Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Convenciones

Notas importantes

Configurar

Diagrama de la red

Configuraciones

Verificación

Catalyst 5500 Switch

Catalyst 5000 Switch

Troubleshoot

Información Relacionada

Introducción

Este documento proporciona configuraciones de ejemplo en Inter-Switch Link (ISL) entre un Catalyst 5500 y un Catalyst 5000 Switch, ambos con Catalyst OS (CatOS). Cualquier miembro de la familia Catalyst 5000 o 6000 que ejecute CatOS podría utilizarse en este escenario para obtener los mismos resultados.

En resumen, el link troncal es una forma de llevar el tráfico de varias VLAN a través de un link punto a punto entre dos dispositivos. Hay dos formas en las que se puede implementar el enlace troncal Ethernet:

- ISL (protocolo de enlace entre switches propietario de Cisco)

- 802.1q (norma IEEE)

Este documento sólo mostrará los archivos de configuración de los switches y el resultado de los comandos show de ejemplo relacionados. Para obtener detalles sobre cómo configurar un troncal ISL entre los switches Catalyst, refiérase a Configuración de Trunking ISL en Catalyst 5500/5000 y 6500/6000 Family Switches.

Prerequisites

Requirements

No hay requisitos específicos para este documento.

Componentes Utilizados

La información que contiene este documento se basa en las siguientes versiones de software y hardware.

- Switch Catalyst 5500 que ejecuta el software Catalyst OS 6.1(1)

- Switch Catalyst 5000 que ejecuta el software Catalyst OS 6.1(1)

The information in this document was created from the devices in a specific lab environment. If your network is live, make sure that you understand the potential impact of any command. Se eliminaron las configuraciones de todos los dispositivos con los comandos clear config all y write erase para asegurar que tuvieran una configuración predeterminada.

Convenciones

For more information on document conventions, refer to the Cisco Technical Tips Conventions.

Notas importantes

La familia Catalyst 4000 (incluidos Catalyst 2948G y Catalyst 2980G) que ejecuta CatOS sólo admite enlaces troncales 802.1Q, no enlaces ISL.

Cualquier puerto Ethernet en un miembro de la familia Catalyst 6000 admite encapsulación 802.1Q e ISL.

Según el módulo, los puertos compatibles con troncales Catalyst 5000 pueden soportar solamente la encapsulación ISL o tanto ISL como 802.1Q. La mejor manera de verificar esto es ejecutar el comando show port capabilities. La capacidad de conexión de troncal se establece en forma explícita. Por ejemplo:

cat5000> show port capabilities 3

Model                    WS-X5225R

Port                     3/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  3/1-2,3/1-4

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off,on)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(none),tx-(none)

CoS rewrite              yes

ToS rewrite              IP-Precedence

Rewrite                  no

UDLD                     yes

AuxiliaryVlan            1..1000,1025..4094,untagged,dot1p,none

SPAN                     source,destination

Asegúrese de que los modos de enlace troncal coincidan a través del link troncal. Si uno de los lados del link está configurado como troncal ISL, el otro lado del link también debe ser configurado como ISL; De manera similar, si un extremo del link está configurado como un 802.1Q, el otro lado del link también debería estar configurado como 802.1Q.

Configurar

En esta sección encontrará la información para configurar las funciones descritas en este documento.

Nota: Para encontrar información adicional sobre los comandos usados en este documento, utilice la Command Lookup Tool (sólo clientes registrados) .

Diagrama de la red

En este documento, se utiliza esta configuración de red:

Configuraciones

En este documento, se utilizan estas configuraciones:

- Catalyst 5500

- Catalyst 5000

Catalyst 5500

#version 6.1(1)

!

set option fddi-user-pri enabled

set password $2$q.J7$O5n.pwx7aEC6NHWJfXadx1

set enablepass $2$o.h/$bAxfjJ4XUA/RMUHqBr1YQ0

!

#errordetection

set errordetection portcounter enable

!

#system

set system name  cat5500

!

#frame distribution method

set port channel all distribution mac both

!

#vtp

!--- In this example, the VLAN Trunking Protocol (VTP) mode is set to be transparent. !--- Depending on your network, set the VTP mode accordingly.

set vtp mode transparent

!--- For details on VTP, refer to Configuring VTP.

set vlan 1 name default type ethernet mtu 1500 said 100001 state active

set vlan 1002 name fddi-default type fddi mtu 1500 said 101002 state active

set vlan 1004 name fddinet-default type fddinet mtu 1500 said 101004 state active stp ieee

set vlan 1005 name trnet-default type trbrf mtu 1500 said 101005 state active stp ibm

set vlan 2

set vlan 1003 name token-ring-default type trcrf mtu 1500 said 101003 state acti

ve mode srb aremaxhop 7 stemaxhop 7 backupcrf off

!

