Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Convenciones

Configurar

Diagrama de la red

Configuraciones

Verificación

Troubleshoot

Comandos para resolución de problemas

Información Relacionada

Introducción

Este documento proporciona una configuración de ejemplo de DMVPN (Dynamic Multipoint VPN) usando GRE (Generic Routing Encapsulation) sobre IPSec con OSPF (Open Shortest Path First), Traducción de Dirección de Red (NAT) y Cisco IOS® Firewall.

Prerequisites

Requirements

Antes de que un GRE multipunto (mGRE) y un túnel IPSec puedan establecerse, deberá definir una política de intercambio de claves de Internet (IKE) mediante el comando crypto isakmp policy.

Nota: Utilice la herramienta Command Lookup (sólo para clientes registrados) para obtener más información sobre los comandos utilizados en esta sección.

Componentes Utilizados

La información que contiene este documento se basa en las siguientes versiones de software y hardware.

- Cisco IOS® Software Release 12.2(15)T1 en el router hub y Cisco IOS Software Release 12.3(1.6) en los routers spoke

- Cisco 3620 como router de eje de conexión, dos routers Cisco 1720 y un router Cisco 3620 como routers radiales

La información que contiene este documento se creó a partir de los dispositivos en un ambiente de laboratorio específico. Todos los dispositivos que se utilizan en este documento se pusieron en funcionamiento con una configuración verificada (predeterminada). If your network is live, make sure that you understand the potential impact of any command.

Convenciones

Consulte Convenciones de Consejos Técnicos de Cisco para obtener más información sobre las convenciones sobre documentos.

Configurar

En esta sección encontrará la información para configurar las funciones descritas en este documento.

Nota: Utilice la herramienta Command Lookup (sólo para clientes registrados) para obtener más información sobre los comandos utilizados en esta sección.

Diagrama de la red

Este documento utiliza esta configuración de red:

Configuraciones

Este documento usa estas configuraciones.

- Concentrador - 3620-B

- Spoke 1 - 3620-A

- Spoke 2 - 1720-b

- Spoke 3 – 1720-A

Concentrador - 3620-B

W2N-6.16-3620-B#write terminal

Building configuration...

Current configuration : 2613 bytes

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname W2N-6.16-3620-B

!

logging queue-limit 100

!

memory-size iomem 10

ip subnet-zero

!

!

ip cef

no ip domain lookup

!

!--- This is the Cisco IOS Firewall configuration and what to inspect. !--- This is applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out ftp

ip inspect name in2out tftp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out http

ip inspect name in2out udp

ip audit po max-events 100

!

!

!

!--- Create an Internet Security Association and Key Management !--- Protocol (ISAKMP) policy for Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

crypto isakmp nat keepalive 20

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPsec profile to be applied dynamically !--- to the GRE over IPsec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!

!

!

!

!

!

!

!

!

no voice hpi capture buffer

no voice hpi capture destination

!

!

mta receive maximum-recipients 0

!

!

!

!--- This is the inbound interface.

interface Loopback1

ip address 192.168.117.1 255.255.255.0

ip nat inside

!

!--- Create a GRE tunnel template to be applied !--- to all the dynamically created GRE tunnels.

interface Tunnel1

description MULTI-POINT GRE TUNNEL for BRANCHES

bandwidth 1000

ip address 172.16.0.1 255.255.255.0

no ip redirects

ip mtu 1416

ip nhrp authentication dmvpn

ip nhrp map multicast dynamic

ip nhrp network-id 99

ip nhrp holdtime 300

no ip route-cache

ip ospf network broadcast

no ip mroute-cache

delay 1000

tunnel source FastEthernet0/0

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

!--- This is the outbound interface.

interface FastEthernet0/0

ip address 14.24.117.1 255.255.0.0

ip nat outside

ip access-group 100 in

ip inspect in2out out

no ip mroute-cache

duplex auto

speed auto

!

interface Serial0/0

no ip address

shutdown

clockrate 2000000

no fair-queue

!

interface FastEthernet0/1

no ip address

no ip mroute-cache

duplex auto

speed auto

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router ospf 1

log-adjacency-changes

network 172.16.0.0 0.0.0.255 area 0

network 192.168.117.0 0.0.0.255 area 0

!

