Table of Contents

spa112-122-232d-302d-rn-1-4-0.fm

Release Notes for Cisco Small Business SPA112/SPA122/SPA232D/SPA302D Analog Telephone Adapter Firmware Version 1.4.0

First Published: July 21, 2015

Introduction

These Release Notes describe the updates and fixes in version 1.4.0 of the Cisco Small Business SPA112/SPA122/SPA232D/SPA302D ATA firmware.

IMPORTANT

As with any firmware release, read these release notes before you upgrade the firmware. Cisco also recommends that you back up the configuration before you perform any firmware upgrade.

Software Compatibility

This firmware release 1.4.0 for SPA112/SPA122 is identical with 1.3.5p, except that release 1.4.0 supports the new RC server.

This firmware release 1.4.0 for SPA232D/SPA302D is identical with 1.3.6, except that release 1.4.0 supports the new RC server.

This firmware release 1.4.0 entails changes only to the RC SKU: SPA122-RC.

Note For all existing RC units that have already been customized remotely (factory version prior to 1.4.0): if the 1.4.0 firmware is loaded, “customer reset” will not work unless you upload its MAC address to the new RC server.

Hardware and Firmware Compatibility

The following matrix describes the hardware and firmware compatibility.

SPA112, SPA122,

SPA232D

(3 types of devices)

Model

SN Range

1.4.0 (SPA112/SPA122/SPA232D)

1.3.6 (SPA232D)

1.3.5p and 1.3.2p (SPA112/SPA122)

1.3.5, 1.3.4,

1.3.3, 1.3.2n

1.3.2 or

earlier

Device 1

(128MB Flash + New SLIC)

SPA112

CCQ18400001 to CCQ1841033K

After CCQ18500DAE

Yes

No

No

SPA122

CCQ1834031U to CCQ1834037D

CCQ1847066I to CCQ184707YA

CCQ184902ED to CCQ184904UL

CCQ184904UM to CCQ184904Y3

CCQ184904Y4 to CCQ184904Y5

After CCQ185001YH

SPA232D

After CCQ1906001V

Device 2

(128MB Flash + Old SLIC)

SPA112

CCQ175106J3 to CCQ175106OM

CCQ181607OO to CCQ181607U7

CCQ18240E34 to CCQ18400000

CCQ1841033L to CCQ18500D9K

Yes

Yes

No

SPA122

CCQ174602V3 to CCQ1746030M

CCQ181502B7 to CCQ181502GQ

CCQ182002W3 to CCQ1834031T

CCQ1834037E to CCQ18470660

CCQ184707YB to CCQ184902EC

CCQ184904UM to CCQ184904UL

CCQ184904Y4 to CCQ184904Y3

CCQ184904Y6 to CCQ185001YH

SPA232D

CCQ17100G3L to CCQ1906001U

Device 3

(32MB Flash + Old SLIC)

SPA112

Before CCQ182002W2

Yes

Yes

Yes

SPA122

Before CCQ181805KR

SPA232D

Before CCQ17100FS0

Note Do not upgrade any device to an unsupported firmware version as detailed in the Hardware and Firmware Compatibility Matrix table.

Note New SLIC devices have a label that reads S/W: Must use 1.3.5(004p) or later.

New and Changed Feature

For the Cisco SPA112/SPA122/SPA232D/SPA302D, the following changes are made in firmware version 1.4.0:

- RC server domain changes from prov.sipura.net to webapps.cisco.com

Upgrade the Firmware

Follow these instructions to upgrade the phone adapter.

Step 2 Connect one PC to its LAN port.

Step 3 Launch a web browser, and then enter the LAN IP addresses of the ATA. The default value is 192.168.15.1.

Step 4 Log in to the Configuration Utility.

in the navigation tree.

and select the location of the upgrade file that you downloaded.

button to upgrade the firmware.

Note Upgrading the firmware may take several minutes. Until the process is complete, DO NOT turn off the power, press the hardware reset button, or click the Back button in your current browser.

Caveats

Open Caveats

For SPA112/SPA122, Release 1.4.0 Open Caveats are the same as the caveats that are listed in the 1.3.5p release notes.

For SPA232D/SPA302D, Release 1.4.0 Open Caveats are the same as the caveats that are listed in the 1.3.6 release notes.

The following additional caveat applies.

Identifier

Description

CSCuq06381

Need power cycle after custom reset to get the new config on RC.

Resolved Caveats

There are no resolved caveats for this release.

Behavior During Times of Network Congestion

Anything that degrades network performance can affect voice and video quality, and in some cases, can cause a call to drop. Sources of network degradation can include, but are not limited to, the following activities:

- Administrative tasks, such as an internal port scan or security scan

- Attacks that occur on your network, such as a Denial of Service attack

To reduce or eliminate any adverse effects to the devices, schedule administrative network tasks during a time when the devices are not being used or exclude the devices from testing.

Documentation, Service Requests, and Additional Information

Obtain Documentation and Submit a Service Request

.

, which lists all new and revised Cisco technical documentation as an RSS feed and delivers content directly to your desktop using a reader application. The RSS feeds are a free service.

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: www.cisco.com/go/trademarks . Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1110R)

Any Internet Protocol (IP) addresses and phone numbers used in this document are not intended to be actual addresses and phone numbers. Any examples, command display output, network topology diagrams, and other figures included in the document are shown for illustrative purposes only. Any use of actual IP addresses or phone numbers in illustrative content is unintentional and coincidental.

© 2015 Cisco Systems, Inc. All rights reserved.