#ip

!--- IP address used for management.

set interface sc0 1 10.10.10.2/255.255.255.0 10.10.10.255

!

#set boot command

set boot config-register 0x2102

set boot system flash slot0:cat5000-sup3.6-1-1.bin

!

# default port status is enable

!

!

#module 1 empty

!

#module 2 : 2-port 1000BaseSX Supervisor

!

#module 3 empty

!

#module 4 : 24-port 10/100BaseTX Ethernet

!--- Ports 4/13-24 are assigned to VLAN 2.

set vlan 2 4/13-24

!--- The ISL trunking mode is set to on. !--- Depending on your network and requirements, set the trunking mode accordingly.

set trunk 4/1 on isl 1-1005

!--- For details on different trunking modes, refer to !--- Configuring VLAN Trunks on Fast Ethernet and Gigabit Ethernet Ports !--- Portfast has been enabled on the ports connected to the workstations.

set spantree portfast 4/2-24 enable

!--- For details on why to enable portfast, refer to !--- Using Portfast and Other Commands to Fix Workstation Startup Connectivity Delays

!

#module 5 empty

!

#module 6 empty

!

#module 7 empty

!

#module 8 empty

!

#module 9 empty

!

#module 10 empty

!

#module 11 empty

!

#module 12 empty

!

#module 13 empty

end

Catalyst 5000

#Version 6.1(1)

!

set option fddi-user-pri enabled

set password $2$J75L$Ug4163kfeHTDcLJZ/L9es1

set enablepass $2$h/BN$i3S54iNvIXknFelh6gOve0

!

#errordetection

set errordetection portcounter enable

!

#system

set system name  cat5000

!

#frame distribution method

set port channel all distribution Mac both

!

#vtp

!--- In this example, the VTP mode is set to be transparent. !--- Depending on your network and requirements, set the VTP mode accordingly.

set vtp mode transparent

!--- For details on VTP, refer to Configuring VTP.

set vlan 1 name default type ethernet mtu 1500 said 100001 state active

set vlan 1002 name fddi-default type fddi mtu 1500 said 101002 state active

set vlan 1004 name fddinet-default type fddinet mtu 1500 said 101004 state active stp IEEE

set vlan 1005 name trnet-default type trbrf mtu 1500 said 101005 state active stp IBM

set vlan 2

set vlan 1003 name token-ring-default type trcrf mtu 1500 said 101003 state acti

ve mode srb aremaxhop 7 stemaxhop 7 backupcrf off

!

#ip

!--- IP address used for management.

set interface sc0 1 10.10.10.3/255.255.255.0 10.10.10.255

!

#set boot command

set boot config-register 0x2102

set boot system flash slot0:cat5000-sup3.6-1-1.bin

!

# default port status is enable

!

!

#module 1 : 0-port Supervisor III

!

#module 2 : 12-port 10/100BaseTX Ethernet

!

#module 3 : 24-port 10/100BaseTX Ethernet

!--- Ports 3/13-24 have been assigned to VLAN 2.

set vlan 2 3/13-24

!--- The ISL trunking mode is set to on. !--- Depending on your network and requirements, set the trunking mode accordingly.

set trunk 3/1 on isl 1-1005

!--- For details on different trunking modes, refer to !--- Configuring VLAN Trunks on Fast Ethernet and Gigabit Ethernet Ports !--- Portfast has been enabled on the ports connected to the workstations.

set spantree portfast 3/2-24 enable

!--- For details on why to enable portfast, refer to !--- Using Portfast and Other Commands to Fix Workstation Startup Connectivity Delays

!

!

#module 4 : 24-port 10/100BaseTX Ethernet

!

#module 5 : 12-port 10BaseFL Ethernet

end

Verificación

En esta sección encontrará información que puede utilizar para confirmar que su configuración esté funcionando correctamente.

Ciertos comandos show, en particular show tech-support, son soportados por la Herramienta Output Interpreter (sólo clientes registrados) , que le permite ver un análisis del resultado del comando show.

