Chapter 1. Compatibility Matrix

- Revision History

- Overview

- Deprecation Announcement for Cisco UCS Invicta

- Supported Languages

- Supported Git Repositories

- Virtualization Support

- Third-Party Authentication Software Support

- Server Support

- Network and Fabric Support

- Security and Firewall Support

- Storage Support

- Hyperconverged Infrastructure Support

- Converged Infrastructure Software Support

- PowerShell Support

- Cisco Solution Partner - Certified Support

- Communications, Services, and Additional Information

Revision History

Release

Date

Description

Cisco UCS Director 6.9(0.0)

May 7, 2024

Updated the Microsoft Active Directory and the Cisco Identity Services Engine (Cisco ISE), see Third-Party Authentication Software Support.

Cisco UCS Director 6.9(1.0)

October 15, 2024

vMedia support for Red Hat Enterprise Linux and VMware ESXi OS installation

Updated the following Device qualification information:

- VMware vSphere Versions

- Cisco Server Support

- Cisco Network and Fabric Support

- Cisco Application Centric Infrastructure and Related Software Support

- F5 Network and Load Balancer Support

- NetApp Storage Support

- Pure Storage - Certified Support

Overview

Cisco UCS Director represents the next generation of software for the management and orchestration of data center infrastructure.

Cisco UCS Director delivers unified management and orchestration for the industry’s leading converged infrastructure solutions that are based on Cisco Unified Computing System (Cisco UCS) and Cisco Nexus. Cisco UCS Director extends the unification of compute, network, and storage layers through Cisco UCS to provide data center professionals with single pane-of-glass management and storage solution choice. Cisco UCS Director supports the industry’s leading converged infrastructure solutions, including NetApp FlexPod™ and FlexPod Express, EMC VSPEX, EMC VPLEX, and VCE Vblock™.

Cisco UCS Director automates the provisioning of resource pools across physical, virtual and baremetal environments from a unified, centralized management console reducing time-to-value for both applications and end users. Cisco UCS Director delivers native automated monitoring, OS and software updates and resource utilization analysis to free up your IT staff from mundane maintenance tasks allowing them to focus on competitive innovation for your business.

This document provides information regarding the physical and virtual devices and software supported by Cisco UCS Director. The information has been segmented into different functional areas and is organized by vendor within each functional area. We do not support hardware or software versions that have reached end of support by their vendors. There could be a delay between when a hardware model or software version reaches its end of support and its subsequent removal from this document. Support for hardware models and software versions is based on the end of support date announced by the vendor.

Deprecation Announcement for Cisco UCS Invicta

The following Cisco UCS Invicta Series Storage accounts have been deprecated:

- Cisco UCS Invicta Appliance

- Cisco UCS Invicta Scaling System

You can no longer create a new Cisco UCS Invicta account. The Cisco UCS Director Invicta Series Management Guide will also no longer be updated.

Note

For End-of-Life milestones and dates, see the End-of-Sale and End-of-Life Announcement for the Cisco UCS Invicta Series.

Supported Languages

Cisco UCS Director supports the following languages:

- English (United States)

- Japanese (Japan)

- Spanish (Latin America)

- French (France)

- Korean (Korea)

- Chinese (China)

- Russian (Russia)

Supported Git Repositories

Cisco UCS Director supports only GitHub (github.com or an enterprise GitHub instance) and Git hosting service (BitBucket). It does not support other Git hosting services such as GitLab, Perforce, or Codebase.

Virtualization Support

Cisco UCS Director enables the management and orchestration of multiple virtualization platforms.

VMware vSphere Versions

The following table outlines the versions of VMware vSphere that are supported by this release of Cisco UCS Director.

Note

Ensure proper compatibility between VMware vSphere Hypervisor and VMware vSphere vCenter Server versions as listed in the VMware vSphere compatibility matrix.

All Cisco UCS Director functionality may not be available across all supported VMware software versions. Certain features may not be available in older versions of VMware software.

Software Components

Certified Version

Supported Versions

Limitations on Support for VMware Features in Cisco UCS Director

VMware vSphere Hypervisor (ESX/ESXi)

8.0

8.0 U3

8.0 U2

8.0 U1

8.0

None

7.0

7.0 U1

7.0 U2

7.0 U3

None

VMware vSphere vCenter Server

8.0

8.0 U3

8.0 U2

8.0 U1

8.0

None

7.0

7.0 U1

7.0 U2

7.0 U3

None

VMware Virtual SAN

6.0

6.0

None

6.6 Patch 2

6.6, Patch 2+

None

6.2 Patch 6

6.2, Patch 6+

None

VMware Site Recovery Manager

6.1.2

8.1.2

8.1.x, 6.1.2+, 6.0.x, 5.8.x, 5.5.x

None

Note

Effective with Cisco UCS Director 6.9, VMware vSphere Hypervisor and VMware vCenter version 6.x is not supported.

Microsoft Hyper-V Versions

The following table outlines the versions of Microsoft Hyper-V that are supported by this release of Cisco UCS Director.

Note

Ensure proper compatibility between Microsoft Hyper-V and Microsoft System Center versions as listed in the Microsoft Hyper-V compatibility matrix.

All Cisco UCS Director functionality may not be available across all supported Microsoft Hyper-V software versions. Certain features may not be available in older versions of Microsoft software.

Software Components

Certified Versions

Supported Versions

Microsoft Hyper-V Hypervisor

2016

2016 Onwards

2019

2022

Microsoft System Center Virtual Machine Manager (SCVMM)

2016 Rollup 4

2016 Rollup 4+

2019 Rollup 4

2019 Rollup 4

2022 Rollup 1

2022 Rollup 2

Note

For integrations with Cisco Application Centric Infrastructure, you must use Windows 2016 R2, Rollup 4.

Effective with Cisco UCS Director 6.9, Hyper-V Hypervisor 2012 and System Center Virtual Machine Manager 2012 are not supported.

RedHat Enterprise Virtualization Versions

The following table outlines the versions of RedHat Enterprise Virtualization that are supported by this release of Cisco UCS Director.

Software Components

Certified Versions

Supported Versions

Red Hat Enterprise Virtualization Manager (RHEVM)

4.1.0.4-0.1.el7

4.1.xx

Red Hat Enterprise Virtualization Hypervisor (RedHat KVM)

4.1

4.1.x.x

VMware vSphere Operating System Support

Cisco UCS Director supports all guest operating systems compatible with VMware vSphere. For a complete list of VMware vSphere compatible guest operating systems, see the VMware Compatibility Guide.

