Date Identified

May 23, 2017

Date Resolved

June 12, 2017

Product Affected

Model

Firmware Version

Fixed In

SG350XG

2.2.0.x

2.2.0.66

Problem Description

The Queue Statistics counters are not updated properly. The packet size is calculated based on the packet size on ingress although the statistics are egress statistics.

Resolution

This issue is fixed when you upgrade to the firmware version 2.2.0.66. To upgrade, click here for instructions.