Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Antecedentes

Configurar

Diagrama de la red

ASR1K

ASR9K

Verificación

Troubleshoot

Comando para verificar la configuración de ASR9K

Comprobar L2VPN XC

Comprobar la lista de interfaces

Comprobación de PWHE utilizado por una lista de interfaces

Compruebe que MA tiene el PWHE con la información correcta

Comprobar información de resumen de PWHE

Comprobar etiquetas

Las sesiones/caídas de tráfico no aparecen

Comandos Show relacionados con BNG

Depuraciones que se habilitarán

Escalado

Introducción

Este documento describe los pasos para configurar sesiones IP over Ethernet (IPoE) sobre Pseudowire Headend (PWHE) en ASR9K.

Prerequisites

Requirements

Cisco recomienda que tenga conocimiento sobre estos temas:

- VPN de capa 2 MPLS

- Funcionalidad BNG en ASR9K

Consejo: Consulte el artículo Guía de configuración de gateway de red de banda ancha para Cisco ASR 9000 Series Cisco para familiarizarse con la funcionalidad BNG.

Consejo: Consulte el artículo Guía de Configuración de VPNs de Capa 2 MPLS de Cisco para familiarizarse con las VPNs de Capa 2 MPLS.

Componentes Utilizados

Este documento no se limita a una versión de software específica, pero la tarjeta de línea que utilizamos en ASR9K es A9K-MPA-20X1GE.

La información que contiene este documento se creó a partir de los dispositivos en un ambiente de laboratorio específico. Todos los dispositivos que se utilizan en este documento se pusieron en funcionamiento con una configuración verificada (predeterminada). If your network is live, make sure that you understand the potential impact of any command.

Antecedentes

BNG proporciona soporte de suscriptor sobre PWHE. PWHE proporciona conectividad de capa 3 a los nodos periféricos del cliente a través de una conexión de pseudowire. PWHE termina los circuitos L2VPN que existen entre los nodos de borde de acceso proporcionado (A-PE) a una interfaz virtual y realiza el ruteo en el paquete IP nativo. Cada interfaz virtual puede utilizar una o más interfaces físicas hacia la nube de acceso para llegar a los routers del cliente a través de los nodos A-PE.

Nota: Esta función es compatible con los suscriptores PPPoE PTA, PPPoE LAC Subscriber Over PWHE e IPoE.

Configurar

Diagrama de la red

Para realizar esta prueba, se emplea un ASR1K con la versión 154-3.S2 y un ASR9K con la versión IOS-XR 5.2.2. OSPF se utiliza como protocolo de ruteo para alcanzar otras direcciones de loopback.

Dirección de bucle invertido ASR9K: 10.1.1.1/32

Dirección de bucle invertido ASR1K: 10.2.2.2/32

ASR1K

pseudowire-class MPLS

encapsulation mpls

interface GigabitEthernet1/0/0

no ip address

media-type rj45

negotiation auto

cdp enable

xconnect 10.1.1.1 2020 encapsulation mpls pw-class MPLS

end

ASR1K#show etherchannel summary

Flags:  D - down        P/bndl - bundled in port-channel

I - stand-alone s/susp - suspended

H - Hot-standby (LACP only)

R - Layer3      S - Layer2

U - in use      f - failed to allocate aggregator

M - not in use, minimum links not met

u - unsuitable for bundling

w - waiting to be aggregated

d - default port

Number of channel-groups in use: 1

Number of aggregators:           1

Group  Port-channel  Protocol    Ports

------+-------------+-----------+-----------------------------------------------

20 Po20(RU) LACP  Gi1/0/1(bndl) Gi1/1/1(bndl)

RU - L3 port-channel UP State

SU - L2 port-channel UP state

P/bndl -  Bundled

S/susp  - Suspended

interface Port-channel20

ip address 192.168.20.2 255.255.255.0

no negotiation auto

mpls ip

end

ASR9K

Esta es la configuración de ASR9K, que actúa como BNG PWHE.