Microsoft Hyper-V Operating System Support

Cisco UCS Director supports all guest operating systems compatible with Microsoft Hyper-V. For a complete list of Microsoft Hyper-V compatible guest operating systems, see the following Microsoft Hyper-V documentation:

- Windows Server 2016

- Windows Server 2019[1]

[1] Supported with Cisco Virtualization Connector Pack Release 6.7.3.1

RedHat Virtualization Operating System Support

Cisco UCS Director supports all guest operating systems supported by Red Hat Virtualization. See SUPPORTED VIRTUAL MACHINE OPERATING SYSTEMS in the Red Hat Virtual Machine Management Guide.

Bare Metal Operating System Support for Cisco UCS Servers

Cisco UCS Director and Cisco UCS Director Bare Metal Agent support VMware, Linux, and Microsoft Windows operating systems in baremetal provisioning workflows.

Cisco UCS Director 6.9(1.0) supports vMedia based OS installation for Red Hat Enterprise Linux and VMware ESXi. For more information, see the Cisco UCS Director Bare Metal Agent Installation and Configuration Guide.

The following table outlines the bare metal operating systems that are supported as of this release for Cisco UCS Director.

Operating System

Versions

Legacy-BIOS

UEFI

vMedia Support

CentOS

CentOS 6.x

√

CentOS 7.0

√

√

CentOS 7.1

√

√

CentOS 7.2

√

√

CentOS 7.3

√

CentOS 7.4

√

√

CentOS 7.5

√

√

CentOS 7.6

√

√

CentOS 7.7

√

√

CentOS 7.9[1]

√

√

CentOS 8.0[2]

√

√

VMware ESXi

ESXi 6.5

√

√

ESXi 6.7

√

√

ESXi 7.0[3]

√

√

ESXi 7.0 U3[4]

√

ESXi 8.0[5]

√

ESXi 8.0 U1[6]

√

ESXi 8.0 U2[7]

√

√

ESXi 8.0 U3[8]

√

√

VMware ESXi - vSAN

vSAN 6.5

√

√

vSAN 6.7

√

√

vSAN 7.0[9]

√

√

Microsoft Windows

Windows 2008 R2

√

Windows 2012

√

√

Windows 2012 R2

√

√

Windows 2016

√

√

Windows 2019[10]

√

√

Windows 2022[11]

√

Red Hat Enterprise Linux

RHEL 6.x

√

RHEL 7.0

√

√

RHEL 7.1

√

√

RHEL 7.2

√

√

RHEL 7.3

√

RHEL 7.4

√

√

RHEL 7.5

√

√

RHEL 7.6

√

√

RHEL 7.7[12]

√

√

RHEL 8.0[13]

√

√

RHEL 8.6[14]

√

RHEL 8.7[15]

√

RHEL 8.8[16]

√

RHEL 8.9[17]

√

RHEL 8.10[18]

√

√

RHEL 9.0[19]

√

RHEL 9.1[20]

√

RHEL 9.2[21]

√

RHEL 9.3[22]

√

√

RHEL 9.4[23]

√

√

SUSE Linux

SUSE 11 SP3 on local disk

√

SUSE 12 and later on local disk

√

√

SUSE 15 SP4 [24]

√

SUSE 15 SP5

√

[1] Supported with Cisco UCS Director Bare Metal Agent Connector Pack release 6.7.4.2

[2] Supported with Cisco UCS Director Bare Metal Agent Connector Pack release 6.7.4.2

[3] Supported with Cisco UCS Director Bare Metal Agent Connector Pack release 6.7.4.2

[4] Supported with Cisco UCS Director Release 6.8(8.0)

[5] Supported with Cisco UCS Director Release 6.8(7.0)

[6] Supported with Cisco UCS Director Release 6.8(8.0)

[7] Supported with Cisco UCS Director Release 6.9(1.0)

[8] Supported with Cisco UCS Director Release 6.9(1.0)

[9] Supported with Cisco UCS Director Bare Metal Agent Connector Pack release 6.7.4.2

[10] Supported with Cisco UCS Director Bare Metal Agent Connector Pack release 6.7.3.1

[11] Supported with Cisco UCS Director Release 6.8(7.0)

[12] Supported with Cisco UCS Director Release 6.7(4.0)

[13] Supported with Cisco UCS Director Release 6.7(4.0)

[14] Supported with Cisco UCS Director Release 6.8(7.0)

[15] Supported with Cisco UCS Director Release 6.8(8.0)

[16] Supported with Cisco UCS Director Release 6.8(8.0)

[17] Supported with Cisco UCS Director Release 6.9(1.0)

[18] Supported with Cisco UCS Director Release 6.9(1.0)

[19] Supported with Cisco UCS Director Release 6.8(7.0) and 6.8(8.0)

[20] Supported with Cisco UCS Director Release 6.8(7.0) and 6.8(8.0)

[21] Supported with Cisco UCS Director Release 6.8(7.0) and 6.8(8.0)

[22] Supported with Cisco UCS Director Release 6.9(0.0)

[23] Supported with Cisco UCS Director Release 6.9(1.0)

[24] Supported with Cisco UCS Director Release 6.8(7.0)

Note

- From Red Hat Enterprise Linux Release 8.7, support for MegaSR driver has ended and you must customize your kickstart files in the Catalogs created for deploying Red Hat Enterprise Linux Release 8.7, Red Hat Enterprise Linux Release 8.8, Red Hat Enterprise Linux Release 8.9, and Red Hat Enterprise Linux Release 8.10 using the Edit action found under OS Catalog page of Bare Metal Agent in Cisco UCS Director by removing it’s references.

- For Red Hat Enterprise Linux Release 8.x and Red Hat Enterprise Linux Release 9.x deployments to use Predictable Network Interface Names instead of traditional ethX naming scheme, you should customize your bootloader file, ipxe-uefi.cfg using the Edit action found under OS Catalog page of Bare Metal Agent in Cisco UCS Director by removing the kernel parameters net.ifnames=0 & biosdevname=0.

Note

Tip:
Predictable Network Interface Names are derived based on various attributes such as physical location, MAC address, and firmware-provided index. The specific names generated may vary depending on the system's hardware configuration and the algorithm implemented in the udev subsystem of 'systemd'.

Following are a few examples of the predictable network interface names:

Example 1: ens1f0: Derived from "Ethernet" (en), the slot number (s1), and the port number (f0) on the motherboard or network adapter.

