Date Identified

May 23, 2017

Date Resolved

N/A

Product Affected

Model

Firmware Version

SG350XG

2.2.0.x

Problem Description

When selecting multiple devices on which to upgrade and checking the Reboot devices after download check box via Smart Network Application (SNA), the success prompt appears even before the operation gets completed on all devices.

Current Status

There is no known workaround.