Contents

Introduction

NCS5500 SATA FPD does not Upgrade with Auto FPD Upgrade

Introduction

This document describes the problems that occur when Network Convergence System 5500 (NCS5500) Serial ATA (SATA) Field Programmable Device (FPD) does not upgrade with Auto FPD Upgrade. When you upgrade to releases 6.3.3/6.5.1/7.0.1 or higher from a prior release and use the auto upgrade feature, some drives for some cards might not be upgraded.

It starts from the the aforementioned releases. The SATA FPD upgrade capability was added along with a new firmware version for some SATA types (Micron). In the case of these releases the new version is 5.00 whereas 3.00 was the old FPD version.

NCS5500 SATA FPD does not Upgrade with Auto FPD Upgrade

Here are the steps to reproduce the issue and how to upgrade the SATA. Note that there is no need to reload the card after you upgrade its FPD.

sysadmin-vm:0_RP0(config)# fpd auto-upgrade enable

sysadmin-vm:0_RP0(config)# commit

Wed Sep  12 15:57:26.892 UTC

Commit complete.

sysadmin-vm:0_RP0(config)# exit

Wed Sep  12 15:57:28.187 UTC

sysadmin-vm:0_RP0# exit

Wed Sep  12 15:57:30.101 UTC

RP/0/RP0/CPU0:router#conf t

Wed Sep 12 10:57:32.154 CDT

RP/0/RP0/CPU0:router(config)#fpd auto-upgrade enable

RP/0/RP0/CPU0:router(config)#commit

<after install activate and reload>

RP/0/RP0/CPU0:router#show hw-module fpd

Wed Sep 12 11:51:32.195 CDT

FPD Versions

=================

Location   Card type        HWver FPD device       ATR Status   Running Programd

------------------------------------------------------------------------------

0/0       NC55-36X100G-S    1.2   MIFPGA               CURRENT    0.07    0.07

0/0       NC55-36X100G-S    1.2   Bootloader           CURRENT    1.13    1.13

0/0       NC55-36X100G-S    1.2   IOFPGA               CURRENT    0.11    0.11

0/0       NC55-36X100G-S    1.2   SATA                 NEED UPGD  3.00    3.00

0/RP0     NC55-RP           1.1   Bootloader           CURRENT    9.25    9.25

0/RP0     NC55-RP           1.1   IOFPGA               CURRENT    0.09    0.09

0/RP1     NC55-RP           1.1   Bootloader           CURRENT    9.25    9.25

0/RP1     NC55-RP           1.1   IOFPGA               CURRENT    0.09    0.09

0/FC0     NC55-5504-FC      1.0   Bootloader           CURRENT    1.75    1.75

0/FC0     NC55-5504-FC      1.0   IOFPGA               CURRENT    0.07    0.07

0/FC1     NC55-5504-FC      1.0   Bootloader           CURRENT    1.75    1.75

0/FC1     NC55-5504-FC      1.0   IOFPGA               CURRENT    0.07    0.07

0/FC2     NC55-5504-FC      1.0   Bootloader           CURRENT    1.75    1.75

0/FC2     NC55-5504-FC      1.0   IOFPGA               CURRENT    0.07    0.07

0/FC3     NC55-5504-FC      1.0   Bootloader           CURRENT    1.75    1.75

0/FC3     NC55-5504-FC      1.0   IOFPGA               CURRENT    0.07    0.07

0/FC5     NC55-5504-FC      1.0   Bootloader           CURRENT    1.75    1.75

0/FC5     NC55-5504-FC      1.0   IOFPGA               CURRENT    0.07    0.07

0/SC0     NC55-SC           2.0   Bootloader           CURRENT    1.74    1.74

0/SC0     NC55-SC           2.0   IOFPGA               CURRENT    0.10    0.10

0/SC1     NC55-SC           2.0   Bootloader           CURRENT    1.74    1.74

0/SC1     NC55-SC           2.0   IOFPGA               CURRENT    0.10    0.10

RP/0/RP0/CPU0:router# admin

Wed Sep 12 11:51:54.259 CDT

admin connected from 127.0.0.1 using console on router

sysadmin-vm:0_RP1# upgrade hw-module location 0/0 fpd ?

