255.255.255.252

no ip directed-broadcast

!

interface Serial0

no ip address

no ip directed-broadcast

shutdown

!

interface Serial1

no ip address

no ip directed-broadcast

shutdown

!

ip classless

!--- This route instructs the inside router to forward all !--- non-local packets to the PIX.

ip route 0.0.0.0 0.0.0.0 192.168.1.1

!

!

line con 0

transport input none

line aux 0

autoselect during-login

line vty 0 4

exec-timeout 5 0

password ww

login

!

end

Router B

Current configuration:

!

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 2522-R4

!

enable secret 5 $1$N0F3$XE2aJhJlCbLWYloDwNvcV.

!

ip subnet-zero

!

!

!

!

interface Ethernet0

!--- Assigns an IP address to the PIX-facing Ethernet interface.

ip address 209.64.3.2 255.255.255.252

no ip directed-broadcast

!

interface Ethernet1

!--- Assigns an IP address to the server-facing Ethernet interface.

ip address 209.64.3.5 255.255.255.252

no ip directed-broadcast

!

interface Serial0

!--- Assigns an IP address to the Internet-facing interface.

ip address 209.64.3.9 255.255.255.252

no ip directed-broadcast

no ip mroute-cache

!

interface Serial1

no ip address

no ip directed-broadcast

!

ip classless

!--- All non-local packets are to be sent out serial 0. In this case, !--- the IP address on the other end of the serial interface is not known, !--- or you can specify it here.

ip route 0.0.0.0 0.0.0.0 serial 0

!

!--- This statement is required to direct traffic destined to the !--- 209.64.3.128 network (the PIX global pool) to the PIX to be translated !--- back to the inside addresses.

ip route 209.64.3.128 255.255.255.128 209.64.3.1

!

!

line con 0

transport input none

line aux 0

autoselect during-login

line vty 0 4

exec-timeout 5 0

password ww

login

!

end

Configuración de ESMTP TLS

Nota: Si utiliza el cifrado de seguridad de la capa de transporte (TLS) para la comunicación de correo electrónico, la función de inspección de ESMTP (habilitada de forma predeterminada) en el PIX descarta los paquetes. Para permitir los correos electrónicos con TLS habilitado, inhabilite la función de inspección ESMTP como muestra este resultado.

pix(config)#policy-map global_policy

pix(config-pmap)#class inspection_default

pix(config-pmap-c)#no inspect esmtp

pix(config-pmap-c)#exit

pix(config-pmap)#exit

Verificación

Actualmente, no hay un procedimiento de verificación disponible para esta configuración.

Troubleshoot

Cisco CLI Analyzer admite ciertos comandos show. Utilice el Analizador CLI para ver un análisis del resultado del comando show.

Nota: Consulte Información Importante sobre Comandos Debug antes de utilizar los comandos debug.

El comando logging console debugging dirige los mensajes a la consola PIX. Si la conectividad con el servidor de correo es un problema, examine los mensajes de depuración de la consola para localizar las direcciones IP de las estaciones de envío y recepción para determinar el problema.

Información Relacionada

- Ajuste de conectividad mediante PIX firewalls de Cisco

- Cisco PIX Firewall Software

- Referencias de Comandos de Cisco Secure PIX Firewall

- Firewalls Cisco ASA serie 5500-X

- Solicitudes de Comentarios (RFC)

- Soporte Técnico y Documentación - Cisco Systems