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show bundle bundle-ether 20

Thu May 21 06:35:39.294 UTC

Bundle-Ether20

Status:                                    Up

Local links

: 2 / 0 / 2 Local bandwidth

: 2000000 (2000000) kbps MAC address (source): 10f3.1172.02c8 (Chassis pool) Inter-chassis link: No Minimum active links / bandwidth: 1 / 1 kbps Maximum active links: 64 Wait while timer: 2000 ms Load balancing: Default LACP: Operational Flap suppression timer: Off Cisco extensions: Disabled mLACP: Not configured IPv4 BFD: Not configured Port Device State Port ID B/W, kbps -------------------- --------------- ----------- -------------- ---------- Gi0/0/1/18 Local Active 0x8000, 0x0007 1000000 Link is Active Gi0/0/1/19 Local Active 0x8000, 0x0008 1000000 Link is Active interface Bundle-Ether20 ipv4 address 192.168.20.1 255.255.255.0 load-interval 30 !

Ahora, configure la interconexión entre ASR1K y ASR9K. Especifique la dirección de loopback de ASR1K (10.2.2.2/32) como vecino xconnect.

l2vpn

router-id 10.1.1.1

pw-class ASR1K

encapsulation mpls

transport-mode ethernet

!

!

xconnect group PWHE

p2p ASR1K

interface PW-Ether20

neighbor ipv4 10.2.2.2 pw-id 2020

pw-class ASR1K

!

!

!

!

generic-interface-list BE20_ONLY

interface Bundle-Ether20

interface GigabitEthernet0/0/1/18

interface GigabitEthernet0/0/1/19

!

interface PW-Ether20

ipv4 address 192.168.1.1 255.255.255.0

attach generic-interface-list BE20_ONLY

!

Ahora, configure la política de control de suscriptor y aplíquela en la interfaz PW-Ethernet donde el suscriptor termina.

dynamic-template

type ipsubscriber WDAAR_PWHE_DT

ipv4 verify unicast source reachable-via rx

ipv4 unnumbered Loopback44

ipv4 unreachables disable

!

!

policy-map type control subscriber IPoE_WDAAR_PWHE

event session-start match-first

class type control subscriber DHCPv4 do-until-failure

5 authorize aaa list WDAAR identifier source-address-mac password cisco

10 activate dynamic-template WDAAR_PWHE_DT

!

!

end-policy-map

interface PW-Ether20.250

ipv4 address 192.168.10.1 255.255.255.252

service-policy type control subscriber IPoE_WDAAR_PWHE

encapsulation dot1q 250

ipsubscriber ipv4 l2-connected

initiator dhcp

!

!

Verificación

Esta sección proporciona información que puede utilizar para verificar que su configuración funcione correctamente. Estos son los comandos que puede emplear para verificar que xconnect está UP/UP en ASR9K.

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect

Legend: ST = State, UP = Up, DN = Down, AD = Admin Down, UR = Unresolved,

SB = Standby, SR = Standby Ready, (PP) = Partially Programmed

XConnect                   Segment 1                       Segment 2

Group      Name       ST   Description            ST       Description            ST

------------------------   -----------------------------   -----------------------------

PWHE       ASR1K      UP   PE20                   UP       10.2.2.2         2020   UP

----------------------------------------------------------------------------------------

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect brief

AToM

Like-to-Like                        UP       DOWN        UNR

PW-Ether                           1          0          0

Total                              1          0          0

Total                                1          0          0

Total: 1 UP, 0 DOWN, 0 UNRESOLVED

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show subscriber session filter ipv4-address 192.168.44.254

Codes: IN - Initialize, CN - Connecting, CD - Connected, AC - Activated,

ID - Idle, DN - Disconnecting, ED - End

Type         Interface                State     IP Address (Vrf)

--------------------------------------------------------------------------------

IP:DHCP      PE20.250.ip1             AC        192.168.44.254 (default)

Una vez que el xconnect está ACTIVO y la sesión IPoE está online en ASR9K, puede ver que la interfaz de acceso es PW-Ether.