!--- Except the private network traffic from the NAT process.

ip nat inside source route-map nonat interface FastEthernet0/0 overload

ip http server

no ip http secure-server

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

ip route 2.0.0.0 255.0.0.0 14.24.121.1

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- Cisco IOS Firewall opens other inbound access as needed.

access-list 100 permit udp any host 14.24.117.1 eq 500

access-list 100 premit esp any host 14.24.117.1

access-list 100 permit gre any host 14.24.117.1

access-list 100 deny ip any any

!--- Except the private network traffic from the NAT process.

access-list 110 deny   ip 192.168.117.0 0.0.0.255 192.168.118.0 0.0.0.255

access-list 110 deny   ip 192.168.117.0 0.0.0.255 192.168.116.0 0.0.0.255

access-list 110 deny   ip 192.168.117.0 0.0.0.255 192.168.120.0 0.0.0.255

access-list 110 permit ip 192.168.117.0 0.0.0.255 any

!

!--- Except the private network traffic from the NAT process.

route-map nonat permit 10

match ip address 110

!

call rsvp-sync

!

!

mgcp profile default

!

dial-peer cor custom

!

!

!

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

!

end

W2N-6.16-3620-B#

Spoke 1 - 3620-A

W2N-6.16-3620-A#write terminal

Building configuration...

Current configuration : 2678 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname W2N-6.16-3620-A

!

boot system flash slot0:c3620-ik9o3s7-mz.122-15.T1.bin

logging queue-limit 100

!

memory-size iomem 15

ip subnet-zero

!

!

ip cef

no ip domain lookup

!

!--- This is the Cisco IOS Firewall configuration and what to inspect. !--- This is applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out tftp

ip inspect name in2out udp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out realaudio

ip inspect name in2out vdolive

ip inspect name in2out netshow

ip audit po max-events 100

!

!

!

!--- Create an ISAKMP policy for !--- Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPsec profile to be applied dynamically !--- to the GRE over IPsec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!

!

!

!

!

!

!

!

!

no voice hpi capture buffer

no voice hpi capture destination

!

!

mta receive maximum-recipients 0

!

!

!

!--- This is the inbound interface.

interface Loopback1

ip address 192.168.118.1 255.255.255.0

ip nat inside

!

!--- Create a GRE tunnel template to be applied to !--- all the dynamically created GRE tunnels.

interface Tunnel1

description HOST DYNAMIC TUNNEL

bandwidth 1000

ip address 172.16.0.2 255.255.255.0

no ip redirects

ip mtu 1416

ip nhrp authentication dmvpn

ip nhrp map multicast dynamic

ip nhrp map 172.16.0.1 14.24.117.1

ip nhrp map multicast 14.24.117.1

ip nhrp network-id 99

ip nhrp holdtime 300

ip nhrp nhs 172.16.0.1

no ip route-cache

ip ospf network broadcast

no ip mroute-cache

delay 1000

tunnel source Ethernet0/0

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

!--- This is the outbound interface.

interface Ethernet0/0

ip address 14.24.118.1 255.255.0.0

ip nat outside

ip access-group 100 in

ip inspect in2out out

no ip mroute-cache

half-duplex

!

interface Ethernet0/1

no ip address

half-duplex

!

interface Ethernet0/2

no ip address

shutdown

half-duplex

!

interface Ethernet0/3

no ip address

shutdown

half-duplex

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router ospf 1

log-adjacency-changes

redistribute connected

network 172.16.0.0 0.0.0.255 area 0

network 192.168.118.0 0.0.0.255 area 0

!

!--- Except the private network traffic from the NAT process.

ip nat inside source route-map nonat interface Ethernet0/0 overload

ip http server

no ip http secure-server

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

ip route 2.0.0.0 255.0.0.0 14.24.121.1

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- Cisco IOS Firewall opens inbound access as needed.

access-list 100 permit udp any host 14.24.118.1 eq 500

access-list 100 premit esp any host 14.24.118.1

access-list 100 permit gre any host 14.24.118.1

access-list 100 deny ip any any

!--- Except the private network traffic from the NAT process.

access-list 110 deny   ip 192.168.118.0 0.0.0.255 192.168.117.0 0.0.0.255

access-list 110 deny   ip 192.168.118.0 0.0.0.255 192.168.116.0 0.0.0.255

access-list 110 deny   ip 192.168.118.0 0.0.0.255 192.168.120.0 0.0.0.255

access-list 110 permit ip 192.168.118.0 0.0.0.255 any

!