Example 2: enp0s3: Derived from "Ethernet" (en), the PCI bus slot number (p0), and the device's position (s3) on that bus.

Bare Metal Operating System Support for Third Party Servers

Cisco UCS Director and Cisco UCS Director Bare Metal Agent support VMware, Linux, and Microsoft Windows operating systems in bare metal provisioning workflows for third party servers.

Cisco UCS Director 6.9(1.0) supports vMedia based OS installation for Red Hat Enterprise Linux and VMware ESXi. For more information, see the Cisco UCS Director Bare Metal Agent Installation and Configuration Guide.

The following table outlines the bare metal operating systems that are supported as of this release for Cisco UCS Director.

Third Party Server

Operating System

Versions

UEFI

vMedia Support

Dell Power Edge R750 Server (Generation 15)

VMware ESXi

ESXi 7.3[1]

√

ESXi 8.0[2]

√

Microsoft Windows

Windows 2019[3]

√

Windows 2022[4]

√

Red Hat Enterprise Linux

RHEL 8.6[5]

√

RHEL 9.0[6]

√

RHEL 9.1[7]

√

RHEL 9.2[8]

√

Dell Power Edge R760 Server (Generation 16)

VMware ESXi

ESXi 7.3[9]

√

ESXi 8.0[10]

√

ESXi 8.0 U1[11]

√

ESXi 8.0 U2[12]

√

√

ESXi 8.0 U3[13]

√

√

Microsoft Windows

Windows 2019[14]

√

Windows 2022[15]

√

Red Hat Enterprise Linux

RHEL 8.9[16]

√

√

RHEL 8.10[17]

√

√

RHEL 9.3[18]

√

√

RHEL 9.4[19]

√

√

HPE Proliant DL380 Gen 10+

VMware ESXi

ESXi 7.0 U3[20]

√

ESXi 8.0[21]

√

ESXi 8.0 U1[22]

√

Microsoft Windows

Windows Server 2019[23]

√

Windows Server 2022[24]

√

HPE Proliant DL380 Gen 11

VMware ESXi

ESXi 7.0 U3[25]

√

ESXi 8.0[26]

√

ESXi 8.0 U1[27]

√

ESXi 8.0 U2[28]

√

√

ESXi 8.0 U3[29]

√

√

Microsoft Windows

Windows Server 2019[30]

√

Windows Server 2022[31]

√

Red Hat Enterprise Linux

RHEL 8.9[32]

√

√

RHEL 8.10[33]

√

√

RHEL 9.3[34]

√

√

RHEL 9.4[35]

√

√

[1] Supported with Cisco UCS Director Release 6.8(7.0)

[2] Supported with Cisco UCS Director Release 6.8(7.0)

[3] Supported with Cisco UCS Director Release 6.8(7.0)

[4] Supported with Cisco UCS Director Release 6.8(7.0)

[5] Supported with Cisco UCS Director Release 6.8(7.0)

[6] Supported with Cisco UCS Director Release 6.8(7.0)

[7] Supported with Cisco UCS Director Release 6.8(7.0)

[8] Supported with Cisco UCS Director Release 6.8(7.0)

[9] Supported with Cisco UCS Director Release 6.8(7.0)

[10] Supported with Cisco UCS Director Release 6.8(7.0)

[11] Supported with Cisco UCS Director Release 6.9(1.0)

[12] Supported with Cisco UCS Director Release 6.9(1.0)

[13] Supported with Cisco UCS Director Release 6.9(1.0)

[14] Supported with Cisco UCS Director Release 6.8(7.0)

[15] Supported with Cisco UCS Director Release 6.8(7.0)

[16] Supported with Cisco UCS Director Release 6.9(1.0)

[17] Supported with Cisco UCS Director Release 6.9(1.0)

[18] Supported with Cisco UCS Director Release 6.9(1.0)

[19] Supported with Cisco UCS Director Release 6.9(1.0)

[20] Supported with Cisco UCS Director Release 6.8(8.0)

[21] Supported with Cisco UCS Director Release 6.8(8.0)

[22] Supported with Cisco UCS Director Release 6.8(8.0)

[23] Supported with Cisco UCS Director Release 6.8(8.0)

[24] Supported with Cisco UCS Director Release 6.8(8.0)

[25] Supported with Cisco UCS Director Release 6.8(8.0)

[26] Supported with Cisco UCS Director Release 6.8(8.0)

[27] Supported with Cisco UCS Director Release 6.8(8.0)

[28] Supported with Cisco UCS Director Release 6.9(1.0)

[29] Supported with Cisco UCS Director Release 6.9(1.0)

[30] Supported with Cisco UCS Director Release 6.8(8.0)

[31] Supported with Cisco UCS Director Release 6.8(8.0)

[32] Supported with Cisco UCS Director Release 6.9(1.0)

[33] Supported with Cisco UCS Director Release 6.9(1.0)

[34] Supported with Cisco UCS Director Release 6.9(1.0)

[35] Supported with Cisco UCS Director Release 6.9(1.0)

Third-Party Authentication Software Support

The following table outlines support for third party authentication software.

Software

Supported Versions

Microsoft Active Directory

Windows 2008

Windows 2012

Windows 2016

Windows 2019

Windows 2022 [1]

OpenLDAP

slapd 2.4.23 (Feb 3 2014 19:11:35) $ mockbuild@c6b10.bsys.dev.centos.org:/builddir/build/ BUILD/openldap-2.4.2 3/openldap-2.4.23/build-servers/servers/slapd

Cisco Identity Services Engine (Cisco ISE)[2]

2.7.0.356 [3]

2.4.0.357 and cumulative patches 4, 6, and 10

2.60.156 and later

3.0

3.1

3.2[4]

[1]
Supported with Cisco UCS Director Release 6.9(0.0)

[2] Supported with Cisco UCS Director Base Platform Connector Pack release 6.7.3.1

[3]
Supported with Cisco Network Devices Connector Pack Release 6.7.4.1

[4]
Supported with Cisco UCS Director Release 6.9(0.0)

Server Support

Cisco UCS Director enables the management and orchestration of multiple server platforms from various server vendors. This support information is grouped by vendor.

- Cisco Server Support

- HP Server Support

- Dell Server Support

Cisco Server Support

The following table outlines support for Cisco UCS servers and related hardware and software. Where a version includes an "x", all patches for that version are supported. For example, Release 3.0(1x) includes support for 3.0(1c), 3.0(1d) and so on.

