Contenido

Introducción

Prerequisites

Requirements

Componentes Utilizados

Convenciones

Configurar

Diagrama de la red

Configuraciones

Verificación

Troubleshoot

Información Relacionada

Introducción

Este documento describe cómo configurar un router y un ordenador central para utilizar Systems Network Architecture Switching Services (SNASw) sobre Data-Link Switching (DLSw), para conectar el flujo ascendente al mainframe y el descendente a un nodo de Unidad física (PU) 2.0 heredado. En este documento, por ejemplo, la conexión ascendente al sistema central se realiza a través de un Procesador de interfaz de canal (CIP), y el nodo PU 2.0 se conecta al sistema central a través del conducto del solicitante de unidad lógica dependiente (DLUR) establecido por SNASw.

Prerequisites

Requirements

No hay requisitos específicos para este documento.

Componentes Utilizados

La información que contiene este documento se basa en las siguientes versiones de software y hardware.

- ¿SNASw 4700 con Cisco IOS? Versión de software 12.1(7)

- CIP 7507 con Cisco IOS Software Release 12.1(7)

- Unidad física descendente (DSPU) 4700 con la versión 12.0(10) del software del IOS de Cisco

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Convenciones

Para obtener más información sobre las convenciones del documento, consulte Convenciones de Consejos Técnicos de Cisco.

Configurar

En esta sección encontrará la información para configurar las funciones descritas en este documento.

Nota: Para encontrar información adicional sobre los comandos usados en este documento, utilice la Command Lookup Tool (sólo clientes registrados) .

Diagrama de la red

En este documento, se utiliza esta configuración de red:

La DSPU sólo se utiliza para activar una PU en el Token Ring. Tenga en cuenta que el MAC remoto (rmac) al que se conecta es la dirección MAC especificada en el puerto Virtual Data-Link Control (VDLC) que se define como SNASw en Brachio.

Configuraciones

En este documento, se utilizan estas configuraciones:

- Brachio

- FEP

- Párr

- Sistema central

Se requiere una instrucción de link solamente para la conexión ascendente, y solamente se necesita una definición de puerto VDLC tanto para las conexiones ascendente como para las descendentes.

¿¿¿Brachio??? Configuración del router SNASwitch

!

version 12.1

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname brachio

!

no logging buffered

!

!

!

!

!

ip subnet-zero

no ip domain-lookup

!

cns event-service server

!

source-bridge ring-group 2

dlsw local-peer peer-id 10.64.3.195

dlsw remote-peer 0 tcp 10.64.3.194

dlsw remote-peer 0 tcp 192.168.25.18

!

!

interface TokenRing0

ip address 10.64.3.195 255.255.255.240

ip ospf authentication-key mypasswo

ring-speed 16

!

interface TokenRing1

ip address 192.168.25.19 255.255.255.240

ring-speed 16

source-bridge 200 1 2

!

snasw cpname P390.BRACHIO

snasw dlus P390.P390SSCP

snasw port PVDLC vdlc 2 mac 4000.0000.1234

snasw link LVDLC port PVDLC rmac 4000.0000.0001

!

router ospf 1

log-adjacency-changes

network 0.0.0.0 255.255.255.255 area 0

!

ip classless

no ip http server

!

!

!

line con 0

exec-timeout 0 0

transport input none

line aux 0

line vty 0 4

login

!

end

FEP ??? Configuración del router CIP

!

version 12.1

service timestamps debug datetime

service timestamps log datetime

no service password-encryption

!

hostname FEP

!

boot system flash slot0:rsp-a3jsv-mz.121-7.bin

logging buffered 64000 debugging

!

!

!

microcode CIP flash slot0:cip27-17

microcode reload

!

source-bridge ring-group 60

dlsw local-peer peer-id 10.64.3.194

dlsw remote-peer 0 tcp 10.64.3.195

!

!

interface TokenRing0/0

ip address 10.64.3.194 255.255.255.240

ip nat inside

ip ospf authentication-key pass

no ip mroute-cache

ethernet-transit-oui 90-compatible

ring-speed 16

multiring all

source-bridge 100 1 60

source-bridge spanning

llc2 local-window 127

!

!

interface Channel5/0

no ip address

no keepalive

csna 0100 40

!

interface Channel5/1

no ip address

no keepalive

shutdown

!

interface Channel5/2

no keepalive

lan TokenRing 0

source-bridge 600 1 60

adapter 0 4000.0000.0001

!