!--- Except the private network traffic from the NAT process.

route-map nonat permit 10

match ip address 110

!

call rsvp-sync

!

!

mgcp profile default

!

dial-peer cor custom

!

!

!

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

!

end

W2N-6.16-3620-A#

Spoke 2 - 1720-b

1720-b#write terminal

Building configuration...

Current configuration : 2623 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 1720-b

!

logging queue-limit 100

enable password cisco

!

username 7206-B password 0 cisco

ip subnet-zero

!

!

no ip domain lookup

!

ip cef

!--- This is the Cisco IOS Firewall configuration and what to inspect. !--- This is applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out tftp

ip inspect name in2out udp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out realaudio

ip inspect name in2out vdolive

ip inspect name in2out netshow

ip audit po max-events 100

vpdn-group 1

request-dialin

protocol pppoe

!

!

!

!

!

!--- Create an ISAKMP policy for !--- Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPsec profile to be applied dynamically !--- to the GRE over IPsec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!

!

!

!--- This is the inbound interface.

interface Loopback1

ip address 192.168.116.1 255.255.255.0

ip nat inside

!

!--- Create a GRE tunnel template to be applied to !--- all the dynamically created GRE tunnels.

interface Tunnel1

description HOST DYNAMIC TUNNEL

bandwidth 1000

ip address 172.16.0.3 255.255.255.0

no ip redirects

ip mtu 1416

ip nhrp authentication dmvpn

ip nhrp map multicast dynamic

ip nhrp map 172.16.0.1 14.24.117.1

ip nhrp map multicast 14.24.117.1

ip nhrp network-id 99

ip nhrp holdtime 300

ip nhrp nhs 172.16.0.1

no ip route-cache

ip ospf network broadcast

no ip mroute-cache

delay 1000

tunnel source Dialer1

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

interface Ethernet0

no ip address

half-duplex

!

interface FastEthernet0

no ip address

no ip mroute-cache

speed auto

pppoe enable

pppoe-client dial-pool-number 1

!

!--- This is the outbound interface.

interface Dialer1

ip address 2.2.2.10 255.255.255.0

ip inspect in2out out

ip access-group 100 in encapsulation ppp

dialer pool 1

dialer-group 1

ppp authentication pap chap callin

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router ospf 1

log-adjacency-changes

redistribute connected

network 172.16.0.0 0.0.0.255 area 0

network 192.168.116.0 0.0.0.255 area 0

!

!--- Except the private network traffic from the NAT process.

ip nat inside source route-map nonat interface Dialer1 overload

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

ip route 0.0.0.0 0.0.0.0 Dialer1

no ip http server

no ip http secure-server

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- Cisco IOS Firewall opens inbound access as needed.

access-list 100 permit udp any host 14.24.116.1 eq 500

access-list 100 premit esp any host 14.24.116.1

access-list 100 permit gre any host 14.24.116.1

access-list 100 deny ip any any

!--- Except the private network traffic from the NAT process.

access-list 110 deny   ip 192.168.116.0 0.0.0.255 192.168.117.0 0.0.0.255

access-list 110 deny   ip 192.168.116.0 0.0.0.255 192.168.118.0 0.0.0.255

access-list 110 deny   ip 192.168.116.0 0.0.0.255 192.168.120.0 0.0.0.255

access-list 110 permit ip 192.168.116.0 0.0.0.255 any

dialer-list 1 protocol ip permit

!

!--- Except the private network traffic from the NAT process.

route-map nonat permit 10

match ip address 110

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

no scheduler allocate

end

1720-b#

Spoke 3 – 1720-A

W2N-6.16-1720-A#write terminal

Building configuration...

Current configuration : 2303 bytes

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname W2N-6.16-1720-A

!

logging queue-limit 100

!

memory-size iomem 25

ip subnet-zero

!

!

no ip domain lookup

!

ip cef

!--- This is the Cisco IOS Firewall configuration and what to inspect. !--- This is applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out tftp

ip inspect name in2out udp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out realaudio

ip inspect name in2out vdolive

ip inspect name in2out netshow

ip audit notify log

ip audit po max-events 100

!

