Contents

Introduction

Secure Endpoint Linux connectors exclusions in F-Secure 11.10.68 on CentOS 7.4.1708

Introduction

Some antivirus products need to be configured to be compatible with the Secure Endpoint Linux connector.

Secure Endpoint Linux connectors exclusions in F-Secure 11.10.68 on CentOS 7.4.1708

1. Configure F-Secure command line for standalone mode.

2. Configure F-Secure to exclude /opt/cisco/amp and all sub-directories from scanning.

3. Configure F-Secure to add file-access operations by the following programs to an allow list:

- /opt/cisco/amp/bin/ampdaemon

- /opt/cisco/amp/bin/ampupdater

- /opt/cisco/amp/bin/ampcli

- /opt/cisco/amp/bin/ampsigncheck

- /opt/cisco/amp/bin/ampsupport

4. Configure Secure Endpoint to exclude the following directories and sub-directories:

- /etc/opt/f-secure

- /opt/f-secure

- /var/opt/f-secure