Possible completions:

Bootloader  IOFPGA  SATA  all

sysadmin-vm:0_RP1# upgrade hw-module location 0/0 fpd all

Wed Sep  12 16:52:07.859 UTC

sysadmin-vm:0_RP1# 0/RP1/ADMIN0:Sep 12 11:52:10.861 CDT: fpdserv[4429]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : Upgrade for the following FPDs has been committed:

0/RP1/ADMIN0:Sep 12 11:52:10.861 CDT: fpdserv[4429]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : Location           FPD name             Force

0/RP1/ADMIN0:Sep 12 11:52:10.861 CDT: fpdserv[4429]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : ==================================================

0/RP1/ADMIN0:Sep 12 11:52:10.864 CDT: fpdserv[4429]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : 0/0                SATA                 FALSE

0/RP1/ADMIN0:Sep 12 11:52:10.864 CDT: fpdserv[4429]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : 0/0                IOFPGA               FALSE

0/RP1/ADMIN0:Sep 12 11:52:10.864 CDT: fpdserv[4429]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : 0/0                Bootloader           FALSE

0/0/ADMIN0:Sep 12 11:52:16.876 CDT: sata_fpd[3179]: %INFRA-FPD_Driver-1-UPGRADE_ALERT : FPD SATA@0/0 image programming completed with UPGRADE DONE state Info: [SATA FPD upgrade Complete]

RP/0/RP0/CPU0:Sep 12 11:52:16.871 CDT: fpd-serv[427]: %PKT_INFRA-FM-3-FAULT_MAJOR : ALARM_MAJOR :FPD-NEED-UPGRADE :CLEAR :0/0:

sysadmin-vm:0_RP1#

sysadmin-vm:0_RP1#

sysadmin-vm:0_RP1#

sysadmin-vm:0_RP1# exit

Wed Sep  12 16:52:27.767 UTC

RP/0/RP0/CPU0:router#show hw-module fpd

Wed Sep 12 11:52:33.810 CDT

FPD Versions

=================

Location   Card type        HWver FPD device       ATR Status   Running Programd

------------------------------------------------------------------------------

0/0       NC55-36X100G-S    1.2   MIFPGA               CURRENT    0.07    0.07

0/0       NC55-36X100G-S    1.2   Bootloader           CURRENT    1.13    1.13

0/0       NC55-36X100G-S    1.2   IOFPGA               CURRENT    0.11    0.11

0/0       NC55-36X100G-S    1.2   SATA                 CURRENT    5.00    5.00

0/RP0     NC55-RP           1.1   Bootloader           CURRENT    9.25    9.25

0/RP0     NC55-RP           1.1   IOFPGA               CURRENT    0.09    0.09

0/RP1     NC55-RP           1.1   Bootloader           CURRENT    9.25    9.25

0/RP1     NC55-RP           1.1   IOFPGA               CURRENT    0.09    0.09

0/FC0     NC55-5504-FC      1.0   Bootloader           CURRENT    1.75    1.75

0/FC0     NC55-5504-FC      1.0   IOFPGA               CURRENT    0.07    0.07

0/FC1     NC55-5504-FC      1.0   Bootloader           CURRENT    1.75    1.75

0/FC1     NC55-5504-FC      1.0   IOFPGA               CURRENT    0.07    0.07

0/FC2     NC55-5504-FC      1.0   Bootloader           CURRENT    1.75    1.75

0/FC2     NC55-5504-FC      1.0   IOFPGA               CURRENT    0.07    0.07

0/FC3     NC55-5504-FC      1.0   Bootloader           CURRENT    1.75    1.75

0/FC3     NC55-5504-FC      1.0   IOFPGA               CURRENT    0.07    0.07

0/FC5     NC55-5504-FC      1.0   Bootloader           CURRENT    1.75    1.75

0/FC5     NC55-5504-FC      1.0   IOFPGA               CURRENT    0.07    0.07

0/SC0     NC55-SC           2.0   Bootloader           CURRENT    1.74    1.74

0/SC0     NC55-SC           2.0   IOFPGA               CURRENT    0.10    0.10

0/SC1     NC55-SC           2.0   Bootloader           CURRENT    1.74    1.74

0/SC1     NC55-SC           2.0   IOFPGA               CURRENT    0.10    0.10