Catalyst 5500 Switch

show port capabilities module/port : ejecute este comando para verificar si el puerto es capaz de trunking.

cat5500> (enable)  show port capabilities 4/1

Model                    WS-X5234

Port                     4/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  4/1-2,4/1-4

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off,on)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(none),TX(1q4t)

COs rewrite              yes

ToS rewrite              IP-Precedence

Rewrite                  no

UDLD                     yes

AuxiliaryVlan            1..1000,1025..4094,untagged,dot1p,none

SPAN                     source,destination

show port module/port : ejecute este comando para determinar el estado de un puerto determinado y si es o no troncal.

cat5500> (enable) show port 4/1

Port  Name               Status     Vlan       Level  Duplex Speed Type

----- ------------------ ---------- ---------- ------ ------ ----- ------------

4/1                     connected  trunk      normal a-full a-100 10/100BaseTX

Port  AuxiliaryVlan AuxVlan-Status

----- ------------- --------------

4/1  none          none

Port  Security Violation Shutdown-Time Age-Time Max-Addr Trap     IfIndex

----- -------- --------- ------------- -------- -------- -------- -------

4/1  disabled  shutdown             0        0        1 disabled      11

Port  Num-Addr Secure-Src-Addr   Age-Left Last-Src-Addr     Shutdown/Time-Left

----- -------- ----------------- -------- ----------------- ------------------

4/1         0                 -        -                 -        -         -

!--- Output suppressed.

show trunk: ejecute este comando para verificar el estado y la configuración de la conexión troncal.

cat5500> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

4/1      on           isl            trunking      1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

4/1      1-1005

Port      Vlans allowed and active in management domain

--------  ---------------------------------------------------------------------

4/1      1-2

Port      Vlans in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

4/1      1-2

show vtp domain: ejecute este comando para verificar la información de VTP.

cat5500> (enable) show vtp domain

Domain Name                      Domain Index VTP Version Local Mode  Password

-------------------------------- ------------ ----------- ----------- ----------

1            2           Transparent -

Vlan-count Max-vlan-storage Config Revision Notifications

---------- ---------------- --------------- -------------

6          1023             0               disabled

Last Updater    V2 Mode  Pruning  PruneEligible on Vlans

--------------- -------- -------- -------------------------

10.10.10.2      disabled disabled 2-1000

Catalyst 5000 Switch

show port capabilities module/port : ejecute este comando para verificar si el puerto es capaz de trunking.

cat5000> (enable) show port capabilities 3/1

Model                    WS-X5225R

Port                     3/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  3/1-2,3/1-4

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off,on)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(none),TX(none)

COs rewrite              yes

ToS rewrite              IP-Precedence

Rewrite                  no

UDLD                     yes

AuxiliaryVlan            1..1000,1025..4094,untagged,dot1p,none

SPAN                     source,destination

show port module/port : ejecute este comando para determinar el estado de un puerto determinado y si es o no troncal.

cat5000> (enable) show port 3/1

Port  Name               Status     Vlan       Level  Duplex Speed Type

----- ------------------ ---------- ---------- ------ ------ ----- ------------

3/1                     connected  trunk      normal a-full a-100 10/100BaseTX

Port  AuxiliaryVlan AuxVlan-Status

----- ------------- --------------

3/1  none          none

Port  Security Violation Shutdown-Time Age-Time Max-Addr Trap     IfIndex

----- -------- --------- ------------- -------- -------- -------- -------

3/1  disabled  shutdown             0        0        1 disabled      57

!--- Output suppressed.

show trunk: ejecute este comando para verificar el estado y la configuración de la conexión troncal.

cat5000> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

3/1      on           isl            trunking      1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

3/1      1-1005

Port      Vlans allowed and active in management domain

--------  ---------------------------------------------------------------------

3/1      1-2

Port      Vlans in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

3/1      1-2

show vtp domain: ejecute este comando para verificar la información de VTP.

cat5000> (enable) show vtp domain

Domain Name                      Domain Index VTP Version Local Mode  Password

-------------------------------- ------------ ----------- ----------- ----------

1            2           Transparent -

Vlan-count Max-vlan-storage Config Revision Notifications

---------- ---------------- --------------- -------------

6          1023             0               disabled

Last Updater    V2 Mode  Pruning  PruneEligible on Vlans

--------------- -------- -------- -------------------------

10.10.10.3      disabled disabled 2-1000

Troubleshoot

Actualmente, no hay información específica de troubleshooting disponible para esta configuración.

Información Relacionada

- Páginas de Soporte de Productos de LAN

- Página de Soporte de LAN Switching

- Soporte Técnico y Documentación - Cisco Systems