!

router ospf 1

log-adjacency-changes

redistribute static

network 0.0.0.0 255.255.255.255 area 0

default-information originate

!

!

line con 0

exec-timeout 0 0

transport input none

line aux 0

line vty 0 4

exec-timeout 0 0

password cisco

login

!

¿¿¿Para??? Configuración del router DSPU

!

version 12.0

service timestamps debug datetime msec

service timestamps log uptime

no service password-encryption

!

hostname para

!

enable secret 5 $1$py25$yYt4gnt.YlmsBH00wQW3G1

enable password parra

!

ip subnet-zero

!

source-bridge ring-group 300

dlsw local-peer peer-id 192.168.25.18

dlsw remote-peer 0 tcp 10.64.3.195

!

!

dspu vdlc 300 4000.0000.5678

dspu vdlc enable-host lsap 12

!

dspu host DPU4 xid-snd 01700004 rmac 4000.0000.1234 rsap 4 lsap 12

!

dspu vdlc start DPU4

!

!

interface TokenRing0

ip address 192.168.25.18 255.255.255.240

no ip directed-broadcast

ring-speed 16

source-bridge 200 1 300

source-bridge spanning

!

router ospf 1

network 0.0.0.0 255.255.255.255 area 0

!

ip classless

!

line con 0

exec-timeout 0 0

transport input none

line aux 0

line vty 0 4

password parra

login

!

end

Mainframe??? Configuración de VTAM

Nodo principal XCA
XCAE40R VBUILD TYPE=XCA

*/*

XPE40R    PORT CUADDR=E40,ADAPNO=0,SAPADDR=4,MEDIUM=RING,   -

DELAY=0,TIMER=30

*/*

*/* --------------------------------------- XCAE40R PERIPHERAL NODES

*/* ----------------------------------------------------------------

*/*

XGE40R   GROUP DIAL=YES,CALL=IN,ANSWER=ON,ISTATUS=ACTIVE

XGRL00    LINE

XGRP00      PU

*/*

XGRL01    LINE

XGRP01      PU

*/*

XGRL02    LINE

XGRP02      PU

*/*

XGRL03    LINE

XGRP03      PU

*/*

XGRL04    LINE

XGRP04      PU

*/*

XGRL05    LINE

XGRP05      PU

*/*

XGRL06    LINE

XGRP06      PU

Nodo principal conmutado para el punto de control SNASwitch

VBUILD TYPE=SWNET

*

*

BRACHPU  PU    ADDR=01,      NOT USED                   X

DISCNT=NO,                 WHEN TO DISCONNECT           X

ANS=CONTINUE,                                           X

ISTATUS=ACTIVE,                                         X

NETID=P390,                                             X

CPCP=YES,                                               X

CONNTYPE=APPN,                                          X

CPNAME=BRACHIO,                                         X

HPR=YES,                                                X

PUTYPE=2

*

Nodo principal conmutado para dispositivos PU2.0 conectados a través de la tubería DLUR

VBUILD TYPE=SWNET,         INCREASE # IF MORE PU        X

MAXGRP=19,                 MAX NO OF PATH GROUPS        X

MAXNO=19                   MAX NO OF 'TEL' NOS

*

*

DPU4     PU    ADDR=01,      NOT USED                   X

DISCNT=NO,                 WHEN TO DISCONNECT           X

IDBLK=017,                 **  MUST MATCH 'PU' CUST     X

IDNUM=00004,  MUST MATCH 'PU' CUST (LAST 5 OF TR ADDR!) X

IRETRY=YES,                REPOLL ON IDLE DETECT T/O  ? X

LOGAPPL=A06TSO,            INITIAL LOGON                X

MAXDATA=265,               PIU SIZE (FIXED FOR DCA CS)  X

MAXOUT=7,                  NO OF PIUS BEFORE RESPONSE ? X

MAXPATH=1,                 MAX NO OF 'DIALOUT' PATHS    X

PASSLIM=7,                 MAX NO OF CONTIG PIUS SENT ? X

USSTAB=USSS,                                            X

MODETAB=ISTINCLM,                                       X

DLOGMOD=M2782,                                          X

SSCPFM=USSSCS,                                          X

PUTYPE=2

*

*

DLU42    LU    LOCADDR=2

DLU43    LU    LOCADDR=3

DLU44    LU    LOCADDR=4

DLU45    LU    LOCADDR=5

DLU46    LU    LOCADDR=6

DLU47    LU    LOCADDR=7

*

Verificación

Esta sección proporciona información que puede utilizar para confirmar que su configuración funciona correctamente.