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show subscriber session filter ipv4-address 192.168.44.254 detail

Interface:                PW-Ether20.250.ip1

Circuit ID:               Unknown

Remote ID:                Unknown

Type:                     IP: DHCP-trigger

IPv4 State:               Up, Mon Apr 20 19:32:51 2015

IPv4 Address:             192.168.44.254, VRF: default

Mac Address:              001f.ca3f.7924

Account-Session Id:       00000068

Nas-Port:                 Unknown

User name:                001f.ca3f.7924

Formatted User name:      unknown

Client User name:         unknown

Outer VLAN ID:            250

Subscriber Label:         0x000001db

Created:                  Mon Apr 20 19:32:49 2015

State:                    Activated

Authentication:           unauthenticated

Authorization:            authorized

Access-interface: PW-Ether20.250 Policy Executed:

policy-map type control subscriber IPoE_WDAAR_PWHE

event Session-Start match-first [at Mon Apr 20 19:32:49 2015]

class type control subscriber DHCPv4 do-until-failure [Succeeded]

5 authorize aaa list WDAAR [Succeeded]

10 activate dynamic-template WDAAR_PWHE_DT [Succeeded]

Session Accounting: disabled

Last COA request received: unavailable

Ahora, verifique la conectividad de Capa 3 del suscriptor BNG sobre PWHE.

RP/0/RSP0/CPU0:ACDC-ASR9000-1#ping 192.168.44.254

Mon Feb 23 19:37:58.188 UTC

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.44.254, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/2 ms

RP/0/RSP0/CPU0:ACDC-ASR9000-1#

Troubleshoot

Esta sección proporciona información que puede utilizar para resolver problemas de configuración y verificar el estado de xconnect en ASR9K.

Comando para verificar la configuración de ASR9K

Estos comandos se pueden utilizar para verificar que la configuración es correcta en ASR9K.

- show running-configuration l2vpn

- show running-configuration int PW-Ether<Interface-Number>

- show running-configuration mpls ldp

- show running-configuration generic-interface-list

Cheque L2VPN XC's

Compruebe la conexión cruzada. El xconnect (y por lo tanto el AC y PW) tiene que estar activo. Puede emplear estos comandos para verificar el estado.

- show l2vpn xconnect summary

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect summary

Thu May 21 05:40:05.068 UTC

Number of groups: 1

Number of xconnects: 1

Up: 1  Down: 0  Unresolved: 0 Partially-programmed: 0

AC-PW: 1  AC-AC: 0  PW-PW: 0 Monitor-Session-PW: 0

Number of Admin Down segments: 0

Number of MP2MP xconnects: 0

Up 0 Down 0

Advertised: 0 Non-Advertised: 0

Number of CE Connections: 0

Advertised: 0 Non-Advertised: 0

Backup PW:

Configured   : 0

UP           : 0

Down         : 0

Admin Down   : 0

Unresolved   : 0

Standby      : 0

Standby Ready: 0

Backup Interface:

Configured   : 0

UP           : 0

Down         : 0

Admin Down   : 0

Unresolved   : 0

Standby      : 0

show l2vpn xconnect interface <Interface> detail

OR

show l2vpn xconnect detai

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect interface pw-eth20 detail

Thu May 21 05:40:55.789 UTC

Group PWHE, XC ASR1K, state is up; Interworking none

AC: PW-Ether20, state is up

Type PW-Ether

Interface-list: BE20_ONLY

Replicate status:

BE20: success

Gi0/0/1/18: success

Gi0/0/1/19: success

MTU 1500; interworking none

Internal label: 16001

Statistics:

packets: received 52970, sent 0

bytes: received 3485714, sent 0

PW: neighbor 10.2.2.2, PW ID 2020, state is up ( established )

PW class asr1k, XC ID 0xc0000001

Encapsulation MPLS, protocol LDP

Source address 10.1.1.1

PW type Ethernet, control word disabled, interworking none

PW backup disable delay 0 sec

Sequencing not set

PW Status TLV in use

MPLS         Local                          Remote

------------ ------------------------------ -----------------------------

Label        16002                          17

Group ID     0x920                          unknown

Interface    PW-Ether20                     unknown

MTU          1500                           1500

Control word disabled                       disabled

PW type      Ethernet                       Ethernet

VCCV CV type 0x2                            0x2

(LSP ping verification)        (LSP ping verification)

VCCV CC type 0x6                            0x6

(router alert label)           (router alert label)

(TTL expiry)                   (TTL expiry)

------------ ------------------------------ -----------------------------

Incoming Status (PW Status TLV):

