Date Identified

August 19, 2016

Date Resolved

June 5, 2017

Product Affected

Model

Firmware Version

Fixed In

SG350XG

2.2.0.x

2.3.0.130

Problem Description

Viewing Smart Network Application (SNA) network topology on a switch fails when logging in with an IPv6 address using Microsoft Edge browser on a Windows 10.

Resolution

This issue is fixed when you upgrade to the firmware version 2.3.0.130. To upgrade, click here for instructions.