Note

All Cisco UCS Director functionality may not be available across all supported Cisco UCS software versions. Certain features may not be available in older versions of Cisco UCS software.

The following table shows Cisco UCS Director compatibility with Cisco UCS hardware and software. This table does not reflect the compatibility between Cisco UCS hardware and software. For information regarding Cisco UCS compatibility, see the Cisco UCS hardware and software interoperability matrices for the appropriate release.

Components

Supported Models

Certified Software

Supported Software

Cisco UCS Manager

Software

All fabric interconnect, servers, and other hardware models supported by the version of Cisco UCS Manager (see the hardware and software interoperability matrices) .

Cisco UCS Infrastructure Bundle and Cisco UCS Manager Software Bundle, Release:

4.3(4c)[1]

4.3(3a)[2]

4.3(2b)[3]

4.2(3b)[4]

4.2(1l)[5]

4.1(1a)

4.0(1c)

4.0(4b)

Cisco UCS Infrastructure Bundle and Cisco UCS Manager Software Bundle, Releases:

4.3(x)

4.2(x)

4.1(x)

4.0(x)

3.2(x)

3.1(x)

3.0(x)

2.2(x)

Cisco UCS Central

Software

Cisco UCS Central Releases

2.0(1s)[6]

2.0(1f)

2.0(1t)[7]

2.0(1v)[8]

Cisco UCS Central , Releases:

2.0(x)

1.5(x)

1.4(x)

1.3(x)

1.2(x)

Cisco UCS C-Series Rack Servers (Standalone through Rack accounts)

All models supported by the firmware versions for Cisco IMC Supervisor, Release 2.2 (see the Cisco IMC Supervisor Release Notes, Release 2.2).

All software versions supported by Cisco IMC Supervisor (see the Cisco IMC Supervisor Release Notes, Release 2.2).

Cisco 8-Socket C-Series Rack Mount Servers for SAP HANA

Cisco C880 M4

Firmware versions:

BA14099

BA15013

Cisco UCS E-Series Servers (Standalone through Rack accounts)

All models supported by the firmware versions for Cisco IMC Supervisor, Release 2.2 (see the Cisco IMC Supervisor Release Notes, Release 2.2).

All software versions supported by Cisco IMC Supervisor (see the Cisco IMC Supervisor Release Notes, Release 2.2).

[1] Supported with Cisco UCS Director and Bare Metal Agent Release 6.9(1.0), for Cisco UCS X210c M7 2 Socket Compute Node and Cisco UCS X210c M6 2 Socket Compute Node server models.

[2] Supported with Cisco UCS Director and Bare Metal Agent OVA Release 6.9.0.0, for Cisco UCS C240M7(EMR) rack server.

[3] Supported with Cisco UCS Director and Bare Metal Agent OVA Release 6.9.0.0, for Cisco UCSX410 M7 4 Socket Compute Node.

[4]

- Supported with Cisco UCS Director Patch Release 6.8.6.0, for C240 M6 Rack Server and Cisco UCS B200 M6 2 Socket Blade Server.

- Supported with Bare Metal Agent Patch Release 6.8.6.0, for Cisco UCS B200 M6 2 Socket Blade Server.

- Supported with Bare Metal Agent Patch Release 6.8.7.0, for Cisco UCS M6 Rack Server.

[5] Supported with Cisco UCS Director Patch Release 6.8.3.0, for M4 and M5 server models.

[6]

- Supported with Cisco UCS Director Patch Release 6.8.8.0

[7]

- Supported with Cisco UCS Director Patch Release 6.8.8.0.

- Supported with Cisco UCS Director OVA Release 6.9.0.0.

[8] Supported with Cisco UCS Director Release 6.9(1.0).

HP Server Support

The following table outlines support for HP servers and related management software.

Components

Supported Models

Supported Software

HP Servers with HP Integrated Lights-Out 2 (iLO2)

Any HP server model or platform that supports iLO2

iLO 2.29

HP Servers with HP Integrated Lights-Out 3 (iLO3)

Any HP server model or platform that supports iLO3

iLO 1.57

HP Servers with HP Integrated Lights-Out 4 (iLO4)

Any HP server model or platform that supports iLO4

iLO 1.01

HP Servers with HP Integrated Lights-Out 5 (iLO5)

Any HP server model or platform that supports iLO5

iLO 1.37 or higher

HP Servers with HP Integrated Lights-Out 6 (iLO6)

Any HP server model or platform that supports iLO6

iLO 1.58

HP Servers with HP Onboard Administrator (OA)

HP OA chassis with c7000 blade servers

HP OA 4.3

HP OA 4.22

HP OA 3.60

Dell Server Support

The following table outlines support for Dell servers and related hardware and software.

Note

Cisco UCS Director leverages the IPMI interface on Dell servers for all management and orchestration capabilities across both blade and rack-mount form factors. Cisco UCS Director does not support any other Dell management interface as of this publication.

Components

Supported Models

Supported Software

Dell Servers with Intelligent Platform Management Interface (IPMI) 2.0

Any Dell server model that supports IPMI 2.0

IPMI 2.0

Network and Fabric Support

Cisco UCS Director enables the management and orchestration of multiple network and fabric platforms from various vendors. This support information is grouped by vendor.

- Cisco Network and Fabric Support

- Cisco Application Centric Infrastructure and Related Software Support

- Brocade Network and Fabric Support

- F5 Network and Load Balancer Support

Cisco Network and Fabric Support

The following table outlines support for Cisco network and fabric devices.

Certified models and software have been systematically tested by Cisco and are warranted to work with the listed component.

Supported models and software are fully supported by Cisco on the listed component even if not fully tested.

Note

This support includes the Nexus Operating System (NX-OS) kickstart and system software images.

Nexus support currently includes the Layer 2 feature-set only. The Layer 3 feature-set is not supported at this time.