Status code: 0x0 (Up) in Notification message

Outgoing Status (PW Status TLV):

Status code: 0x0 (Up) in Notification message

MIB cpwVcIndex: 3221225473

Create time: 21/05/2015 02:52:43 (02:48:12 ago)

Last time status changed: 21/05/2015 05:21:17 (00:19:38 ago)

Last time PW went down: 21/05/2015 03:10:45 (02:30:10 ago)

Statistics:

packets: received 52970, sent 0

bytes: received 3485714, sent 0

Comprobar la lista de interfaces

Mostrar la lista de interfaces utilizada por PWHE: debe existir y tener las interfaces adecuadas.

- show generic-interface-list name <NAME>

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show generic-interface-list name BE20_ONLY

Thu May 21 05:43:26.649 UTC

generic-interface-list: BE20_ONLY (ID: 1, interfaces: 3)

Bundle-Ether20 - items pending 0, downloaded to FIB

GigabitEthernet0/0/1/18 - items pending 0, downloaded to FIB

GigabitEthernet0/0/1/19 - items pending 0, downloaded to FIB

Number of items: 1

List is downloaded to FIB

Comprobación de PWHE utilizado por una lista de interfaces

La salida privada a continuación indica qué interfaces miembro están "activas", es decir, cuáles se han descargado a la FIB.

- show l2vpn generic-interface-list name <NAME>

- show l2vpn generic-interface-list private

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn generic-interface-list name BE20_ONLY detail

Thu May 21 05:39:04.983 UTC

Generic-interface-list: BE20_ONLY (ID: 1, interfaces: 3)

Bundle-Ether20 - items pending 0

GigabitEthernet0/0/1/18 - items pending 0

GigabitEthernet0/0/1/19 - items pending 0

Number of items: 1

PW-Ether: 20

Compruebe que MA tiene el PWHE con la información correcta

La información de la lista de interfaces, CW, tipo de VC, etc., debe configurarse correctamente en MA.

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn ma pwhe interface PW-Ether 20 private

Thu May 21 05:36:28.170 UTC

Interface: PW-Ether20   Interface State: Up, Admin state: Up

Interface handle 0x920

MTU:  1514

BW:   10000 Kbit

Interface MAC addresses (1 address):

10f3.1172.02c5

IDB is not in Replicate Linked List

IDB is not in Create Linked List

IDB is not in Attr Linked List

Opaque flags: 0xe

Flags: 0x3c

Valid  : IFH, MTU, MAC, BW

MA trace history [Num events: 32]