!

!

!

!--- Create an ISAKMP policy for !--- Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPsec profile to be applied dynamically !--- to the GRE over IPsec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!

!

!

!--- This is the inbound interface.

interface Loopback1

ip address 192.168.120.1 255.255.255.0

ip nat inside

!

!--- Create a GRE tunnel template to be applied to !--- all the dynamically created GRE tunnels.

interface Tunnel1

description HOST DYNAMIC TUNNEL

bandwidth 1000

ip address 172.16.0.4 255.255.255.0

no ip redirects

ip mtu 1416

ip nhrp authentication dmvpn

ip nhrp map multicast dynamic

ip nhrp map 172.16.0.1 14.24.117.1

ip nhrp map multicast 14.24.117.1

ip nhrp network-id 99

ip nhrp holdtime 300

ip nhrp nhs 172.16.0.1

ip ospf network broadcast

no ip mroute-cache

delay 1000

tunnel source FastEthernet0

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

interface Ethernet0

no ip address

no ip mroute-cache

half-duplex

!

!--- This is the outbound interface.

interface FastEthernet0

ip address 14.24.120.1 255.255.0.0

ip nat outside

ip inspect in2out out

ip access-group 100 in

no ip mroute-cache

speed auto

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router ospf 1

log-adjacency-changes

redistribute connected

network 172.16.0.0 0.0.0.255 area 0

network 192.168.120.0 0.0.0.255 area 0

!

!--- Except the private network traffic from the NAT process.

ip nat inside source route-map nonat interface FastEthernet0 overload

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

ip route 2.0.0.0 255.0.0.0 14.24.121.1

no ip http server

no ip http secure-server

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- Cisco IOS Firewall opens inbound access as needed.

access-list 100 permit udp any host 14.24.116.1 eq 500

access-list 100 premit esp any host 14.24.116.1

access-list 100 permit gre any host 14.24.116.1

access-list 100 deny ip any any

access-list 110 permit ip 192.168.120.0 0.0.0.255 any

!--- Except the private network traffic from the NAT process.

access-list 110 deny   ip 192.168.120.0 0.0.0.255 192.168.116.0 0.0.0.255

access-list 110 deny   ip 192.168.120.0 0.0.0.255 192.168.117.0 0.0.0.255

access-list 110 deny   ip 192.168.120.0 0.0.0.255 192.168.118.0 0.0.0.255

access-list 110 permit ip 192.168.120.0 0.0.0.255 any

!

!--- Except the private network traffic from the NAT process.

route-map nonat permit 10

match ip address 110

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

end

W2N-6.16-1720-A#

Verificación

Use esta sección para confirmar que su configuración funciona correctamente.

La herramienta Output Interpreter Tool (clientes registrados solamente) (OIT) soporta ciertos comandos show. Utilice la OIT para ver un análisis del resultado del comando show.

- show crypto isakmp sa—Muestra el estado de la asociación de seguridad ISAKMP (SA).

- show crypto engine connections active—Muestra el total de cifrados/descifrados por SA.

- show crypto ipsec sa — Muestra las estadísticas en los túneles activos.

- show ip route — Muestra la tabla de ruteo.

- show ip ospf neighbor: muestra la información de vecinos OSPF por interfaz.

- show ip nhrp — Muestra la memoria caché del Protocolo de resolución de salto siguiente (NHRP) de IP, opcionalmente limitado a entradas de caché estáticas o dinámicas para un determinada interfaz.

Troubleshoot

En esta sección encontrará información que puede utilizar para solucionar problemas de configuración.

Comandos para resolución de problemas

Nota: Consulte Información importante sobre los comandos de depuración antes de utilizar este tipo de comandos.

- debug crypto ipsec — Muestra eventos de IPSec.

- debug crypto isakmp — Muestra mensajes acerca de eventos IKE.

- debug crypto engine — Muestra información del motor de criptografía.

Puede encontrar información adicional sobre la resolución de problemas de IPSec en Resolución de problemas de seguridad IP – Introducción y uso de los comandos de depuración.

Información Relacionada

- Resolución de problemas de configuración de firewall de Cisco IOS

- Información general de DMVPN y Cisco IOS

- Negociación IPSec/Protocolos IKE

- Soporte Técnico y Documentación - Cisco Systems