Components

Certified Models

Supported Models

Certified Software Version

Supported Software Version

Cisco IOS Devices

C2960S

C2960S

Other devices that support the software version

IOS 15.2.2(2) E9 [1]

IOS 12.2(55)SE5

IOS 15.2.2(2) E9

IOS 12.2(55)SE5

Cisco Nexus 1000 Series Distributed Virtual Switch

Nexus 1000V for VMware vSphere

NX-OS, Release:

5.2(1)SV3(4.1c) MD

5.2(1)SV3(4.1b)[2]

5.2(1)SV3(4.1)

NX-OS, Releases:

5.2(x)SV3(x)

5.2(x)SVx(x)

4.2(x)SVx(x)

4.0(x)

Nexus 1000V for Microsoft Hyper-V

5.2(1)SM3(1.1b)

Cisco Nexus 3000 Series Data Center Switches

3064T

30xx

9.3(12)

9.3(11)

9.3(10)

9.3(7a)

9.3(4)[3]

9.2.1

NX-OS, Releases:

9.3(x)

7.0(x)Ix(x)

6.2(x)

3132Q

3172

31xx

32xx

35xx

Cisco Nexus 5000 Series Data Center Switches

5548UP

5548P

554x

NX-OS, Release:

7.3(13)N1(1)

7.3(12)N1(1)

7.3(7)N1(1b)[4]

7.3(4)N1(1)

NX-OS, Releases:

7.3(x)

7.2(x)

7.1(x)

7.0(x)

5596Q

559x

NX-OS, Release:

7.3(4)N1(1)

C5624Q

5648Q

5696Q

56128P

56xx

7.3(9)N1(1)

5672UP

56xx

7.3(9)N1(1)

7.3(13)N1(1)

Cisco Nexus 6000 Series Switches

6001

60xx

7.3(x)

7.2(x)

7.0(x)

Cisco Nexus 7000 Series Data Center Switches

(M-series I/O modules do not support Fabric Path and are not listed)

7004

70xx

NX-OS, Releases:

8.4(7)

8.4(6)

8.4(4a)

8.4(2)

8.3(1)

NX-OS, Releases:

8.4(x)

8.2(x)

8.0(x)

7.3(x)

7.2(x)

6.2(x)

7010

77xx

Cisco Nexus 9000 Series Data Center Switches (standalone mode only)

93120

93128

931xx

NX-OS, Release:

9.3(10)

9.2.1

NX-OS, Releases:

9.3(x)

7.0(3)Ix(x)

6.1(x)Ix

9332PQ

93xx

NX-OS, Release:

9.3(10)

9.3(7a)

9.3(4)[5]

9.2.1

9372PX

9372TX

937x

9.3(10)

9396PX

9396TX

NX-OS, Release:

9.3(11)

9.3(10)

7.0(3)I7(5a)

9508

9504

9.3(10)

9516

10.4(2)F

10.3(3)

10.3(2)

9.3(10)

NX-OS, Releases:

10.4(x)

10.3(x)

9.3(x)

C9336C-FX2-E

10.4(3)F

10.4(x)

Cisco MDS Data Center Fabric Switches

M9148S

M9124

M9148

M9148S

M91xx

NX-OS, Release:

8.5(1)

8.4(1a)

8.3(2)

8.3(1)

9.4(x)

9.2(x)

8.5(x)

8.4(x)

8.3(x)

8.2(x)

8.1(x)

7.3(x)

6.2(x)

M9250i

M92xx

9.4(2)

9.4(1a)

9.2(1a)

M9396S

NX-OS, Release:

8.3(2)

8.3(1)

M9396T

9.4(2)

9.2(2)

M9500

M9506

M9509

M9513

M9706

M9710

M97xx

[1] Supported with Cisco Network Devices Connector Pack Release 6.7.4.1

[2] Supported with Cisco Network Devices Connector Pack Release 6.7.4.1

[3] Supported with Cisco Network Devices Connector Pack Release 6.7.4.1

[4] Supported with Cisco Network Devices Connector Pack Release 6.7.4.1

[5] Supported with Cisco Devices Network Connector Pack Release 6.7.4.1

Cisco Application Centric Infrastructure and Related Software Support

The following table outlines support for Cisco Application Centric Infrastructure (Cisco ACI) components.

Software

Certified Versions

Supported Versions

Cisco Application Centric Infrastructure Controllers

6.0(5h)M

6.0.4(c)

6.0(2h)(F)

6.0(1j)

5.2(6e), 6.0(1g)

5.2(3g)

5.1(3e)

5.0(2h) [1]

4.2(4i) [2]

4.1(2u), and 4.2(2g) [3]

4.0(0.234g), 4.0(1h), 4.0(3d)[4]

3.2(4b)

6.0(x)

5.2(x)

5.1(x)

5.0(x)

4.2(x)

4.1(x)

4.0(x)

3.2(x), 3.2(xm)

3.1.(x), 3.1(xi), 3.1(xm)

3.0.(x)

2.(x)

1.(x)

Cisco Application Centric Infrastructure Multi-Site Controllers

4.3(1.1008)

4.2(3e)

4.1(2e)

4.1(1i)

3.7(1l), 4.0(2i)

3.5(2f)

3.1(3i)

3.0(3i) [5]

2.2(4e) [6]

2.1(2g) and 2.2(2c) [7]

2.0(0.453), 2.0(2d)[8]

1.2(4b)

4.3(1x)

4.2(3x)

4.1(2x)

4.0(x)

3.7(x)

3.5(x)

3.1(x)

3.0(x)

2.2(x)

2.1(x)

2.0(x)

1.2(x)

1.1(x)

[1] Supported with Cisco ACI APIC Connector Pack Release 6.7.4.2

[2] Supported with Cisco ACI APIC Connector Pack Release 6.7.4.1

[3] Supported with Cisco ACI APIC Connector Pack Release 6.7.3.2.

[4] Supported with Cisco ACI APIC Connector Pack Release 6.7.2.1

[5] Supported with Cisco ACI Multi-Site Connector Pack Release 6.7.4.2

[6] Supported with Cisco ACI APIC Connector Pack Release 6.7.4.1

[7] Supported with Cisco ACI Multi-Site Connector Pack Release 6.7.3.1.

[8] Supported with Cisco ACI Multi-Site Connector Pack Release 6.7.2.1

Note

Cisco ACI Multi-Site Controller is called as:

- Multi-Site Controller, in versions until 1.1(x)

- Multi-Site Orchestrator, in versions between 1.1(x) and 3.1(x)

- Nexus Dashboard Orchestrator, in versions released after 3.1(x)

Support for Related Software with Cisco ACI

The following table outlines support for related software used with Cisco ACI.