---------------------------------------------------

Time                Event                     Value      Sticky Many

====                =====                     ========== ====== ====

05/21/2015 02:56:05 Remove retry list         0x3        No     No

05/21/2015 02:56:05 IDB Set flag              0x3c       No     No

05/21/2015 03:08:26 IDB Set State             0x1        No     No

05/21/2015 03:08:26 IM publish attr           0x45       No     No

05/21/2015 03:08:26 IM update init-data       0x1e       No     No

05/21/2015 03:08:26 IDB Set flag              0x3c       No     No

05/21/2015 03:08:26 Remove retry list         0x3        No     No

05/21/2015 03:08:26 IDB Set flag              0x3c       No     No

05/21/2015 03:09:54 IDB Set State             0          No     No

05/21/2015 03:09:54 IM publish attr           0x45       No     No

05/21/2015 03:09:54 IM publish attr           0x52       No     No

05/21/2015 03:09:54 IM update init-data       0x1e       No     No

05/21/2015 03:09:54 IDB Set flag              0x3c       No     No

05/21/2015 03:09:54 Remove retry list         0x3        No     No

05/21/2015 03:09:54 IDB Set flag              0x3c       No     No

05/21/2015 03:09:54 Remove retry list         0x3        No     No

05/21/2015 03:09:54 IDB Set flag              0x3c       No     No

05/21/2015 03:10:45 IDB Set State             0x1        No     No

05/21/2015 03:10:45 IM publish attr           0x45       No     No

05/21/2015 03:10:45 IM update init-data       0x1e       No     No

05/21/2015 03:10:45 IDB Set flag              0x3c       No     No

05/21/2015 03:10:45 Remove retry list         0x3        No     No

05/21/2015 03:10:45 IDB Set flag              0x3c       No     No

05/21/2015 05:21:17 IDB Set State             0          No     No

05/21/2015 05:21:17 IM publish attr           0x45       No     No

05/21/2015 05:21:17 IM publish attr           0x52       No     No

05/21/2015 05:21:17 IM update init-data       0x1e       No     No

05/21/2015 05:21:17 IDB Set flag              0x3c       No     No

05/21/2015 05:21:17 Remove retry list         0x3        No     No

05/21/2015 05:21:17 IDB Set flag              0x3c       No     No

05/21/2015 05:21:17 Remove retry list         0x3        No     No

05/21/2015 05:21:17 IDB Set flag              0x3c       No     No

CLIENT MA trace history [Num events: 27]

---------------------------------------------------

Time                Event                     Value      Sticky Many

====                =====                     ========== ====== ====

05/21/2015 02:54:01 IM Notify Up              0x50049e10 No     No

05/21/2015 02:54:01 FSM state change          0x200      No     No

05/21/2015 02:54:01 FSM state change          0x2030d    No     No

05/21/2015 02:54:02 Double restart detected   0x5        No     No

05/21/2015 02:55:00 I/f created/added         0x4000540  No     No

05/21/2015 02:55:00 I/f created/added         0x4000580  No     No

05/21/2015 02:55:00 I/f created/added         0x4000540  No     No

05/21/2015 02:55:00 I/f created/added         0x4000580  No     No

05/21/2015 02:55:00 Intf list change          0x3000300  No     No

05/21/2015 02:55:00 Intf add error            0x4000540  No     No

05/21/2015 02:55:00 Intf add error            0x4000580  No     No

05/21/2015 02:55:00 FSM state change          0x30505    No     No

05/21/2015 02:55:01 Replicate result          0x13fe     No     No

05/21/2015 02:55:01 FSM state change          0x5060b    No     No

05/21/2015 02:55:01 I/f up                    0x4000580  No     No

05/21/2015 02:55:01 I/f up                    0x4000580  No     No

05/21/2015 02:55:02 I/f up                    0x4000540  No     No

05/21/2015 02:55:02 I/f up                    0x4000540  No     No

05/21/2015 02:56:05 Added to peer             0x6060606  No     No

05/21/2015 02:56:05 FSM state change          0x60704    No     No

05/21/2015 02:56:05 Fill VIMI attr            0x20002    No     No

05/21/2015 03:08:26 FSM state change          0x70605    No     No

05/21/2015 03:09:54 FSM state change          0x60704    No     No

05/21/2015 03:09:54 Fill VIMI attr            0x20002    No     No

05/21/2015 03:10:45 FSM state change          0x70605    No     No

05/21/2015 05:21:17 FSM state change          0x60704    No     No

05/21/2015 05:21:17 Fill VIMI attr            0x20002    No     No

PW-HE IDB client data

---------------------

IDB handle 0x5016db2c

Dot1q vlan: 0x81000000

Label: 16001

Remote VC label: 17

Remote PE: 10.2.2.2

Use flow-label on tx: N

L2-overhead: 0

VC-type: 5

CW: N

FSM state: 'Up'(7)

Fwding is up: Y, got route update: Y

Use OWNED_RESOURCE fwding: N

OWNED_RESOURCE fwding is up: N

OWNED_RESOURCE data&colon; 0

Replication error msg has been printed: N

VIF MA reg_handle: 50049e10

PIC array:

(nil)

Replicate retry count: 0

Configured i/f list name: 'BE20_ONLY'

From L2VPN i/f list name: 'BE20_ONLY', i/f list id: 1

L3 i/f:'Bundle-Ether20', idx=0, repl_status 1, fwding up:N, active:Y

L3 i/f:'GigabitEthernet0/0/1/18', idx=1, repl_status 1, fwding up:Y, active:Y

L3 i/f:'GigabitEthernet0/0/1/19', idx=2, repl_status 1, fwding up:Y, active:Y

List intf: 0x5016e154, PLs size:4, num in use:2

I/f:'Gi0/0/1/18', ifh:0x4000540, bundle: 0xb20, ifl idx:1, in-use:Y, misconfig:Y, in peer route:Y, VIMI active:Y

