Date Identified

February 12, 2017

Date Resolved

N/A

Products Affected

Model

Firmware Version

SG350X, Sx550X

2.2.0.x

Problem Description

When using the Remote Switched Port Analyzer (RSPAN) function, if traffic is simultaneously forwarded to a destination port due to a mirror operation and another operation (such as regular forwarding), not all traffic is mirrored to the RSPAN destination port.

Workaround

There is no workaround.