Components

Supported Hardware Versions

Supported Software Versions

Certified Device Packages

Supported Device Packages

Citrix NetScaler VPX

10.1 and later

Major Version: 1.0, Minor Version: 52.41

Major Version: 1.0, Minor Version: 10.1-129.52

Major Version 1.0, Minor Version 10.1-129.62

Major Version 10.5 Minor Version 52.1155

Citrix NetScaler SDX

8015

10.1 and later

Major Version: 1.0, Minor Version: 52.41

Major Version: 1.0, Minor Version: 10.1-129.52

Major Version 1.0, Minor Version 10.1-129.62

Major Version 10.5 Minor Version 56.22

Citrix NetScaler 1000V

10.1 and later

Major Version: 1.0, Minor Version: 52.41

Major Version: 1.0, Minor Version: 10.1-129.52

Major Version 1.0, Minor Version 10.1-129.62

Cisco ASAv

9.9.1

9.5(2)

9.6(x)

9.5(x)

9.4(x)

9.3(x)

9.2(x)

Cisco ASA

5555

9.9.1

9.5(2)

9.6(x)

9.5(x)

9.4(x)

9.3(x)

9.2(x)

5585

9.5(2)

Support for Cisco Application Virtual Switch

Component

Certified Model

Certified Software Version

Supported Software Version

Cisco Application Virtual Switch

Cisco Application Virtual Switch for VMware vSphere

5.2(1)SV3(1.20)

5.2(1)SV3(x)

Brocade Network and Fabric Support

The following table outlines support for Brocade network and fabric devices.

Components

Certified Models

Supported Models

Certified Software

Supported Software

Brocade DCX Backbone

DCX-8510

DCX85xx

v7.3.1c

7.3.x

v7.2.x

VDX Network & Fabric/Storage Switches

VDX6740

VDC67xx

v7.1.0

v7.1.x

Brocade Silkworm SAN Switches

FOS v6.3.0a

FOS6.x

F5 Network and Load Balancer Support

The following table outlines support for F5 network and load balancer devices.

Note

Remote user authentication is not supported for F5 Load Balancer with a version less than 12.0.0. To use remote authentication, you must have F5 Load Balancer 12.0.0(0.0.606) and follow the instructions provided by F5.

Components

Certified Models

Supported Models

Certified Software

Supported Software

F5 Load Balancer (physical device only)

Big-IP 2200

Big-IP VPR-B25xx

14.1.2.3[1]

13.0.0

12.1.2

11.6.1

14.x.x

13.x.x

12.x.x

11.x.x

Big-IP VPR-C2400

Virtual Device

17.1.1.2

17.1.0.2

17.x.x

[1] Supported with Cisco UCS Director F5 BIG-IP Connector Pack Release 6.7.4.1

Security and Firewall Support

Cisco UCS Director enables the management and orchestration of Cisco security and firewall platforms.

- Cisco Security and Firewall Support

Cisco Security and Firewall Support

The following table outlines support for Cisco security and firewalls.

Components

Certified Models

Supported Models

Certified Software

Supported Software

Cisco ASA 5500 Series Firewall

5510, 5515

55xx

9.12(4)

9.9.2

9.12(x)

9.6(x)

9.5(x)

9.4(x)

9.3(x)

9.2(x)

Cisco ASA 5500-X Series Firewall

5555-X

55xx-X

9.12(4)[1]

9.9.2

9.12(x)

9.6(x)

9.4(x)

9.3(x)

9.2(x)

5585-X

Cisco ASAv

Virtual

9.20.3

9.20.2

9.19.1

9.18.2

9.16.1

9.14(1)6[2]

9.9.2

9.20(x)

9.19(x)

9.18(x)

9.16(x)

9.14(x)x

9.7(x)

9.6(x)

9.5(x)

9.4(x)

9.3(x)

9.2(x)

Cisco FirePower 2110

FPR-2140

FPR-21-XX

9.20.2

9.19.1

9.18.2

9.16.1

9.10(1)

9.20x

9.16(x)

9.10(x)

Cisco FirePower 4110

FPR4K-SM-12

FPR4K-XX

9.18.3

9.18.2

9.16.1

9.15(1)

9.16(x)

9.15(x)

Cisco Virtual Security Gateway

4.2(1)VSG2(1.1)

4.2.x

Cisco Prime Network Services Controller

3.4.1*

3.4.x

[1] Supported with Cisco Network Devices Connector Pack Release 6.7.4.1

[2] Supported with Cisco Network Devices Connector Pack Release 6.7.4.1

Storage Support

Cisco UCS Director enables the management and orchestration of multiple storage platforms from various vendors. This support information is grouped by vendor.

- EMC Storage Support

- NetApp Storage Support

- IBM Storwize Storage Support

- Hyperconverged Storage Support

EMC Storage Support

The following table outlines support for EMC storage devices.

Components

Supported Models

Certified Software

Supported Software

Supported Management Interfaces

PowerMax[1]

PowerMax_2000

PowerMax_8000

Enginuity:

5978.221.221

Symmetrix CLI (symcli):

9.0.0.0

9.1.0.0

9.2.0.0

Linux-based Solutions Enabler v9.0.

Windows-based Solutions Enabler v9.0, v9.1, v9.2.

VMAX All Flash

VMAX 250F

VMAX 450F

VMAX 850F

VMAX 950F

Enginuity:

5978.221.221

Symmetrix CLI (symcli):

9.0.0.0

Windows-based Solutions Enabler v9.0.

Symmetrix VMAX (block only)

VMAX 10K

VMAX 40K

Enginuity:

5876.309.196

Symmetrix CLI (symcli):

8.3.0.22

Enginuity:

5876.x.x

Symmetrix CLI (symcli):

v7.5.1.0

v7.6.1.0

v8.0.2.0

8.1.0.24

8.2.0.18

8.3.0.x

Linux-based Solutions Enabler:

v7.5

v7.6

v8.0

v8.1.0.24

v8.2.0.18

v8.3.0.22

v8.4.0.9

Windows-based Solutions Enabler:

v 8.0

8.1.0.24

8.2.0.18

8.3.0.22

8.4.0.9

Symmetrix VMAX3

VMAX 100K

VMAX 200K

VMAX 400K

Enginuity:

5977.1125.1125

Symmetrix CLI (symcli):

8.3.0.22

Enginuity:

5977.x.x

Symmetrix CLI (symcli):

v8.0.2.0

v8.1.0

v8.1.0.24

v8.2.0.18

v8.3.0.x

v8.4.0.9

Linux-based Solutions Enabler v8.0

Linux-based Solutions Enabler v8.1.0

v8.1.0.24

v8.2.0.18

v8.3.0.22

v8.4.0.9

Windows-based Solutions Enabler:

v8.0

v8.1.0

v8.1.0.24

v8.2.0.18

v8.3.0.22

v8.4.0.9

VNX2 (File, Block, Unified)