La herramienta Output Interpreter (sólo para clientes registrados) permite utilizar algunos comandos “show” y ver un análisis del resultado de estos comandos.

Estos ejemplos de salida del comando show muestran información de estado para los routers en la configuración de ejemplo:

para# show dspu

dspu host DPU4 Vdlc  PU STATUS Active

FRAMES RECEIVED 7 FRAMES SENT 7

LUs USED BY DSPU 0 LUs ACTIVE 0

LUs USED BY API 0 LUs ACTIVE 0

LUs ACTIVATED BY HOST BUT NOT USED 6

brachio# show snasw link

Number of links 2

SNA Links                                                            HPR

Link Name     State    Port Name   Adjacent CP Name  Node Type     Sess  Sup

---------    --------  ---------   ----------------  ------------  ----  ---

1> @I000003   Active    PVDLC      P390.DPU4         LEN Node         7  No

2> LVDLC      Active    PVDLC      P390.P390SSCP     Network Node     2  Yes

brachio# show snasw dlus

Number of Dependent LU Servers 1

SNA Dependent LU Servers

DLUS Name          Default?  Backup?  Pipe State         PUs

-----------------  --------  -------  ----------------  -------

1> P390.P390SSCP      Yes       No       Active            1

brachio# show snasw pu

Number of DLUR PUs 1

SNA DLUR PUs

PU Name    PU ID     State       DLUS Name

--------  --------  --------  -----------------

1> DPU4    01700004  Active    P390.P390SSCP

Estos ejemplos de la salida del comando display muestran el estado del Método de acceso a las telecomunicaciones virtuales (VTAM):

D NET,ID=SNASW1,E

IST097I DISPLAY ACCEPTED

IST075I NAME = SNASW1, TYPE = SW SNA MAJ NODE 231

IST486I STATUS= ACTIV, DESIRED STATE= ACTIV

IST1656I VTAMTOPO = REPORT, NODE REPORTED - YES

IST084I NETWORK RESOURCES:

IST089I BRACHPU  TYPE = PU_T2.1          , ACTIV--L--

IST1500I STATE TRACE = OFF

IST314I END

D NET,ID=XCAE40R,E

IST097I DISPLAY ACCEPTED

IST075I NAME = XCAE40R, TYPE = XCA MAJOR NODE 234

IST486I STATUS= ACTIV, DESIRED STATE= ACTIV

IST1021I MEDIUM=RING,ADAPNO= 0,CUA=0E40,SNA SAP= 4

IST654I I/O TRACE = OFF, BUFFER TRACE = OFF

IST1656I VTAMTOPO = REPORT, NODE REPORTED - YES

IST170I LINES:

IST232I XGRL00   ACTIV

IST232I XGRL01   ACTIV

IST232I XGRL02   ACTIV

IST232I XGRL03   ACTIV

IST232I XGRL04   ACTIV

IST232I XGRL05   ACTIV

IST232I XGRL06   ACTIV

IST314I END

D NET,ID=CISCOPU4,E

IST097I DISPLAY ACCEPTED

IST075I NAME = CISCOPU4, TYPE = SW SNA MAJ NODE 237

IST486I STATUS= ACTIV, DESIRED STATE= ACTIV

IST1656I VTAMTOPO = REPORT, NODE REPORTED - YES

IST084I NETWORK RESOURCES:

IST089I DPU4     TYPE = PU_T2.1          , ACTIV

IST089I DLU42    TYPE = LOGICAL UNIT     , ACTIV

IST089I DLU43    TYPE = LOGICAL UNIT     , ACTIV

IST089I DLU44    TYPE = LOGICAL UNIT     , ACTIV

IST089I DLU45    TYPE = LOGICAL UNIT     , ACTIV

IST089I DLU46    TYPE = LOGICAL UNIT     , ACTIV

IST089I DLU47    TYPE = LOGICAL UNIT     , ACTIV

IST314I END

Troubleshoot

Actualmente, no hay información específica de troubleshooting disponible para esta configuración.

Información Relacionada

- Servicios de conmutación SNA

- Página de soporte de SNAsw (SNA Switching Services)

- Soporte de la Tecnología

- Soporte de Producto

- Soporte Técnico - Cisco Systems