Repl:Y pending:N failed:N not supp:N, unrepl pending:N failed:N, up:Y us:3

I/f:'Gi0/0/1/19', ifh:0x4000580, bundle: 0xb20, ifl idx:2, in-use:Y, misconfig:Y, in peer route:Y, VIMI active:Y

Repl:Y pending:N failed:N not supp:N, unrepl pending:N failed:N, up:Y us:3

I/f:'', ifh:0x0, bundle: 0x0, ifl idx:0, in-use:N, misconfig:N, in peer route:N, VIMI active:N

Repl:N pending:N failed:N not supp:N, unrepl pending:N failed:N, up:N us:0

I/f:'', ifh:0x0, bundle: 0x0, ifl idx:0, in-use:N, misconfig:N, in peer route:N, VIMI active:N

Repl:N pending:N failed:N not supp:N, unrepl pending:N failed:N, up:N us:0

---------------------------------------------------

Comprobar información de resumen de PWHE

Compruebe que los contadores de la salida son correctos:

- show l2vpn pwhe summary

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn pwhe summary

Thu May 21 05:35:59.381 UTC

Number of PW-HE interfaces: 1

Up: 1  Down: 0  Admindown: 0

PW-Ether: 1

Up: 1  Down: 0  Admindown: 0

PW-IW: 0

Up: 0  Down: 0  Admindown: 0

Comprobar etiquetas

Compruebe la etiqueta en la tabla de etiquetas. Primero debe obtener las etiquetas internas de la información de xconnect con este comando.

- show l2vpn xconnect detail

a continuación, busque internal Label en el resultado y ejecute este comando show para verificar la asociación de la etiqueta y la interfaz en ASR9K.

- show mpls label table label <internal_label> detail

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show l2vpn xconnect detail

Thu May 21 05:27:11.762 UTC

Group PWHE, XC ASR1K, state is up; Interworking none

AC: PW-Ether20, state is up

Type PW-Ether

Interface-list: BE20_ONLY

Replicate status:

BE20: success

Gi0/0/1/18: success

Gi0/0/1/19: success

MTU 1500; interworking none

Internal label: 16001

Statistics:

packets: received 27293, sent 0

bytes: received 1996176, sent 0

PW: neighbor 10.2.2.2, PW ID 2020, state is up ( established )

PW class asr1k, XC ID 0xc0000001

Encapsulation MPLS, protocol LDP

Source address 10.1.1.1

PW type Ethernet, control word disabled, interworking none

PW backup disable delay 0 sec

Sequencing not set

RP/0/RSP0/CPU0:ACDC-ASR9000-1#show mpls label table label 16001 detail

Thu May 21 05:27:55.760 UTC

Table Label   Owner                        State  Rewrite

----- ------- ---------------------------- ------ -------

0     16001   L2VPN:Active                 InUse  Yes

(PW-HE, vers:0, intf=PE20)

Las sesiones/caídas de tráfico no aparecen

Si la sesión no aparece, verifique si los paquetes se descartan en NP. Puede utilizar estos comandos para ver el descarte de paquetes en NP en ASR9K.

- clear counters

- show l2vpn xconnect detail | incluir paquete

- clear controllers np counters all

- show controller np counters all

Comandos Show relacionados con BNG

Utilice estos comandos para verificar la información relacionada con BNG en ASR9K.

- show subscriber session all summary

- show subscriber manager disconnect-history unique summary

- show subscriber manager statistics debug total

- show subscriber manager statistics summary total

- show subscriber manager trace event/error

Depuraciones que se habilitarán

Si la sesión no se inició en ASR9K y no encontró ningún paquete descartado en NP, puede habilitar estos debugs en ASR9K para ver por qué la sesión no se inicia en ASR9K.

- debug l2vpn ea pwhe platform verbose

- debug l2vpn forwarding platform common all

- debug pm api location <location>

- debug pm error location <location>

- debug uidb api errors location <location>

Escalado

Si sigue teniendo algún problema, póngase en contacto con el TAC de Cisco y recopile el material técnico Show de ASR9K.

- show tech-support subscriber

- show tech-support l2vpn