VNX 5200

VNX 5400

VNX 5600

VNX 5800

VNX 7600

VNX 8000

File: Operating Environment (OE)

v8.1.9.217

Block: Flare OS

05.33.009.5.218

File: Operating Environment (OE)

v8.1.0

v8.1.0.15

v8.1.9.x

Block: Flare OS

05.33.009.5.x

Navisphere naviseccli:

Revision 7.33.9.1.55 (certified)

Revision 7.33.9.1.84 (supported)

VM: CentOS 6.4

NaviCLI installed on one of the following:

CentOS 6.4

Windows 2008

VPLEX

Local

6.0.1.07.00.44

v5.2.1.01.00.02

v5.3.0.01.00.04

v5.4

v6.0.1.01.00.04 (6.0 Service Pack 1, Patch 1)

v6.0.1.07.00.x

Metro

6.0.1.07.00.44

v5.2.1.01.00.02

v5.3.0.01.00.04

v5.4

v6.0.1.01.00.04 (6.0 Service Pack 1, Patch 1)

v6.0.1.07.00.x

VNXe

VNXe-3200

3.1.5.8711957

v3.0.1.4029529

v3.1.5.x

v3.1.8.9340299

RecoverPoint

RecoverPoint EX

5.1.0.1

4.0.2

4.1.SP2.P1

4.4.SP1.P1

5.0SP1

5.1.0.x

RecoverPoint Cluster

5.1.0.1

4.4 SP1

5.1.0.x

Isilon

S200-2U-Dual-24GB- 2x1GE-2x10GE SFP+-7373GB

X200-2U-Single-6144MB- 2x1GE-2x10GE SFP+-6144GB

NL400-4U-Dual-12GB- 4x1GE-36TB

7.2.1.5

7.1.0.0

7.2.0.3

7.2.1.x

EMC Unity

UnityOS:

4.3.1.1525703027

UnityOS:

4.1.1.9138882

4.3.0.1522077968

4.3.1.x

XtremIO

XIOS

4.0.25-27

4.0.15

4.0.25-x

XMS

6.0.1 build 30

4.2.1

6.0.x

XtremIO2

XIOS

6.1.0-96

XMS

6.1.0 build 99

[1] Supported with Cisco UCS Director Release 6.7(1.0).

NetApp Storage Support

The following table outlines support for NetApp storage devices.

Note

For NetApp Data-ONTAP 7-Mode, the Cisco UCS Cisco UCS Director can connect either directly to the storage controllers or it can leverage the NetApp OnCommand Unified Manager Core to proxy the management of each storage controller.

Components

Supported Models

Certified Versions

Supported Versions

Supported Management Interfaces

NetApp FAS (Data-ONTAP 7-Mode)

NetApp FAS (Data-ONTAP 7-Mode)

Data-ONTAP 8.2.5

Data-ONTAP 8.2.x

Direct Data ONTAP Ether

NetApp FAS (Clustered Data ONTAP)

All FAS models supported by NetApp Clustered Data-ONTAP, except All Flash FAS

Data-ONTAP 9.4

Data-ONTAP 9.5[1]

Data-ONTAP 9.6[2]

Data-ONTAP 9.7[3]

Data-ONTAP 9.3

Data-ONTAP 9.4

Data-ONTAP 9.5

Data-ONTAP 9.6

Data-ONTAP 9.7

NetApp Clustered Data ONTAP- Management Logical Interface (LIF)

Netapp AFF (ALL Flash FAS ONTAP)

ALL Flash FAS

Data-ONTAP 9.4

Data-ONTAP 9.5[4]

Data-ONTAP 9.6[5]

Data-ONTAP 9.7[6]

Data-ONTAP 9.12.1

Data-ONTAP 9.13.1

Data-ONTAP 9.14.1P5

Data-ONTAP 9.3

Data-ONTAP 9.4

Data-ONTAP 9.5

Data-ONTAP 9.6

Data-ONTAP 9.7

Data-ONTAP 9.12

Data-ONTAP 9.13

Data-ONTAP 9.14

NetApp OnCommand Unified Manager Core (7-Mode only)

Software

NetApp OnCommand Data Fabric Manager 4.0

NetApp OnCommand Unified Manager Core 5.0.2 (formerly named Data Fabric Manager)

Virtual Storage Console

Plugin for VMware vCenter

4.2.1

6.0

4.2.x

6.x

[1] Supported with Cisco UCS Director Release 6.7(1.0).

[2] Supported with Cisco UCS Director Release 6.7(3.0).

[3] Supported with Cisco UCS Director Release 6.7(3.0).

[4] Supported with Cisco UCS Director Release 6.7(1.0).

[5] Supported with Cisco UCS Director Release 6.7(3.0).

[6] Supported with Cisco UCS Director Release 6.7(3.0).

Important

After the Cisco UCS Director release 6.9, Cisco Engineering will no longer develop, repair, maintain, or test the NetApp FAS (Data-ONTAP 7-Mode), NetApp OnCommand Unified Manager Core (7-Mode only), and Virtual Storage Console.

IBM Storwize Storage Support

The following table outlines support for IBM Storwize storage devices:

Components

Certified Versions

Supported Versions

Supported Management Interfaces

IBM Storwize V5000

7.8.1.5

SSH (Secure Shell)

IBM Storwize V7000 Unified

File: 1.6.1.0-44

Block: 7.6.0.4 (build 122.23.1602250020000)

SSH (Secure Shell)

IBM Storwize V7000

7.6.0.4 (build 122.23.1602250020000)

SSH (Secure Shell)

IBM Storwize V9000

7.8.0.2 (build 133.17.1701251545000)

8.1.2.0

SSH (Secure Shell)

IBM SAN Volume Controller

7.8.0.2 (build 133.17.1701251545000)

8.1.2.0

SSH (Secure Shell)

Hyperconverged Storage Support

The following table outlines support for hyperconverged storage.

Components

Certified Host

Supported Host (Cisco UCS C-Series Rack Servers)

Certified Software

Supported Software

Cisco VSAN Ready Node

C240 M3

C240 M3

VMware VSAN 6.7

VMware VSAN 6.0, with VMware vSphere 6.5

VMware VSAN 6.0 (backward compatibility features of VSAN 5.5), with VMware vSphere 6.0 Update1

C240 M4

C240 M4

VMware VSAN 7.0, with VMware vSphere 7.0

VMware VSAN 6.0, with VMware vSphere 6.5

VMware VSAN 6.0 (backward compatibility features of VSAN 5.5), with VMware vSphere 6.0 Update1

Hyperconverged Infrastructure Support

Cisco UCS Director supports hyperconverged infrastructure. This support information is grouped by vendor.

- Cisco HyperFlex System Support

Cisco HyperFlex System Support

The following table outlines support for Cisco HyperFlex System and related hardware and software.

Components

Supported Models

Certified Software

Supported Software

Cisco HX-Series Server

All compatible hardware for the listed certified and supported Cisco HX Data Platform software (see Cisco HyperFlex HX Data Platform)

Note

Hyperflex support is available only for VMware clusters. For HyperV clusters, Hyperflex is not supported.

Cisco HX Data Platform, 3.0.1f-29833

Cisco HX Data Platform, 3.5.2a-31601[1]

Cisco HX Data Platform, 4.0.2a[2]

Cisco HX Data Platform, 4.5.2c

Cisco HX Data Platform, 5.0.2b

Cisco HX Data Platform, 3.5

Cisco HX Data Platform, 4.0[3]

Cisco HX Data Platform, 4.5

[1] Supported with Cisco HyperFlex Connector Pack Release 6.7.2.1

[2] Supported with Cisco HyperFlex Connector Pack Release 6.7.4.1

[3] Supported with Cisco HyperFlex Connector Pack Release 6.7.2.1

Converged Infrastructure Software Support

Cisco UCS Director supports software designed for converged infrastructure. This support information is grouped by vendor.

- VCE Software Support

VCE Software Support

The following table outlines support for VCE converged infrastructure software.

Components

Supported Software

Vision Intelligent Operations

V2.5.3

PowerShell Support

Cisco UCS Director supports Microsoft Windows PowerShell for automation of the administration of system resources. This support information is grouped by PowerShell application.

- PowerShell Agent Support

- PowerShell Console Support

PowerShell Agent Support

The following table outlines support and system requirements for PowerShell Agent.

Software

Supported Versions

Windows PowerShell

5.1

5.0

4.0

3.0

Operating System

Microsoft Windows Server 2019

Microsoft Windows Server 2016

Microsoft Windows Server 2012

Microsoft Windows Server 2008 R2 64-bit

.Net Framework

4.0 (Full Package) or higher

PowerShell Console Support

The following table outlines support and system requirements for PowerShell Console.

Software

Supported Versions

Windows PowerShell

3.0

4.0

5.0

5.1

Operating System

Any version of the Windows Operating System

.Net Framework

4.0 (Full Package) or higher

Cisco Solution Partner - Certified Support

This section describes the support for integrations with and solutions for Cisco UCS Director that were developed by Cisco partners and have been tested and certified by Cisco.

The intellectual property for these solutions (developed as Cisco UCS Director Open Automation plug-in software) are owned by the partner that developed the solution. Therefore, the plug-in software is not distributed with Cisco UCS Director software from Cisco. You can download all Cisco certified solutions and plug-in software for Cisco UCS Director directly from the website of the partner who developed the plug-in. You can also contact the sales team for the partner or its vendor for more information. Cisco UCS Director customers can also log in to the Technology Solution Catalog on Cisco Market Place and search on the partner name for more information about feature support and benefits.

- Hitachi Vantara - Certified Support

- Pure Storage - Certified Support

Hitachi Vantara - Certified Support

The following table outlines support for integrations with Cisco UCS Director that were developed by Hitachi Vantara and have been tested and validated by Cisco. This solution is available for download from Hitachi Vantara. Additional information about the solution is available on the Hitachi Storage Connector page on Cisco Marketplace.

Solution Name

Solution Version

Supported Models

Supported Software/Firmware Versions

Hitachi Storage Connector for Cisco UCS Director

v2.1.3

v2.2[1]

v2.3

v2.3.1[2]

VSP

70-06-63-00/00 [3]

VSP 5500, VSP 5500H, VSP 5100, VSP 5100H

90-01-51-00/00

VSP F1500, VSP G1000, VSP G1500

80-06-70-00/00

VSP F400, VSP F600, VSP F800, VSP G200, VSP G400, VSP G600, VSP G800

83-05-31-x0/00

VSP F350, VSP F370, VSP F700, VSP F900, VSP G130, VSP G150, VSP G350, VSP G370, VSP G700, VSP G900

88-03-26-x0/00

VSP Gx00 Unified (G400, G600, G800)

83-05-31-x0/00

[1] Supported with Cisco UCS Director Release 6.7(3.0)

[2] Supported with Cisco UCS Director Release 6.7(3.0)

[3] Cisco UCS Director Release 6.7(3.0) is certified with 70-06-28-00/00 and 70-06-65/00

Pure Storage - Certified Support

The following table outlines support for integrations with Cisco UCS Director that were developed by Pure Storage and have been tested and validated by Cisco. Additional information about the solution and a link to download the solution are available on the Pure Storage Connector for UCS Director page on Cisco Marketplace.

Solution Name

Solution Version

Components

Supported Models

Supported Software

Pure Storage Connector for Cisco UCS Director

v03.1.0

Pure Storage FlashArray

FlashArray //M

FlashArray //X

Purity Operating Environment, Releases:

4.x

5.x

6.x (version: 6.6.5)

Communications, Services, and Additional Information

- To receive timely, relevant information from Cisco, sign up at Cisco Profile Manager.

- To get the business impact you’re looking for with the technologies that matter, visit Cisco Services.

- To submit a service request, visit Cisco Support.

- To discover and browse secure, validated enterprise-class apps, products, solutions and services, visit Cisco DevNet.

- To obtain general networking, training, and certification titles, visit Cisco Press.

- To find warranty information for a specific product or product family, access Cisco Warranty Finder.

Cisco Bug Search Tool

Cisco Bug Search Tool (BST) is a web-based tool that acts as a gateway to the Cisco bug tracking system that maintains a comprehensive list of defects and vulnerabilities in Cisco products and software. BST provides you with detailed defect information about your products and software.

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: https://www.cisco.com/c/en/us/about/legal/trademarks.html. Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1721R)

Any Internet Protocol (IP) addresses and phone numbers used in this document are not intended to be actual addresses and phone numbers. Any examples, command display output, network topology diagrams, and other figures included in the document are shown for illustrative purposes only. Any use of actual IP addresses or phone numbers in illustrative content is unintentional and coincidental.